目錄

簡介

必要條件

需求

採用元件

背景資訊

概念

設定

解除安裝UTD

預檢查

組態

驗證

設定

安裝UTD

預檢查

組態

驗證

疑難排解

相關資訊

簡介

本文檔介紹通過SDWAN路由器的CLI安裝和解除安裝統一威脅防禦(UTD)的過程。

必要條件

需求

思科建議您瞭解以下主題：

- 思科軟體定義廣域網路(SD-WAN)

- Cisco IOS® XE命令列介面(CLI)

採用元件

本檔案是根據以下軟體和硬體版本所編制：

- 路由器ISR4461/K9

- 軟體版本17.3.4

- 處於控制器模式的路由器

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路運作中，請確保您瞭解任何指令可能造成的影響。

背景資訊

當cedge處於CLI模式或vManage和cedge之間沒有控制連線時，需要應用這些步驟。

但是，如果您有控制平面，並且您的邊緣處於vManage模式，則繼續檢視此其他文章。

概念

本文檔的具體要求包括：

- Cisco vManage 20.3版或更高版本。

- 思科整合多業務路由器4431版本17.3.4

有關支援的平台的更多資訊，請導航至SDWAN支援的平台和限制的UTD。

設定

解除安裝UTD

預檢查

以下是解除安裝UTD之前的cedge路由器示例。

*裝置處於控制器模式，未連線任何模板，但應用了UTD配置。

cedge#show sdwan system

Viptela (tm) vEdge Operating System Software

Copyright (c) 2013-2022 by Viptela, Inc.

Controller Compatibility: 20.3

Version: 17.03.04a.0.5574

Build: Not applicable

Model name:              ISR4461/K9

Services:                None

vManaged:                false

Commit pending:          false

Configuration template:  None

cedge#show platform software device-mode

Device Operating-mode: Controller-Managed

cedge#show run | sec utd

utd multi-tenancy

utd engine standard multi-tenancy

threat-inspection whitelist profile Sig-white-list

generator id 3 signature id 22089

generator id 3 signature id 36208

threat-inspection profile IPS-POLICY

threat detection

policy balanced

logging level alert

whitelist profile Sig-white-list

policy utd-policy-vrf-1

vrf 511

all-interfaces

threat-inspection profile IPS-POLICY

app-hosting appid utd

app-vnic gateway0 virtualportgroup 0 guest-interface 0

guest-ipaddress 192.168.1.2 netmask 255.255.255.252

app-vnic gateway1 virtualportgroup 1 guest-interface 1

guest-ipaddress 192.0.2.2 netmask 255.255.255.252

app-resource package-profile urlf-low

start

cedge#

cedge#show running-config | section VirtualPortGroup0

interface VirtualPortGroup0

description Management interface

vrf forwarding 65529

ip address 192.168.1.1 255.255.255.252

no mop enabled

no mop sysid

cedge#show running-config | section VirtualPortGroup1

interface VirtualPortGroup1

description Data interface

ip address 192.0.2.1 255.255.255.252

no mop enabled

no mop sysid

cedge#

附註：必須先刪除UTD配置，然後才能解除安裝。

組態

1. 停止UTD服務。

cedge#config-transaction

cedge(config)# app-hosting appid utd

cedge(config-app-hosting)# no start

cedge(config-app-hosting)# commit

Commit complete.

附註：未應用啟動後，UTD狀態從Running更改為Deployed。

cedge#show app-hosting list

App id                                   State

---------------------------------------------------------

utd                                      DEPLOYED

cedge#

2.刪除UTD配置。

cedge#config-transaction

cedge(config)# utd engine standard multi-tenancy

cedge(config-utd-multi-tenancy)# no policy utd-policy-vrf-1

cedge(config-utd-multi-tenancy)# commit

Commit complete.

