目錄

簡介

必要條件

需求

採用元件

背景資訊

ISE IPSec架構

網路圖表

使用預共用金鑰配置ikev1 ipsec vpn（開箱即用）

IOS路由器CLI配置

配置介面

配置ISAKMP(IKEv1)策略

配置加密ISAKMP金鑰

為相關的VPN流量配置ACL

配置轉換集

設定密碼編譯對應並將其套用到介面

IOS最終配置

ISE 組態

配置ISE上的IP地址

向ISE上的IPSec組新增NAD

在ISE上啟用IPSEC

在ISE上設定Tacacs策略

驗證

IOS路由器

ESR

ISE

疑難排解

配置NAD和ISE 2.2之間的FlexVPN站點到站點（DVTI到SVTI）

Flex VPN設計的優勢

路由器配置

ISE上的ESR配置

FlexVPN設計注意事項

簡介

本檔案介紹如何設定TACACS IPSEC並疑難排解，以確保思科身分識別服務引擎(ISE)2.2 — 網路存取裝置(NAD)通訊的安全。TACACS流量可以使用路由器和ISE之間的站點到站點（LAN到LAN）IPSec網際網路金鑰交換版本2(IKEv2)隧道進行加密。本文檔不涉及TACACS配置部分。

必要條件

需求

思科建議您瞭解以下主題：

- ISE

- 思科路由器

- 一般IPSec概念

- 一般TACACS概念

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- 運行軟體版本15.4(3)S2的Cisco ISR4451-X路由器

- 思科身分識別服務引擎版本2.2

- Windows 7 Service Pack 1

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

背景資訊

目標是保護使用不安全的MD5雜湊、Radius和具有IPSec的TACACS的協定。需要考慮的事實很少：

- 思科ISE在隧道和傳輸模式下支援IPSec。

- 當您在Cisco ISE介面上啟用IPSec時，會在Cisco ISE和NAD之間建立IPSec隧道以保護通訊。

- 您可以定義預共用金鑰或使用X.509證書進行IPSec身份驗證。

- 可以在Eth1到Eth5介面上啟用IPSec。每個PSN只能在一個思科ISE介面上配置IPSec。

ISE IPSec架構

GE-1 ISE介面收到加密資料包後，嵌入式服務路由器(ESR)會攔截其Eth0/0介面。

interface Ethernet0/0

description e0/0->connection to external NAD

ip address 10.48.17.87 255.255.255.0

ip nat outside

ip virtual-reassembly in

no ip route-cache

crypto map radius

ESR會解密它們，並根據預配置的NAT規則執行地址轉換。傳出（傳向NAD）RADIUS/TACACS資料包被轉換為Ethernet0/0介面地址，然後進行加密。

ip nat inside source list 1 interface Ethernet0/0 overload

ip nat inside source static udp 10.1.1.2 1645 interface Ethernet0/0 1645

ip nat inside source static udp 10.1.1.2 1646 interface Ethernet0/0 1646

ip nat inside source static udp 10.1.1.2 1812 interface Ethernet0/0 1812

ip nat inside source static udp 10.1.1.2 1813 interface Ethernet0/0 1813

ip nat inside source static tcp 10.1.1.2 49 interface Ethernet0/0 49

access-list 1 permit 10.1.1.0 0.0.0.3

目的地為RADIUS/TACACS埠上Eth0/0介面的資料包應該通過Eth0/1介面轉發到10.1.1.2 ip address（ISE的內部地址）。Eth0/1的ESR配置

interface Ethernet0/1

description e0/1->tap0 internal connection to ISE

ip address 10.1.1.1 255.255.255.252

ip nat inside

ip virtual-reassembly in

no ip route-cache

內部Tap-0介面的ISE配置：

ISE22-1ek/admin# show interface | b tap0

tap0: flags=4163<UP,BROADCAST,RUNNING,MULTICAST>  mtu 1500

inet 10.1.1.2  netmask 255.255.255.252  broadcast 10.1.1.3

inet6 fe80::6c2e:37ff:fe5f:b609  prefixlen 64  scopeid 0x20<link>

ether 6e:2e:37:5f:b6:09  txqueuelen 500  (Ethernet)

