目錄

簡介

背景資訊

升級集群中的ESA

簡介

本文說明如何升級在群集中執行的思科電子郵件安全裝置(ESA)。

背景資訊

當ESA在群集中運行時，它們必須使用完全相同的AsyncOS版本和內部版本。如果要升級ESA，必須先斷開群集連線。升級所有電腦後，可以通過clusterconfig命令重新連線群集。

附註：當群集斷開時，不影響郵件流；但是，在重新連線完成之前，在群集斷開連線時所做的任何更改都不會傳播到其他系統。

升級集群中的ESA

附註：您可以使用CLI或GUI執行升級，但是reconnect clusterconfig命令只能通過CLI使用。本文說明如何通過CLI升級電腦。

完成以下步驟，以便通過CLI升級群集中運行的ESA:

1. 在CLI中輸入upgrade命令，以便將AsyncOS升級到較新版本。當系統詢問您是否要斷開群集連線時，請用字母Y進行響應以繼續：

(Machine host1.example.com)> upgrade

You must disconnect all machines in the cluster in order to upgrade them. Do you wish

to disconnect all machines in the cluster now? [Y]> Y

2. 按照所有升級提示操作(包括reboot提示)。

3. 升級並重新引導群集中的所有電腦後，通過CLI登入到群集中的電腦並輸入clusterconfig命令。

4. 回應Yes重新連線。不必提交。

Choose the machine to reattach to the cluster. Separate multiple machines with commas

or specify a range with a dash.

1. host2.example.com (group Main)

2. host3.example.com (group Main)

3. host4.example.com (group Main)

[1]> 1-3