cedge(config-utd-multi-tenancy)#

cedge#config-transaction

cedge(config)# utd multi-tenancy

cedge(config)# utd engine standard multi-tenancy

cedge(config-utd-multi-tenancy)# no threat-inspection whitelist profile Sig-white-list

cedge(config-utd-multi-tenancy)# no threat-inspection profile IPS-POLICY

cedge(config-utd-multi-tenancy)# exit

cedge(config)# commit

Commit complete.

cedge(config)# no utd engine standard multi-tenancy

cedge(config)# commit

Commit complete.

cedge(config)#

cedge#config-transaction

cedge(config)# no utd multi-tenancy

cedge(config)# commit

Commit complete.

cedge(config)#

cedge(config)# app-hosting appid utd

cedge(config-app-hosting)# no app-vnic gateway0 virtualportgroup 0 guest-interface 0

cedge(config-app-hosting)# no app-vnic gateway1 virtualportgroup 1 guest-interface 1

cedge(config-app-hosting)# no app-resource package-profile urlf-low

cedge(config-app-hosting)# commit

Commit complete.

cedge(config-app-hosting)#exit

cedge(config)# no app-hosting appid utd

cedge(config)# commit

Commit complete.

cedge(config)#

cedge(config)# no interface VirtualPortGroup0

cedge(config)# no interface VirtualPortGroup1

cedge(config)# commit

Commit complete.

cedge(config)#

cedge(config)# no iox

cedge(config)# commit

Commit complete.

cedge(config)#

3.驗證。

以下是刪除UTD組態後cedge路由器應如何處理的一個範例。

cedge#show running-config | section iox

cedge#show running-config | section VirtualPortGroup0

cedge#show running-config | section VirtualPortGroup1

cedge#show running-config | section utd

cedge#

cedge#show platform software utd global

UTD Global state

=========================

Engine : Standard

Global Inspection : Disabled

Operational Mode : Intrusion Detection

Fail Policy : Fail-open

Container technology : LXC

Redirect interface : Not specified

UTD interfaces

No interfaces are protected by UTD

<snipped>

附註：雖然組態已移除，UTD仍會顯示installed。這是意料之中的。

cedge#show utd engine standard version

UTD Virtual-service Name: utd

IOS-XE Recommended UTD Version: 1.0.16_SV2.9.16.1_XE17.3

IOS-XE Supported UTD Regex: ^1\.0\.([0-9]+)_SV(.*)_XE17.3$

UTD Installed Version: 1.0.16_SV2.9.16.1_XE17.3

cedge#show virtual-service

Virtual Service Global State and Virtualization Limits:

Infrastructure version : 1.7

Total virtual services installed : 1

Total virtual services activated : 0

<snipped>

cedge#show app-hosting list

The process for the command is not responding or is otherwise unavailable   >>>> Expected because UTD config was removed but UTD engine remains installed

** Before to remove Configuration **

cedge#show virtual-service version name utd running

Virtual service utd running version:

Name : UTD-Snort-Feature

Version : 1.0.16_SV2.9.16.1_XE17.3

** After configuration is removed **

cedge#

cedge#show virtual-service version name utd running

Virtual service utd running version:

Name : UTD-Snort-Feature

Version : None

4.刪除UTD引擎。

提示：您需要啟用iox和應用宿主appid utd才能解除安裝UTD引擎。

以下範例顯示了在未啟用iox和應用託管啟用的情況下刪除UTD會發生的情況。

cedge#app-hosting uninstall appid utd    >>>> No action is taken.

cedge#

以下是成功解除安裝UTD的範例。

cedge#config-transaction

cedge(config)# iox

cedge(config)# app-hosting appid utd

cedge(config-app-hosting)# commit

Commit complete.

cedge(config-app-hosting)#

*Mar 3 20:25:24.889: %UICFGEXP-6-SERVER_NOTIFIED_START: R0/0: psd: Server iox has been notified to start

*Mar 3 20:25:50.268: %IM-6-IOX_RECONCILE_INFO: R0/0: ioxman: App-hosting application reconcile process start

*Mar 3 20:25:51.956: %IM-6-IOX_ENABLEMENT: R0/0: ioxman: IOX is ready.

