目錄

簡介

必要條件

需求

採用元件

背景資訊

設定

網路圖表

組態

使用FMC在FTD上配置IPSec VPN

使用FMC設定FTD上的回送介面

在ASA上配置IPSec VPN

配置ASA上的環回介面

使用FMC在FTD上設定重疊BGP

在ASA上配置重疊BGP

驗證

FTD上的輸出

ASA上的輸出

疑難排解

簡介

本檔案介紹如何透過將動態路由BGP作為重疊的FMC，在ASA和FTD之間設定路由型站點到站點VPN通道。

必要條件

需求

思科建議您瞭解以下主題：

- 對IPsec站點到站點VPN的基本瞭解

- Firepower威脅防禦託管(FTD)和自適應安全裝置(ASA)上的邊界網關協定(BGP)配置

- 使用Firepower管理中心(FMC)的經驗

採用元件

- Cisco ASAv版本9.20(2)2

- Cisco FMC版本7.4.1

- Cisco FTD版本7.4.1

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路運作中，請確保您瞭解任何指令可能造成的影響。

背景資訊

基於路由的VPN允許確定要加密或通過VPN隧道傳送的相關流量，並且使用流量路由而不是策略/訪問清單（如基於策略或基於加密對映的VPN中）。加密域設定為允許任何進入IPsec隧道的流量。IPsec本地和遠端流量選擇器設定為0.0.0.0/0.0.0.0。路由到IPsec隧道的所有流量都會被加密，與源/目標子網無關。

本檔案將重點介紹將動態路由BGP作為重疊的靜態虛擬通道介面(SVTI)組態。

設定

本節介紹ASA和FTD上通過SVTI IPSec隧道啟用BGP鄰近所需的配置。

網路圖表

網路圖表

組態

使用FMC在FTD上配置IPSec VPN

步驟1。導覽至Devices > VPN > Site To Site。

步驟2.按一下+Site to Site VPN。

站點到站點VPN

步驟3.提供Topology Name，然後選擇VPN的類Route Based (VTI)型。選擇IKE Version。

在本演示中：

- 拓撲名稱：ASAv-VTI

- IKE版本：IKEv2

VPN拓撲

步驟4.選Device擇需要配置隧道的位置。您可以新增新的虛擬通道介面(按一下該圖+標)，或從現有清單中選擇一個虛擬通道介面。

終端節點A

步驟5.定義引數New Virtual Tunnel Interface。按一下Ok。

在本演示中：

- 名稱:ASA-VTI

- 說明（可選）：含Extranet ASA的VTI通道

- 安全區域:VTI區域

- 通道ID:1

- IP 位址:169.254.2.1/24

- 通道來源：GigabitEthernet0/1（外部）

- IPsec通道模式：IPv4

虛擬通道介面

步驟6.OK按一下彈出視窗，提示已建立新VTI。

已新增虛擬通道介面

步驟7.選擇新建立的VTI或下面的VTIVirtual Tunnel Interface。提供節點B（對等裝置）的資訊。

在本演示中：

- 裝置:Extranet

- 裝置名稱：ASAv-Peer

- 終端IP地址：10.197.226.187

終端節點B

步驟8.導覽至IKE 索引標籤。按一下  .您可以選擇使用預定義Policy,或按一下選+項卡旁的Policy按鈕以建立新選項。

步驟9.（可選，如果建立新的IKEv2策略。） 為策Name略提供一個，並選Algorithms擇要在策略中使用的。按一下Save。

在本演示中：

- 名稱:ASAv-IKEv2-policy

- 完整性演算法：SHA-256

- 加密演算法：AES-256

- PRF演算法：SHA-256

- Diffie-Hellman組：14

IKEv2-Policy

步驟10.選擇新建立的Policy，或現Policy有的。選擇Authentication Type。如果使用預共用手動金鑰，請在和框中輸Key入Confirm Key 金鑰。

在本演示中：

- 策略：ASAv-IKEv2-Policy

- 身份驗證型別：預共用手動金鑰

驗證

步驟11.定位至標籤IPsec 卡。按一下  可以選擇使用預定義的IKEv2 IPsec建議或建立一個新的IKEv2 IPsec建議。按一下選+項卡旁邊的按IKEv2 IPsec Proposal 鈕。

