目錄

簡介

解決方案

簡介

本文檔介紹如何對特定域或主機的傳送進行速率限制。

解決方案

CLI上的destconfig命令或GUI中Mail Policies頁籤上的Destination Controls表可用於在思科郵件安全裝置上配置特定域或主機的傳送速率限制。有時建議啟用此選項以防止載入遠端主機。

以下是如何將速率傳遞限制到域「example.com」的CLI示例。

mail.example.com> destconfig

There are currently 2 entries configured.

Choose the operation you want to perform:

- NEW - Create a new entry.

- EDIT - Modify an entry.

- DELETE - Remove an entry.

- DEFAULT - Change the default.

- PRINT - Display all entries.

- CLEAR - Remove all entries.

[]> new

Enter the domain you wish to limit.

[]> example.com

Do you wish to configure a concurrency limit for example.com? [Y]>

Enter the max concurrency limit for "example.com".

[500]> 100

Do you wish to apply a recipient limit to this domain? [N]> y

Enter the number of minutes used to measure the recipient limit.

[60]> 60

Enter the max number of recipients per 60 minutes for "example.com".

[]> 1000

Select how you want to apply the limits for example.com:

1. One limit applies to the entire domain example.com

2. Separate limit for each mail exchanger IP address

[1]>

Select how the limits will be enforced:

1. System Wide

2. Per Virtual Gateway(tm)

[1]>

Do you wish to apply a specific TLS setting for this domain? [N]>

Do you wish to apply a specific bounce verification address tagging setting for this domain? [N]>

Do you wish to apply a specific bounce profile to this domain? [N]>

There are currently 3 entries configured

Choose the operation you want to perform:

- NEW - Create a new entry.

- EDIT - Modify an entry.

- DELETE - Remove an entry.

- DEFAULT - Change the default.

- PRINT - Display all entries.

- CLEAR - Remove all entries.

[]>

mail.example.com> commit