RX packets 81462  bytes 8927953 (8.5 MiB)

RX errors 0  dropped 68798  overruns 0  frame 0

TX packets 105  bytes 8405 (8.2 KiB)

TX errors 0  dropped 0 overruns 0  carrier 0  collisions 0

網路圖表

本檔案中的資訊使用以下網路設定：

使用預共用金鑰配置ikev1 ipsec vpn（開箱即用）

本節介紹如何完成IOS CLI和ISE配置。

IOS路由器CLI配置

配置介面

如果尚未配置IOS路由器介面，則至少應配置WAN介面。以下是範例：

interface GigabitEthernet0/0/0

ip address 10.48.23.68 255.255.255.0

negotiation auto

no shutdown

!

確儲存在與遠端對等點的連線，該連線應用於建立站點到站點VPN隧道。您可以使用ping驗證基本連線。

配置ISAKMP(IKEv1)策略

若要為IKEv1連線配置ISAKMP策略，請在全域性配置模式下輸入crypto isakmp policy <priority>命令。下面是一個示例：

crypto isakmp policy 10

encr aes

hash sha256

authentication pre-share

group 16

注意：可以在參與IPSec的每個對等體上配置多個IKE策略。當IKE協商開始時，它會嘗試查詢在兩個對等體上配置的公共策略，並且從遠端對等體上指定的最高優先順序策略開始。

配置加密ISAKMP金鑰

若要設定預先共用的驗證金鑰，請在全域組態模式下輸入crypto isakmp key指令：

crypto isakmp key Krakow123 address 10.48.17.87

為相關的VPN流量配置ACL

使用擴充或命名存取清單來指定應受加密保護的流量。以下是範例：

access-list 101 permit ip 10.48.23.68 0.0.0.0 10.48.17.87 0.0.0.0

注意：用於VPN流量的ACL在NAT之後使用源和目標IP地址。

配置轉換集

要定義IPSec轉換集（安全協定和演算法的可接受組合），請在全域性配置模式下輸入crypto ipsec transform-set命令。以下是範例：

crypto ipsec transform-set SET esp-aes esp-sha256-hmac

mode transport

設定密碼編譯對應並將其套用到介面

若要建立或修改加密對映條目並進入加密對映配置模式，請輸入crypto map global configuration命令。為了完成加密對映條目，必須至少定義以下幾個方面：

- 必須定義可將受保護流量轉發到的IPsec對等路由器。以下是可以建立SA的對等路由器。要在加密對映條目中指定IPSec對等體，請輸入set peer命令。

- 必須定義可接受用於受保護流量的轉換集。若要指定可與加密對映條目一起使用的轉換集，請輸入set transform-set命令。

- 必須定義應保護的流量。要為加密對映條目指定擴展訪問清單，請輸入match address命令。

以下是範例：

crypto map MAP 10 ipsec-isakmp

set peer 10.48.17.87

set transform-set SET

match address 101

最後一步是將之前定義的加密對映集應用到介面。若要套用此功能，請輸入crypto map interface configuration指令：

interface GigabitEthernet0/0

crypto map MAP

IOS最終配置

下面是最終的IOS路由器CLI配置：

aaa group server tacacs+ ISE_TACACS

server name ISE22

!

aaa authentication login default group ISE_TACACS

aaa authorization exec default group ISE_TACACS

!

crypto isakmp policy 10

encr aes

hash sha256

authentication pre-share

group 16

!

crypto isakmp key Krakow123 address 10.48.17.87

!

crypto ipsec transform-set SET esp-aes esp-sha256-hmac

mode transport

!

crypto map MAP 10 ipsec-isakmp

set peer 10.48.17.87

set transform-set SET

match address 101

!

access-list 101 permit ip 10.48.23.68 0.0.0.0 10.48.17.87 0.0.0.0

!

interface GigabitEthernet0/0/0

ip address 10.48.23.68 255.255.255.0

negotiation auto

no shutdown

!