步驟12.（可選，如果建立新的IKEv2 IPsec提議。） 為建議Name輸入一個，並選Algorithms擇要在建議中使用的項。按一下Save。

在本演示中：

- 名稱:ASAv-IPSec-Policy

- ESP雜湊：SHA-256

- ESP加密：AES-256

IKEv2-IPsec-Proposal

步驟13.從可用建議清單Proposal中Proposal選擇新建立的建議或現有建議。按一下OK。

轉換集

步驟14。（可選）選擇設置Perfect Forward Secrecy。配置IPsecLifetime Duration and Lifetime Size。

在本演示中：

- 完全向前保密：模陣列14

- 生存期持續時間：28800（預設）

- 生存期大小：4608000（預設）

PFS配置

步驟15.檢查配置的設定。按一下Save，如下圖所示。

儲存配置

使用FMC設定FTD上的回送介面

導航至Devices > Device Management。編輯需要配置環回的裝置。

步驟1。轉到Interfaces > Add Interfaces > Loopback Interface。

導航到環回介面

步驟2.輸入名稱"loopback"，提供環回ID "1"並啟用介面。

啟用環回介面

步驟3.配置介面的IP地址，按一下OK。

為環回介面提供IP地址

在ASA上配置IPSec VPN

!--- Configure IKEv2 Policy ---!

crypto ikev2 policy 1

encryption aes-256

integrity sha256

group 14

prf sha256

lifetime seconds 86400

!--- Enable IKEv2 on the outside interface ---!

crypto ikev2 enable outside

!---Configure Tunnel-Group with pre-shared-key---!

tunnel-group 10.197.226.222 type ipsec-l2l

tunnel-group 10.197.226.222 ipsec-attributes

ikev2 remote-authentication pre-shared-key *****

ikev2 local-authentication pre-shared-key *****

!--- Configure IPSec Policy ---!

crypto ipsec ikev2 ipsec-proposal ipsec_proposal_for_FTD

protocol esp encryption aes-256

protocol esp integrity sha-256

!--- Configure IPSec Profile ---!

crypto ipsec profile ipsec_profile_for_FTD

set ikev2 ipsec-proposal FTD-ipsec-proposal

set pfs group14

!--- Configure VTI ---!

interface Tunnel1

nameif FTD-VTI

ip address 169.254.2.2 255.255.255.0

tunnel source interface outside

tunnel destination 10.197.226.222

tunnel mode ipsec ipv4

tunnel protection ipsec profile ipsec_profile_for_FTD

!--- Configure the WAN routes ---!

route outside 0.0.0.0 0.0.0.0 10.197.226.1 1

配置ASA上的環回介面

interface Loopback1

nameif loopback

ip address 1.1.1.1 255.255.255.0

使用FMC在FTD上設定重疊BGP

導航到Devices > Device Management.Edit，導航到配置VTI隧道的裝置，然後導航到Routing > General Settings > BGP。

步驟1.啟用BGP並配置自治系統(AS)編號和路由器ID，如下圖所示。

裝置FTD和ASA上的AS編號必須相同。

路由器ID用於識別參與BGP的每個路由器。

導航到配置BGP

步驟2.導覽至BGP > IPv4，並在FTD上啟用BGP IPv4。

啟用BGP

步驟3.在Neighbor頁籤下，將ASAv VTI隧道IP地址新增為鄰居並啟用鄰居。

新增BGP鄰居

步驟4.在Networks下，新增要透過BGP進行廣告且需要通過VTI通道的網路，在本案例中為回送1。

新增BGP網路

步驟5.所有其他BGP設定都是可選的，您可以根據您的環境對其進行配置。驗證配置並按一下Save。

儲存BGP配置

步驟6.部署所有配置。

部署

在ASA上配置重疊BGP

router bgp 1000

bgp log-neighbor-changes

bgp router-id 10.1.1.2

address-family ipv4 unicast

neighbor 169.254.2.1 remote-as 1000

neighbor 169.254.2.1 transport path-mtu-discovery disable

neighbor 169.254.2.1 activate

network 1.1.1.0 mask 255.255.255.0

no auto-summary

no synchronization

exit-address-family

驗證

使用本節內容，確認您的組態是否正常運作。

FTD上的輸出

#show crypto ikev2 sa

IKEv2 SAs:

