目錄

簡介

背景資訊

問：如何從FXOS系統產生Show Tech？

問：如何驗證和更改機箱管理IP地址、網路掩碼和網關？

問：如何執行FXOS Ping測試？

問：如何驗證帶外管理介面的Mac地址？

問：如何驗證頻外管理介面是否已開啟？

問：如何檢查FXOS路由表？

問：如何檢查FXOS ARP表？

問：如何檢查FXOS故障事件？

問：如何變更系統的主機名稱？

問：show server status Output中的「Compute Mismatch」是什麼？

問：show slot輸出中「令牌不匹配」的含義是什麼？

問：如何透過CLI設定時區、NTP和DNS？

問：如何設定智慧許可和HTTP代理？

問：如何透過CLI配置系統日誌？

問：如何在Firepower裝置上配置SNMP？

問：如何安裝/更換機箱管理器使用的SSL證書？

問：如何排除透過FPR9300機箱的流量故障？

問：如何檢視機箱Mac地址表？

問：如何檢視機箱介面MAC地址？

問：如何在FXOS Supervisor (MIO)上執行口令恢復？

問：如何在ASA或FTD邏輯裝置上執行口令恢復？

問：如何更改FXOS使用者（例如admin）的當前密碼？

問：如何降級FXOS？

問：如何降級/升級ASA邏輯裝置？

問：如何透過CLI檢查FXOS升級狀態？

問：如何從FXOS CLI重新載入邏輯裝置？

問：如何檢查FXOS機箱正常運行時間和上次重新載入的原因？

問：如何檢查FXOS上的可用磁碟空間？

問：如何將FXOS組態重設為出廠預設值？

問：如何從FXOS CLI檢查邏輯裝置的載入程式配置（分配的介面、版本等）？

問：如何檢查FXOS介面的狀態（埠型別、狀態）？

問：如何檢查機箱上的CPU和記憶體使用率？

問：如何檢查機箱介面收發器型別？

問：如何檢查模組/刀片/伺服器/網路模組資訊（硬體型別/PID/SN/記憶體/核心等）？

問：如何從FXOS GUI和CLI中刪除ASA或FTD映像？

問：如何從CLI檢查FXOS版本？

問：如何驗證FXOS上的介面MTU？

問：如何檢查已安裝的應用程式？

問：如何從FXOS CLI驗證埠通道配置？

問：如何從Show Tech Output中找到FXOS捆綁包版本？

問：MIO如何將介面資訊（增加/刪除）傳播到刀片應用(FTD、ASA)？

問：在Firepower機箱的RMA中，必須使用什麼序列號(SN)？

問：您能否在2個不同的FXOS機箱之間交換SSD1？

問：如何檢查機箱功耗？

問：如何檢查開機載入器版本？

問：如何升級引導載入程式？

問：如何停用絕對SSH超時？

問：如何捕獲發往機箱管理引擎（控制平面）的LACP資料包？

問：如何查詢SSD資訊？

問：如何設定內部交換器(FXOS)擷取？

參考資料

簡介

本文檔介紹與FXOS平台相關的常見問題。

背景資訊

Firepower可擴展作業系統(FXOS)是Firepower或安全防火牆平台上的底層作業系統。根據FXOS用於配置功能、監控機箱狀態和訪問高級故障排除功能的平台。

Firepower 4100/9300和Firepower 2100上的FXOS以及平台模式下的自適應安全裝置軟體允許配置更改，而在其他平台中，除特定功能外，FXOS是只讀的。

問：如何從FXOS系統產生Show Tech？

自2.8.x版起，fprm已棄用。因此，FXOS 2.8.x僅支援機箱和刀片顯示技術。

KSEC-FPR4115-2-1(local-mgmt)# show tech-support fprm detail

WARNING: show tech-support fprm detail command is deprecated.

Please use show tech-support chassis 1 detail command instead.

- 機箱：包含機箱、刀鋒、介面卡、基板管理控制器(BMC)和思科整合式管理控制器(CIMC)的記錄檔

- 模組：包含邏輯裝置自適應安全裝置(ASA)或Firepower威脅防禦(FTD)所在刀片/模組的日誌檔案。這包括諸如appAgent等元件的日誌)

在2.8.x之前的版本中，FXOS提供三種不同的show tech輸出。FPRM捆綁包包含管理輸入/輸出(MIO)（管理引擎）和服務管理器)的日誌檔案

通常，生成全部3個捆綁。使用show tech-support <option> detail生成用於TAC分析的3個不同日誌捆綁：

FPR4140-A# connect local-mgmt

FPR4140-A(local-mgmt)# show tech-support fprm detail

FPR4140-A(local-mgmt)# show tech-support chassis 1 detail

FPR4140-A(local-mgmt)# show tech-support module 1 detail

- 如果不指定細節選項，則會在螢幕上獲得輸出

- detail選項會建立tar檔案

檢查產生的檔案名稱：

FPR4140-A(local-mgmt)# dir techsupport/

1 15595520 Apr 09 17:29:10 2017 20170409172722_FPR4140_FPRM.tar

1   962560 Apr 09 17:32:20 2017 20170409172916_FPR4140_BC1_all.tar

1  7014400 Apr 09 18:06:25 2017 Firepower-Module1_04_09_2017_18_05_59.tar

若要從CLI匯出套件組合，請執行下列動作：

FPR4140-A(local-mgmt)# copy workspace:///techsupport/20170409172722_FPR4140_FPRM.tar ftp|tftp|scp|sftp://username@192.168.0.1/

注意：除了FXOS show tech輸出外，邏輯裝置（例如ASA和/或FTD）還具有他們自己的獨立show tech功能。在多例項(MI)的情形中，每個例項還具有自己的獨立show-tech捆綁包。最後，FCM不支援MI show-techs

從FXOS 2.6開始，透過「工具」>「故障排除日誌」下的「Firepower機箱管理器(FCM) UI，可以生成和下載FXOS技術支援

在FP9300上：

在FP41xx上：

問：如何驗證和更改機箱管理IP地址、網路掩碼和網關？

驗證管理介面配置的方法有以下幾種：

FPR4115-2-1# show fabric-interconnect

Fabric Interconnect:

ID   OOB IP Addr     OOB Gateway     OOB Netmask     OOB IPv6 Address OOB IPv6 Gateway Prefix Operability Ingress VLAN Group Entry Count (Current/Max) Switch Forwarding Path Entry Count (Current/Max)

---- --------------- --------------- --------------- ---------------- ---------------- ------ ----------- -------------------------------------------- ------------------------------------------------

A    10.62.184.19    10.62.184.1     255.255.255.0   ::               ::               64     Operable    0/500                                        14/1021

或

FPR4115-2-1# scope fabric-interconnect a

FPR4115-2-1 /fabric-interconnect # show

Fabric Interconnect:

ID   OOB IP Addr     OOB Gateway     OOB Netmask     OOB IPv6 Address OOB IPv6 Gateway Prefix Operability Ingress VLAN Group Entry Count (Current/Max) Switch Forwarding Path Entry Count (Current/Max)

---- --------------- --------------- --------------- ---------------- ---------------- ------ ----------- -------------------------------------------- ------------------------------------------------

A    10.62.184.19    10.62.184.1     255.255.255.0   ::               ::               64     Operable    0/500                                        14/1021

FPR4115-2-1 /fabric-interconnect # show detail

Fabric Interconnect:

ID: A

Product Name: Cisco FPR-4115-SUP

PID: FPR-4115-SUP

VID: V01

Vendor: Cisco Systems, Inc.

Serial (SN): JAD12345NY6

HW Revision: 0

Total Memory (MB): 8074

OOB IP Addr: 10.62.184.19

OOB Gateway: 10.62.184.1

OOB Netmask: 255.255.255.0

OOB IPv6 Address: ::

OOB IPv6 Gateway: ::

Prefix: 64

Operability: Operable

Thermal Status: Ok

Ingress VLAN Group Entry Count (Current/Max): 0/500

Switch Forwarding Path Entry Count (Current/Max): 14/1021

Current Task 1:

Current Task 2:

Current Task 3:

要更改IP設定：

FPR4115-2-1# scope fabric-interconnect a

FPR4115-2-1 /fabric-interconnect # set out-of-band

gw       Gw

ip       Ip

netmask  Netmask

KSEC-FPR4115-2-1 /fabric-interconnect # set out-of-band ip 10.62.184.19 netmask 255.255.255.0 gw 10.62.184.1

KSEC-FPR4115-2-1 /fabric-interconnect* # commit-buffer

關於提交：

FPR4115-2-1 /fabric-interconnect # commit-buffer verify-only    ! verify the change for error

FPR4115-2-1 /fabric-interconnect # commit-buffer                ! commit the change

FPR4115-2-1 /fabric-interconnect # discard-buffer               ! cancel the change

如需詳細資訊，請檢查：

Cisco Firepower 4100/9300 FXOS命令參考

問：如何執行FXOS Ping測試？

導航到本地管理CLI範圍，然後使用ping命令：

FPR4115-2-1# connect local-mgmt

FPR4115-2-1(local-mgmt)# ping 10.62.184.1

PING 10.62.184.1 (10.62.184.1) from 10.62.184.19 eth0: 56(84) bytes of data.

64 bytes from 10.62.184.1: icmp_seq=1 ttl=255 time=0.602 ms

64 bytes from 10.62.184.1: icmp_seq=2 ttl=255 time=0.591 ms

64 bytes from 10.62.184.1: icmp_seq=3 ttl=255 time=0.545 ms

64 bytes from 10.62.184.1: icmp_seq=4 ttl=255 time=0.552 ms

問：如何驗證帶外管理介面的Mac地址？

導航到本地管理CLI範圍並使用此命令：

FPR4115-2-1# connect local-mgmt

FPR4115-2-1(local-mgmt)# show mgmt-ip-debug | begin eth0

eth0      Link encap:Ethernet  HWaddr 78:bc:1a:e7:a4:11

inet addr:10.62.184.19  Bcast:10.62.184.255  Mask:255.255.255.0

inet6 addr: fe80::7abc:1aff:fee7:a411/64 Scope:Link

UP BROADCAST RUNNING MULTICAST  MTU:1500  Metric:1

RX packets:3420589 errors:0 dropped:0 overruns:0 frame:0

TX packets:2551231 errors:0 dropped:0 overruns:0 carrier:0

collisions:0 txqueuelen:1000

RX bytes:419362704 (399.9 MiB)  TX bytes:1530147643 (1.4 GiB)

問：如何驗證頻外管理介面是否已開啟？

除了scope fabric-interconnect a > show下的Operational外，您還可以使用此命令：

FPR4115-2-1# connect local-mgmt

FPR4115-2-1(local-mgmt)# show mgmt-port

eth0      Link encap:Ethernet  HWaddr 78:bc:1a:e7:a4:11

inet addr:10.62.184.19  Bcast:10.62.184.255  Mask:255.255.255.0

inet6 addr: fe80::7abc:1aff:fee7:a411/64 Scope:Link

UP BROADCAST RUNNING MULTICAST  MTU:1500  Metric:1

RX packets:3422158 errors:0 dropped:0 overruns:0 frame:0

TX packets:2552019 errors:0 dropped:0 overruns:0 carrier:0

collisions:0 txqueuelen:1000

RX bytes:419611452 (400.1 MiB)  TX bytes:1530247862 (1.4 GiB)

或者，您可以使用此指令。Scope部分顯示Link UP。請注意，UP顯示於下一行：

FPR4115-2-1# connect local-mgmt

FPR4115-2-1(local-mgmt)# show mgmt-ip-debug | begin eth0

eth0      Link encap:Ethernet  HWaddr 78:bc:1a:e7:a4:11

inet addr:10.62.184.19  Bcast:10.62.184.255  Mask:255.255.255.0

inet6 addr: fe80::7abc:1aff:fee7:a411/64 Scope:Link

UP BROADCAST RUNNING MULTICAST  MTU:1500  Metric:1

RX packets:3420589 errors:0 dropped:0 overruns:0 frame:0

TX packets:2551231 errors:0 dropped:0 overruns:0 carrier:0

collisions:0 txqueuelen:1000

RX bytes:419362704 (399.9 MiB)  TX bytes:1530147643 (1.4 GiB)

註： UP狀態是介面的管理狀態。即使拔下物理電纜或SFP模組，狀態仍為UP。 另一個重要點是RUNNING狀態，這意味著鏈路運行正常（線路協定為運行狀態）。

關閉介面的邏輯狀態：

FPR4100-3-A(local-mgmt)# mgmt-port shut

FPR4100-3-A(local-mgmt)# show mgmt-ip-debug ifconfig | b eth0

eth0      Link encap:Ethernet  HWaddr 58:97:BD:B9:76:EB

inet addr:10.62.148.88  Bcast:10.62.148.127  Mask:255.255.255.128

BROADCAST MULTICAST  MTU:1500  Metric:1

RX packets:3685870 errors:0 dropped:0 overruns:0 frame:0

TX packets:7068372 errors:0 dropped:0 overruns:0 carrier:0

collisions:0 txqueuelen:1000

RX bytes:295216623 (281.5 MiB)  TX bytes:1049391193 (1000.7 MiB)

再次提出問題：

FPR4100-3-A(local-mgmt)# mgmt-port no-shut

FPR4100-3-A(local-mgmt)# show mgmt-ip-debug ifconfig | b eth0

eth0      Link encap:Ethernet  HWaddr 58:97:BD:B9:76:EB

inet addr:10.62.148.88  Bcast:10.62.148.127  Mask:255.255.255.128

inet6 addr: fe80::5a97:bdff:feb9:76eb/64 Scope:Link

UP BROADCAST RUNNING MULTICAST  MTU:1500  Metric:1

RX packets:3685885 errors:0 dropped:0 overruns:0 frame:0

TX packets:7068374 errors:0 dropped:0 overruns:0 carrier:0

collisions:0 txqueuelen:1000

RX bytes:295218130 (281.5 MiB)  TX bytes:1049391353 (1000.7 MiB)

註：fxos模式下的show interface brief和show interface mgmt 0分別顯示mgmt0介面關閉和Admin down。請勿使用此參照它已關閉。

FPR-4110-A# connect fxos

FPR-4110-A(fxos)# show interface brief | include mgmt0

mgmt0  --           down   172.16.171.83                           --       1500

FPR-4110-A(fxos)# show interface mgmt 0

mgmt0 is down (Administratively down)

Hardware: GigabitEthernet, address: 5897.bdb9.212d (bia 5897.bdb9.212d)

