目錄

簡介

必要條件

需求

問題

解決方案

簡介

本檔案介紹如何將資料庫(DB)從一個Cisco M系列裝置備份至另一個裝置。

必要條件

需求

思科建議您瞭解以下主題：

- AsyncOS 7.2及更高版本

問題

開始將資料庫備份到輔助M系列裝置。

解決方案

以下是開始將資料庫備份到輔助M系列裝置之前的需求。

- 兩個M系列裝置必須位於同一個AsyncOS版本上（僅限7.2及更高版本）

- 目標M系列裝置必須具有足夠的磁碟空間進行備份。導航到系統管理>磁碟管理（請參閱聯機文檔，瞭解如何分配剩餘磁碟）。

如果在安裝過程中沒有足夠的磁碟空間，可能會收到類似以下內容的消息：

Verifying target machine for version compatibility and disk space...

Backup cannot be scheduled. Reason: There is not enough space for Centralized

Spam Quarantine, Centralized Email Tracking, Centralized Reporting. Please

increase disk allocation for these services on the target machine.

或

Verifying target machine for version compatibility and disk space...

Backup cannot be scheduled. Reason: There is not enough space for Centralized

Web Tracking. Please increase disk allocation for these services on the target

machine.

檢查目標電腦上前面提到的磁碟配額。

兩個安全管理裝置(SMA)、一個M650(名為m650sma.run的資料庫系統的源)和目標M1050(名為m1050sma.run和IP 192.168.15.1的資料庫系統的目標備份)。

登入到源M系列的CLI(在我們的測試sma1.example.com中)，然後輸入以下命令：

sma1.example.com> backupconfig

Choose the operation you want to perform:

- VIEW - View scheduled backups

- VERIFY - Verify if backup can be scheduled to a remote machine

- SCHEDULE - Schedule backup to an appliance

- CANCEL - Cancel a scheduled backup

- STATUS - Show the status of a backup in progress.

- SETUP - Configure backup parameters.

[]> setup

Enter level of verbosity:

[0]> 0         < this can be 0 or 3 0=lowest verbosity of backup logs and 3 is the highest>

Compression is desirable on slow connections, but will only slow down backup on

fast networks. Would you like to enable compression? [N]>   <hit enter here to pick default withing the brackets [N]>

Choose the operation you want to perform:

- VIEW - View scheduled backups

- VERIFY - Verify if backup can be scheduled to a remote machine

- SCHEDULE - Schedule backup to an appliance

- CANCEL - Cancel a scheduled backup

- STATUS - Show the status of a backup in progress.

- SETUP - Configure backup parameters.

[]> verify

Enter the IP address of a machine to transfer data to.

[]> 192.168.15.1

Enter a name to identify this appliance

[]>sma2.example.com

Please enter username and password:

Username:

[]> admin

Password:

[]> <enter admin password for the target SMA>

Verifying target machine for version compatibility and disk space...

Backup can be scheduled on to 192.168.15.1.

Choose the operation you want to perform:

- VIEW - View scheduled backups

- VERIFY - Verify if backup can be scheduled to a remote machine

- SCHEDULE - Schedule backup to an appliance

- CANCEL - Cancel a scheduled backup

- STATUS - Show the status of a backup in progress.

- SETUP - Configure backup parameters.

[]> schedule

Enter the IP address of a machine to transfer data to.

[]> 192.168.15.1

Enter a name to identify this appliance

[]>sma2.example.com

Please enter username and password:

Username:

[]> admin

Password:

[]> <type the admin password on the target SMA>

Verifying target machine for version compatibility and disk space...

1. Set up a repeating backup schedule

2. Schedule a single backup

3. Start a single backup now

[1]>

1. Daily

2. Weekly

3. Monthly

[1]> 3

What day of the month would you like the backup to occur?

[1]>  <hit enter here>

What time of day would you like the backup to start?  Please enter in HH:MM

format.

[]> 02:00

Please enter a name for this backup job:

[]> weekly

Backup "weekly" has been scheduled successfully.

Choose the operation you want to perform:

- VIEW - View scheduled backups

- VERIFY - Verify if backup can be scheduled to a remote machine

- SCHEDULE - Schedule backup to an appliance

- CANCEL - Cancel a scheduled backup

- STATUS - Show the status of a backup in progress.

- SETUP - Configure backup parameters.

[]> view

Scheduled Backups:

# Name   IP              Schedule

= ====== =============== ================================

1 weekly To 192.168.15.1 on day 1 of every month at 02:00

Choose the operation you want to perform:

- VIEW - View scheduled backups

- VERIFY - Verify if backup can be scheduled to a remote machine

- SCHEDULE - Schedule backup to an appliance

- CANCEL - Cancel a scheduled backup

- STATUS - Show the status of a backup in progress.

- SETUP - Configure backup parameters.

[]> <hit enter until your back in CLI>

sma1.example.com> commit

Please enter some comments describing your changes:

[]> scheduled a weekly backup

Changes committed: Wed Mar 16 18:09:51 2011 GMT

sma1.example.com>