Session-id:20, Status:UP-ACTIVE, IKE count:1, CHILD count:1

Tunnel-id         Local                   Remote                fvrf/ivrf          Status       Role

666846307         10.197.226.222/500      10.197.226.187/500    Global/Global      READY        RESPONDER

Encr: AES-CBC, keysize: 256, Hash: SHA256, DH Grp:14, Auth sign: PSK, Auth verify: PSK

Life/Active Time: 86400/1201 sec

Child sa: local selector 0.0.0.0/0 - 255.255.255.255/65535

remote selector 0.0.0.0/0 - 255.255.255.255/65535

ESP spi in/out: 0xa14edaf6/0x8540d49e

#show crypto ipsec sa

interface: ASAv-VTI

Crypto map tag: __vti-crypto-map-Tunnel1-0-1, seq num: 65280, local addr: 10.197.226.222

Protected vrf (ivrf): Global

local ident (addr/mask/prot/port): (0.0.0.0/0.0.0.0/0/0)

remote ident (addr/mask/prot/port): (0.0.0.0/0.0.0.0/0/0)

current_peer: 10.197.226.187

#pkts encaps: 45, #pkts encrypt: 45, #pkts digest: 45

#pkts decaps: 44, #pkts decrypt: 44, #pkts verify: 44

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed:0, #pkts comp failed: 0, #pkts decomp failed: 0

#pre-frag successes: 0, #pre-frag failures: 0, #fragments created: 0

#PMTUs sent: 0, #PMTUs rcvd: 0, #decapsulated frgs needing reassembly: 0

#TFC rcvd: 0, #TFC sent: 0

#Valid ICMP Errors rcvd: 0, #Invalid ICMP Errors rcvd: 0

#send errors: 0, #recv errors: 0

local crypto endpt.: 10.197.226.222/500, remote crypto endpt.: 10.197.226.187/500

path mtu 1500, ipsec overhead 78(44), media mtu 1500

PMTU time remaining (sec): 0, DF policy: copy-df

ICMP error validation: disabled, TFC packets: disabled

current outbound spi: 8540D49E

current inbound spi : A14EDAF6

inbound esp sas:

spi: 0xA14EDAF6 (2706299638)

SA State: active

transform: esp-aes-256 esp-sha-256-hmac no compression

in use settings ={L2L, Tunnel, PFS Group 14, IKEv2, VTI, }

slot: 0, conn_id: 49, crypto-map: __vti-crypto-map-Tunnel1-0-1

sa timing: remaining key lifetime (kB/sec): (4331517/27595)

IV size: 16 bytes

replay detection support: Y

Anti replay bitmap:

000001FFF 0xFFFFFFFF

outbound esp sas:

spi: 0x8540D49E (2235618462)

SA State: active

transform: esp-aes-256 esp-sha-256-hmac no compression

in use settings ={L2L, Tunnel, PFS Group 14, IKEv2, VTI, }

slot: 0, conn_id: 49, crypto-map: __vti-crypto-map-Tunnel1-0-1

sa timing: remaining key lifetime (kB/sec): (4101117/27595)

IV size: 16 bytes

replay detection support: Y

Anti replay bitmap:

0x00000000 0x00000001

#show bgp summary

BGP router identifier 10.1.1.1, local AS number 1000

BGP table version is 5, main routing table version 5

2 network entries using 400 bytes of memory

2 path entries using 160 bytes of memory

2/2 BGP path/bestpath attribute entries using 416 bytes of memory

0 BGP route-map cache entries using 0 bytes of memory

0 BGP filter-list cache entries using 0 bytes of memory

BGP using 976 total bytes of memory

BGP activity 21/19 prefixes, 24/22 paths, scan interval 60 secs

Neighbor           V         AS      MsgRcvd      MsgSent       TblVer      InQ      OutQ      Up/Down      State/PfxRcd

169.254.2.2      4         1000   22               22                  5             0         0            00:19:42        1