crypto map MAP 10 ipsec-isakmp

set peer 10.48.17.87

set transform-set SET

match address 101

!

tacacs server ISE22

address ipv4 10.48.17.87

key cisco

ISE 組態

配置ISE上的IP地址

應該從CLI在介面GE1-GE5上配置地址，不支援GE0。

interface GigabitEthernet 1

ip address 10.48.17.87 255.255.255.0

ipv6 address autoconfig

ipv6 enable

附註：在介面上配置IP地址後，應用程式重新啟動：

%更改IP地址可能導致ISE服務重新啟動

是否繼續更改IP地址？  Y/N [N]:Y

向ISE上的IPSec組新增NAD

導覽至Administration > Network Resources > Network Devices。按一下「Add」。確保配置名稱、IP地址和共用金鑰。要從NAD終止IPSec隧道，請針對IPSEC網路裝置組選擇YES。

新增NAD後，應在ISE上建立其他路由，以確保RADIUS流量通過ESR並加密：

ip route 10.48.23.68 255.255.255.255 gateway 10.1.1.1

在ISE上啟用IPSEC

導覽至Administration > System > Settings。按一下Radius，然後進一步按一下IPSEC。選擇PSN（單一/多重/全部）選擇啟用選項，選擇介面並選擇身份驗證方法。按一下「Save」。此時服務將在所選節點上重新啟動。

請注意，服務重新啟動後，ISE CLI配置顯示配置介面沒有IP地址且處於關閉狀態，預期由ESR（嵌入式服務路由器）控制ISE介面。

interface GigabitEthernet 1

shutdown

ipv6 address autoconfig

ipv6 enable

服務重新啟動後，ESR功能將啟用。要登入到ESR，請在命令列中鍵入esr:

ISE22-1ek/admin# esr

% Entering ESR 5921 shell

% Cisco IOS Software, C5921 Software (C5921_I86-UNIVERSALK9-M), Version 15.5(2)T2, RELEASE SOFTWARE (fc3)

% Technical Support: http://www.cisco.com/techsupport

% Copyright (c) 1986-2015 Cisco Systems, Inc.

Press RETURN to get started, <CTRL-C> to exit

ise-esr5921>en

ise-esr5921#

ESR隨附此加密配置，足以使ipsec隧道以預共用金鑰終止：

crypto keyring MVPN-spokes

pre-shared-key address 0.0.0.0 0.0.0.0 key Krakow123

!

crypto isakmp policy 10

encr aes

hash sha256

authentication pre-share

group 16

!

crypto isakmp policy 20

encr aes

hash sha256

authentication pre-share

group 14

!

crypto isakmp key Krakow123 address 0.0.0.0

!

crypto isakmp profile MVPN-profile

description LAN-to-LAN for spoke router(s) connection

keyring MVPN-spokes

match identity address 0.0.0.0

!

crypto ipsec transform-set radius esp-aes esp-sha256-hmac

mode tunnel

crypto ipsec transform-set radius-2 esp-aes esp-sha256-hmac

mode transport

!

crypto dynamic-map MVPN-dynmap 10

set transform-set radius radius-2

!

crypto map radius 10 ipsec-isakmp dynamic MVPN-dynmap

確保ESR具有傳送加密資料包的路由：

ip route 0.0.0.0 0.0.0.0 10.48.26.1

在ISE上設定Tacacs策略

驗證

IOS路由器

在啟動到路由器的ssh會話之前，沒有活動的VPN連線：

ISR4451#sh cry isa sa

IPv4 Crypto ISAKMP SA

dst             src             state          conn-id status

IPv6 Crypto ISAKMP SA

由於使用身份驗證源ISE 2.2，因此客戶端連線到路由器。

EKORNEYC-M-K04E:~ ekorneyc$ ssh alice@10.48.23.68

Password:

ISR4451#

一旦通道開啟，IOS會傳送一個TACACS封包，其會觸發VPN作業階段的建立，但路由器上會顯示此輸出。這確認通道的第一階段已啟動：

ISR4451#sh cry isa sa

IPv4 Crypto ISAKMP SA

dst             src             state          conn-id status

10.48.17.87     10.48.23.68     QM_IDLE           1962 ACTIVE

IPv6 Crypto ISAKMP SA

ISR4451#

階段2已啟動，封包已加密和解密：

ISR4451#sh cry ipsec sa

interface: GigabitEthernet0/0/0

Crypto map tag: MAP, local addr 10.48.23.68

protected vrf: (none)

local  ident (addr/mask/prot/port): (10.48.23.68/255.255.255.255/0/0)

remote ident (addr/mask/prot/port): (10.48.17.87/255.255.255.255/0/0)

current_peer 10.48.17.87 port 500

PERMIT, flags={origin_is_acl,}

#pkts encaps: 48, #pkts encrypt: 48, #pkts digest: 48

#pkts decaps: 48, #pkts decrypt: 48, #pkts verify: 48

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0

#pkts not decompressed: 0, #pkts decompress failed: 0

#send errors 0, #recv errors 0

local crypto endpt.: 10.48.23.68, remote crypto endpt.: 10.48.17.87

plaintext mtu 1458, path mtu 1500, ip mtu 1500, ip mtu idb GigabitEthernet0/0/0

current outbound spi: 0x64BD51B8(1690128824)

PFS (Y/N): N, DH group: none

inbound esp sas:

spi: 0xFAE51DF8(4209319416)

transform: esp-aes esp-sha256-hmac ,

in use settings ={Transport, }

conn id: 2681, flow_id: ESG:681, sibling_flags FFFFFFFF80004008, crypto map: MAP

sa timing: remaining key lifetime (k/sec): (4607998/3127)

IV size: 16 bytes

replay detection support: Y

Status: ACTIVE(ACTIVE)

inbound ah sas:

inbound pcp sas:

outbound esp sas:

spi: 0x64BD51B8(1690128824)

transform: esp-aes esp-sha256-hmac ,

in use settings ={Transport, }

conn id: 2682, flow_id: ESG:682, sibling_flags FFFFFFFF80004008, crypto map: MAP

sa timing: remaining key lifetime (k/sec): (4607997/3127)

IV size: 16 bytes

replay detection support: Y

Status: ACTIVE(ACTIVE)

outbound ah sas:

outbound pcp sas:

ISR4451#

ESR

在ESR上可以檢查相同的輸出，第一階段為up:

ise-esr5921#sh cry isa sa

IPv4 Crypto ISAKMP SA

dst             src             state          conn-id status

10.48.17.87     10.48.23.68     QM_IDLE           1002 ACTIVE

IPv6 Crypto ISAKMP SA

ise-esr5921#

階段2已啟動，資料包已成功加密和解密：

ise-esr5921#sh cry ipsec sa

interface: Ethernet0/0

Crypto map tag: radius, local addr 10.48.17.87

protected vrf: (none)

local  ident (addr/mask/prot/port): (10.48.17.87/255.255.255.255/0/0)

remote ident (addr/mask/prot/port): (10.48.23.68/255.255.255.255/0/0)

current_peer 10.48.23.68 port 500

PERMIT, flags={}

#pkts encaps: 48, #pkts encrypt: 48, #pkts digest: 48

#pkts decaps: 48, #pkts decrypt: 48, #pkts verify: 48

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0

#pkts not decompressed: 0, #pkts decompress failed: 0

#send errors 0, #recv errors 0

local crypto endpt.: 10.48.17.87, remote crypto endpt.: 10.48.23.68

plaintext mtu 1458, path mtu 1500, ip mtu 1500, ip mtu idb Ethernet0/0

current outbound spi: 0xFAE51DF8(4209319416)

PFS (Y/N): N, DH group: none

inbound esp sas:

spi: 0x64BD51B8(1690128824)

transform: esp-aes esp-sha256-hmac ,

in use settings ={Transport, }

conn id: 3, flow_id: SW:3, sibling_flags 80000000, crypto map: radius

sa timing: remaining key lifetime (k/sec): (4242722/3056)

