目錄

簡介

問題

解決方案

相關資訊

簡介

本文檔介紹如何解決導致錯誤的安全管理裝置(SMA)和電子郵件安全裝置(ESA)整合故障："(3, '找不到匹配的金鑰交換演算法。')或"Unexpected EOF on connect"和其他症狀。

背景資訊

SMA與ESA的連線在首次整合時，SMA為ESA提供以下密碼/金鑰交換演算法：

kex_algorithms string: diffie-hellman-group-exchange-sha256,diffie-hellman-group-exchange-sha1,diffie-hellman-group14-sha1,ecdh-sha2-nistp256,ecdh-sha2-nistp384,ecdh-sha2-nistp521

encryption_algorithms_client_to_server string: aes128-ctr,aes192-ctr,aes256-ctr,aes128-cbc,3des-cbc,blowfish-cbc,cast128-cbc,aes192-cbc,aes256-cbc,rijndael-cbc@lysator.liu.se

encryption_algorithms_server_to_client string: aes128-ctr,aes192-ctr,aes256-ctr,aes128-cbc,3des-cbc,blowfish-cbc,cast128-cbc,aes192-cbc,aes256-cbc,rijndael-cbc@lysator.liu.se

建立SMA和ESA連線後，SMA為ESA提供以下密碼/金鑰交換演算法：

kex_algorithms string: curve25519-sha256@libssh.org,ecdh-sha2-nistp256,ecdh-sha2-nistp384,ecdh-sha2-nistp521,diffie-hellman-group-exchange-sha256,diffie-hellman-group-exchange-sha1,diffie-hellman-group14-sha1,diffie-hellman-group1-sha1

encryption_algorithms_client_to_server string [truncated]: aes128-ctr,aes192-ctr,aes256-ctr,arcfour256,arcfour128,aes128-gcm@openssh.com,aes256-gcm@openssh.com,chacha20-poly1305@openssh.com,aes128-cbc,3des-cbc,blowfish-cbc,cast128-cbc,aes192-cbc,aes256-cbc,arcfour,rijndael-cbc@lysator.liu.se

encryption_algorithms_server_to_client string [truncated]: aes128-ctr,aes192-ctr,aes256-ctr,arcfour256,arcfour128,aes128-gcm@openssh.com,aes256-gcm@openssh.com,chacha20-poly1305@openssh.com,aes128-cbc,3des-cbc,blowfish-cbc,cast128-cbc,aes192-cbc,aes256-cbc,arcfour,rijndael-cbc@lysator.liu.se

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路運作中，請確保您瞭解任何指令可能造成的影響。

問題

從GUI > Management Appliance > Centralized Services > Security Appliances或CLI > applianceconfig將SMA整合到ESA時存在問題。此問題會在連線時提示錯誤，這是因為ESA缺少某些kex演算法/密碼演算法。

1. (3, 'Could not find matching key exchange algorithm.')

2. Error — Unexpected EOF on connect.

解決方案

要解決此問題，需要將ESA ssh密碼配置恢復為提供的預設值：

lab.esa.com> sshconfig

Choose the operation you want to perform:

- SSHD - Edit SSH server settings.

- USERKEY - Edit SSH User Key settings

- ACCESS CONTROL - Edit SSH whitelist/blacklist

[]> sshd

ssh server config settings:

Public Key Authentication Algorithms:

rsa1

ssh-dss

ssh-rsa

Cipher Algorithms:

aes128-ctr

aes192-ctr

aes256-ctr

aes128-cbc

3des-cbc

blowfish-cbc

cast128-cbc

aes192-cbc

aes256-cbc

rijndael-cbc@lysator.liu.se

MAC Methods:

hmac-md5

hmac-sha1

umac-64@openssh.com

hmac-ripemd160

hmac-ripemd160@openssh.com

hmac-sha1-96

hmac-md5-96

Minimum Server Key Size:

1024

KEX Algorithms:

diffie-hellman-group-exchange-sha256

diffie-hellman-group-exchange-sha1

diffie-hellman-group14-sha1

diffie-hellman-group1-sha1

ecdh-sha2-nistp256

ecdh-sha2-nistp384

ecdh-sha2-nistp521

CLI > sshconfig > sshd在逐步設定中的輸出：

[]> setup

Enter the Public Key Authentication Algorithms do you want to use

[rsa1,ssh-dss,ssh-rsa]>

Enter the Cipher Algorithms do you want to use

[aes128-ctr,aes192-ctr,aes256-ctr,aes128-cbc,3des-cbc,blowfish-cbc,cast128-cbc,aes192-cbc,aes256-cbc,rijndael-cbc@lysator.liu.se]>

Enter the MAC Methods do you want to use

[hmac-md5,hmac-sha1,umac-64@openssh.com,hmac-ripemd160,hmac-ripemd160@openssh.com,hmac-sha1-96,hmac-md5-96]>

Enter the Minimum Server Key Size do you want to use

[1024]>

Enter the KEX Algorithms do you want to use

[diffie-hellman-group-exchange-sha256,diffie-hellman-group-exchange-sha1,diffie-hellman-group14-sha1,diffie-hellman-group1-sha1,ecdh-sha2-nistp256,ecdh-sha2-nistp384,ecdh-sha2-nistp521]>

相關資訊

- Cisco Email Security Appliance — 最終使用手冊

- 技術支援與文件 - Cisco Systems

- 集中策略病毒和爆發隔離的最佳實踐

- 使用SMA設定ESA垃圾郵件隔離區的綜合指南