Internet Address is 172.16.171.83/24

MTU 1500 bytes, BW 1000000 Kbit, DLY 10 usec

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA

auto-duplex, auto-speed

EtherType is 0x0000

1 minute input rate 3080 bits/sec 2 packets/sec

1 minute output rate 0 bits/sec 0 packets/sec

Rx

977 unicast packets 12571 multicast packets 5229 broadcast packets

18777 input packets 2333662 bytes

Tx

0 unicast packets 0 multicast packets 0 broadcast packets

0 output packets 0 bytes

如果您在fxos模式下執行show run interface mgmt0，則在該介面下執行shutdown force。同樣地，請勿使用此參考指出其已關閉：

FPR4115-2-1(fxos)# show run interface mgmt0

!Command: show running-config interface mgmt0

!Time: Tue May  5 14:19:42 2020

version 5.0(3)N2(4.81)

interface mgmt0

shutdown force

ip address 10.62.184.19/24

問：如何檢查FXOS路由表？

帶外管理僅依賴於預設網關集。因此，請確保選擇的預設網關允許連線到需要訪問系統的客戶端。connect fxos下有一個show ip route vrf all命令，但它不用於帶外管理。

問：如何檢查FXOS ARP表？

ARP表在FXOS CLI中不可見。您還可以在fxos模式(ethanalyzer)下使用資料包捕獲來捕獲ARP和/或檢查進出管理層的流量。

以下是捕獲ARP資料包的示例。您可以將capture-filter（捕獲過濾器）更改為任何內容。該過濾器類似於tcpdump過濾器：

fp9300-A# connect fxos

fp9300-A(fxos)# ethanalyzer local interface mgmt capture-filter arp

Capturing on eth0

2016-10-14 18:04:57.551221 00:50:56:85:be:44 -> ff:ff:ff:ff:ff:ff ARP Who has 172.16.171.240? Tell 172.16.171.101

2016-10-14 18:04:57.935562 00:12:80:85:a5:49 -> ff:ff:ff:ff:ff:ff ARP Who has 172.16.171.112? Tell 172.16.171.1

2016-10-14 18:04:58.167029 00:50:56:85:78:4e -> ff:ff:ff:ff:ff:ff ARP Who has 172.16.171.205? Tell 172.16.171.100

2016-10-14 18:04:59.156000 00:50:56:9f:b1:43 -> ff:ff:ff:ff:ff:ff ARP Who has 172.16.171.1? Tell 172.16.171.151

2016-10-14 18:04:59.165701 00:50:56:9f:b1:43 -> ff:ff:ff:ff:ff:ff ARP Who has 172.16.171.1? Tell 172.16.171.151

2016-10-14 18:04:59.166925 00:50:56:85:78:4e -> ff:ff:ff:ff:ff:ff ARP Who has 172.16.171.205? Tell 172.16.171.100

2016-10-14 18:04:59.268168 00:50:56:9f:b1:43 -> ff:ff:ff:ff:ff:ff ARP Who has 172.16.171.151? Tell 0.0.0.0

2016-10-14 18:05:00.150217 00:50:56:85:78:4e -> ff:ff:ff:ff:ff:ff ARP Who has 172.16.171.204? Tell 172.16.171.100

2016-10-14 18:05:00.268369 00:50:56:9f:b1:43 -> ff:ff:ff:ff:ff:ff ARP Who has 172.16.171.151? Tell 0.0.0.0

2016-10-14 18:05:01.150243 00:50:56:85:78:4e -> ff:ff:ff:ff:ff:ff ARP Who has 172.16.171.204? Tell 172.16.171.100

10 packets captured

Program exited with status 0.

fp9300-A(fxos)#

此外，您可以將捕獲儲存到檔案，然後將其導出到遠端伺服器：

FPR4140-A# connect fxos

FPR4140-A(fxos)# ethanalyzer local interface mgmt capture-filter arp limit-captured-frames 0 write workspace:///ARP.pcap

FPR4140-A# connect local-mgmt

FPR4140-A(local-mgmt)# dir

1 23075 Jan 12 13:13:18 2020 ARP.pcap

FPR4140-A(local-mgmt)# copy  workspace:///ARP.pcap ftp://anonymous@10.48.40.70/ARP.pcap

問：如何檢查FXOS故障事件？

使用show fault命令：

FPR4115-2-1# show fault

Severity  Code     Last Transition Time     ID       Description

--------- -------- ------------------------ -------- -----------

Major     F0909    2020-04-26T21:19:37.520    554924 default Keyring's certificate is invalid, reason: expired.

Major     F1769    2012-01-19T00:30:02.733    323268 The password encryption key has not been set.

Minor     F1437    2012-01-19T00:30:02.732     32358 Config backup may be outdated

您還可以根據嚴重性過濾故障：

FPR4115-2-1# show fault ?

0-18446744073709551615  ID

<CR>

>                       Redirect it to a file

>>                      Redirect it to a file in append mode

cause                   Cause

detail                  Detail

severity                Severity

suppressed              Fault Suppressed

|                       Pipe command output to filter

FPR4115-2-1# show fault severity major

Severity  Code     Last Transition Time     ID       Description

--------- -------- ------------------------ -------- -----------

Major     F0909    2020-04-26T21:19:37.520    554924 default Keyring's certificate is invalid, reason: expired.

Major     F1769    2012-01-19T00:30:02.733    323268 The password encryption key has not been set.

從FXOS UI Overview > FAULTS控制台也可看到相同的故障：

問：如何變更系統的主機名稱？

在系統範圍下使用set name命令：

KSEC-FPR4115-2-1# scope system

KSEC-FPR4115-2-1 /system # set name new-name

Warning: System name modification changes FC zone name and redeploys them non-disruptively

KSEC-FPR4115-2-1 /system* # commit-buffer

KSEC-FPR4115-2-1 /system # exit

new-name#

問：show server status Output中的「Compute Mismatch」是什麼？

在使用新安裝的安全模組之前，必須對其進行確認和重新初始化。即使透過RMA更換裝置也是如此。

FPR9300# show server status

Server  Slot Status                       Overall Status        Discovery

------- --------------------------------- --------------------- ---------

1/1     Mismatch                          Compute Mismatch      Complete

1/2     Equipped                          Ok                    Complete

1/3     Empty

FPR9300#

計算不匹配可能導致此故障事件：

Service profile ssp-sprof-1 configuration failed due to compute-unavailable,insufficient-resources

show service-profile狀態將顯示「Unassociated」，就像模組不存在一樣。

從CLI確認的步驟：

scope chassis 1

acknowledge slot <slot#>

commit-buffer

或者，您可以使用機箱管理器UI來確認模組：

問：show slot輸出中「令牌不匹配」的含義是什麼？

這表示在確認安全模組後，尚未重新初始化：

FPR9300# scope ssa

FPR9300 /ssa # show slot

Slot:

Slot ID    Log Level Admin State  Operational State

---------- --------- ------------ -----------------

1          Info      Ok           Token Mismatch

2          Info      Ok           Online

3          Info      Ok           Not Available

FPR9300 /ssa #

透過CLI重新初始化的步驟：

scope ssa

scope slot <#>

reinitialize

commit-buffer

在Firepower 41xx上，這也意味著SSD丟失或故障。在scope server 1/1下透過show inventory storage檢查SSD是否仍然存在：

FPR4140-A# scope ssa

FPR4140-A /ssa # show slot 1

Slot:

Slot ID    Log Level Admin State  Oper State

---------- --------- ------------ ----------

1          Info      Ok           Token Mismatch

FPR4140-A /ssa # show fault severity critical

Severity  Code     Last Transition Time     ID       Description

--------- -------- ------------------------ -------- -----------

Critical  F1548    2018-03-11T01:22:59.916     38768 Blade swap detected on slot 1

FPR4140-A /ssa # scope server 1/1

FPR4140-A /chassis/server # show inventory storage

Server 1/1:

Name:

User Label:

Equipped PID: FPR4K-SM-36

Equipped VID: V01

Equipped Serial (SN): FLM12345KL6

Slot Status: Equipped

Acknowledged Product Name: Cisco Firepower 4100 Series Extreme Performance Security Engine

Acknowledged PID: FPR4K-SM-36

Acknowledged VID: V00

Acknowledged Serial (SN): FLM12345KL6

Acknowledged Memory (MB): 262144

Acknowledged Effective Memory (MB): 262144

Acknowledged Cores: 36

Acknowledged Adapters: 2

Motherboard:

Product Name: Cisco Firepower 4100 Series Extreme Performance Security Engine

PID: FPR4K-SM-36

VID: V01

Vendor: Cisco Systems Inc

Serial (SN): FLM12345KL6

HW Revision: 0

RAID Controller 1:

Type: SATA

Vendor: Cisco Systems Inc

Model: CHORLEYWOOD

Serial: FLM12345KL6

HW Revision:

PCI Addr: 00:31.2

Raid Support:

OOB Interface Supported: No

Rebuild Rate: N/A

Controller Status: Unknown

Local Disk 1:

Vendor:

Model:

Serial:

HW Rev: 0

Operability: N/A

Presence: Missing

Size (MB): Unknown

Drive State: Unknown

Power State: Unknown

Link Speed: Unknown

Device Type: Unspecified

Local Disk Config Definition:

Mode: No RAID

Description:

Protect Configuration: No

問：如何透過CLI設定時區、NTP和DNS？

這是在FXOS平台設定下配置的。應用本文檔的說明：FXOS平台設定。

驗證機箱時間設定：

KSEC-FPR4115-2-1# show clock

Tue May  5 21:30:55 CEST 2020

KSEC-FPR4115-2-1# show ntp

NTP Overall Time-Sync Status: Time Synchronized

要從模組引導CLI驗證模組/刀片時間，請使用以下3條命令：

Firepower-module1>show ntp peerstatus

remote           local      st poll reach  delay   offset    disp

=======================================================================

*203.0.113.126   203.0.113.1      2   64  377 0.00006  0.000018 0.02789

remote 203.0.113.126, local 203.0.113.1

hmode client, pmode mode#255, stratum 2, precision -20

leap 00, refid [192.0.2.1], rootdistance 0.19519, rootdispersion 0.17641

ppoll 6, hpoll 6, keyid 0, version 4, association 43834

reach 377, unreach 0, flash 0x0000, boffset 0.00006, ttl/mode 0

timer 0s, flags system_peer, config, bclient, prefer, burst

reference time:      dbef8823.8066c43a  Mon, Dec  5 2016  8:30:59.501

originate timestamp: 00000000.00000000  Mon, Jan  1 1900  2:00:00.000

receive timestamp:   dbefb27d.f914589d  Mon, Dec  5 2016 11:31:41.972

transmit timestamp:  dbefb27d.f914589d  Mon, Dec  5 2016 11:31:41.972

filter delay:  0.00008  0.00006  0.00008  0.00009

0.00008  0.00008  0.00008  0.00009

filter offset: 0.000028 0.000018 0.000034 0.000036

0.000033 0.000036 0.000034 0.000041

filter order:  1        2        6        0

4        5        3        7

offset 0.000018, delay 0.00006, error bound 0.02789, filter error 0.00412

Firepower-module1>show ntp association

remote           refid      st t when poll reach   delay   offset  jitter

==============================================================================

*203.0.113.126   192.0.2.1     2 u   37   64  377    0.062    0.018   0.017

ind assid status  conf reach auth condition  last_event cnt

===========================================================

1 43834  961d   yes   yes  none  sys.peer              1

associd=43834 status=961d conf, reach, sel_sys.peer, 1 event, popcorn,

srcadr=203.0.113.126, srcport=123, dstadr=203.0.113.1, dstport=123,

leap=00, stratum=2, precision=-20, rootdelay=195.190, rootdisp=176.407,

refid=192.0.2.1,

reftime=dbef8823.8066c43a  Mon, Dec  5 2016  8:30:59.501,

rec=dbefb27d.f91541fc  Mon, Dec  5 2016 11:31:41.972, reach=377,

unreach=0, hmode=3, pmode=4, hpoll=6, ppoll=6, headway=22, flash=00 ok,

keyid=0, offset=0.018, delay=0.062, dispersion=0.778, jitter=0.017,

xleave=0.011,

filtdelay=     0.08    0.06    0.08    0.10    0.08    0.09    0.08    0.10,

filtoffset=    0.03    0.02    0.03    0.04    0.03    0.04    0.03    0.04,

filtdisp=      0.00    0.03    1.04    1.07    2.06    2.09    3.09    3.12

Firepower-module1>show ntp sysinfo

associd=0 status=0618 leap_none, sync_ntp, 1 event, no_sys_peer,

version="ntpd 4.2.6p5@1.2349-o Fri Oct  7 17:08:03 UTC 2016 (2)",

processor="x86_64", system="Linux/3.10.62-ltsi-WR6.0.0.27_standard",

leap=00, stratum=3, precision=-23, rootdelay=195.271, rootdisp=276.641,

refid=203.0.113.126,

reftime=dbefb238.f914779b  Mon, Dec  5 2016 11:30:32.972,

clock=dbefb2a7.575931d7  Mon, Dec  5 2016 11:32:23.341, peer=43834, tc=6,

mintc=3, offset=0.035, frequency=25.476, sys_jitter=0.003,

clk_jitter=0.015, clk_wander=0.011

system peer:          203.0.113.126

system peer mode:     client

leap indicator:       00

stratum:              3

precision:            -23

root distance:        0.19527 s

root dispersion:      0.27663 s

reference ID:         [203.0.113.126]

reference time:       dbefb238.f914779b  Mon, Dec  5 2016 11:30:32.972

system flags:         auth monitor ntp kernel stats

jitter:               0.000000 s

stability:            0.000 ppm

broadcastdelay:       0.000000 s

authdelay:            0.000000 s

time since restart:     1630112

time since reset:       1630112

packets received:       157339

packets processed:      48340

current version:        48346

previous version:       0

declined:               0

access denied:          0

bad length or format:   0

bad authentication:     0

rate exceeded:          0

Firepower-module1>

有關NTP驗證和故障排除的詳細資訊，請查閱本文檔：配置、驗證和排除Firepower FXOS裝置上的網路時間協定(NTP)設定故障

問：如何設定智慧許可和HTTP代理？

對於ASA邏輯裝置，FXOS機箱需要智慧許可。有關詳細資訊，請參閱本文：ASA許可證管理

以下是許可證狀態的輸出示例：

FPR4115-2-1# scope license

FPR4115-2-1 /license # show license all

Smart Licensing Status

======================

Smart Licensing is ENABLED

Registration:

Status: REGISTERED

Smart Account: BU Production Test

Virtual Account: TAC-BETA

Export-Controlled Functionality: Not Allowed

Initial Registration: SUCCEEDED on Dec 15 14:41:55 2015 PST

Last Renewal Attempt: SUCCEEDED on Dec 23 09:26:05 2015 PST

Next Renewal Attempt: Jun 21 07:00:21 2016 PST

Registration Expires: Dec 23 06:54:19 2016 PST

License Authorization:

Status: AUTHORIZED on Apr 07 15:44:26 2016 PST

Last Communication Attempt: SUCCEEDED on Apr 07 15:44:26 2016 PST

Next Communication Attempt: May 07 15:44:25 2016 PST

Communication Deadline: Jul 06 15:38:24 2016 PST

License Usage

==============

No licenses in use

Product Information

===================

UDI: PID:FPR9K-SUP,SN:JAD123456AB

Agent Version

=============

Smart Agent for Licensing: 1.4.1_rel/31

或者：

fp9300-A# connect local-mgmt

fp9300-A(local-mgmt)# show license all

Smart Licensing Status

======================

Smart Licensing is ENABLED

Registration:

Status: REGISTERED

Smart Account: Cisco Internal

Virtual Account: Escalations

Export-Controlled Functionality: Allowed

Initial Registration: SUCCEEDED on Feb 10 18:55:08 2016 CST

Last Renewal Attempt: SUCCEEDED on Oct 09 15:07:25 2016 CST

Next Renewal Attempt: Apr 07 15:16:32 2017 CST

Registration Expires: Oct 09 15:10:31 2017 CST

License Authorization:

Status: AUTHORIZED on Sep 20 07:29:06 2016 CST

Last Communication Attempt: SUCCESS on Sep 20 07:29:06 2016 CST

Next Communication Attempt: None  Communication Deadline: None

Licensing HA configuration error:

No Reservation Ha config error

License Usage

==============

No licenses in use

Product Information

===================

UDI: PID:FPR9K-SUP,SN:JAD190800VU

Agent Version

=============

Smart Agent for Licensing: 1.6.7_rel/95

問：如何透過CLI配置系統日誌？

檢查下列檔案：

- 在Firepower FXOS裝置上配置系統日誌

- FXOS配置指南：平台設定系統日誌

問題： 如何在Firepower裝置上配置SNMP？

檢查此文檔：在Firepower NGFW裝置上配置SNMP

問：如何安裝/更換機箱管理器使用的SSL證書？

本文檔可以幫助您：安裝FXOS機箱管理器的受信任證書

問：如何排除透過FPR9300機箱的流量故障？

檢查下列檔案：

- Firepower資料路徑故障排除第1階段：資料包入口

- Firepower資料路徑故障排除：概述

- 分析 Firepower 防火牆擷取，以有效針對網路問題進行疑難排解

問題： 如何檢視機箱Mac地址表？

對於FP41xx和FP93xx平台，請使用以下任一命令：

FPR4115-2-1# connect fxos

FPR4115-2-1(fxos)# show l2-table

Ingress      MAC             Vlan Class VlanGrp   Status  Dst

Eth1/1       78bc.1ae7.a45e  101  1     0         present 1

Veth776      78bc.1ae7.a45e  101  1     0         present 1

Po1          0100.5e00.0005  1001 1     0         present 1

Po1          0100.5e00.0006  1001 1     0         present 1

Po1          78bc.1ae7.a44e  1001 1     0         present 1

Po1          ffff.ffff.ffff  1001 63    0         present 1

FPR4115-2-1(fxos)# show mac address-table

Legend:

* - primary entry, G - Gateway MAC, (R) - Routed MAC, O - Overlay MAC

age - seconds since first seen,+ - primary entry using vPC Peer-Link

VLAN     MAC Address      Type      age     Secure NTFY   Ports/SWID.SSID.LID

---------+-----------------+--------+---------+------+----+------------------

* 1001     0100.5e00.0005    static    0          F    F  Eth1/1

* 1001     0100.5e00.0006    static    0          F    F  Eth1/1

* 1001     78bc.1ae7.a44e    static    0          F    F  Eth1/1

* 1001     ffff.ffff.ffff    static    0          F    F  Eth1/1

* 101      78bc.1ae7.a45e    static    0          F    F  Eth1/1

* 101      78bc.1ae7.a46f    static    0          F    F  Veth776

* 4047     0015.a501.0100    static    0          F    F  Veth864

* 4047     0015.a501.0101    static    0          F    F  Veth1015

* 4043     78bc.1ae7.b000    static    0          F    F  Eth1/10

* 4043     78bc.1ae7.b00c    static    0          F    F  Eth1/9

* 1        0015.a500.001f    static    0          F    F  Veth887

* 1        0015.a500.002f    static    0          F    F  Veth1018

* 1        0015.a500.01bf    static    0          F    F  Veth905

* 1        0015.a500.01ef    static    0          F    F  Veth1019

問：如何檢視機箱介面MAC地址？

使用以下命令：

FPR4115-2-1# connect fxos

FPR4115-2-1(fxos)# show interface mac-address

--------------------------------------------------------------------------------

Interface                  Mac-Address     Burn-in Mac-Address

--------------------------------------------------------------------------------

Ethernet1/1                78bc.1ae7.a417  78bc.1ae7.a418

Ethernet1/2                78bc.1ae7.a417  78bc.1ae7.a419

Ethernet1/3                78bc.1ae7.a417  78bc.1ae7.a41a

Ethernet1/4                78bc.1ae7.a417  78bc.1ae7.a41b

Ethernet1/5                78bc.1ae7.a417  78bc.1ae7.a41c

Ethernet1/6                78bc.1ae7.a417  78bc.1ae7.a41d

Ethernet1/7                78bc.1ae7.a417  78bc.1ae7.a41e

Ethernet1/8                78bc.1ae7.a417  78bc.1ae7.a41f

Ethernet1/9                78bc.1ae7.a417  78bc.1ae7.a420

Ethernet1/10               78bc.1ae7.a417  78bc.1ae7.a421

Ethernet1/11               78bc.1ae7.a417  78bc.1ae7.a422

Ethernet1/12               78bc.1ae7.a417  78bc.1ae7.a423

port-channel1              78bc.1ae7.a417  78bc.1ae7.a41a

port-channel48             78bc.1ae7.a417  0000.0000.0000

mgmt0                      78bc.1ae7.a411  78bc.1ae7.a411

Vethernet690               78bc.1ae7.a417  78bc.1ae7.a417

Vethernet691               78bc.1ae7.a417  78bc.1ae7.a417

Vethernet692               78bc.1ae7.a417  78bc.1ae7.a417

Vethernet693               78bc.1ae7.a417  78bc.1ae7.a417

Vethernet694               78bc.1ae7.a417  78bc.1ae7.a417

Vethernet695               78bc.1ae7.a417  78bc.1ae7.a417

Vethernet696               78bc.1ae7.a417  78bc.1ae7.a417

Vethernet697               78bc.1ae7.a417  78bc.1ae7.a417

Vethernet698               78bc.1ae7.a417  78bc.1ae7.a417

Vethernet699               78bc.1ae7.a417  78bc.1ae7.a417

Vethernet700               78bc.1ae7.a417  78bc.1ae7.a417

Vethernet774               78bc.1ae7.a417  78bc.1ae7.a417

Vethernet775               78bc.1ae7.a417  78bc.1ae7.a417

Vethernet776               78bc.1ae7.a417  78bc.1ae7.a417

Vethernet777               78bc.1ae7.a417  78bc.1ae7.a417

Vethernet778               78bc.1ae7.a417  78bc.1ae7.a417

Vethernet779               78bc.1ae7.a417  78bc.1ae7.a417

Vethernet861               78bc.1ae7.a417  78bc.1ae7.a417

Vethernet862               78bc.1ae7.a417  78bc.1ae7.a417

Vethernet863               78bc.1ae7.a417  78bc.1ae7.a417

Vethernet864               78bc.1ae7.a417  78bc.1ae7.a417

Vethernet887               78bc.1ae7.a417  78bc.1ae7.a417

Vethernet905               78bc.1ae7.a417  78bc.1ae7.a417

Vethernet906               78bc.1ae7.a417  78bc.1ae7.a417

Vethernet1015              78bc.1ae7.a417  78bc.1ae7.a417

Vethernet1018              78bc.1ae7.a417  78bc.1ae7.a417

Vethernet1019              78bc.1ae7.a417  78bc.1ae7.a417

Vethernet1020              78bc.1ae7.a417  78bc.1ae7.a417

Vethernet1021              78bc.1ae7.a417  78bc.1ae7.a417

問：如何在FXOS Supervisor (MIO)上執行口令恢復？

有關FP41xx和FP9300上的口令恢復過程，請參閱以下文檔：Firepower 9300/4100系列裝置的口令恢復過程

問：如何在ASA或FTD邏輯裝置上執行口令恢復？

要重置邏輯裝置密碼，需要重新引導裝置。使用Bootstrap災難恢復過程，您可以更改以下任何內容：

- ASA/ FTD管理IP - IP、網路掩碼、網關、IPv6、字首長度

- ASA密碼

- FTD註冊金鑰、密碼、FMC IP、搜尋網域、防火牆模式、DNS伺服器、FQDN

- ASA集群IP池、網路掩碼、網關、字首長度、虛擬IP。

註：必須在維護窗口(MW)中執行引導恢復過程，因為它需要重新載入邏輯裝置

範例 1

您可以使用FXOS UI編輯邏輯裝置的載入程式設定。導航到Logical Devices（邏輯裝置）頁籤， Edit a device（編輯裝置）

設定密碼：

一旦您儲存此訊息，就會出現：

範例 2

以下是ASA啟用密碼更改/恢復的示例：

FP4110-A# scope ssa

FP4110-A /ssa # show logical-device

Logical Device:

Name       Description Slot ID    Mode       Oper State               Templa                                                        te Name

---------- ----------- ---------- ---------- ------------------------ ------                                                        -------

asa                    1          Standalone Ok                       asa

FP4110-A /ssa # scope logical-device asa

FP4110-A /ssa/logical-device # scope mgmt-bootstrap asa

FP4110-A /ssa/logical-device/mgmt-bootstrap # show config

enter mgmt-bootstrap asa

create bootstrap-key-secret PASSWORD

!       set value

exit

enter ipv4 1 default

set gateway 172.16.171.1

set ip 172.16.171.226 mask 255.255.255.0

exit

exit

FP4110-A /ssa/logical-device/mgmt-bootstrap # enter bootstrap-key-secret PASSWORD

FP4110-A /ssa/logical-device/mgmt-bootstrap/bootstrap-key-secret # set value

Value:   <enter new enable password in here>

Warning: Bootstrap changes are not automatically applied to app-instances. To apply the changes, please do clear-mgmt-bootstrap, and restart each app-instance.

FP4110-A /ssa/logical-device/mgmt-bootstrap/bootstrap-key-secret* # commit-buffer

FP4110-A /ssa/logical-device/mgmt-bootstrap/bootstrap-key-secret # top

FP4110-A# scope ssa

FP4110-A /ssa # scope slot 1

FP4110-A /ssa/slot # scope app-instance asa

FP4110-A /ssa/slot/app-instance # clear-mgmt-bootstrap

Warning: Clears the application management bootstrap. Application needs to be restarted for this action to be effective.

FP4110-A /ssa/slot/app-instance* # commit-buffer

FP4110-A /ssa/slot/app-instance # restart

FP4110-A /ssa/slot/app-instance* # commit-buffer

在連線到ASA之前檢查ASA是否處於聯機狀態，並使用新的啟用密碼。

FP4110-A /ssa/slot/app-instance # show

Application Instance:

App Name   Admin State Oper State       Running Version Startup Version Profile Name Cluster State   Cluster Role

---------- ----------- ---------------- --------------- --------------- ------------ --------------- ------------

asa        Enabled     Online           9.9.1.76        9.9.1.76                     Not Applicable  None

FP4110-A /ssa/slot/app-instance #

問：如何更改FXOS使用者（例如admin）的當前密碼？

使用此程式：

FP4110-1-A# scope security

FP4110-1-A /security # show local-user

User Name       First Name      Last name

--------------- --------------- ---------

admin

FP4110-1-A /security # enter local-user admin

FP4110-1-A /security/local-user # set password

Enter a password:

Confirm the password:

FP4110-1-A /security/local-user* # commit-buffer

FP4110-1-A /security/local-user #

問：如何降級FXOS？

FXOS映像的降級不受正式支援。思科支援的唯一一種降低FXOS映像版本的方法是執行裝置的完整重新映像。Firepower 4100/9300升級路徑中對此進行了說明

問：如何降級/升級ASA邏輯裝置？

透過機箱管理器降級/升級ASA版本：更新邏輯裝置的映像版本

要透過CLI進行更改，請使用以下配置指南部分：更新邏輯裝置的映像版本

注意：在CLI上提交緩衝區後，它會立即重新啟動模組。與此類似，在機箱管理器上，一旦按一下「確定」，模組就會重新啟動。無需手動重新啟動。

問題： 如何透過CLI檢查FXOS升級狀態？

所有元件均進入就緒狀態後，升級即完成：

FP9300# scope system

FP9300 /system # show firmware monitor

FPRM:

Package-Vers: 2.0(1.37)

Upgrade-Status: Ready

Fabric Interconnect A:

Package-Vers: 2.0(1.23)

Upgrade-Status: Upgrading

Chassis 1:

Server 1:

Package-Vers: 2.0(1.23)

Upgrade-Status: Ready

Server 2:

Package-Vers: 2.0(1.23)

Upgrade-Status: Upgrading

其他有用的命令

FP9300 /firmware/auto-install # show fsm status

FP9300 /firmware/auto-install # show fsm status expand

問：如何從FXOS CLI重新載入邏輯裝置？

首選方法是使用FCM UI。如果由於某種原因無法訪問使用者介面，請使用以下命令：

# scope chassis 1

/chassis # scope server 1/1

/chassis/server # reset ?

hard-reset-immediate  Perform an immediate hard reset

hard-reset-wait       Wait for the completion of any pending management oper

/chassis/server # commit-buffer

問題： 如何檢查FXOS機箱正常運行時間和上次重新載入的原因？

FXOS正常運行時間檢查在存在FXOS回溯時非常有用。您可以從UI (FCM)或CLI看到FXOS：

FPR9K-1-A# connect fxos

FPR9K-1-A(fxos)# show system uptime

System start time: Sun Sep 25 09:57:19 2016

System uptime: 28 days, 9 hours, 38 minutes, 14 seconds

Kernel uptime: 28 days, 9 hours, 38 minutes, 41 seconds

Active supervisor uptime: 28 days, 9 hours, 38 minutes, 14 seconds

此外，若要判斷上次重新載入原因，請使用以下命令：

FPR9K-1-A(fxos)# show system reset-reason

----- reset reason for Supervisor-module 1 (from Supervisor in slot 1) ---

1) At 212883 usecs after Fri Oct 21 22:34:35 2016

Reason: Kernel Panic

Service:

Version: 5.0(3)N2(3.02)

2) At 106690 usecs after Thu May 26 16:07:38 2016

Reason: Reset Requested by CLI command reload

Service:

Version: 5.0(3)N2(3.02)

對於FPR2100正常運行時間，請執行以下操作：

1. 獲取「show tech-support fprm detail」捆綁包

2. 提取捆綁包的內容

3. 檢視檔案tmp/inventory_manager.xml

有一個條目顯示正常運行時間（以秒為單位）：

tmp/inventory_manager.xml:

<uptime>151</uptime>

問：如何檢查FXOS上的可用磁碟空間？

也稱為「工作區」：

FPR9K-1-A# connect local-mgmt

FPR9K-1-A(local-mgmt)# dir

1       29 Sep 25 09:56:22 2016 blade_debug_plugin

1       19 Sep 25 09:56:22 2016 bladelog

1       16 Aug 05 15:41:05 2015 cores

1  2841476 Apr 26 14:13:12 2016 d

2     4096 Dec 01 10:09:11 2015 debug_plugin/

1       31 Aug 05 15:41:05 2015 diagnostics

1  2842049 Feb 23 03:26:38 2016 dp

1 18053120 Feb 23 11:10:19 2016 fpr9k-1-0-sam_logs_all.tar

1 18176000 Feb 23 11:10:43 2016 fpr9k-1-1-sam_logs_all.tar

1 19302400 Feb 23 11:11:07 2016 fpr9k-1-2-sam_logs_all.tar

1 16312320 Feb 23 11:06:53 2016 fpr9k-1-3-sam_logs_all.tar

1  2841476 Feb 22 18:47:00 2016 fxos-dplug.5.0.3.N2.3.13.67g.gSSA

2     4096 Aug 05 15:38:58 2015 lost+found/

1       25 Dec 01 11:11:50 2015 packet-capture

1 18493440 Feb 23 10:44:51 2016 sam_logs_all.tar

2     4096 Sep 14 11:23:11 2016 techsupport/

Usage for workspace://

4032679936 bytes total

324337664 bytes used

3503489024 bytes free

FPR9K-1-A(local-mgmt)# dir volatile:/

1 66 Oct 27 08:17:48 2016 xmlout_5816

Usage for volatile://

251658240 bytes total

4096 bytes used

251654144 bytes free

檢查引導快閃記憶體的可用空間。請注意，此輸出也會顯示工作區大小及使用狀況：

FPR9K-1-A# scope fabric-interconnect a

FPR9K-1-A /fabric-interconnect # show storage

Storage on local flash drive of fabric interconnect:

Partition        Size (MBytes)    Used Percentage

---------------- ---------------- ---------------

bootflash        106490           9

opt              3870             2

spare            5767             1

usbdrive         Nothing          Empty

workspace        3845             9

問：如何將FXOS組態重設為出廠預設值？

使用以下命令：

FPR9K-1-A# connect local-mgmt

FPR9K-1-A(local-mgmt)# erase configuration

註：此操作將重新啟動系統並清除整個配置，包括管理IP地址。因此，請確保控制檯已連線。系統重新啟動後，安裝應用程式會執行，您可以重新輸入管理組態資訊。

範例

FPR9K-1# connect local-mgmt

FPR9K-1(local-mgmt)# erase configuration

All configurations are erased and system must reboot. Are you sure? (yes/no): yes

Removing all the configuration. Please wait....

/bin/rm: cannot remove directory `/bootflash/sysdebug//tftpd_logs': Device or resource busy

sudo: cannot get working directory

sudo: cannot get working directory

Configurations are cleaned up. Rebooting....

...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

2016 Oct 28 06:31:00  %$ VDC-1 %$ %USER-0-SYSTEM_MSG: Starting bcm_attach - bcm_usd

System is coming up ... Please wait ...

2016 Oct 28 06:31:06  %$ VDC-1 %$ %USER-0-SYSTEM_MSG: Finished bcm_attach... - bcm_usd

2016 Oct 28 06:31:07  %$ VDC-1 %$ %USER-0-SYSTEM_MSG: Enabling Filter on CPU port  - bcm_usd

System is coming up ... Please wait ...

2016 Oct 28 06:31:11 switch %$ VDC-1 %$ %VDC_MGR-2-VDC_ONLINE: vdc 1 has come online

System is coming up ... Please wait ...

nohup: appending output to `nohup.out'

---- Basic System Configuration Dialog ----

This setup utility guides you through the basic configuration of

the system. Only minimal configuration including IP connectivity to

the Fabric interconnect and its clustering mode is performed through these steps.

Type Ctrl-C at any time to abort configuration and reboot system.

To back track or make modifications to already entered values,

complete input till end of section and answer no when prompted

to apply configuration.

You have chosen to setup a new Security Appliance. Continue? (y/n):

問：如何從FXOS CLI檢查邏輯裝置的載入程式配置（分配的介面、版本等）？

FPR4100-3-A# scope ssa

FPR4100-3-A /ssa # show configuration

scope ssa

enter logical-device FTD4150-3 ftd 1 standalone

enter external-port-link Ethernet16_ftd Ethernet1/6 ftd

set decorator ""

set description ""

set port-name Ethernet1/6

exit

enter external-port-link Ethernet17_ftd Ethernet1/7 ftd

set decorator ""

set description ""

set port-name Ethernet1/7

exit

enter external-port-link Ethernet18_ftd Ethernet1/8 ftd

set decorator ""

set description ""

set port-name Ethernet1/8

exit

enter mgmt-bootstrap ftd

enter bootstrap-key DNS_SERVERS

set value 192.0.2.100

exit

enter bootstrap-key FIREPOWER_MANAGER_IP

set value 10.62.148.57

exit

enter bootstrap-key FIREWALL_MODE

set value routed

exit

enter bootstrap-key FQDN

set value FTD4150-3.lab.com

exit

enter bootstrap-key SEARCH_DOMAINS

set value lab.com

exit

enter bootstrap-key-secret PASSWORD

!               set value

exit

enter bootstrap-key-secret REGISTRATION_KEY

!               set value

exit

enter ipv4 1 firepower

set gateway 10.62.148.1

set ip 10.62.148.89 mask 255.255.255.128

exit

exit

set description ""

set res-profile-name ""

exit

scope slot 1

enter app-instance ftd

enable

set startup-version 6.0.1.1213

exit

set log-level info

exit

scope app asa 9.12.4.12

set-default

exit

scope app ftd 6.0.1.1213

accept-license-agreement

set-default

exit

exit

這相當於：

如果要檢視所有FXOS配置，則增加關鍵字「all」（輸出有幾頁長）：

FPR4100-3-A /ssa # show configuration all

問：如何檢查FXOS介面的狀態（埠型別、狀態）？

FPR4100-3-A# scope eth-uplink

FPR4100-3-A /eth-uplink # scope fabric a

FPR4100-3-A /eth-uplink/fabric # show interface

Interface:

Port Name       Port Type          Admin State Oper State       State Reason

--------------- ------------------ ----------- ---------------- ------------

Ethernet1/1     Data               Disabled    Admin Down       Administratively down

Ethernet1/2     Data               Disabled    Admin Down       Administratively down

Ethernet1/3     Data               Disabled    Admin Down       Administratively down

Ethernet1/4     Data               Disabled    Sfp Not Present  Unknown

Ethernet1/5     Data               Disabled    Admin Down       Administratively down

Ethernet1/6     Data               Enabled     Up

Ethernet1/7     Mgmt               Enabled     Up

Ethernet1/8     Data               Enabled     Up

FPR4100-3-A /eth-uplink/fabric #

這相當於：

問：如何檢查機箱上的CPU和記憶體使用率？

FPR9K-2-A# connect fxos

FPR9K-2-A(fxos)# show system resources

Load average:   1 minute: 1.60   5 minutes: 1.30   15 minutes: 1.15

Processes   :   967 total, 1 running

CPU states  :   1.8% user,   1.1% kernel,   97.1% idle

Memory usage:   16326336K total,   4359740K used,   11966596K free

註：即使對於屬於同一型號的2台裝置，輸出中顯示的總數也可能不同。具體來說，總數取自自由命令輸出，而自由命令輸出又取自/proc/meminfo。

檢查記憶體：

FPR4100-8-A /fabric-interconnect # show detail

Fabric Interconnect:

ID: A

Product Name: Cisco FPR-4140-SUP

PID: FPR-4140-SUP

VID: V02

Vendor: Cisco Systems, Inc.

Serial (SN): FLM12345KL6

HW Revision: 0

Total Memory (MB): 8074

OOB IP Addr: 10.62.148.196

OOB Gateway: 10.62.148.129

OOB Netmask: 255.255.255.128

OOB IPv6 Address: ::

OOB IPv6 Gateway: ::

Prefix: 64

Operability: Operable

Thermal Status: Ok

Current Task 1:

Current Task 2:

Current Task 3:

驗證每個進程的記憶體使用率檢查（RES =實體記憶體）：

FPR4100-2-A-A# connect local-mgmt

FPR4100-2-A-A(local-mgmt)# show processes

Cpu(s):  8.0%us,  4.2%sy,  3.9%ni, 83.8%id,  0.0%wa,  0.0%hi,  0.1%si,  0.0%st

Mem:   8267648k total,  3866552k used,  4401096k free,      288k buffers

Swap:        0k total,        0k used,        0k free,  1870528k cached

PID USER      PR  NI  VIRT  RES  SHR S %CPU %MEM    TIME+  COMMAND

5024 root      -2   0  354m 114m  34m R   43  1.4   7976:51 /isan/bin/bcm_usd

1096 root      20   0 10352 3992 3332 S    0  0.0   0:00.28 sshd: admin@pts/1

1140 root      20   0  117m  78m  53m S    0  1.0   0:00.42 /isan/bin/ucssh --ucs-mgmt -p admin

1856 root      20   0  2404  632  512 S    0  0.0   2:29.32 /nuova/bin/cmcmon -f /etc/cmcmon.conf

1859 root      20   0 23804 1932 1532 S    0  0.0   1427:47 dmserver -F

1860 root      20   0  2244  472  404 S    0  0.0   0:00.01 /sbin/hotplug2 --persistent --set-rules-file /etc/automount.rules --set-worker /lib/worker_single.so

1861 root      20   0 57116  10m 6552 S    0  0.1   7:28.76 /isan/sbin/sysmgr -V

1864 root      20   0 14044 4136 1072 S    0  0.1   1:06.19 rsyslogd -c3 -i/var/run/rsyslogd.pid

4909 root      20   0  3568 1100  876 S    0  0.0   0:00.48 /isan/sbin/xinetd -syslog local7 -loop 250 -stayalive -reuse -dontfork

4911 root      20   0 58232  12m 6152 S    0  0.2  18:39.24 /isan/sbin/syslogd -d -n -m 0 -r

4912 root      20   0 20076 3532 2368 S    0  0.0   0:00.02 /isan/bin/sdwrapd

4913 root      21   1  2756  300  192 S    0  0.0   0:00.04 /usr/sbin/in.tftpd -l -c -s /bootflash

4914 root      20   0 58312  17m 8724 S    0  0.2  13:45.34 /isan/bin/pfm

4937 root      20   0  2208  332  272 S    0  0.0   0:00.01 /sbin/klogd -2 -x -c 1

4939 root      20   0 26692 4656 3620 S    0  0.1   0:24.01 /isan/bin/vshd

...

提示：

1. 收集show process memory輸出

2. 將輸出貼到Linux機器上的檔案中(cat > top.log)

3. 根據RES欄排序檔案

這會顯示GB、MB等

mzafeiro@MZAFEIRO-JA2YS:$ cat top.log | sort -V -k 6

1954 root      20   0 1645m 1.6g 1372 S  0.0 20.7 793:32.99 dmserver

7556 root      20   0  207m 9.8m 6184 S  0.0  0.1  73:52.25 udld

5563 root      20   0  333m 9.8m 7032 S  0.0  0.1   5:08.65 cdpd

5523 root      20   0  327m 103m  28m S  0.0  1.3   0:12.38 afm

24040 daemon    23   3  592m 115m  33m S  0.0  1.5  74:56.57 httpd

5329 root      -2   0  384m 132m  29m S  9.4  1.7  27130:09 bcm_usd

5317 root      20   0  401m 150m  35m S  0.0  1.9  33:19.05 fwm

5625 root      24   4  450m 179m  35m S  0.0  2.3 275:38.25 svc_sam_statsAG

5614 root      23   3  495m 247m  54m S  0.0  3.2 355:59.95 svc_sam_dme

21688 root      20   0  2672 1080  880 S  0.0  0.0   3:15.29 ntpd

8819 root      35  15  2408 1084  748 R  5.6  0.0   0:00.06 top

問：如何檢查機箱介面收發器型別？

在Firepower 4100/9300中，使用此命令：

FPR9K-2-A# connect fxos

FPR9K-2-A(fxos)# show interface e1/3 transceiver details

Ethernet1/3

transceiver is present

type is 1000base-T

name is CISCO-METHODE

part number is SP7041-R

revision is

serial number is FLM12345KL6

nominal bitrate is 1300 MBit/sec

Link length supported for copper is 100 m

cisco id is --

cisco extended id number is 4

DOM is not supported

FPR9K-2-A(fxos)#

對於光纖，輸出為：

FPR4100-1-A(fxos)# show interface e1/1 transceiver details

Ethernet1/1

transceiver is present

type is 10Gbase-SR

name is CISCO-JDSU

part number is PLRXPL-SC-S43-CS

revision is 1

serial number is FLM12345KL6

nominal bitrate is 10300 MBit/sec

Link length supported for 50/125um OM2 fiber is 82 m

Link length supported for 62.5/125um fiber is 26 m

Link length supported for 50/125um OM3 fiber is 300 m

cisco id is --

cisco extended id number is 4

Calibration info not available

在Firepower 1000/2100中，使用此命令：

FPR2100# scope fabric-interconnect

FPR2100 /fabric-interconnect # show inventory expand detail | egrep ignore-case "Port|Xcvr"

...

Slot 1 Port 13:

Xcvr: 10 Gbase SR

Xcvr Model: PLRXPL-SC-S43-C

Xcvr Vendor: Cisco Systems, Inc.

Xcvr Serial: ABCD1234

Slot 1 Port 14:

Xcvr: 10 Gbase SR

Xcvr Model: PLRXPL-SC-S43-C

Xcvr Vendor: Cisco Systems, Inc.