#show bgp neighbors

BGP neighbor is 169.254.2.2, vrf single_vf, remote AS 1000, internal link

BGP version 4, remote router ID 10.1.1.2

BGP state = Established, up for 00:19:49

Last read 00:01:04, last write 00:00:38, hold time is 180, keepalive interval is 60 seconds

Neighbor sessions:

1 active, is not multisession capable (disabled)

Neighbor capabilities:

Route refresh: advertised and received(new)

Four-octets ASN Capability: advertised and received

Address family IPv4 Unicast: advertised and received

Multisession Capability:

Message statistics:

InQ depth is 0

OutQ depth is 0

Sent    Rcvd

Opens                  1        1

Notifications:         0        0

Updates:               2        2

Keepalives:            19      19

Route Refresh:         0        0

Total:                 22      22

Default minimum time between advertisement runs is 0 seconds

For address family: IPv4 Unicast

Session: 169.254.2.2

BGP table version 5, neighbor version 5/0

Output queue size : 0

Index 15

15 update-group member

Sent     Rcvd

Prefix activity:             ----    ----

Prefixes Current:            1          1         (Consumes 80 bytes)

Prefixes Total:              1          1

Implicit Withdraw:           0          0

Explicit Withdraw:           0          0

Used as bestpath:            n/a        1

Used as multipath:           n/a        0

Outbound           Inbound

Local Policy Denied Prefixes:   --------            -------

Bestpath from this peer:         1                          n/a

Invalid Path:                    1                          n/a

Total:                           2                            0

Number of NLRIs in the update sent: max 1, min 0

Address tracking is enabled, the RIB does have a route to 169.254.2.2

Connections established 7; dropped 6

Last reset 00:20:06, due to Peer closed the session of session 1

Transport(tcp) path-mtu-discovery is disabled

Graceful-Restart is disabled

#show route bgp

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, V - VPN

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, + - replicated route

SI - Static InterVRF, BI - BGP InterVRF

Gateway of last resort is 10.197.226.1 to network 0.0.0.0

B        1.1.1.0 255.255.255.0 [200/0] via 169.254.2.2, 00:19:55

ASA上的輸出

#show crypto ikev2 sa

IKEv2 SAs:

Session-id:7, Status:UP-ACTIVE, IKE count:1, CHILD count:1

Tunnel-id    Local                       Remote                     fvrf/ivrf             Status           Role

442126361    10.197.226.187/500          10.197.226.222/500         Global/Global          READY           INITIATOR

Encr: AES-CBC, keysize: 256, Hash: SHA256, DH Grp:14, Auth sign: PSK, Auth verify: PSK

Life/Active Time: 86400/1200 sec

Child sa: local selector 0.0.0.0/0 - 255.255.255.255/65535

remote selector 0.0.0.0/0 - 255.255.255.255/65535

ESP spi in/out: 0x8540d49e/0xa14edaf6

#show crypto ipsec sa

interface: FTD-VTI

Crypto map tag: __vti-crypto-map-Tunnel1-0-1, seq num: 65280, local addr: 10.197.226.187

Protected vrf (ivrf): Global

local ident (addr/mask/prot/port): (0.0.0.0/0.0.0.0/0/0)

remote ident (addr/mask/prot/port): (0.0.0.0/0.0.0.0/0/0)

current_peer: 10.197.226.222

#pkts encaps: 44 #pkts encrypt: 44, #pkts digest: 44

#pkts decaps: 45, #pkts decrypt: 45, #pkts verify: 45

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed:0, #pkts comp failed: 0, #pkts decomp failed: 0

#pre-frag successes: 0, #pre-frag failures: 0, #fragments created: 0

#PMTUs sent: 0, #PMTUs rcvd: 0, #decapsulated frgs needing reassembly: 0

#TFC rcvd: 0, #TFC sent: 0

#Valid ICMP Errors rcvd: 0, #Invalid ICMP Errors rcvd: 0

#send errors: 0, #recv errors: 0

local crypto endpt.: 10.197.226.187/500, remote crypto endpt.: 10.197.226.222/500

path mtu 1500, ipsec overhead 78(44), media mtu 1500

PMTU time remaining (sec): 0, DF policy: copy-df

ICMP error validation: disabled, TFC packets: disabled

current outbound spi: A14EDAF6

current inbound spi : 8540D49E

inbound esp sas:

spi: 0x8540D49E (2235618462)

