目錄

簡介

必要條件

需求

採用元件

背景資訊

設定

網路圖表

任務1.從思科軟體下載頁面下載ASA映像

任務2.將ASA映像上傳到Firepower機箱管理器

任務3.升級第一個ASA裝置

任務4.升級第二台ASA裝置

驗證

疑難排解

相關資訊

簡介

本檔案介紹在firepower硬體裝置上安裝的高可用性(HA)對調適型安全裝置(ASA)的升級程式。

必要條件

需求

思科建議您瞭解以下主題：

- ASA管理

- ASA故障轉移

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- 2個運行代碼2.0.1-86的FP4150

- ASA 9.6.2.1（升級到9.6.2.3）

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路運作中，請確保您瞭解任何指令可能造成的影響。

背景資訊

配置HA（主用/備用或主用/主用）時，在Firepower裝置（FPR4100、FPR9300等）上安裝的ASA模組的升級過程在Firepower可擴展操作系統(FXOS)配置指南中進行了介紹。以下是相關部分：

本文的目標是對HA環境中的升級過程提供更為詳細的概述。

附註：本文檔假定目標ASA版本與現有的FXOS版本相容，因此在此情況下不需要升級FXOS捆綁包。請始終檢查FXOS相容性矩陣，確認目標ASA版本是否與FXOS映像相容。如果沒有，則按照FXOS發行說明中的說明先升級FXOS映像。

設定

網路圖表

在Firepower機箱管理器(FCM)UI中看到ASA1:

ASA2:

任務1.從思科軟體下載頁面下載ASA映像

導覽至Downloads Home > Products > Security > Firewalls > Next-Generation Firewalls(NGFW)，然後選擇硬體平台（例如4100、9000等），如下圖所示。

任務2.將ASA映像上傳到Firepower機箱管理器

將ASA映像上傳到Firepower機箱。可從Firepower機箱管理器(FCM)UI或FXOS命令列介面(CLI)執行此操作。

方法1.從FCM UI上傳ASA映像。

導航到System > Updates。選擇Upload Image，指定檔名並選擇Upload:

方法2.從FXOS CLI上傳ASA映像。

您可以從FTP、SCP、SFTP或TFTP伺服器上傳映像。要驗證機箱管理介面和遠端伺服器之間的連線，請執行以下操作：

FPR4100# connect local-mgmt

FPR4100(local-mgmt)# ping 10.48.40.70

PING 10.48.40.70 (10.48.40.70) from 10.62.148.88 eth0: 56(84) bytes of data.

64 bytes from 10.48.40.70: icmp_seq=1 ttl=61 time=34.4 ms

64 bytes from 10.48.40.70: icmp_seq=2 ttl=61 time=34.3 ms

64 bytes from 10.48.40.70: icmp_seq=3 ttl=61 time=34.3 ms

若要傳輸ASA映像，請導航到此範圍並運行download image命令：

FPR4100# scope ssa

FPR4100 /ssa # scope app-software

FPR4100 /ssa/app-software # download image ftp://ftp_username@ 10.48.40.70/cisco-asa.9.6.2.3.SPA.csp

Password:

若要監控映像傳輸進度，請執行show download-task detail命令：

FPR4100 /ssa/app-software # show download-task detail

Downloads for Application Software:

File Name: cisco-asa.9.6.2.3.SPA.csp

Protocol: Ftp

Server: 10.48.40.70

Port: 0

Userid: anonymous

Path:

Downloaded Image Size (KB): 94214

Time stamp: 2016-12-08T10:21:56.775

State: Downloading

Transfer Rate (KB/s): 450.784698

Current Task: downloading image cisco-asa.9.6.2.3.SPA.csp from 10.48.40.70(FSM-STAGE:sam:dme:ApplicationDownloaderDownload:Local)

您也可以使用以下命令驗證傳輸是否成功：

FPR4100 /ssa/app-software # show download-task

Downloads for Application Software:

File Name                      Protocol   Server          Port      Userid       State

------------------------------ ---------- --------------- --------- ------------ -----

cisco-asa.9.6.2.2.SPA.csp      Ftp        10.48.40.70             0 anonymous    Downloaded

有關其他詳細資訊：

FPR4100 /ssa/app-software # show download-task fsm status expand

File Name: cisco-asa.9.6.2.3.SPA.csp

FSM Status:

Affected Object: sys/app-catalogue/dnld-cisco-asa.9.6.2.3.SPA.csp/fsm

Current FSM: Download

Status: Success

Completion Time: 2016-12-08T10:26:52.142

Progress (%): 100

FSM Stage:

Order  Stage Name                               Status       Try

------ ---------------------------------------- ------------ ---

1      DownloadLocal                            Success      1

2      DownloadUnpackLocal                      Success      1

ASA映像顯示在機箱儲存庫中：

FPR4100 /ssa/app-software # exit

FPR4100 /ssa # show app

Application:

Name       Version    Description Author     Deploy Type CSP Type    Is Default App

---------- ---------- ----------- ---------- ----------- ----------- --------------

asa        9.6.2.1    N/A         cisco      Native      Application No

asa        9.6.2.3    N/A         cisco      Native      Application No

任務3.升級第一個ASA裝置

首先升級備用ASA裝置，如下圖所示：

指定新映像並選擇確定以開始升級：

驗證

從FCM GUI升級ASA的進度：

1-2分鐘後，FCM UI顯示：

ASA模組重新載入：

從Firepower機箱CLI升級ASA的過程。

CLI顯示邏輯裝置(ASA)重新啟動。從以下輸出中的模組引導CLI執行整個升級過程：

asa/sec/stby(config)#

[screen is terminating]

Disconnected from asa console!

Firepower-module1>

INIT: SwitchingStopping OpenBSD Secure Shell server: sshdstopped /usr/sbin/sshd (pid 5738)

.

Stopping Advanced Configuration and Power Interface daemon: stopped /usr/sbin/acpid (pid 5742)

acpid: exiting

acpid.

Stopping system message bus: dbus.

Stopping ntpd: stopped process in pidfile '/var/run/ntp.pid' (pid 6186)

done

Stopping crond: OK

Deconfiguring network interfaces... done.

Sending all processes the TERM signal...

SIGKILL_ALL will be delayed for 1 + 5 secs

Sending all processes the KILL signal...

Deactivating swap...

Unmounting local filesystems...

Rebooting... [ 1679.605561] Restarting system.

Cisco Systems, Inc.

Configuring and testing memory..

Cisco Systems, Inc.

Configuring and testing memory..

Configuring platform hardware...

Bios Version : FXOSSM1.1.2.1.3.031420161207

Platform ID  : FXOSSM1

Processor(s) Intel(R) Xeon(R) CPU E5-2699 v4 @ 2.20GHz

Total Memory  = 256 GB Effective Memory = 256 GB

Memory Operating Speed 2400 Mh

Please wait, preparing to boot.. .........................................................................................................

UEFI Interactive Shell v2.0. UEFI v2.40 (American Megatrends, 0x0005000B). Revision 1.02

Mapping table

fs0: Alias(s):HD17a65535a1:;blk1:

PciRoot(0x0)/Pci(0x1F,0x2)/Sata(0x0,0xFFFF,0x0)/HD(1,MBR,0x000EC692,0x800,0xEE6800)

blk0: Alias(s):

PciRoot(0x0)/Pci(0x1F,0x2)/Sata(0x0,0xFFFF,0x0)

blk2: Alias(s):

PciRoot(0x0)/Pci(0x1F,0x2)/Sata(0x0,0xFFFF,0x0)/HD(2,MBR,0x000EC692,0xEE7000,0x3BA000)

blk3: Alias(s):

PciRoot(0x0)/Pci(0x1F,0x2)/Sata(0x0,0xFFFF,0x0)/HD(3,MBR,0x000EC692,0x12A1000,0x950000)

blk4: Alias(s):

PciRoot(0x0)/Pci(0x1F,0x2)/Sata(0x0,0xFFFF,0x0)/HD(4,MBR,0x000EC692,0x1BF1000,0x2CD20800)

blk5: Alias(s):

PciRoot(0x0)/Pci(0x1F,0x2)/Sata(0x0,0xFFFF,0x0)/HD(4,MBR,0x000EC692,0x1BF1000,0x2CD20800)/HD(1,MBR,0x00000000,0x1BF1800,0x5D22000)

blk6: Alias(s):

PciRoot(0x0)/Pci(0x1F,0x2)/Sata(0x0,0xFFFF,0x0)/HD(4,MBR,0x000EC692,0x1BF1000,0x2CD20800)/HD(2,MBR,0x00000000,0x7914000,0x26FFD800)

To launch ROMMON.