IV size: 16 bytes

replay detection support: Y

Status: ACTIVE(ACTIVE)

inbound ah sas:

inbound pcp sas:

outbound esp sas:

spi: 0xFAE51DF8(4209319416)

transform: esp-aes esp-sha256-hmac ,

in use settings ={Transport, }

conn id: 4, flow_id: SW:4, sibling_flags 80000000, crypto map: radius

sa timing: remaining key lifetime (k/sec): (4242722/3056)

IV size: 16 bytes

replay detection support: Y

Status: ACTIVE(ACTIVE)

outbound ah sas:

outbound pcp sas:

ise-esr5921#

ISE

Live Authentication指示常規PAP_ASCII身份驗證：

捕獲在ISE的GE1介面上捕獲並使用ESP或Tacacs過濾，確認明文中沒有Tacacs，並且所有流量都加密：

疑難排解

常見VPN故障排除技術可用於排除與IPSEC相關的問題。您可以在下面找到有用的文檔：

使用PSK的站點到站點VPN的IOS IKEv2調試故障排除技術說明

適用於採用PSK的站點到站點VPN的ASA IKEv2調試

IPsec 疑難排解：瞭解和使用偵錯指令

配置NAD和ISE 2.2之間的FlexVPN站點到站點（DVTI到SVTI）

也可以使用FlexVPN保護RADIUS流量。以下示例中使用了以下拓撲：

FlexVPN的配置非常簡單。更多詳情可參閱此處：

http://www.cisco.com/c/en/us/support/docs/security/flexvpn/115782-flexvpn-site-to-site-00.html

Flex VPN設計的優勢

- 您可以在所有先前的IPsec VPN上運行Flex。大多數方案都允許以前的配置和彈性並存。

- Flex VPN基於IKEv2而不是IKEv1，這幾乎改進了協商和協定穩定性的所有方面。

- 用一個框架可以實現多種功能。

- 使用明智的預設值易於配置 — 您不需要定義策略、轉換集等，IKEv2內建的預設值合理且已更新。

路由器配置

aaa new-model

!

!

aaa group server tacacs+ ISE_TACACS

server name ISE22_VRF

ip vrf forwarding TACACS

!

aaa authentication login default group ISE_TACACS

aaa authorization exec default group ISE_TACACS

aaa authorization network default local

!

crypto ikev2 authorization policy default

route set interface Loopback0

no route set interface

!

!

crypto ikev2 keyring mykeys

peer ISE22

address 10.48.17.87

pre-shared-key Krakow123

!

!

!

crypto ikev2 profile default

match identity remote address 10.48.17.87 255.255.255.255

authentication remote pre-share (with the command authentication remote pre-share key

in place keyring is not required)

authentication local pre-share

keyring local mykeys

aaa authorization group psk list default default

!

!

ip tftp source-interface GigabitEthernet0

!

!

!

crypto ipsec profile default

set ikev2-profile default (it is default configuration)

!

!

!

interface Loopback0

ip vrf forwarding TACACS

ip address 100.100.100.100 255.255.255.0

!

interface Tunnel0

ip vrf forwarding TACACS

ip address 10.1.12.1 255.255.255.0

tunnel source GigabitEthernet0/0/0

tunnel mode ipsec ipv4

tunnel destination 10.48.17.87

tunnel protection ipsec profile default

!

interface GigabitEthernet0/0/0

ip address 10.48.23.68 255.255.255.0

negotiation auto

!

!

ip route 0.0.0.0 0.0.0.0 10.48.23.1

ip tacacs source-interface Loopback0

!

!

tacacs server ISE22_VRF

address ipv4 10.1.1.2

key cisco

!

ISR4451#

ISE上的ESR配置

ise-esr5921#sh run

Building configuration...

Current configuration : 5778 bytes

!

! Last configuration change at 17:32:58 CET Thu Feb 23 2017

!

version 15.5

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

service call-home

!

hostname ise-esr5921

!

boot-start-marker

boot host unix:default-config

boot-end-marker

!

!

