目錄

簡介

背景資訊

簡介

本檔案介紹所見的錯誤「Aquarium|screenLoop」的典型根本原因。

背景資訊

這些應用程式故障的單個例項可視為良性。它們通常是快速連續提交兩次相同的網頁導致的。頻繁或定期的應用程式故障值得客戶支援部門進一步調查。

這些示例包括：

發生應用程式故障：(('CoroSessionContainer', '__getitem__',

'230')、'aquarium.session.CoroSessionContainer.CoroSessionKeyError'、

「<exceptions.KeyError instance at 0x995684c>」，

'[Aquarium|screenLoop|344] [InternalLibrary|inverseExtend|321]

[InternalLibrary|__call__|735] [Bare|__call__|579]

[InternalLibrary|__call__|735] [CssAndJavaScript|__call__|452]

[InternalLibrary|__call__|735] [Sparse|__call__|977]

[NameMapper|valueFromSearchList|250] [NameMapper|_valueForName|229]

[完成|doPrimaryNavigation|134] [InternalLibrary|call|273]

[PrimaryComplete|__call__|105] [NameMapper|valueForName|212]

[NameMapper|_valueForName|229] [Map|getFilteredMap|203]

[Map|_getFilteredMap|220] [Map|hasAccess|271]

[CoroSessionContainer|__getitem__|230]')

發生應用程式故障：(('scheduled_reports_super',

'doSaveNewAction', '200'),'exceptions.KeyError',"'name'",

'[Aquarium|screenLoop|397] [InternalLibrary|inverseExtend|321]

[InternalLibrary|__call__|739] [Controller|__call__|23]

[InternalLibrary|__call__|739] [CommonController|__call__|38]

[InternalLibrary|__call__|739] [AppController|__call__|127]

[InternalLibrary|__call__|741] [scheduled_reports_new|__call__|29]

[scheduled_reports_super|executeAction|172]

[Controller|executeAction|65]

[scheduled_reports_super|doSaveNewAction|200]')