Xcvr Serial: VWXY1234

Slot 1 Port 15:

Xcvr: Non Present

Xcvr Model:

Xcvr Vendor:

Xcvr Serial:

Slot 1 Port 16:

Xcvr: Non Present

Xcvr Model:

Xcvr Vendor:

Xcvr Serial:

問：如何檢查模組/刀片/伺服器/網路模組資訊（硬體型別/PID/SN/記憶體/核心等）？

此命令顯示機箱和模組（網路模組）的產品ID (PID)和序列號(SN)

FP4110-7-A# connect fxos

FP4110-7-A(fxos)# show inventory

NAME: "Chassis", DESCR: "Firepower 41xx Security Appliance"

PID: FPR-4110-SUP      , VID: V02 , SN: FLM12345KL6  <--- Chassis SN

NAME: "Module 1", DESCR: "Firepower 41xx Supervisor"

PID: FPR-4110-SUP      , VID: V02 , SN: FLM12345KL6  <--- Embedded module on FPR4100

NAME: "Module 3", DESCR: "Firepower 6x10G FTW SFP+ SR NM"

PID: FPR-NM-6X10SR-F   , VID: V00 , SN: FLM12345KL6  <--- FTW Netmode SN

FPR4110有2個用於網路模組（2和3）的插槽，示例中的裝置在插槽3中安裝有FTW網路模組。

FPR9K-1-A# scope chassis 1

FPR9K-1-A /chassis # show inventory server

Chassis 1:

Servers:

Server 1/1:

Equipped Product Name: Cisco Firepower 9000 Series High Performance Security Module

Equipped PID: FPR9K-SM-36

Equipped VID: V01

Equipped Serial (SN): FLM12345KL6

Slot Status: Equipped

Acknowledged Product Name: Cisco Firepower 9000 Series High Performance Security Module

Acknowledged PID: FPR9K-SM-36

Acknowledged VID: V01

Acknowledged Serial (SN): FLM12345KL6

Acknowledged Memory (MB): 262144

Acknowledged Effective Memory (MB): 262144

Acknowledged Cores: 36

Acknowledged Adapters: 2

Server 1/2:

Equipped Product Name: Cisco Firepower 9000 Series High Performance Security Module

Equipped PID: FPR9K-SM-36

Equipped VID: V01

Equipped Serial (SN): FLM12345KL6

Slot Status: Equipped

Acknowledged Product Name: Cisco Firepower 9000 Series High Performance Security Module

Acknowledged PID: FPR9K-SM-36

Acknowledged VID: V01

Acknowledged Serial (SN): FLM12345KL6

Acknowledged Memory (MB): 262144

Acknowledged Effective Memory (MB): 262144

Acknowledged Cores: 36

Acknowledged Adapters: 2

Server 1/3:

Equipped Product Name: Cisco Firepower 9000 Series High Performance Security Module

Equipped PID: FPR9K-SM-36

Equipped VID: V01

Equipped Serial (SN): FLM12345KL6

Slot Status: Equipped

Acknowledged Product Name: Cisco Firepower 9000 Series High Performance Security Module

Acknowledged PID: FPR9K-SM-36

Acknowledged VID: V01

Acknowledged Serial (SN): FLM12345KL6

Acknowledged Memory (MB): 262144

Acknowledged Effective Memory (MB): 262144

Acknowledged Cores: 36

Acknowledged Adapters: 2

伺服器1/1 =模組/刀片1

伺服器1/2 =模組/刀片2

伺服器1/3 =模組/刀片3

FPR41xx型號PID：

- FPR4K-SM-12 = FPR4110

- FPR4K-SM-24 = FPR4120

- FPR4K-SM-36 = FPR4140

- FPR4K-SM-44 = FPR4150

- FPR4K-SM-24S = FPR4115

- FPR4K-SM-32S = FPR4125

- FPR4K-SM-44S = FPR4145

您也可以在<機箱ID/刀片ID>範圍內獲取其他資訊：

FP9300-A# scope server 1/1

FP9300-A /chassis/server # show inventory

<CR>

>        Redirect it to a file

>>       Redirect it to a file in append mode

adapter  Adapter

bios     Bios

board    Board

cpu      Cpu

detail   Detail

expand   Expand

memory   Memory

mgmt     Mgmt

storage  Storage

|        Pipe command output to filter

FP9300-A /chassis/server # show inventory storage

Server 1/1:

Name:

User Label:

Equipped PID: FPR9K-SM-36

Equipped VID: V01

Equipped Serial (SN): FLM12345PBD

Slot Status: Equipped

Acknowledged Product Name: Cisco Firepower 9000 Series High Performance Security Module

Acknowledged PID: FPR9K-SM-36

Acknowledged VID: 01

Acknowledged Serial (SN): FLM67890PBD

Acknowledged Memory (MB): 262144

Acknowledged Effective Memory (MB): 262144

Acknowledged Cores: 36

Acknowledged Adapters: 2

Motherboard:

Product Name: Cisco Firepower 9000 Series High Performance Security Module

PID: FPR9K-SM-36

VID: V01

Vendor: Cisco Systems Inc

Serial (SN): FLM12345KL6

HW Revision: 0

RAID Controller 1:

Type: SAS

Vendor: Cisco Systems Inc

Model: UCSB-MRAID12G

Serial: FLM12345KL6

HW Revision: C0

PCI Addr: 01:00.0

Raid Support: RAID0, RAID1

OOB Interface Supported: Yes

Rebuild Rate: 30

Controller Status: Optimal

Local Disk 1:

Product Name:

PID:

VID:

Vendor: TOSHIBA

Model: PX02SMF080

Vendor Description:

Serial: FLM12345KL6

HW Rev: 0

Block Size: 512

Blocks: 1560545280

Operability: Operable

Oper Qualifier Reason: N/A

Presence: Equipped

Size (MB): 761985

Drive State: Online

Power State: Active

Link Speed: 12 Gbps

Device Type: SSD

Local Disk 2:

Product Name:

PID:

VID:

Vendor: TOSHIBA

Model: PX02SMF080

Vendor Description:

Serial: FLM12345KL6

HW Rev: 0

Block Size: 512

Blocks: 1560545280

Operability: Operable

Oper Qualifier Reason: N/A

Presence: Equipped

Size (MB): 761985

Drive State: Online

Power State: Active

Link Speed: 12 Gbps

Device Type: SSD

Local Disk Config Definition:

Mode: RAID 1 Mirrored

Description:

Protect Configuration: Yes

Virtual Drive 0:

Type: RAID 1 Mirrored

Block Size: 512

Blocks: 1560545280

Operability: Operable

Presence: Equipped

Size (MB): 761985

Lifecycle: Allocated

Drive State: Optimal

Strip Size (KB): 64

Access Policy: Read Write

Read Policy: Normal

Configured Write Cache Policy: Write Through

Actual Write Cache Policy: Write Through

IO Policy: Direct

Drive Cache: No Change

Bootable: True

FP9300-A /chassis/server #

註：在FP41xx平台上，由於未使用RAID，show inventory storage會將「Controller Status」顯示為「Unknown」。它們不是RAID的主要原因是第二個SSD用於FTD邏輯裝置上的MSP（惡意軟體儲存包）等其他功能。

問題： 如何從FXOS GUI和CLI中刪除ASA或FTD映像？

在FCM GUI上：

要從GUI中刪除，請導航到System > Updates並刪除影象：

從FXOS CLI

FPR4100# scope ssa

FPR4100 /ssa # show app

Application:

Name   Version    Description Author     Deploy Type CSP Type    Is Default App

------ ---------- ----------- ---------- ----------- ----------- --------------

asa    9.6.1      N/A         cisco      Native      Application Yes

ftd    6.0.1.1213 N/A         cisco      Native      Application No

ftd    6.1.0.330  N/A         cisco      Native      Application Yes

FPR4100 /ssa # delete app asa 9.6.1

FPR4100 /ssa* # commit

FPR4100 /ssa # show app

Application:

Name       Version    Description Author     Deploy Type CSP Type    Is Default App

---------- ---------- ----------- ---------- ----------- ----------- --------------

ftd        6.0.1.1213 N/A         cisco      Native      Application No

ftd        6.1.0.330  N/A         cisco      Native      Application Yes

問：如何從CLI檢查FXOS版本？

有幾種方法可以做到這一點。

方式1

FPR4100# show fabric-interconnect firmware

Fabric Interconnect A:

Running-Kern-Vers: 5.0(3)N2(4.01.65)

Running-Sys-Vers: 5.0(3)N2(4.01.65)

Package-Vers: 2.0(1.86)

Startup-Kern-Vers: 5.0(3)N2(4.01.65)

Startup-Sys-Vers: 5.0(3)N2(4.01.65)

Act-Kern-Status: Ready

Act-Sys-Status: Ready

Bootloader-Vers:

這與FCM GUI中顯示的相同：

方式2

FP4145-1# show version

Version: 2.6(1.192)

Startup-Vers: 2.6(1.192)

問：如何驗證FXOS上的介面MTU？

預設情況下，Firepower 4100/9300機箱支援超巨型幀。您可以使用以下命令檢查介面MTU：

FPR9K-1-A# connect fxos

FPR9K-1-A(fxos)# show hardware internal bcm-usd info phy-info all

+-----------------+------------------------------------------------------------+

| port phy info                                                                |

+-----------------+------------------------------------------------------------+

front-port :   1           asic-port : 125      sfp installed : yes

enable : ena               speed :  1G            autoneg :  on

interface : (10)XFI           duplex: half          linkscan : sw

pause_tx : 0x0            pause_rx : 0x0          max frame : 9216

local_advert : 0x20       remote_advert : 0x420    port_40g_enable : 0

local_fault : 0x1       remote_fault : 0x0

xcvr sfp type : (1)PHY_SFP_1G_COPPER

TSC4 registers:

txfir(0xc252):0x0000      txdrv(0xc017):0x0000      lane(0x9003):0x1b1b

Asic 56846 Registers

signal_detect(1.0x81d0):0x0000      link_status(1.0x81d1):0x0000

rx_link_state(1.0x0):0x0000      pcs_rx_tx_fault(1.0x0008):0x0000

pcs_block_status_0x20(1.0x20) :0x0000

pcs_block_status_0x21(1.0x021) : 0x0000

transmitter_reg(1.0x8000):0x0000      micro_ver(1.0x81f0):0x0000

或者，檢查fxos命令shell中的MTU：

KSEC-FPR4112-4# connect fxos

<output is skipped>

KSEC-FPR4112-4(fxos)# show interface ethernet 1/1

Ethernet1/1 is up

Dedicated Interface

Hardware: 1000/10000 Ethernet, address: 14a2.a02f.07c0 (bia 14a2.a02f.07c0)

Description: U: Uplink

MTU 9216 bytes, BW 1000000 Kbit, DLY 10 usec

問：如何檢查已安裝的應用程式？

從機箱CLI使用命令scope ssa，然後使用show slot expand detail。

可以在機箱show tech bundle內的檔案sam_techsupportinfo上找到相同資訊。

`scope ssa`

`show slot expand detail`

Slot:

Slot ID: 1

Log Level: Info

Admin State: Ok

Operational State: Online

Disk State: Ok

Clear Log Data: Available

Application Instance:

Application Name: asa

Admin State: Enabled

Operational State: Online

Running Version: 9.6.2

Startup Version: 9.6.2

Hotfixes:

Externally Upgraded: No

Cluster Oper State: Not Applicable

Current Job Type: Start

Current Job Progress: 100

Current Job State: Succeeded

Clear Log Data: Available

Error Msg:

Current Task:

App Attribute:

App Attribute Key: mgmt-ip

Value: 0.0.0.0

App Attribute Key: mgmt-url

Value: https://0.0.0.0/

Heartbeat:

Last Received Time: 2017-03-15T10:25:02.220

Heartbeat Interval: 1

Max Number of Missed heartbeats Permitted: 3

Resource:

Allocated Core NR: 46

Allocated RAM (KB): 233968896

Allocated Data Disk (KB): 20971528

Allocated Binary Disk (KB): 174964

Allocated Secondary Disk (KB): 0

Heartbeat:

Last Received Time: 2017-03-15T10:25:00.447

Heartbeat Interval: 5

Max Number of Missed heartbeats Permitted: 3

Monitor:

OS Version: 9.6(1.150)

CPU Total Load 1 min Avg: 48.110001

CPU Total Load 5 min Avg: 48.110001

CPU Total Load 15 min Avg: 48.110001

Memory Total (KB): 264377600

Memory Free (KB): 236835112

Memory Used (KB): 27542488

Memory App Total (KB): 233968896

Disk File System Count: 5

Blade Uptime: up 1 day,  6:56

Last Updated Timestamp: 2017-03-15T10:24:10.306

Disk File System:

File System: /dev/sda1

Mount Point: /mnt/boot

Disk Total (KB): 7796848

Disk Free (KB): 7694456

Disk Used (KB): 102392

File System: /dev/sda2

Mount Point: /opt/cisco/config

Disk Total (KB): 1923084

Disk Free (KB): 1734420

Disk Used (KB): 90976

File System: /dev/sda3

Mount Point: /opt/cisco/platform/logs

Disk Total (KB): 4805760

Disk Free (KB): 4412604

Disk Used (KB): 149036

File System: /dev/sda5

Mount Point: /var/data/cores

Disk Total (KB): 48061320

Disk Free (KB): 43713008

Disk Used (KB): 1906892

File System: /dev/sda6

Mount Point: /opt/cisco/csp

Disk Total (KB): 716442836

Disk Free (KB): 714947696

Disk Used (KB): 1495140

問：如何從FXOS CLI驗證埠通道配置？

埠通道驗證命令

檢查 1

要驗證機箱上當前配置了哪些埠通道，請執行以下操作：

FPR9K-1-A# connect fxos

FPR9K-1-A(fxos)# show port-channel summary

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

--------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

--------------------------------------------------------------------------------

11    Po11(SU)    Eth      LACP      Eth1/4(P)    Eth1/5(P)

15    Po15(SD)    Eth      LACP      Eth1/6(D)

48    Po48(SU)    Eth      LACP      Eth1/2(P)    Eth1/3(P)

檢查 2

驗證分配給邏輯裝置的埠通道：

FPR9K-1-A# scope ssa

FPR9K-1-A /ssa # show configuration

scope ssa

enter logical-device ftd_682021968 ftd "1,2,3" clustered

enter cluster-bootstrap

set chassis-id 1

set ipv4 gateway 0.0.0.0

set ipv4 pool 0.0.0.0 0.0.0.0

set ipv6 gateway ::

set ipv6 pool :: ::

set virtual ipv4 0.0.0.0 mask 0.0.0.0

set virtual ipv6 :: prefix-length ""