!

no aaa new-model

bsd-client server url https://cloudsso.cisco.com/as/token.oauth2

clock timezone CET 1 0

mmi polling-interval 60

no mmi auto-configure

no mmi pvc

mmi snmp-timeout 180

call-home

! If contact email address in call-home is configured as sch-smart-licensing@cisco.com

! the email address configured in Cisco Smart License Portal will be used as contact email address to send SCH notifications.

contact-email-addr sch-smart-licensing@cisco.com

profile "CiscoTAC-1"

active

destination transport-method http

no destination transport-method email

!

!

!

!

!

!

!

!

!

!

!

!

ip cef

no ipv6 cef

!

multilink bundle-name authenticated

!

!

!

!

!

!

!

!

!

crypto pki trustpoint SLA-TrustPoint

enrollment pkcs12

revocation-check crl

!

!

crypto pki certificate chain SLA-TrustPoint

certificate ca 01

30820321 30820209 A0030201 02020101 300D0609 2A864886 F70D0101 0B050030

32310E30 0C060355 040A1305 43697363 6F312030 1E060355 04031317 43697363

6F204C69 63656E73 696E6720 526F6F74 20434130 1E170D31 33303533 30313934

3834375A 170D3338 30353330 31393438 34375A30 32310E30 0C060355 040A1305

43697363 6F312030 1E060355 04031317 43697363 6F204C69 63656E73 696E6720

526F6F74 20434130 82012230 0D06092A 864886F7 0D010101 05000382 010F0030

82010A02 82010100 A6BCBD96 131E05F7 145EA72C 2CD686E6 17222EA1 F1EFF64D

CBB4C798 212AA147 C655D8D7 9471380D 8711441E 1AAF071A 9CAE6388 8A38E520

1C394D78 462EF239 C659F715 B98C0A59 5BBB5CBD 0CFEBEA3 700A8BF7 D8F256EE

4AA4E80D DB6FD1C9 60B1FD18 FFC69C96 6FA68957 A2617DE7 104FDC5F EA2956AC

7390A3EB 2B5436AD C847A2C5 DAB553EB 69A9A535 58E9F3E3 C0BD23CF 58BD7188

68E69491 20F320E7 948E71D7 AE3BCC84 F10684C7 4BC8E00F 539BA42B 42C68BB7

C7479096 B4CB2D62 EA2F505D C7B062A4 6811D95B E8250FC4 5D5D5FB8 8F27D191

C55F0D76 61F9A4CD 3D992327 A8BB03BD 4E6D7069 7CBADF8B DF5F4368 95135E44

DFC7C6CF 04DD7FD1 02030100 01A34230 40300E06 03551D0F 0101FF04 04030201

06300F06 03551D13 0101FF04 05300301 01FF301D 0603551D 0E041604 1449DC85

4B3D31E5 1B3E6A17 606AF333 3D3B4C73 E8300D06 092A8648 86F70D01 010B0500

03820101 00507F24 D3932A66 86025D9F E838AE5C 6D4DF6B0 49631C78 240DA905

604EDCDE FF4FED2B 77FC460E CD636FDB DD44681E 3A5673AB 9093D3B1 6C9E3D8B

D98987BF E40CBD9E 1AECA0C2 2189BB5C 8FA85686 CD98B646 5575B146 8DFC66A8

467A3DF4 4D565700 6ADF0F0D CF835015 3C04FF7C 21E878AC 11BA9CD2 55A9232C

7CA7B7E6 C1AF74F6 152E99B7 B1FCF9BB E973DE7F 5BDDEB86 C71E3B49 1765308B

5FB0DA06 B92AFE7F 494E8A9E 07B85737 F3A58BE1 1A48A229 C37C1E69 39F08678

80DDCD16 D6BACECA EEBC7CF9 8428787B 35202CDC 60E4616A B623CDBD 230E3AFB

418616A9 4093E049 4D10AB75 27E86F73 932E35B5 8862FDAE 0275156F 719BB2F0

D697DF7F 28

quit

license udi pid CISCO5921-K9 sn 98492083R3X

username lab password 0 lab

!

redundancy

!