cedge#

cedge#app-hosting uninstall appid utd

Uninstalling 'utd'. Use 'show app-hosting list' for progress.

cedge#

*Mar 3 20:26:31.653: %VIRT_SERVICE-5-INSTALL_STATE: Successfully uninstalled virtual service utd

*Mar 3 20:26:32.706: %IM-6-INSTALL_MSG: R0/0: ioxman: app-hosting: Uninstall succeeded: utd uninstalled successfully

cedge#

驗證

運行以下命令以驗證是否刪除了UTD。

cedge#show app-hosting list

No App found

cedge#show virtual-service version name utd running

% Error: Virtual-service utd is not found

cedge#show utd engine standard version

IOS-XE Recommended UTD Version: 1.0.16_SV2.9.16.1_XE17.3

IOS-XE Supported UTD Regex: ^1\.0\.([0-9]+)_SV(.*)_XE17.3$

cedge#show virtual-service

Virtual Service Global State and Virtualization Limits:

Infrastructure version : 1.7

Total virtual services installed : 0

Total virtual services activated : 0

<snipped>

設定

安裝UTD

預檢查

檢視UTD支援的版本，然後將其下載到bootflash中。

cedge#

cedge#show utd engine standard version

IOS-XE Recommended UTD Version: 1.0.16_SV2.9.16.1_XE17.3

IOS-XE Supported UTD Regex: ^1\.0\.([0-9]+)_SV(.*)_XE17.3$

cedge#

cedge#dir bootflash: | i utd

36 -rw- 55050240 Mar 1 2022 01:08:29 +00:00 secapp-utd.17.03.04a.1.0.16_SV2.9.16.1_XE17.3.x86_64.tar

cedge#

組態

1.啟用iox和應用託管。

cedge#config-transaction

cedge(config)# iox

cedge(config)# app-hosting appid utd

cedge(config-app-hosting)# commit

Commit complete.

cedge(config-app-hosting)#

*Mar 3 20:25:24.889: %UICFGEXP-6-SERVER_NOTIFIED_START: R0/0: psd: Server iox has been notified to start

*Mar 3 20:25:50.268: %IM-6-IOX_RECONCILE_INFO: R0/0: ioxman: App-hosting application reconcile process start

*Mar 3 20:25:51.956: %IM-6-IOX_ENABLEMENT: R0/0: ioxman: IOX is ready.

cedge#

2.安裝UTD引擎。

cedge#app-hosting install appid utd package bootflash:secapp-utd.17.03.04a.1.0.16_SV2.9.16.1_XE17.3.x86_64.tar

Installing package 'bootflash:secapp-utd.17.03.04a.1.0.16_SV2.9.16.1_XE17.3.x86_64.tar' for 'utd'. Use 'show app-hosting list' for progress.

cedge#

*Mar 3 21:07:43.529: %VMAN-5-PACKAGE_SIGNING_LEVEL_ON_INSTALL: R0/0: vman: Package 'secapp-utd.17.03.04a.1.0.16_SV2.9.16.1_XE17.3.x86_64.tar' for service container 'utd' is 'Cisco signed', signing level cached on original install is 'Cisco signed'

*Mar 3 21:07:56.332: %VIRT_SERVICE-5-INSTALL_STATE: Successfully installed virtual service utd

*Mar 3 21:07:56.922: %IM-6-INSTALL_MSG: R0/0: ioxman: app-hosting: Install succeeded: utd installed successfully Current state is deployed

cedge#

3.確保已安裝UTD引擎。運行下一命令。

附註：DEPLOYED狀態指已安裝但未配置的UTD。RUNNING state表示UTD Installed and configured。

cedge#show app-hosting list

App id                                   State

---------------------------------------------------------

utd                                      DEPLOYED

cedge#show virtual-service version name utd running

Virtual service utd running version:

Name : UTD-Snort-Feature

Version : None >>>> "None", it is expected due to the fact that no config yet

cedge#show utd engine standard version

UTD Virtual-service Name: utd

IOS-XE Recommended UTD Version: 1.0.16_SV2.9.16.1_XE17.3

IOS-XE Supported UTD Regex: ^1\.0\.([0-9]+)_SV(.*)_XE17.3$

UTD Installed Version: 1.0.16_SV2.9.16.1_XE17.3 >>>> UTD Package installed

cedge#

cedge#show virtual-service

Virtual Service Global State and Virtualization Limits:

Infrastructure version : 1.7

Total virtual services installed : 1 >>>> Installed 1 but Activated 0 as expected

Total virtual services activated : 0

4.要使UTD處於運行狀態，請繼續配置IPS/URL。這是來自實驗室的一個示例。

cedge#config-transaction

cedge(config)# interface VirtualPortGroup0

cedge(config-if)# description Management interface

cedge(config-if)# vrf forwarding 65529

cedge(config-if)# ip address 192.168.1.1 255.255.255.252

cedge(config-if)# exit

cedge(config)# commit

Commit complete.

cedge(config)#

cedge(config)# interface VirtualPortGroup1

cedge(config-if)# description Data interface

cedge(config-if)# ip address 192.168.2.1 255.255.255.252

cedge(config-if)# exit

cedge(config)# commit

Commit complete.

cedge(config)#

cedge(config)# app-hosting appid utd

cedge(config-app-hosting)# app-vnic gateway0 virtualportgroup 0 guest-interface 0

cedge(config-app-hosting-gateway)# guest-ipaddress 192.168.1.2 netmask 255.255.255.252

cedge(config-app-hosting-gateway)# exit

cedge(config-app-hosting)# app-vnic gateway1 virtualportgroup 1 guest-interface 1

cedge(config-app-hosting-gateway)# guest-ipaddress 192.168.2.2 netmask 255.255.255.252

cedge(config-app-hosting-gateway)# exit

cedge(config-app-hosting)# app-resource package-profile urlf-low

cedge(config-app-hosting)# start

cedge(config-app-hosting)# commit

Commit complete.

cedge(config-app-hosting)#

cedge(config-app-hosting)# exit

cedge(config)# utd multi-tenancy

cedge(config)# utd engine standard multi-tenancy

cedge(config-utd-multi-tenancy)# threat-inspection whitelist profile Sig-white-list

cedge(config-utd-mt-whitelist)# generator id 3 signature id 22089

cedge(config-utd-mt-whitelist)# generator id 3 signature id 36208

cedge(config-utd-mt-whitelist)# exit

cedge(config-utd-multi-tenancy)# threat-inspection profile IPS-POLICY

cedge(config-utd-mt-threat)# threat detection

cedge(config-utd-mt-threat)# policy balanced

cedge(config-utd-mt-threat)# whitelist profile Sig-white-list

cedge(config-utd-mt-threat)# logging level alert

cedge(config-utd-mt-threat)# exit

cedge(config-utd-multi-tenancy)# commit

Commit complete.

cedge(config-utd-multi-tenancy)#

cedge(config-utd-multi-tenancy)# policy utd-policy-vrf-1

cedge(config-utd-mt-policy)# vrf 511

cedge(config-utd-mt-policy)# all-interfaces

cedge(config-utd-mt-policy)# fail close

cedge(config-utd-mt-policy)# threat-inspection profile IPS-POLICY

cedge(config-utd-mt-policy)# exit

cedge(config-utd-multi-tenancy)# commit

Commit complete.