CpuFrequency = 2200002 KHz

Cisco FXOSSM1 Blade Rommon 1.2.1.3, Mar 14 2016 12:11:29

Platform: SSPXRU

INFO: enic_identify: Enabling Cruz driver...

INFO: enic_identify: Cruz driver enabled.

INFO: init_spi_interface: HSFS_BERASE_4K.

INFO: enic_init: bar[0].vaddr 0xc6e00000.

INFO: enic_init: bar[2].vaddr 0xc6e10000.

INFO: enic_init: eNic port MTU is 1500.

INFO: enic_init: eNic bsize 1500 ring size 512.

INFO: enic_init: Waiting for Cruz link...

INFO: enic_init: Cruz link detected.

INFO: nb_eth_app_init: MAC address for interface 0: 00 15 a5 01 01 00

INFO: nb_eth_app_init: IP address 127.128.1.254

Start communicating with MIO in blade slot 1...

INFO: Allocated 1000 bytes of memory for cmd at 0x78a7d018.

INFO: Allocated 1000 bytes of memory for status at 0x76d34918.

INFO: Allocated 196608 bytes of memory for key file at 0x76d03018.

INFO: Status code 1: 'rommon initialize is completed'.

INFO: tftp_open: '/rommon/status_1.txt'@127.128.254.1 via 127.128.254.1

!

INFO: nb_tftp_upload: 31 bytes sent.

tftpget 0x78a7d018 1000

INFO: tftp_open: '/rommon/command_1.txt'@127.128.254.1 via 127.128.254.1

Received 154 bytes

WARNING: retrieve_mio_cmd_info: Invalid checksum 0x0.

tftpget 0x76d03018 196608

INFO: tftp_open: 'rommon/key_1.bin'@127.128.254.1 via 127.128.254.1

!

Received 131072 bytes

INFO: Status code 8: 'rommon succeeds to retrieve key file'.

INFO: tftp_open: '/rommon/status_1.txt'@127.128.254.1 via 127.128.254.1

!

INFO: nb_tftp_upload: 31 bytes sent.

INFO: Primary keys in flash are up-to-date.

INFO: Backup keys in flash are up-to-date.

continue check local image

the image file path: installables/chassis/fxos-lfbff-k8.9.6.2.2.SPA

the image file name only: fxos-lfbff-k8.9.6.2.2.SPA

local_image_file: fs0:fxos-lfbff-k8.9.6.2.2.SPA

INFO: File 'fs0:fxos-lfbff-k8.9.6.2.2.SPA' has 104831328 bytes.

local_image_file_size 104831328

Found image fs0:fxos-lfbff-k8.9.6.2.2.SPA in local storage, boot local image.

set pboot_image fxos-lfbff-k8.9.6.2.2.SPA

INFO: File 'fs0:fxos-lfbff-k8.9.6.2.2.SPA' has 104831328 bytes.

INFO: 'fs0:fxos-lfbff-k8.9.6.2.2.SPA' has 104831328 bytes

INFO: Booting LFBFF image...

INFO: Status code 7: 'rommon about to verify image signature from local disk'.

INFO: tftp_open: '/rommon/status_1.txt'@127.128.254.1 via 127.128.254.1

!

INFO: nb_tftp_upload: 31 bytes sent.

INIT: version 2.88 booting

Starting udev

Configuring network interfaces... done.

Populating dev cache

rw console=ttyS0,38400 loglevel=2 auto kstack=128 reboot=force panic=1 ide_generic.probe_mask=0x1 ide1=noprobe pci=nocrs processor.max_cstate=1 iommu=pt platform=sspxru boot_img=disk0:/fxos-lfbff-k8.9.6.2.2.SPA ciscodmasz=786432 cisconrsvsz=2359296 hugepagesz=1g hugepages=24 ssp_mode=0

No Partitions for HDD2.. Creating partition..