!

!

crypto keyring MVPN-spokes

pre-shared-key address 0.0.0.0 0.0.0.0 key Krakow123

crypto ikev2 authorization policy default

route set interface

route set remote ipv4 10.1.1.0 255.255.255.0

!

!

!

crypto ikev2 keyring mykeys

peer ISR4451

address 10.48.23.68

pre-shared-key Krakow123

!

!

!

crypto ikev2 profile default

match identity remote address 0.0.0.0

authentication remote pre-share

authentication local pre-share

keyring local mykeys

aaa authorization group psk list default default local

virtual-template 1

!

!

crypto isakmp policy 10

encr aes

hash sha256

authentication pre-share

group 16

!

crypto isakmp policy 20

encr aes

hash sha256

authentication pre-share

group 14

crypto isakmp key Krakow123 address 0.0.0.0

crypto isakmp profile MVPN-profile

description LAN-to-LAN for spoke router(s) connection

keyring MVPN-spokes

match identity address 0.0.0.0

!

!

crypto ipsec transform-set radius esp-aes esp-sha256-hmac

mode tunnel

crypto ipsec transform-set radius-2 esp-aes esp-sha256-hmac

mode transport

!

!

!

crypto dynamic-map MVPN-dynmap 10

set transform-set radius radius-2

!

!

crypto map radius 10 ipsec-isakmp dynamic MVPN-dynmap

!

!

!

!

!

interface Loopback0

ip address 10.1.12.2 255.255.255.0

!

interface Ethernet0/0

description e0/0->connection to external NAD

ip address 10.48.17.87 255.255.255.0

ip nat outside

ip virtual-reassembly in

no ip route-cache

crypto map radius

!

interface Ethernet0/1

description e0/1->tap0 internal connection to ISE

ip address 10.1.1.1 255.255.255.252

ip nat inside

ip virtual-reassembly in

no ip route-cache

!

interface Ethernet0/2

description e0/2->connection to CSSM backend license server

no ip address

ip virtual-reassembly in

no ip route-cache

!

interface Ethernet0/3

no ip address

shutdown

!

interface Virtual-Template1 type tunnel

ip unnumbered Loopback0

tunnel source Ethernet0/0

tunnel mode ipsec ipv4

tunnel protection ipsec profile default

!

ip forward-protocol nd

!

!

no ip http server

no ip http secure-server

ip nat inside source list 1 interface Ethernet0/0 overload

ip nat inside source static udp 10.1.1.2 1645 interface Ethernet0/0 1645

ip nat inside source static udp 10.1.1.2 1646 interface Ethernet0/0 1646

ip nat inside source static udp 10.1.1.2 1812 interface Ethernet0/0 1812

ip nat inside source static udp 10.1.1.2 1813 interface Ethernet0/0 1813

ip nat inside source static tcp 10.1.1.2 49 interface Ethernet0/0 49

ip route 0.0.0.0 0.0.0.0 10.48.17.1

!

!

!

access-list 1 permit 10.1.1.0 0.0.0.3

!

control-plane

!

!

!

!

!

!

!

!

!

!

!

!

line con 0

logging synchronous

line aux 0

line vty 0 4

login

transport input none

!

!

end

FlexVPN設計注意事項

- 在大多數情況下，應該在ISE的G0/1介面（即ESR的E0/0介面）上終止Radius連線。使用加密對映時，應該使用訪問清單定義相關流量，並使用SVTI — 使用路由。如果兩個路由器配置為通過Tunnel（加密）的ISE介面1和通過interface(Tunnel establishment)的ISE介面，則它將不起作用。 路由器配置也存在同樣的問題。

- 因此，相關流量（加密Radius）在路由器的Lo0介面與ISE的Tap0介面之間通訊（在這種情況下，在ESR上不需要nat）。 因此，可以設定ip route，迫使Radius流量通過通道並進行加密。

- 由於ISE的Tap0介面的IP地址是固定的(10.1.1.2)，因此可以將其置於路由器的VRF中，以確保只在TACACS中通過隧道與此IP地址進行通訊。