cedge(config-utd-multi-tenancy)#

cedge(config-utd-multi-tenancy)# end

cedge#

5.確保配置完成。

cedge#show run | section utd

utd multi-tenancy

utd engine standard multi-tenancy

threat-inspection whitelist profile Sig-white-list

generator id 3 signature id 22089

generator id 3 signature id 36208

threat-inspection profile IPS-POLICY

threat detection

policy balanced

logging level alert

whitelist profile Sig-white-list

policy utd-policy-vrf-1

vrf 511

all-interfaces

threat-inspection profile IPS-POLICY

fail close

app-hosting appid utd

app-vnic gateway0 virtualportgroup 0 guest-interface 0

guest-ipaddress 192.168.1.2 netmask 255.255.255.252

app-vnic gateway1 virtualportgroup 1 guest-interface 1

guest-ipaddress 192.168.2.2 netmask 255.255.255.252

app-resource package-profile urlf-low

start

cedge#

驗證

1.運行show logging並確保您獲得類似日誌（如下所示）。

*Mar 3 23:17:17.573: %LINK-3-UPDOWN: Interface VirtualPortGroup0, changed state to up

*Mar 3 23:17:18.094: %LINK-3-UPDOWN: Interface VirtualPortGroup1, changed state to up

*Mar 3 23:17:18.572: %LINEPROTO-5-UPDOWN: Line protocol on Interface VirtualPortGroup0, changed state to up

*Mar 3 23:17:19.095: %LINEPROTO-5-UPDOWN: Line protocol on Interface VirtualPortGroup1, changed state to up

*Mar 3 23:17:25.630: %LINEPROTO-5-UPDOWN: Line protocol on Interface Tunnel2000000001, changed state to up

*Mar 3 23:19:36.863: %VIRT_SERVICE-5-ACTIVATION_STATE: Successfully activated virtual service utd

*Mar 3 23:19:37.577: %IM-6-START_MSG: R0/0: ioxman: app-hosting: Start succeeded: utd started successfully Current state is running

*Mar 3 23:19:38.318: %ONEP_BASE-6-CONNECT: [Element]: ONEP session Application:utd_snort Host:cedge ID:6633 User: has connected.

*Mar 3 23:19:50.428: %IOSXE_UTD-4-MT_CONFIG_DOWNLOAD: UTD MT configuration download has started

*Mar 3 23:20:06.460: %IOSXE_UTD-4-MT_CONFIG_DOWNLOAD: UTD MT configuration download has completed

*Mar 3 23:20:08.389: %IOSXE-5-PLATFORM: R0/0: cpp_cp: QFP:0.0 Thread:011 TS:00000780131568867961 %SDVT-5-SDVT_HEALTH_UP: Service node is up for channel Threat Defense. Current Health: Green, Previous Health: Down

附註：如果配置成功，當前運行狀況將從Down更改為Green。

2.運行這些命令以驗證UTD安裝。

cedge#show app-hosting list

App id                                   State

---------------------------------------------------------

utd                                      RUNNING   >>> State change from Deployed to Running

cedge#show utd engine standard version

UTD Virtual-service Name: utd

IOS-XE Recommended UTD Version: 1.0.16_SV2.9.16.1_XE17.3

IOS-XE Supported UTD Regex: ^1\.0\.([0-9]+)_SV(.*)_XE17.3$

UTD Installed Version: 1.0.16_SV2.9.16.1_XE17.3

cedge#show virtual-service version name utd running

Virtual service utd running version:

Name : UTD-Snort-Feature

Version : 1.0.16_SV2.9.16.1_XE17.3 >>>> Changed from NONE to "1.0.16_SV2.9.16.1_XE17.3" after config.

cedge#

cedge#show virtual-service

Virtual Service Global State and Virtualization Limits:

Infrastructure version : 1.7

Total virtual services installed : 1

Total virtual services activated : 1 >>>>>>>>> Now it is activated

cedge#show virtual-service version name utd running

Virtual service utd running version:

Name : UTD-Snort-Feature

Version : 1.0.16_SV2.9.16.1_XE17.3

疑難排解

本節提供的資訊可用於對組態進行疑難排解。

有用的命令

show platform software device-mode

show app-hosting list

show virtual-service version name utd running

show utd engine standard version

show utd engine standard status

show virtual-service

相關資訊

- 安全配置指南：統一威脅防禦，Cisco IOS XE 17

- 安全配置指南：統一威脅防禦，Cisco IOS XE 16

- 用於SDWAN支援的平台和限制的UTD。

- 使用vManage安裝UTD。