!           set key

set mode spanned-etherchannel

set name 682021968

set site-id 0

exit

enter external-port-link Ethernet11_ftd Ethernet1/1 ftd

set decorator ""

set description ""

set port-name Ethernet1/1

exit

enter external-port-link PC11_ftd Port-channel11 ftd

set decorator ""

set description ""

set port-name Port-channel11

exit

enter external-port-link PC48_ftd Port-channel48 ftd

set decorator ""

set description ""

set port-name Port-channel48

exit

檢查 3

檢查每個埠的埠通道流量統計資訊：

FPR9K-1-A(fxos)# show port-channel traffic interface port-channel 11

ChanId      Port Rx-Ucst Tx-Ucst Rx-Mcst Tx-Mcst Rx-Bcst Tx-Bcst

------ --------- ------- ------- ------- ------- ------- -------

11    Eth1/4  62.91%    0.0%  58.90%  49.99% 100.00%    0.0%

11    Eth1/5  37.08%    0.0%  41.09%  50.00%    0.0%    0.0%

檢查 4

檢查特定Port-Channel的詳細資訊：

FPR9K-1-A(fxos)# show port-channel database interface port-channel 11

port-channel11

Last membership update is successful

2 ports in total, 2 ports up

First operational port is Ethernet1/4

Age of the port-channel is 0d:20h:26m:27s

Time since last bundle is 0d:18h:29m:07s

Last bundled member is Ethernet1/5

Ports:   Ethernet1/4     [active ] [up] *

Ethernet1/5     [active ] [up]

檢查 5

檢查本地LACP系統ID：

FPR9K-1-A(fxos)# show lacp system-identifier

32768,b0-aa-77-2f-81-bb

檢查 6

檢查上游裝置的LACP系統ID以及LACP狀態標誌：

FPR9K-1-A(fxos)# show lacp neighbor

Flags:  S - Device is sending Slow LACPDUs F - Device is sending Fast LACPDUs

A - Device is in Active mode       P - Device is in Passive mode

port-channel11 neighbors

Partner's information

Partner                Partner                     Partner

Port        System ID              Port Number     Age         Flags

Eth1/4      32768,4-62-73-d2-65-0  0x118           66828       FA

LACP Partner           Partner                     Partner

Port Priority          Oper Key                    Port State

32768                  0xb                         0x3d

Partner's information

Partner                Partner                     Partner

Port        System ID              Port Number     Age         Flags

Eth1/5      32768,4-62-73-d2-65-0  0x119           66826       FA

LACP Partner           Partner                     Partner

Port Priority          Oper Key                    Port State

32768                  0xb                         0x3d

檢查 7

檢查埠通道事件歷史記錄：

FPR9K-1-A(fxos)# show port-channel internal event-history all

Low Priority Pending queue: len(0), max len(1) [Thu Apr  6 11:07:48 2017]

High Priority Pending queue: len(0), max len(16) [Thu Apr  6 11:07:48 2017]

PCM Control Block info:

pcm_max_channels        : 4096

pcm_max_channel_in_use  : 48

pc count                : 3

hif-pc count            : 0

Max PC Cnt              : 104

Load-defer timeout      : 120

====================================================

PORT CHANNELS:

2LvPC PO in system : 0

port-channel11

channel       : 11

bundle        : 65535

ifindex       : 0x1600000a

admin mode    : active

oper mode     : active

fop ifindex   : 0x1a003000

nports     : 2

active     : 2

pre cfg    : 0

ltl        : 0x0 (0)

lif        : 0x0

iod        : 0x78 (120)

global id  : 3

flag       : 0

lock count : 0

num. of SIs: 0

ac mbrs    : 0 0

lacp graceful conv disable   : 0

lacp suspend indiv disable   : 1

pc min-links                 : 1

pc max-bundle                : 16

pc max active members        : 32

pc is-suspend-minlinks       : 0

port load defer enable       : 0

lacp fast-select-hot-standby disable   : 0

ethpm bundle lock count : 0

bundle res global id    : 2

Members:

Ethernet1/4 [bundle_no = 0]

Ethernet1/5 [bundle_no = 0]

port-channel external lock:

Lock Info: resource [eth-port-channel 11]

type[0] p_gwrap[(nil)]

FREE @ 246108 usecs after Wed Apr  5 14:18:10 2017

type[1] p_gwrap[(nil)]

FREE @ 436471 usecs after Wed Apr  5 16:15:30 2017

type[2] p_gwrap[(nil)]

FREE @ 436367 usecs after Wed Apr  5 16:15:30 2017

0x1600000a

internal (ethpm bundle) lock:

Lock Info: resource [eth-port-channel 11]

type[0] p_gwrap[(nil)]

FREE @ 246083 usecs after Wed Apr  5 14:18:10 2017

type[1] p_gwrap[(nil)]

FREE @ 610546 usecs after Wed Apr  5 16:19:04 2017

type[2] p_gwrap[(nil)]

FREE @ 610437 usecs after Wed Apr  5 16:19:04 2017

0x1600000a

>>>>FSM: <eth-port-channel 11> has 194 logged transitions<<<<<

1) FSM:<eth-port-channel 11> Transition at 557291 usecs after Wed Apr  5 16:04:27 2017

Previous state: [PCM_PC_ST_WAIT_REL_RESRC]

Triggered event: [PCM_PC_EV_REL_RESRC_DONE]

Next state: [PCM_PC_ST_INIT]

2) FSM:<eth-port-channel 11> Transition at 49036 usecs after Wed Apr  5 16:07:18 2017

Previous state: [PCM_PC_ST_INIT]

Triggered event: [PCM_PC_EV_L2_CREATE]

Next state: [PCM_PC_ST_WAIT_CREATE]

3) FSM:<eth-port-channel 11> Transition at 49053 usecs after Wed Apr  5 16:07:18 2017

Previous state: [PCM_PC_ST_WAIT_CREATE]

Triggered event: [PCM_PC_EV_L2_CREATED]

Next state: [PCM_PC_ST_CREATED]

檢查 8

Debug lacp all會產生非常大的輸出：

FPR9K-1-A(fxos)# debug lacp all

2017 Jul 11 10:42:23.854160 lacp: lacp_pkt_parse_pdu(569): lacp_pkt_parse_pdu: got packet from actorport=220a partnerport= 43

2017 Jul 11 10:42:23.854177 lacp: lacp_pkt_compute_port_params(1163): Ethernet1/3(0x1a002000): pa aggregatable state=1 ac aggregatable state=1 pkt sync=1 port_stateactive=1

2017 Jul 11 10:42:23.854190 lacp: lacp_pkt_compute_port_params(1170): p_el=(8000, 2-0-0-0-0-1, 136, 8000, 220a)

2017 Jul 11 10:42:23.854198 lacp: lacp_pkt_compute_port_params(1172): p_el_pkt=(8000, 2-0-0-0-0-1, 136, 8000, 220a)

2017 Jul 11 10:42:23.854207 lacp: lacp_utils_get_obj_type_from_ifidx(390): lacp_utils_get_obj_type_from_ifidx: For if-index 1a002000 , if_type =26

2017 Jul 11 10:42:23.854218 lacp: Malloc in fu_fsm_event_new@../utils/fsmutils/fsm.c[5317]-ty[1]0x9bf719c[124]

2017 Jul 11 10:42:23.854228 lacp: lacp_utils_cr_fsm_event(572): Called from lacp_utils_create_fsm_event_with_params: Create event 0x9bf719c

2017 Jul 11 10:42:23.854237 lacp: Malloc in fu_fsm_event_pair_new@../utils/fsmutils/fsm.c[5327]-ty[2]0x9bf730c[132]

2017 Jul 11 10:42:23.854248 lacp: fu_fsm_execute_all: match_msg_id(0), log_already_open(0)

2017 Jul 11 10:42:23.854257 lacp: Malloc in fu_fsm_event_new@../utils/fsmutils/fsm.c[5317]-ty[1]0x9bf719c[124]

2017 Jul 11 10:42:23.854268 lacp: fu_fsm_execute: (Ethernet1/3)

2017 Jul 11 10:42:23.854275 lacp:     current state [LACP_ST_PORT_MEMBER_COLLECTING_AND_DISTRIBUTING_ENABLED]

2017 Jul 11 10:42:23.854283 lacp:     current event [LACP_EV_PARTNER_PDU_IN_SYNC_COLLECT_ENABLED_DISTRIBUTING_ENABLED]

2017 Jul 11 10:42:23.854291 lacp:     next state    [FSM_ST_NO_CHANGE]

2017 Jul 11 10:42:23.854304 lacp: lacp_proto_get_state(969): IF Ethernet1/3(0x1a002000): end PartnerEnd(2): state TimeOut(1): enable_flag False

2017 Jul 11 10:42:23.854314 lacp: lacp_proto_record_pdu(2266): Recording PDU for LACP pkt on IF Ethernet1/3(0x1a002000)

2017 Jul 11 10:42:23.854325 lacp: lacp_proto_set_state(900): IF Ethernet1/3(0x1a002000): Set end ActorEnd(1): state Defaulted(6) from False to False

2017 Jul 11 10:42:23.854335 lacp: lacp_proto_get_state(969): IF Ethernet1/3(0x1a002000): end PartnerEnd(2): state TimeOut(1): enable_flag False

2017 Jul 11 10:42:23.854344 lacp: lacp_proto_update_ntt(2211): updateNTT called for IF Ethernet1/3(0x1a002000)

2017 Jul 11 10:42:23.854355 lacp: lacp_proto_get_state(969): IF Ethernet1/3(0x1a002000): end ActorEnd(1): state TimeOut(1): enable_flag True

2017 Jul 11 10:42:23.854362 lacp: lacp_timer_start_w_chgd_time(681): lacp_timer_start_w_chgd_time: starting timer with time in ms = 15000

2017 Jul 11 10:42:23.854377 lacp: lacp_timer_start(637): Timer Started: Timer_Arg ([rid type IF-Rid: ifidx 0x1a002000: ch_num 0: event_id LACP_EV_RECEIVE_PARTNER_PDU_TIMED_OUT(17): timer_id 426092: type PartnerTimedOut: active True: period_in_ms 15000])

2017 Jul 11 10:42:23.854386 lacp: lacp_timer_start(638): Timer period=15 seconds

2017 Jul 11 10:42:23.854396 lacp: Free ptr in fu_fsm_execute@../utils/fsmutils/fsm.c[1091] for addr 0x9bf719c

2017 Jul 11 10:42:23.854408 lacp: fu_fsm_execute_all: done processing event LACP_EV_PARTNER_PDU_IN_SYNC_COLLECT_ENABLED_DISTRIBUTING_ENABLED

2017 Jul 11 10:42:23.854419 lacp: fu_mts_drop ref 0x9bf7320 opc 90117

2017 Jul 11 10:42:23.854434 lacp: fu_fsm_execute_all: MTS_OPC_NET_L2_RX_DATA_HDR(msg_id 2623696) dropped

2017 Jul 11 10:42:23.854445 lacp: fu_fsm_engine_post_event_processing

2017 Jul 11 10:42:23.854453 lacp:  end of while in fu_fsm_engine

2017 Jul 11 10:42:23.854461 lacp: fu_handle_process_hot_plugin_msg: Entered the function line 143

2017 Jul 11 10:42:23.854468 lacp: begin fu_fsm_engine: line[2357]

2017 Jul 11 10:42:24.361501 lacp: lacp_pkt_encode_pdu_helper(770): lacp_pkt_encode_pdu_helper: pkt_len=LACP_PDU_LEN=110 periodic_rate:1

2017 Jul 11 10:42:24.361530 lacp: lacp_pkt_encode_pdu_helper(797): lacp_pkt_encode_pdu_helper: if_idx=Ethernet1/3(0x1a002000) partner-mac=0-a6-ca-f3-c7-83 port_num=43

2017 Jul 11 10:42:24.361542 lacp: lacp_debug_wrapper_tl(1718): Executing [mcecm_api_is_pc_mcec]

2017 Jul 11 10:42:24.361551 lacp: lacp_debug_wrapper_tl(1718): input: if_index = [0x16000000]

2017 Jul 11 10:42:24.361559 lacp: lacp_debug_wrapper_tl(1718): Executing [mcecm_cache_is_pc_mcec]

2017 Jul 11 10:42:24.361568 lacp: lacp_debug_wrapper_tl(1718): output:0

2017 Jul 11 10:42:24.361589 lacp: lacp_pkt_encode_pdu_helper(842): 0x1a002000: Set short_timeout to periodic_rate:1

2017 Jul 11 10:42:24.361599 lacp: lacp_pkt_encode_pdu_helper(879): lacp_pkt_encode_pdu_helper: actor-port-state=3f agg=1 insync=1 coll=1 dis=1 active=1 short_timeout=1

2017 Jul 11 10:42:24.361612 lacp: lacp_pkt_encode_pdu_helper(906): lacp_pkt_encode_pdu_helper: if_idx=Ethernet1/3(0x1a002000) partner-port-state=3d agg=1 insync=1 coll=1 dis=1 active=1 short-timeout=0

2017 Jul 11 10:42:24.361624 lacp: lacp_pkt_encode_pdu_helper(910): lacp_pkt_encode_pdu_helper: if_idx=Ethernet1/3(0x1a002000) partner-mac=2-0-0-0-0-1 port_num=220a

2017 Jul 11 10:42:24.361636 lacp: lacp_net_tx_data(206): lacp_net_tx_data: Sending buffer with length 110

2017 Jul 11 10:42:24.361648 lacp: lacp_net_tx_data(215): 01 01 01 14 ffff

2017 Jul 11 10:42:24.361658 lacp: lacp_net_tx_data(215): ffff

2017 Jul 11 10:42:24.361668 lacp: lacp_net_tx_data(215): 00 00 00 02 14 ffff

2017 Jul 11 10:42:24.361678 lacp: lacp_net_tx_data(215): ffff

2017 Jul 11 10:42:24.361689 lacp: lacp_net_tx_data(215): 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00

2017 Jul 11 10:42:24.361700 lacp: lacp_net_tx_data(215): 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00

2017 Jul 11 10:42:24.361710 lacp: lacp_net_tx_data(215): 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00

2017 Jul 11 10:42:24.361721 lacp: lacp_net_tx_data(247): Ethernet1/3(0x1a002000): Tx LACP PDU len: 110 As:3f, Ps:3d

2017 Jul 11 10:42:24.361753 lacp: lacp_proto_get_state(969): IF Ethernet1/3(0x1a002000): end PartnerEnd(2): state TimeOut(1): enable_flag False

2017 Jul 11 10:42:24.361764 lacp: lacp_proto_restart_tx_timer(1802): lacp_proto_restart_tx_timer: got enable flag=0 before sending on interface Ethernet1/3(0x1a002000)

2017 Jul 11 10:42:24.361773 lacp: lacp_proto_restart_tx_timer(1825): lacp_proto_restart_tx_timer: flag 0 interface Ethernet1/3(0x1a002000) periodic_timer is fast

