目錄

簡介

必要條件

需求

採用元件

慣例

確定您使用的HTTP伺服器版本

採用HTTP V1伺服器的Cisco IOS軟體

採用HTTP V1.1伺服器的Cisco IOS軟體

HTTP V1.1伺服器 — 思科錯誤ID CSCeb82510之前

HTTP V1.1伺服器 — 思科錯誤ID CSCeb82510之後

調試

相關資訊

簡介

本文顯示如何透過驗證、授權及記帳(AAA)控制對Cisco IOS® HTTP伺服器的存取。 對使用AAA的Cisco IOS HTTP伺服器的訪問的控制因Cisco IOS軟體版本而異。

必要條件

需求

本文件沒有特定需求。

採用元件

本文件所述內容不限於特定軟體和硬體版本。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

確定您使用的HTTP伺服器版本

發出exec命令show subsys name http以檢視您的HTTP伺服器版本。

router1#show subsys name http

Class         Version

http                Protocol    1.001.001

這是使用HTTP V1.1伺服器的系統。Cisco IOS軟體版本12.2(15)T和所有Cisco IOS軟體版本12.3都使用HTTP V1.1。

router2#show subsys name http

Class         Version

http                Protocol    1.000.001

這是使用HTTP V1伺服器的系統。低於12.2(15)T的Cisco IOS軟體版本(包括Cisco IOS軟體版本12.2(15)JA和12.2(15)XR)具有HTTP V1。

採用HTTP V1伺服器的Cisco IOS軟體

在包含HTTP V1伺服器的Cisco IOS軟體版本中，HTTP作業階段使用虛擬終端線路(vty)。 因此，HTTP身份驗證和授權使用為vty配置的相同方法控制。

ip http server

!

aaa new-model

aaa authentication login VTYSandHTTP radius local

aaa authorization exec VTYSandHTTP radius local

!

ip http authentication aaa

!

line vty 0 19

!--- The number of vtys you have.

login authentication VTYSandHTTP

authorization exec VTYSandHTTP

採用HTTP V1.1伺服器的Cisco IOS軟體

在使用HTTP V1.1伺服器的Cisco IOS軟體版本中，HTTP會話不使用vty。他們使用插座。

HTTP V1.1伺服器 — 思科錯誤ID CSCeb82510之前

在Cisco IOS軟體版本12.3(7.3)和12.3(7.3)T中整合Cisco錯誤ID CSCeb82510(僅限註冊客戶)之前，HTTP V1.1伺服器必須使用為主控台設定的相同驗證和授權方法。

ip http server

!

aaa new-model

aaa authentication login CONSOLEandHTTP radius local

aaa authorization exec CONSOLEandHTTP radius local

!

ip http authentication aaa

!

line con 0

login authentication CONSOLEandHTTP

authorization exec CONSOLEandHTTP

HTTP V1.1伺服器 — 思科錯誤ID CSCeb82510之後

藉由在Cisco IOS軟體版本12.3(7.3)和12.3(7.3)T中整合Cisco錯誤ID CSCeb82510(僅供註冊客戶使用),HTTP伺服器可以使用其自己的獨立驗證和授權方法，並在ip http authentication aaa指令中使用新關鍵字。新關鍵字包括：

router(config)#ip http authentication aaa command-authorization listname

router(config)#ip http authentication aaa exec-authorization listname

router(config)#ip http authentication aaa login-authentication listname

以下是輸出範例：

ip http server

!

aaa new-model

aaa authentication login HTTPonly radius local

aaa authorization exec HTTPonly radius local

!

ip http authentication aaa

ip http authentication aaa exec-authorization HTTPonly

ip http authentication aaa login-authentication HTTPonly

調試

發出以下debug命令，以疑難排解HTTP驗證/授權問題：

debug ip tcp transactions

debug modem

!--- If you use the HTTP 1.0 server.

debug ip http authentication

debug aaa authentication

debug aaa authorization

debug radius

!--- If you use RADIUS.

debug tacacs

!--- If you use TACACS+.

此輸出顯示一些調試示例：

*Apr 23 13:12:16.871: TCB626DD444 created

*Apr 23 13:12:16.871: TCP0: state was LISTEN -> SYNRCVD [80 -> 64.101.98.203(19662)]

*Apr 23 13:12:16.871: TCP0: Connection to 64.101.98.203:19662, received MSS 1460, MSS is 516

*Apr 23 13:12:16.875: TCP: sending SYN, seq 2078657456, ack 2459301798

*Apr 23 13:12:16.875: TCP0: Connection to 64.101.98.203:19662, advertising MSS 536

*Apr 23 13:12:16.899: TCP0: state was SYNRCVD -> ESTAB [80 -> 64.101.98.203(19662)]

!--- The TCP connection from the browser on 64.101.98.203 to the !--- local HTTP server is established.

*Apr 23 13:12:16.899: TCB62229100 accepting 626DD444 from 64.101.98.203.19662

*Apr 23 13:12:16.899: TCB626DD444 setting property TCP_PID (8) 626FEC84

*Apr 23 13:12:16.899: TCB626DD444 setting property TCP_NO_DELAY (1) 626FEC88

*Apr 23 13:12:16.899: TCB626DD444 setting property TCP_NONBLOCKING_WRITE (10) 626FED14

*Apr 23 13:12:16.899: TCB626DD444 setting property TCP_NONBLOCKING_READ (14) 626FED14

*Apr 23 13:12:16.899: TCB626DD444 setting property unknown (15) 626FED14

*Apr 23 13:12:16.919: HTTP AAA Login-Authentication List name: HTTPauthen

*Apr 23 13:12:16.919: HTTP AAA Exec-Authorization List name: HTTPauthor

*Apr 23 13:12:16.919: AAA/AUTHEN/LOGIN (00000000): Pick method list 'HTTPauthen'

!--- Uses 'HTTPauthen' as the login authentication method.