mount: special device /dev/sdb1 does not exist

rw console=ttyS0,38400 loglevel=2 auto kstack=128 reboot=force panic=1 ide_generic.probe_mask=0x1 ide1=noprobe pci=nocrs processor.max_cstate=1 iommu=pt platform=sspxru boot_img=disk0:/fxos-lfbff-k8.9.6.2.2.SPA ciscodmasz=786432 cisconrsvsz=2359296 hugepagesz=1g hugepages=24 ssp_mode=0

Create libvirt group

Start libvirtd Service

* Starting virtualization library daemon: libvirtd

no /usr/bin/dnsmasq found; none killed

2016-12-07 12:47:24.090+0000: 4373: info : libvirt version: 1.1.2

2016-12-07 12:47:24.090+0000: 4373: warning : virGetHostname:625 : getadd[ ok ]failed for 'ciscoasa': Name or service not known

Disable the default virtual networks

Network default destroyed

Done with libvirt initialization

rw console=ttyS0,38400 loglevel=2 auto kstack=128 reboot=force panic=1 ide_generic.probe_mask=0x1 ide1=noprobe pci=nocrs processor.max_cstate=1 iommu=pt platform=sspxru boot_img=disk0:/fxos-lfbff-k8.9.6.2.2.SPA ciscodmasz=786432 cisconrsvsz=2359296 hugepagesz=1g hugepages=24 ssp_mode=0

+++++++++++++++ BOOT CLI FILES COPIED +++++++++++++++++++++++++++

rw console=ttyS0,38400 loglevel=2 auto kstack=128 reboot=force panic=1 ide_generic.probe_mask=0x1 ide1=noprobe pci=nocrs processor.max_cstate=1 iommu=pt platform=sspxru boot_img=disk0:/fxos-lfbff-k8.9.6.2.2.SPA ciscodmasz=786432 cisconrsvsz=2359296 hugepagesz=1g hugepages=24 ssp_mode=0

Turbo Boost is UNSUPPORTED on this platform.

Configuration Xml found is /opt/cisco/csp/applications/configs/cspCfg_cisco-asa.9.6.2.3__asa_001_JAD201200C64A93395.xml

INIT: Entering runlevel: 3

rw console=ttyS0,38400 loglevel=2 auto kstack=128 reboot=force panic=1 ide_generic.probe_mask=0x1 ide1=noprobe pci=nocrs processor.max_cstate=1 iommu=pt platform=sspxru boot_img=disk0:/fxos-lfbff-k8.9.6.2.2.SPA ciscodmasz=786432 cisconrsvsz=2359296 hugepagesz=1g hugepages=24 ssp_mode=0

Starting system message bus: dbus.

Starting OpenBSD Secure Shell server: sshd

generating ssh RSA key...

generating ssh ECDSA key...

generating ssh DSA key...

done.

Starting Advanced Configuration and Power Interface daemon: acpid.

acpid: starting up

acpid: 1 rule loaded

acpid: waiting for events: event logging is off

Starting ntpd: done

Starting crond: OK

Cisco Security Services Platform

Type ? for list of commands

Firepower-module1>

Firepower-module1>show services status

Services currently running:

Feature   | Instance ID    |     State  |          Up Since

-----------------------------------------------------------

asa     | 001_JAD201200C64A93395 |   RUNNING  | :00:00:20

Firepower-module1>

整個過程大約需要5分鐘。

您還可以從機箱CLI使用show app-instance命令驗證ASA應用程式是否已聯機運行:

FPR4100# scope ssa

FPR4100 /ssa # show app-instance

Application Name     Slot ID    Admin State     Operational State  Running Version Startup Version Cluster Oper State

-------------------- ---------- --------------- ------------------ --------------- --------------- ------------------

asa                  1          Enabled         Online             9.6.2.3          9.6.2.3         Not Applicabl

ASA模組相互發現：

asa/sec/actNoFailover>

************WARNING****WARNING****WARNING******************************** Mate version 9.6(2)1 is not identical with ours 9.6(2)3 ************WARNING****WARNING****WARNING********************************

.

Detected an Active mate

Beginning configuration replication from mate.

End configuration replication from mate.

asa/sec/stby>

驗證

FPR4100# connect module 1 console

Telnet escape character is '~'.

Trying 127.5.1.1...

Connected to 127.5.1.1.

Escape character is '~'.