2017 Jul 11 10:42:24.361782 lacp: lacp_timer_start_w_chgd_time(681): lacp_timer_start_w_chgd_time: starting timer with time in ms = 1000

2017 Jul 11 10:42:24.361798 lacp: lacp_timer_start(637): Timer Started: Timer_Arg ([rid type IF-Rid: ifidx 0x1a002000: ch_num 0: event_id LACP_EV_PERIODIC_TRANSMIT_TIMER_EXPIRED(19): timer_id 400214: type PDUSendTime: active True: period_in_ms 1000])

2017 Jul 11 10:42:24.361807 lacp: lacp_timer_start(638): Timer period=1 seconds

2017 Jul 11 10:42:24.361820 lacp: lacp_pkt_encode_pdu_helper(770): lacp_pkt_encode_pdu_helper: pkt_len=LACP_PDU_LEN=110 periodic_rate:1

2017 Jul 11 10:42:24.361833 lacp: lacp_pkt_encode_pdu_helper(797): lacp_pkt_encode_pdu_helper: if_idx=Ethernet1/4(0x1a003000) partner-mac=0-a6-ca-f3-c7-83 port_num=44

2017 Jul 11 10:42:24.361841 lacp: lacp_debug_wrapper_tl(1718): Executing [mcecm_api_is_pc_mcec]

2017 Jul 11 10:42:24.361849 lacp: lacp_debug_wrapper_tl(1718): input: if_index = [0x16000000]

2017 Jul 11 10:42:24.361857 lacp: lacp_debug_wrapper_tl(1718): Executing [mcecm_cache_is_pc_mcec]

2017 Jul 11 10:42:24.361865 lacp: lacp_debug_wrapper_tl(1718): output:0

2017 Jul 11 10:42:24.361879 lacp: lacp_pkt_encode_pdu_helper(842): 0x1a003000: Set short_timeout to periodic_rate:1

2017 Jul 11 10:42:24.361888 lacp: lacp_pkt_encode_pdu_helper(879): lacp_pkt_encode_pdu_helper: actor-port-state=7f agg=1 insync=1 coll=1 dis=1 active=1 short_timeout=1

2017 Jul 11 10:42:24.361899 lacp: lacp_pkt_encode_pdu_helper(906): lacp_pkt_encode_pdu_helper: if_idx=Ethernet1/4(0x1a003000) partner-port-state=0 agg=0 insync=0 coll=0 dis=0 active=0 short-timeout=0

2017 Jul 11 10:42:24.361910 lacp: lacp_pkt_encode_pdu_helper(910): lacp_pkt_encode_pdu_helper: if_idx=Ethernet1/4(0x1a003000) partner-mac=0-0-0-0-0-0 port_num=0

2017 Jul 11 10:42:24.361920 lacp: lacp_net_tx_data(206): lacp_net_tx_data: Sending buffer with length 110

2017 Jul 11 10:42:24.361930 lacp: lacp_net_tx_data(215): 01 01 01 14 ffff

2017 Jul 11 10:42:24.361940 lacp: lacp_net_tx_data(215): ffff

2017 Jul 11 10:42:24.361950 lacp: lacp_net_tx_data(215): 00 00 00 02 14 00 00 00 00 00 00 00 00 00 00 00 00

2017 Jul 11 10:42:24.361960 lacp: lacp_net_tx_data(215): 00 00 00 00 00 00 03 10 00 00 00 00 00 00 00 00 00

2017 Jul 11 10:42:24.361971 lacp: lacp_net_tx_data(215): 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00

2017 Jul 11 10:42:24.361981 lacp: lacp_net_tx_data(215): 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00

2017 Jul 11 10:42:24.361991 lacp: lacp_net_tx_data(215): 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00

2017 Jul 11 10:42:24.362001 lacp: lacp_net_tx_data(247): Ethernet1/4(0x1a003000): Tx LACP PDU len: 110 As:7f, Ps:00

2017 Jul 11 10:42:24.362022 lacp: lacp_proto_get_state(969): IF Ethernet1/4(0x1a003000): end PartnerEnd(2): state TimeOut(1): enable_flag False

2017 Jul 11 10:42:24.362032 lacp: lacp_proto_restart_tx_timer(1802): lacp_proto_restart_tx_timer: got enable flag=0 before sending on interface Ethernet1/4(0x1a003000)

2017 Jul 11 10:42:24.362042 lacp: lacp_proto_restart_tx_timer(1825): lacp_proto_restart_tx_timer: flag 0 interface Ethernet1/4(0x1a003000) periodic_timer is fast

2017 Jul 11 10:42:24.362050 lacp: lacp_timer_start_w_chgd_time(681): lacp_timer_start_w_chgd_time: starting timer with time in ms = 1000

2017 Jul 11 10:42:24.362062 lacp: lacp_timer_start(637): Timer Started: Timer_Arg ([rid type IF-Rid: ifidx 0x1a003000: ch_num 0: event_id LACP_EV_PERIODIC_TRANSMIT_TIMER_EXPIRED(19): timer_id 399340: type PDUSendTime: active True: period_in_ms 1000])

提示

檢查是否從對等體接收LACP資料包。例如，Ethernet1/3介面接收LACP資料包，但Ethernet1/4否：

2017 Jul 11 10:42:25.641920 lacp: lacp_net_get_pkt_info(746): Packet received on phy_if_idx Ethernet1/3(0x1a002000): log_if_idx Ethernet1/3(0x1a002000): pkt_len 124 l2 header len 14

2017 Jul 11 10:42:25.641937 lacp: lacp_net_process_rx_data(480): Ethernet1/3(0x1a002000): Rx LACP PDU len: 124 As:3f, Ps:3d

檢查 9

在此輸出中，介面Ethernet1/4是Port-Channel的成員，但處於個別模式（在交換器端擱置）：

ciscofcm01-A(fxos)# show lacp internal event-history interface ethernet 1/4

>>>>FSM: <Ethernet1/4> has 549 logged transitions<<<<<

1) FSM:<Ethernet1/4> Transition at 385779 usecs after Wed Jul  5 13:13:03 2017

Previous state: [LACP_ST_PORT_IS_DOWN_OR_LACP_IS_DISABLED]

Triggered event: [LACP_EV_CLNUP_PHASE_II]

Next state: [LACP_ST_PORT_IS_DOWN_OR_LACP_IS_DISABLED]

2) FSM:<Ethernet1/4> Transition at 955546 usecs after Wed Jul  5 13:13:03 2017

Previous state: [LACP_ST_PORT_IS_DOWN_OR_LACP_IS_DISABLED]

Triggered event: [LACP_EV_LACP_ENABLED_AND_PORT_UP]

Next state: [LACP_ST_DETACHED_LAG_NOT_DETERMINED]

3) FSM:<Ethernet1/4> Transition at 962224 usecs after Wed Jul  5 13:13:10 2017

Previous state: [LACP_ST_DETACHED_LAG_NOT_DETERMINED]

Triggered event: [LACP_EV_RECEIVE_PARTNER_PDU_TIMED_OUT]

Next state: [FSM_ST_NO_CHANGE]

4) FSM:<Ethernet1/4> Transition at 963838 usecs after Wed Jul  5 13:13:13 2017

Previous state: [LACP_ST_DETACHED_LAG_NOT_DETERMINED]

Triggered event: [LACP_EV_RECEIVE_PARTNER_PDU_TIMED_OUT]

Next state: [FSM_ST_NO_CHANGE]

5) FSM:<Ethernet1/4> Transition at 964002 usecs after Wed Jul  5 13:13:13 2017

Previous state: [LACP_ST_DETACHED_LAG_NOT_DETERMINED]

Triggered event: [LACP_EV_RECEIVE_PARTNER_PDU_TIMED_OUT_II_INDIVIDUAL]

Next state: [LACP_ST_INDIVIDUAL_OR_DEFAULT]

6) FSM:<Ethernet1/4> Transition at 735923 usecs after Wed Jul  5 13:13:36 2017

Previous state: [LACP_ST_INDIVIDUAL_OR_DEFAULT]

Triggered event: [LACP_EV_UNGRACEFUL_DOWN]

Next state: [LACP_ST_PORT_IS_DOWN_OR_LACP_IS_DISABLED]

檢查 10

在此輸出中，雖然屬於PortChannel1的成員的Ethernet1/4處於獨立模式，但介面Ethernet1/3仍可正常工作並屬於PortChannel1。請注意，Ethernet1/3傳送(tx)和接收(rx)封包，但Ethernet1/4僅傳送(rx) no tx：

ciscofcm01-A(fxos)# debug lacp pkt

ciscofcm01-A(fxos)# 2017 Jul 11 11:04:05.278736 lacp: lacp_net_process_rx_data(480): Ethernet1/3(0x1a002000): Rx LACP PDU len: 124 As:3f, Ps:3d

2017 Jul 11 11:04:05.602855 lacp: lacp_net_tx_data(247): Ethernet1/3(0x1a002000): Tx LACP PDU len: 110 As:3f, Ps:3d

2017 Jul 11 11:04:05.983134 lacp: lacp_net_tx_data(247): Ethernet1/4(0x1a003000): Tx LACP PDU len: 110 As:7f, Ps:00

2017 Jul 11 11:04:06.249929 lacp: lacp_net_process_rx_data(480): Ethernet1/3(0x1a002000): Rx LACP PDU len: 124 As:3f, Ps:3d

2017 Jul 11 11:04:06.602815 lacp: lacp_net_tx_data(247): Ethernet1/3(0x1a002000): Tx LACP PDU len: 110 As:3f, Ps:3d

2017 Jul 11 11:04:06.992812 lacp: lacp_net_tx_data(247): Ethernet1/4(0x1a003000): Tx LACP PDU len: 110 As:7f, Ps:00

2017 Jul 11 11:04:07.163780 lacp: lacp_net_process_rx_data(480): Ethernet1/3(0x1a002000): Rx LACP PDU len: 124 As:3f, Ps:3d

2017 Jul 11 11:04:07.602814 lacp: lacp_net_tx_data(247): Ethernet1/3(0x1a002000): Tx LACP PDU len: 110 As:3f, Ps:3d

2017 Jul 11 11:04:08.002817 lacp: lacp_net_tx_data(247): Ethernet1/4(0x1a003000): Tx LACP PDU len: 110 As:7f, Ps:00

2017 Jul 11 11:04:08.102006 lacp: lacp_net_process_rx_data(480): Ethernet1/3(0x1a002000): Rx LACP PDU len: 124 As:3f, Ps:3d

2017 Jul 11 11:04:08.612810 lacp: lacp_net_tx_data(247): Ethernet1/3(0x1a002000): Tx LACP PDU len: 110 As:3f, Ps:3d

2017 Jul 11 11:04:09.002811 lacp: lacp_net_tx_data(247): Ethernet1/4(0x1a003000): Tx LACP PDU len: 110 As:7f, Ps:00

2017 Jul 11 11:04:09.091937 lacp: lacp_net_process_rx_data(480): Ethernet1/3(0x1a002000): Rx LACP PDU len: 124 As:3f, Ps:3d

2017 Jul 11 11:04:09.622810 lacp: lacp_net_tx_data(247): Ethernet1/3(0x1a002000): Tx LACP PDU len: 110 As:3f, Ps:3d

2017 Jul 11 11:04:10.002807 lacp: lacp_net_tx_data(247): Ethernet1/4(0x1a003000): Tx LACP PDU len: 110 As:7f, Ps:00

2017 Jul 11 11:04:10.004411 lacp: lacp_net_process_rx_data(480): Ethernet1/3(0x1a002000): Rx LACP PDU len: 124 As:3f, Ps:3d

2017 Jul 11 11:04:10.632806 lacp: lacp_net_tx_data(247): Ethernet1/3(0x1a002000): Tx LACP PDU len: 110 As:3f, Ps:3d

2017 Jul 11 11:04:10.854094 lacp: lacp_net_process_rx_data(480): Ethernet1/3(0x1a002000): Rx LACP PDU len: 124 As:3f, Ps:3d

2017 Jul 11 11:04:11.002789 lacp: lacp_net_tx_data(247): Ethernet1/4(0x1a003000): Tx LACP PDU len: 110 As:7f, Ps:00

2017 Jul 11 11:04:11.642807 lacp: lacp_net_tx_data(247): Ethernet1/3(0x1a002000): Tx LACP PDU len: 110 As:3f, Ps:3d

2017 Jul 11 11:04:11.714199 lacp: lacp_net_process_rx_data(480): Ethernet1/3(0x1a002000): Rx LACP PDU len: 124 As:3f, Ps:3d

如需其他資訊，請查閱本檔案：

問：如何從Show Tech Output中找到FXOS捆綁包版本？

方式1

在FPRM tar檔案中，擷取FPRM_A_TechSupport.tar.gz檔案的內容。然後開啟sam_techsupportinfo檔案並搜尋Package-Verse：

FPR4140-A# show fabric-interconnect firmware

Fabric Interconnect A:

Running-Kern-Vers: 5.0(3)N2(4.11.74)

Running-Sys-Vers: 5.0(3)N2(4.11.74)

Package-Vers: 2.1(1.77)

Startup-Kern-Vers: 5.0(3)N2(4.11.74)

Startup-Sys-Vers: 5.0(3)N2(4.11.74)

Act-Kern-Status: Ready

Act-Sys-Status: Ready

Bootloader-Vers:

方式2

在FRPM tar檔案中，擷取FPRM_A_TechSupport.tar.gz檔案的內容。然後開啟/var/sysmgr/sam_logs/svc_sam_dme.log檔案並搜尋aInPlatformVersion關鍵字：

問：MIO如何將介面資訊（增加/刪除）傳播到刀片應用(FTD、ASA)？

它使用MIO App-Agent元件。

例如，從MIO將新連線埠通道指派給FTD時：

FTD應用程式代理程式偵錯顯示：

firepower# debug app-agent 255

appagent : part 0 : ftd_001_JAD19500BAB0Z690F2.interfaceMapping.update

appagent : part 1 : ssp-xml:3

appagent : part 2 : 7

appagent : part 3 : appAG

appagent : part 4 : <interfaceMappingConfigUpdateRequest><interfaceMapping action="insert"><externalPort><portName>Port-channel11</portName><vlan>1011</vlan><role>data</role><mode>individual</mode><mc_mode>individual</mc_mode><status>down</status><speed>1000</speed><mac type="system">5897.bdb9.367e</mac></externalPort><internalPort><bladeVNIC>9</bladeVNIC>

<bladeVNIC>22</bladeVNIC></internalPort></interfaceMapping></interfaceMappingConfigUpdateRequest>

appagent : Process the request message

appagent : It is an update request command

appagent : Invoke request msg handler for cmd interfaceMapping.update

appagent : Processing InterfaceMapping Update Message

appagent : Creating Interface Mapping Structure.