*Apr 23 13:12:16.919: RADIUS/ENCODE(00000000):Orig. component type = INVALID

*Apr 23 13:12:16.919: RADIUS/ENCODE(00000000): dropping service type,

"radius-server attribute 6 on-for-login-auth" is off

*Apr 23 13:12:16.919: RADIUS(00000000): Config NAS IP: 0.0.0.0

*Apr 23 13:12:16.919: RADIUS(00000000): sending

*Apr 23 13:12:16.919: RADIUS/ENCODE: Best Local IP-Address 172.16.175.103 for

Radius-Server 10.1.2.3

*Apr 23 13:12:16.919: RADIUS(00000000): Send Access-Request to 10.1.2.3:1645 id 1645/2, len 51

*Apr 23 13:12:16.919: RADIUS:  authenticator 5F 6E E6 C1 3E 40 5D E2 - FB AC E8 E8 E4 93 BA 98

*Apr 23 13:12:16.919: RADIUS:  User-Name           [1]   7   "cisco"

*Apr 23 13:12:16.919: RADIUS:  User-Password       [2]   18  *

*Apr 23 13:12:16.919: RADIUS:  NAS-IP-Address      [4]   6   172.16.175.103

!--- Sent an Access-Request to the RADIUS server !--- at 10.1.2.3 using the username of "cisco".

*Apr 23 13:12:21.923: RADIUS: Retransmit to (10.1.2.3:1645,1646) for id 1645/2

*Apr 23 13:12:26.923: RADIUS: Retransmit to (10.1.2.3:1645,1646) for id 1645/2

*Apr 23 13:12:31.923: RADIUS: Retransmit to (10.1.2.3:1645,1646) for id 1645/2

*Apr 23 13:12:36.923: RADIUS: No response from (10.1.2.3:1645,1646) for id 1645/2

*Apr 23 13:12:36.923: RADIUS/DECODE: parse response no app start; FAIL

*Apr 23 13:12:36.923: RADIUS/DECODE: parse response; FAIL

*Apr 23 13:12:36.923: AAA/AUTHOR (0x0): Pick method list 'HTTPauthor'

*Apr 23 13:12:36.923: RADIUS/ENCODE(00000000):Orig. component type = INVALID

*Apr 23 13:12:36.923: RADIUS(00000000): Config NAS IP: 0.0.0.0

*Apr 23 13:12:36.923: RADIUS(00000000): sending

*Apr 23 13:12:36.923: RADIUS/ENCODE: Best Local IP-Address 172.16.175.103

for Radius-Server 10.1.2.3

*Apr 23 13:12:36.923: RADIUS(00000000): Send Access-Request to 10.1.2.3:1645

id 1645/3, len 57

*Apr 23 13:12:36.927: RADIUS:  authenticator AA DB 63 E1 D4 BF 23 9E -

49 71 78 42 A5 A3 44 B8

*Apr 23 13:12:36.927: RADIUS:  User-Name           [1]   7   "cisco"

*Apr 23 13:12:36.927: RADIUS:  User-Password       [2]   18  *

*Apr 23 13:12:36.927: RADIUS:  Service-Type        [6]   6   Outbound     [5]

*Apr 23 13:12:36.927: RADIUS:  NAS-IP-Address      [4]   6   172.16.175.103

*Apr 23 13:12:41.927: RADIUS: Retransmit to (10.1.2.3:1645,1646) for id 1645/3

*Apr 23 13:12:46.927: RADIUS: Retransmit to (10.1.2.3:1645,1646) for id 1645/3

*Apr 23 13:12:51.927: RADIUS: Retransmit to (10.1.2.3:1645,1646) for id 1645/3

*Apr 23 13:12:56.927: RADIUS: No response from (10.1.2.3:1645,1646) for id 1645/3

*Apr 23 13:12:56.927: RADIUS/DECODE: parse response no app start; FAIL

*Apr 23 13:12:56.927: RADIUS/DECODE: parse response; FAIL

*Apr 23 13:12:56.927: HTTP: Authentication failed for level 15

!--- Authentication has failed due to no response from the RADIUS server.

*Apr 23 13:12:56.927: TCB626DD444 shutdown writing

*Apr 23 13:12:56.927: TCP0: state was ESTAB -> FINWAIT1 [80 -> 64.101.98.203(19662)]

*Apr 23 13:12:56.927: TCP0: sending FIN

*Apr 23 13:12:56.967: TCP0: state was FINWAIT1 -> FINWAIT2 [80 -> 64.101.98.203(19662)]

*Apr 23 13:12:56.967: TCP0: FIN processed

*Apr 23 13:12:56.971: TCP0: state was FINWAIT2 -> TIMEWAIT [80 -> 64.101.98.203(19662)]

*Apr 23 13:13:10.227: TCP0: state was TIMEWAIT -> CLOSED [80 -> 64.101.98.203(16260)]

*Apr 23 13:13:10.227: TCB 0x626DCFA0 destroyed

!--- The TCP connection to the browser 64.101.93.203 is closed.

相關資訊

- 終端存取控制器存取控制系統(TACACS+)

- 遠端驗證撥入使用者服務(RADIUS)

- 要求建議 (RFC)

- 技術支援與文件 - Cisco Systems