CISCO Serial Over LAN:

Close Network Connection to Exit

Firepower-module1> connect asa

asa> enable

Password:

asa/sec/stby# show failover

Failover On

Failover unit Secondary

Failover LAN Interface: fover Ethernet1/8 (up)

Reconnect timeout 0:00:00

Unit Poll frequency 1 seconds, holdtime 15 seconds

Interface Poll frequency 5 seconds, holdtime 25 seconds

Interface Policy 1

Monitored Interfaces 2 of 1041 maximum

MAC Address Move Notification Interval not set

Version: Ours 9.6(2)3, Mate 9.6(2)1

Serial Number: Ours FLM2006EQFW, Mate FLM2006EN9U

Last Failover at: 12:48:23 UTC Dec 7 2016

This host: Secondary - Standby Ready

Active time: 0 (sec)

slot 0: UCSB-B200-M3-U hw/sw rev (0.0/9.6(2)3) status (Up Sys)

Interface INSIDE (192.168.0.2): Normal (Not-Monitored)

Interface OUTSIDE (192.168.1.2): Normal (Monitored)

Interface management (0.0.0.0): Normal (Waiting)

Other host: Primary - Active

Active time: 10320 (sec)

slot 0: UCSB-B200-M3-U hw/sw rev (0.0/9.6(2)1) status (Up Sys)

Interface INSIDE (192.168.0.1): Normal (Not-Monitored)

Interface OUTSIDE (192.168.1.1): Normal (Monitored)

Interface management (10.0.0.50): Normal (Waiting)

...

要確認ASA裝置之間的正確故障轉移操作，請運行以下命令：

- show conn count

- show xlate count

- show crypto ipsec sa

任務4.升級第二台ASA裝置

切換故障轉移對等項並升級主ASA:

asa/sec/stby# failover active

Switching to Active

asa/sec/act#

指定新映像並開始升級：

5分鐘後，升級完成。

驗證

從機箱CLI驗證ASA應用已聯機:

FPR4100# scope ssa

FPR4100 /ssa # show app-instance

Application Name     Slot ID    Admin State     Operational State  Running Version Startup Version Cluster Oper State

-------------------- ---------- --------------- ------------------ --------------- --------------- ------------------

asa                  1          Enabled         Online             9.6.2.3          9.6.2.3         Not Applicable

從ASA模組驗證故障切換操作：

asa/pri/stby# show failover

Failover On

Failover unit Primary

Failover LAN Interface: fover Ethernet1/8 (up)

Reconnect timeout 0:00:00

Unit Poll frequency 1 seconds, holdtime 15 seconds

Interface Poll frequency 5 seconds, holdtime 25 seconds

Interface Policy 1

Monitored Interfaces 2 of 1041 maximum

MAC Address Move Notification Interval not set

Version: Ours 9.6(2)3, Mate 9.6(2)3

Serial Number: Ours FLM2006EN9U, Mate FLM2006EQFW

Last Failover at: 14:35:37 UTC Dec 7 2016

This host: Primary - Standby Ready

Active time: 0 (sec)

slot 0: UCSB-B200-M3-U hw/sw rev (0.0/9.6(2)3) status (Up Sys)

Interface INSIDE (192.168.0.2): Normal (Not-Monitored)

Interface OUTSIDE (192.168.1.2): Normal (Waiting)

Interface management (0.0.0.0): Normal (Waiting)

Other host: Secondary - Active

Active time: 656 (sec)

slot 0: UCSB-B200-M3-U hw/sw rev (0.0/9.6(2)3) status (Up Sys)

Interface INSIDE (192.168.0.1): Failed (Not-Monitored)

Interface OUTSIDE (192.168.1.1): Normal (Waiting)

Interface management (10.0.0.50): Normal (Waiting)

Stateful Failover Logical Update Statistics

Link : fover Ethernet1/8 (up)

Stateful Obj    xmit       xerr       rcv        rerr

General         7          0          8          0

...

切換回故障切換以具有主/主用、輔助/備用：

asa/pri/stby# failover active

Switching to Active

asa/pri/act#

疑難排解

目前尚無適用於此組態的具體疑難排解資訊。

相關資訊

- FXOS配置指南

- FXOS-ASA相容性指南

- 《 FXOS發佈說明》

- 技術支援與文件 - Cisco Systems