appagent : Processing the tag externalPort.

appagent : ================================

appagent : PortName=Port-channel11

appagent : ftw capability=0

appagent : no available ftw peers

appagent : cleaning external_port_ftw_peers_t

appagent : Sending Response message for Interface Mapping update Message

appagent : Send response message to appAG

appagent : resp_msg->cmdName =appAG.interfaceMapping.update

appagent : resp_msg->content_version =ssp-xml:3

appagent : resp_msg->msgId =7

appagent : resp_msg->statuscode =100

appagent : resp_msg->data =<interfaceMappingConfigUpdateResponse>

<response>

<code>100</code>

<message>Request success</message>

</response>

</interfaceMappingConfigUpdateResponse>

appagent : part 0 : ftd_001_JAD19500BAB0Z690F2.interfaceStatus.update

appagent : part 1 : ssp-xml:3

appagent : part 2 : 8

appagent : part 3 : appAG

appagent : part 4 : <interfaceStatusUpdateRequest><interface><interfaceName>Port-channel11</interfaceName><externalOperationalStatus>down</externalOperationalStatus><internalOperationalStatus>up</internalOperationalStatus></interface></interfaceStatusUpdateRequest>

appagent : Process the request message

appagent : It is an update request command

appagent : Invoke request msg handler for cmd interfaceStatus.update

appagent : Processing Interface Status Update Request.

appagent : The Fxos version is 2.1.1 or newer

appagent : Parsing interface status update request message for FXOS > 211

appagent : Parsing Interface Status Req.

appagent : Interface Status Successfully Updated.

appagent : Sending Response for Interface Status Update Request

appagent : Send response message to appAG

appagent : resp_msg->cmdName =appAG.interfaceStatus.update

appagent : resp_msg->content_version =ssp-xml:3

appagent : resp_msg->msgId =8

appagent : resp_msg->statuscode =100

appagent : resp_msg->data =<interfaceStatusUpdateResponse>

<response>

<code>100</code>

<message>Request success</message>

</response>

</interfaceStatusUpdateResponse>

問：在Firepower機箱的RMA中，必須使用什麼序列號(SN)？

Firepower機箱具有多個SN。RMA請求所用的命令可從以下輸出中獲取：

FP4120-5-A# scope chassis 1

FP4120-5-A /chassis # show inventory

Chassis    PID             Vendor            Serial (SN) HW Revision

---------- --------------- ----------------- ----------- -----------

1 FPR-4120-K9     Cisco Systems Inc FLM12345KL6 0

或:

FP4120-5-A# connect local-mgmt

FP4120-5-A(local-mgmt)# show license all

Smart Licensing Status

======================

Smart Licensing is ENABLED

Registration:

Status: UNREGISTERED

Export-Controlled Functionality: Not Allowed

License Authorization:

Status: No Licenses in Use

License Usage

==============

No licenses in use

Product Information

===================

UDI: PID:FPR-4120-SUP,SN:JAD19500BAB

或:

FP4120-5-A# scope license

FP4120-5-A /license # show license all

Smart Licensing Status

======================

Smart Licensing is ENABLED

Registration:

Status: UNREGISTERED

Export-Controlled Functionality: Not Allowed

License Authorization:

Status: No Licenses in Use

License Usage

==============

No licenses in use

Product Information

===================

UDI: PID:FPR-4120-SUP,SN:JAD19500BAB

問：您能否在2個不同的FXOS機箱之間交換SSD1？

簡短的回答是「否」。SSD1包含應用映像（例如FTD或ASA）。如果您將SSD1從機箱中取出，並將其插入不同的機箱，則模組不會出現，並且會顯示以下錯誤：

F1548 2017-11-08T11:36:40.095 427280刀鋒交換偵測到插槽1

安全模組映像不匹配

伺服器1/1上缺少本地磁碟1

問：如何檢查機箱功耗？

從FXOS 2.2.1版本開始，您可以使用命令show environment summary：

FPR4100-1 /chassis # show environment summary

Chassis INFO :

Total Power Consumption: 440.000000

Inlet Temperature (C): 21.000000

CPU Temperature (C): 39.000000

Last updated Time: 2018-07-01T09:39:55.157

PSU 1:

Type: AC

Input Feed Status: Ok

12v Output Status: Ok

Overall Status: Operable

PSU 2:

Type: AC

Input Feed Status: N/A

12v Output Status: N/A

Overall Status: Removed

FAN 1

Fan Speed RPM (RPM): 12110

Speed Status: Ok

Overall Status: Operable

FAN 2

Fan Speed RPM (RPM): 12110

Speed Status: Ok

Overall Status: Operable

FAN 3

Fan Speed RPM (RPM): 12100

Speed Status: Ok

Overall Status: Operable

有關其他資訊，請檢視：

監控機箱運行狀況

問：如何檢查開機載入器版本？

FPR-4110-7-A# scope chassis 1

FPR-4110-7-A /chassis # scope server 1

FPR-4110-7-A /chassis/server # scope adapter 1

FPR-4110-7-A /chassis/server/adapter # show version detail

Adapter 1:

Running-Vers: 5.3(1.91)

Package-Vers: 2.3(1.88)

Update-Status: Ready

Activate-Status: Ready

Bootloader-Update-Status: Ready

Startup-Vers: 5.3(1.91)

Backup-Vers: 5.3(1.48)

Bootloader-Vers: MF-111-234949

問：如何升級引導載入程式？

安裝FXOS 2.3.1.58或更新版本後，系統可能會顯示您的安全裝置上發生嚴重故障，指示需要升級介面卡韌體：

Critical F1715 2017-05-11T11:43:33.121 339561 Adapter 1 on Security Module 1 requires a critical firmware upgrade. Please see Adapter Bootloader Upgrade instructions in the FXOS Release Notes posted with this release.

開機載入程式升級的程式在此連結中說明：

https://www.cisco.com/c/en/us/td/docs/security/firepower/fxos/fxos231/release/notes/fxos231_rn.html#pgfId-173826

如果在引導載入程式升級期間遇到以下錯誤，可以嘗試使用「force」選項。

FPR-4110-7-A# scope chassis 1

FPR-4110-7-A /chassis # scope server 1

FPR-4110-7-A /chassis/server # scope adapter 1/1/1

FPR-4110-7-A /chassis/server/adapter # show image

Name Type Version

--------------------------------------------- -------------------- -------

fxos-m83-8p40-cruzboot.4.0.1.62.bin Adapter Boot 4.0(1.62)

fxos-m83-8p40-vic.4.0.1.51.bin Adapter 4.0(1.51)

fxos-m83-8p40-vic.5.3.1.2.bin Adapter 5.3(1.2)

fxos-m83-8p40-vic.5.3.1.48.bin Adapter 5.3(1.48)

fxos-m83-8p40-vic.5.3.1.91.bin Adapter 5.3(1.91)

FPR-4110-7-A /chassis/server/adapter # update boot-loader 4.0(1.62)

Warning: Please DO NOT reboot blade or chassis during uprgade, otherwise, it may cause adapter UNUSABLE

After upgrade completed, blade must be power cycled automatically

FPR-4110-7-A /chassis/server/adapter* # commit-buffer

Error: Update failed: [This adaptor is not applicable for boot-loader upgrade.]

問：如何停用絕對SSH超時？

這在實驗室測試和故障排除過程中非常有用。請注意，此絕對超時是一種安全最佳實踐，對於非零值，如果要在使用者環境中暫時完成，請注意這一點。

FPR-4115-A# scope security

FPR-4115-A /security # scope default-auth

FPR-4115-A /security/default-auth # show detail

Default authentication:

Admin Realm: Local

Operational Realm: Local

Web session refresh period(in secs): 600

Idle Session timeout(in secs) for web, ssh, telnet sessions: 3600

Absolute Session timeout(in secs) for web, ssh, telnet sessions: 3600

Serial Console Idle Session timeout(in secs): 3600

Serial Console Absolute Session timeout(in secs): 3600

Admin Authentication server group:

Operational Authentication server group:

Use of 2nd factor: No

FPR-4115-A /security/default-auth # set absolute-session-timeout 0

FPR-4115-A /security/default-auth* # commit-buffer

FPR-4115-A /security/default-auth # show detail

Default authentication:

Admin Realm: Local

Operational Realm: Local

Web session refresh period(in secs): 600

Idle Session timeout(in secs) for web, ssh, telnet sessions: 3600

Absolute Session timeout(in secs) for web, ssh, telnet sessions: 0

Serial Console Idle Session timeout(in secs): 3600

Serial Console Absolute Session timeout(in secs): 3600

Admin Authentication server group:

Operational Authentication server group:

Use of 2nd factor: No

問：如何捕獲發往機箱管理引擎（控制平面）的LACP資料包？

發往Firepower 4100/9300機箱管理引擎（控制平面）的LACP資料包封裝在特定資料包的資料部分內，並可使用ethanalyzer命令在內部入站- 高介面上捕獲。從值為01 80 C2 00 00 02（IEEE 802.3 Slow_Protocols_Multicast地址）的位元組開始嵌入LACP PDU位元組，直至資料部分結束：

firepower# connect fxos

...

firepower(fxos)# ethanalyzer local interface inbound-hi limit-captured-frames 10000 limit-frame-size 9000 detail

Capturing on 'eth4'

Frame 1: 188 bytes on wire (1504 bits), 188 bytes captured (1504 bits) on interface 0

Interface id: 0 (eth4)

Interface name: eth4

Encapsulation type: Ethernet (1)

Arrival Time: Dec  5, 2023 09:16:06.736180828 UTC

[Time shift for this packet: 0.000000000 seconds]

Epoch Time: 1701767766.736180828 seconds

[Time delta from previous captured frame: 0.000000000 seconds]

[Time delta from previous displayed frame: 0.000000000 seconds]

[Time since reference or first frame: 0.000000000 seconds]

Frame Number: 1

Frame Length: 188 bytes (1504 bits)

Capture Length: 188 bytes (1504 bits)

[Frame is marked: False]

[Frame is ignored: False]

[Protocols in frame: eth:ethertype:vlan:ethertype:data]

Ethernet II, Src: 02:10:18:a3:4f:f5 (02:10:18:a3:4f:f5), Dst: 58:97:bd:b9:36:4e (58:97:bd:b9:36:4e)

Destination: 58:97:bd:b9:36:4e (58:97:bd:b9:36:4e)

Address: 58:97:bd:b9:36:4e (58:97:bd:b9:36:4e)

.... ..0. .... .... .... .... = LG bit: Globally unique address (factory default)

.... ...0 .... .... .... .... = IG bit: Individual address (unicast)

Source: 02:10:18:a3:4f:f5 (02:10:18:a3:4f:f5)

Address: 02:10:18:a3:4f:f5 (02:10:18:a3:4f:f5)

.... ..1. .... .... .... .... = LG bit: Locally administered address (this is NOT the factory default)

.... ...0 .... .... .... .... = IG bit: Individual address (unicast)

Type: 802.1Q Virtual LAN (0x8100)

802.1Q Virtual LAN, PRI: 0, DEI: 0, ID: 4048

000. .... .... .... = Priority: Best Effort (default) (0)

...0 .... .... .... = DEI: Ineligible

.... 1111 1101 0000 = ID: 4048

Type: Unknown (0xde08)

Data (170 bytes)

0000  b8 50 20 04 00 00 00 00 00 00 00 00 00 00 81 00   .P .............

0010  00 00 00 00 00 04 09 04 cd 00 00 00 00 00 00 00   ................

0020  00 00 00 00 00 00 00 00 00 00 00 00 00 00 01 80   ................

0030  c2 00 00 02 58 97 bd b9 36 51 88 09 01 01 01 14   ....X...6Q......

0040  80 00 58 97 bd b9 36 4d 00 28 80 00 00 44 3f 00   ..X...6M.(...D?.

0050  00 00 02 14 80 00 00 17 df d6 ec 00 00 33 80 00   .............3..

0060  02 2c 3d 00 00 00 03 10 00 00 00 00 00 00 00 00   .,=.............

0070  00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00   ................

0080  00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00   ................

0090  00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00   ................

00a0  00 00 00 00 00 00 00 00 00 00                     ..........

Data: b85020040000000000000000000081000000000000040904...

使用聯機工具可將十六進位制轉儲轉換為PCAP。

問：如何查詢SSD資訊？

以下是FN72077中步驟1的解決辦法/解決方案部分提到的所有FXOS版本，都提供了機箱管理引擎內部SSD資訊：

KSEC-FPR4112-4 # scope chassis 1

KSEC-FPR4112-4 /chassis # show sup version detail

SUP FIRMWARE:

ROMMON:

Running-Vers: 1.0.15

Package-Vers: 1.0.18

Activate-Status: Ready

Upgrade Status: SUCCESS

FPGA:

Running-Vers: 2.00

Package-Vers: 1.0.18

Activate-Status: Ready

SSD:

Running-Vers: MU03

Model: Micron_M500IT_MTFDDAT128MBD

安全引擎（刀鋒） SSD：

KSEC-FPR4112-4# show server storage detail

Server 1/1:

<output skipped>

RAID Controller 1:

Type: SATA

Vendor: Cisco Systems Inc

Model: FPR4K-PT-01

Serial: JAD260508TZ

HW Revision:

PCI Addr: 00:31.2

Raid Support:

OOB Interface Supported: No

Rebuild Rate: N/A

Controller Status: Unknown

Local Disk 1:

Vendor: INTEL

Model: SSDSC2KG48

Serial: PHYG109603PA480BGN

HW Rev: 0

Operability: Operable

Presence: Equipped

Size (MB): 400000

Drive State: Online

Power State: Active

Link Speed: 6 Gbps

Device Type: SSD

Local Disk 2:

Vendor: INTEL

Model: SSDSC2KG96

Serial: PHYG143301JG960CGN

HW Rev: 0

Operability: Operable

Presence: Equipped

Size (MB): 800000

Drive State: Online

Power State: Active

Link Speed: 6 Gbps

Device Type: SSD

Local Disk Config Definition:

Mode: No RAID

Description:

Protect Configuration: No

問：如何設定內部交換器(FXOS)擷取？

請參閱文章配置和驗證安全防火牆和Firepower內部交換機捕獲。

參考資料

- Cisco Firepower 4100/9300 FXOS安全防火牆機箱管理器配置指南，2.14(1)

- Cisco Secure FXOS for Firepower 4100/9300 CLI配置指南，2.14(1)

- Cisco Firepower 4100/9300 FXOS命令參考

- 配置並驗證安全防火牆和Firepower內部交換機捕獲