目錄

簡介

從ESA查詢DHAP事件

從GUI檢視或更新DHAP配置

從CLI檢視或更新DHAP配置

相關資訊

簡介

本檔案介紹如何在思科電子郵件安全裝置(ESA)上找到與目錄蒐集攻擊預防(DHAP)警報相關的資訊。

從ESA查詢DHAP事件

描述DHAP事件的條目駐留在郵件日誌中。以下是發生DHAP時的郵件日誌條目示例：

Tue Oct 18 00:25:35 2005 Warning: LDAP: Dropping connection due to potential Directory

Harvest Attack from host=(192.168.10.1', None), dhap_limit=4, sender_group=SUSPECTLIST

註：預設情況下，在搜索中會查詢/24網路掩碼。

在CLI中輸入此查詢以檢視郵件日誌：

myesa.local> grep "dhap_limit=" mail_logs

DHAP計數器包括收件人訪問表(RAT)拒絕和輕型目錄訪問協定(LDAP)接受查詢拒絕。DHAP設定是在郵件流策略中配置的。

從GUI檢視或更新DHAP配置

完成以下步驟，以便從GUI檢視或編輯DHAP配置引數：

1. 導航到Mail Policies > Mail Flow Policies。

2. 按一下策略名稱進行編輯，或按一下Default Policy Parameters檢視當前DHAP配置。

3. 根據需要對目錄收集攻擊預防(DHAP)部分進行更改：

4. 按一下Submit，然後按一下Commit以儲存更改。

從CLI檢視或更新DHAP配置

若要從CLI檢視或編輯DHAP配置參數，請輸入listenerconfig > edit [listener number] > hostaccess > default命令：

Default Policy Parameters

==========================

Maximum Message Size: 10M

Maximum Number Of Concurrent Connections From A Single IP: 10

Maximum Number Of Messages Per Connection: 10

Maximum Number Of Recipients Per Message: 50

Directory Harvest Attack Prevention: Enabled

Maximum Number Of Invalid Recipients Per Hour: 25

Maximum Number Of Recipients Per Hour: Disabled

Maximum Number of Recipients per Envelope Sender: Disabled

Use SenderBase for Flow Control: Yes

Spam Detection Enabled: Yes

Virus Detection Enabled: Yes

Allow TLS Connections: No

Allow SMTP Authentication: No

Require TLS To Offer SMTP authentication: No

DKIM/DomainKeys Signing Enabled: No

DKIM Verification Enabled: No

SPF/SIDF Verification Enabled: No

DMARC Verification Enabled: No

Envelope Sender DNS Verification Enabled: No

Domain Exception Table Enabled: No

Accept untagged bounces: No

There are currently 5 policies defined.

There are currently 8 sender groups.

Choose the operation you want to perform:

- NEW - Create a new entry.

- EDIT - Modify an entry.

- DELETE - Remove an entry.

- MOVE - Move an entry.

- DEFAULT - Set the defaults.

- PRINT - Display the table.

- IMPORT - Import a table from a file.

- EXPORT - Export the table to a file.

- RESET - Remove senders and set policies to system default.

[]> default

Enter the default maximum message size. Add a trailing k for kilobytes, M for

megabytes, or no letter for bytes.

[10M]>

Enter the maximum number of concurrent connections allowed from a single IP address.

[10]>

Enter the maximum number of messages per connection.

[10]>

Enter the maximum number of recipients per message.

[50]>

Do you want to override the hostname in the SMTP banner? [N]>

Would you like to specify a custom SMTP acceptance response? [N]>

Would you like to specify a custom SMTP rejection response? [N]>

Do you want to enable rate limiting per host? [N]>

Do you want to enable rate limiting per envelope sender? [N]>

Do you want to enable Directory Harvest Attack Prevention per host? [Y]>

Enter the maximum number of invalid recipients per hour from a remote host.

[25]>

Select an action to apply when a recipient is rejected due to DHAP:

1. Drop

2. Code

[1]>

Would you like to specify a custom SMTP DHAP response? [Y]>

Enter the SMTP code to use in the response. 550 is the standard code.

[550]>

Enter your custom SMTP response. Press Enter on a blank line to finish.

Would you like to use SenderBase for flow control by default? [Y]>

Would you like to enable anti-spam scanning? [Y]>

Would you like to enable anti-virus scanning? [Y]>

Do you want to allow encrypted TLS connections?

1. No

2. Preferred

3. Required

4. Preferred - Verify

5. Required - Verify

[1]>

Would you like to enable DKIM/DomainKeys signing? [N]>

Would you like to enable DKIM verification? [N]>

Would you like to change SPF/SIDF settings? [N]>

Would you like to enable DMARC verification? [N]>

Would you like to enable envelope sender verification? [N]>

Would you like to enable use of the domain exception table? [N]>

Do you wish to accept untagged bounces? [N]>

如果選擇進行更新，請確保返回主CLI提示符並提交所有更改。

相關資訊

- Cisco Email Security Appliance — 最終使用手冊

- 技術支援與檔案 - Cisco Systems