SA State: active

transform: esp-aes-256 esp-sha-256-hmac no compression

in use settings ={L2L, Tunnel, PFS Group 14, IKEv2, VTI, }

slot: 0, conn_id: 9, crypto-map: __vti-crypto-map-Tunnel1-0-1

sa timing: remaining key lifetime (kB/sec): (4147198/27594)

IV size: 16 bytes

replay detection support: Y

Anti replay bitmap:

0x00000000 0x007FFFFF

outbound esp sas:

spi: 0xA14EDAF6 (2706299638)

SA State: active

transform: esp-aes-256 esp-sha-256-hmac no compression

in use settings ={L2L, Tunnel, PFS Group 14, IKEv2, VTI, }

slot: 0, conn_id: 9, crypto-map: __vti-crypto-map-Tunnel1-0-1

sa timing: remaining key lifetime (kB/sec): (3916798/27594)

IV size: 16 bytes

replay detection support: Y

Anti replay bitmap:

0x00000000 0x00000001

#show bgp summary

BGP router identifier 10.1.1.2, local AS number 1000

BGP table version is 7, main routing table version 7

2 network entries using 400 bytes of memory

2 path entries using 160 bytes of memory

2/2 BGP path/bestpath attribute entries using 416 bytes of memory

0 BGP route-map cache entries using 0 bytes of memory

0 BGP filter-list cache entries using 0 bytes of memory

BGP using 976 total bytes of memory

BGP activity 5/3 prefixes, 7/5 paths, scan interval 60 secs

Neighbor        V      AS      MsgRcvd      MsgSent     TblVer    InQ     OutQ     Up/Down     State/PfxRcd

169.254.2.1      4     1000       22             22       7       0         0      00:19:42      1

#show bgp neighbors

BGP neighbor is 169.254.2.1, context single_vf, remote AS 1000, internal link

BGP version 4, remote router ID 10.1.1.1

BGP state = Established, up for 00:19:42

Last read 00:01:04, last write 00:00:38, hold time is 180, keepalive interval is 60 seconds

Neighbor sessions:

1 active, is not multisession capable (disabled)

Neighbor capabilities:

Route refresh: advertised and received(new)

Four-octets ASN Capability: advertised and received

Address family IPv4 Unicast: advertised and received

Multisession Capability:

Message statistics:

InQ depth is 0

OutQ depth is 0

Sent     Rcvd

Opens:             1         1

Notifications:     0         0

Updates:           2         2

Keepalives:        19       19

Route Refresh:     0         0

Total:             22       22

Default minimum time between advertisement runs is 0 seconds

For address family: IPv4 Unicast

Session: 169.254.2.1

BGP table version 7, neighbor version 7/0

Output queue size : 0

Index 5

5 update-group member

Sent      Rcvd

Prefix activity:     ----      ----

Prefixes Current:    1         1         (Consumes 80 bytes)

Prefixes Total:      1         1

Implicit Withdraw:   0         0

Explicit Withdraw:   0         0

Used as bestpath:    n/a       1

Used as multipath:   n/a       0

Outbound        Inbound

Local Policy Denied Prefixes:     --------        -------

Bestpath from this peer:           1              n/a

Invalid Path:                      1              n/a

Total:                             2              0

Number of NLRIs in the update sent: max 1, min 0

Address tracking is enabled, the RIB does have a route to 169.254.2.1

Connections established 5; dropped 4

Last reset 00:20:06, due to Peer closed the session of session 1

Transport(tcp) path-mtu-discovery is disabled

Graceful-Restart is disabled

#show route bgp

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, V - VPN

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, + - replicated route

SI - Static InterVRF, BI - BGP InterVRF

Gateway of last resort is 10.197.226.1 to network 0.0.0.0

B       2.2.2.0 255.255.255.0 [200/0] via 169.254.2.1, 00:19:55

疑難排解

本節提供的資訊可用於對組態進行疑難排解。

debug crypto ikev2 platform 255

debug crypto ikev2 protocol 255

debug crypto ipsec 255

debug ip bgp all

- 僅支援IPv4介面，以及IPv4、受保護的網路或VPN負載（不支援IPv6）。