目錄

簡介

面向終端的Cisco AMP Linux聯結器有哪些已知的AV不相容性？

簡介

本文檔介紹面向終端的AMP Linux聯結器的防病毒(AV)不相容。

面向終端的Cisco AMP Linux聯結器有哪些已知的AV不相容性？

以下是已知會干擾面向終端的AMP Linux聯結器的AV應用清單：

- F-Secure Linux Security on RHEL/CentOS 6.x。

- Kaspersky Endpoint Security。

- McAfee VSE for Linux。

- 用於Linux的McAfee Endpoint Security。

- RHEL/CentOS 6.x上的Sophos Server Security 9。

- Symantec Endpoint Protection。

- RHEL 7的炭黑。

- Trend Micro DSA （深度安全代理）。

注意：可能有其他應用程式或更新會導致相容的應用程式出現問題。請參閱使用手冊，尤其是Linux一章以瞭解更多詳細資訊(https://docs.amp.cisco.com/en/A4E/AMP%20for%20Endpoints%20User%20Guide.pdf)。