目錄

簡介

相關資訊

簡介

本文檔介紹如何使用TLSVERIFY排除TLS傳送問題。

與思科郵件安全裝置(ESA)上的郵件處理相關，您可能看到TLS未傳送或返回錯誤或警報。

在裝置的CLI上，使用tlsverify測試從裝置到外部域的TLS通訊。

mail3.example.com> tlsverify

Enter the TLS domain to verify against:

[]> example.com

Enter the destination host to connect to. Append the port

(example.com:26) if you are not connecting on port 25:

[example.com]> mxe.example.com:25

Connecting to 1.1.1.1 on port 25.

Connected to 1.1.1.1 from interface 10.10.10.10.

Checking TLS connection.

TLS connection established: protocol TLSv1, cipher RC4-SHA.

Verifying peer certificate.

Verifying certificate common name mxe.example.com.

TLS certificate match mxe.example.com

TLS certificate verified.

TLS connection to 1.1.1.1 succeeded.

TLS successfully connected to mxe.example.com.

TLS verification completed.

tlsverify命令的上述輸出顯示了從此裝置到IP地址為1.1.1.1的目標的TLS驗證。

相關資訊

- Cisco Email Security Appliance — 最終使用手冊

- 技術支援與文件 - Cisco Systems