目錄

簡介

背景

光纖

介面

連線埠速度

故障信令機制

DWDM可調光纜

IPoDWDM — 相干DSP

詳細故障排除

首先要檢查的事項

警報

顯示控制器光纖

相干DSP

Show Controllers PHY

NPU

摘要

收集日誌

簡介

本文說明如何解決介面關閉或介面翻動問題。

本檔案特定於Cisco IOS®XR，但並不限於特定軟體版本。

本文檔專為NCS平台。

背景

介面關閉或介面翻動的原因有多種。連結可能會因為多個裝置而關閉，如圖1所示。它顯示了一台NCS路由器，其中一個前面板埠通過PHY（物理層）裝置連線到NPU（網路處理器單元），位於兩者之間（稱為PHY型埠）。有些平台的前面板埠直接連線到NPU（稱為PHYless埠）。一台路由器可以同時具有兩種變體。

圖1

光纖

介面

請注意，Cisco IOS XR上總是以這種方式描述介面。

R/S/I/P：機架/插槽/例項/埠/分支

R/S/I/P/B：機架/插槽/例項/埠/

連線埠速度

某些平台/線卡在某些埠上支援多種速度。例如：1/10GE、25/40GE、40/100GE、1/10/25GE。

可在每個埠或每組埠上配置速度。檢視NCS上埠對映的硬體文檔。檢查埠速度是否設定正確。有些埠可以自動檢測速度，有些埠需要配置。

有些埠可以按組進行配置（通常為四埠：四埠組）。

舉例來說：

(config)#hw-module quad 0 location 0/0/CPU0 mode ?

WORD  10g or 25g

某些埠可以單獨配置。這通常是100G埠。100G是預設速度，但您可以配置40G。

舉例來說：

(config)#controller optics 0/0/1/0

(config-Optics)#speed 40g

故障信令機制

請注意，排除介面故障時，鏈路故障信令機制可以發揮作用。在10G及更高版本中，PHY層包含鏈路故障信令機制。因此，當檢測到本地故障時，會通知遠端端。

圖2

在GigE介面上，沒有這樣的板載機制。檢查「ethernet oam」是否配置為替代方法。

舉例來說：

interface GigabitEthernet0/6/0/2

ethernet oam

uni-directional link-fault detection

action

uni-directional link-fault efd

DWDM可調光纜

在支援頻率調諧的DWDM光纖上，使用此配置設定可使用的頻率（基於電路提供商設定的DWDM電路）：

命令如下：

controller optics 0/6/0/2

dwdm-carrier {100MHz-grid | 50GHz-grid} frequency {frequency}

驗證設定：

RP/0/RP0/CPU0:NCS-5508#show controllers optics 0/6/0/2 dwdm-carrier-map

DWDM Carrier Band:: OPTICS_C_BAND

MSA ITU channel range supported: 1~96

DWDM Carrier Map table

----------------------------------------------------

ITU Ch      G.694.1     Frequency     Wavelength

Num        Ch Num        (THz)          (nm)

----------------------------------------------------

1       -35           191.35      1566.723

----------------------------------------------------

2       -34           191.40      1566.314

----------------------------------------------------

3       -33           191.45      1565.905

----------------------------------------------------

4       -32           191.50      1565.496

----------------------------------------------------

...

----------------------------------------------------

95        59           196.05      1529.163

----------------------------------------------------

96        60           196.10      1528.773

----------------------------------------------------

在DWDM光纖上，所有DWDM特定調諧均在控制器dwdm配置下完成：

RP/0/RP0/CPU0:NCS-5508(config)#controller dwdm 0/6/0/2 ?

admin-state       Configure the transport admin state of the controller: in-service, out-of-service or maintenance

g709              Configure G709 parameters

laser             To be deprecated and removed in 7.5.1 release

log               Proactive log

loopback          Configure loopback mode

network           Configure DWDM network information

pm                Configure pm parameters

proactive         Enable Proactive Protection Feature

rx-los-threshold  Configure transponder receive power LOS threshold

transmit-power    Configure transponder transmit power

vtxp-monitor      Enable VTXP monitoring function

wavelength        Configure ITU Channel, Wavelength and Frequency

<cr>

RP/0/RP0/CPU0:NCS-5508(config-dwdm)#g709 fec ?

15sdfec                       15%-SD Forward Error Correction

15sdfecde                     15%-SD Forward Error Correction with Diff

ci-bch                        Continuously Interleaved BCH FEC

disable                       Disable FEC

enhanced                      Enhanced FEC mode

high-gain                     To be deprecated and removed in 7.5.1 release

high-gain-hd-fec              7% HD FEC (Staircase FEC)

high-gain-multivendor-hd-fec  7% HD FEC (Staircase FEC) Multivendor Interoperable

high-gain-sd-fec              7% CISCO SD FEC (Soft-Decision FEC)

long-haul                     To be deprecated and removed in 7.5.1 release

long-haul-hd-fec              20% HD FEC (Staircase FEC)

long-haul-sd-fec              20% CISCO SD FEC (Soft-Decision FEC)

standard                      Standard FEC mode

IPoDWDM — 相干DSP

相干DSP支援遠距離高速率(100/200/400G)。DWDM處理由相干DSP（數位訊號處理器）處理。

此類NCS模組的示例：NC55-6X200-DWDM-S或NC55-MPA-2TH-S（帶CFP2-WDM-D-1HL）

RP/0/RP0/CPU0:NCS-5508(config)# controller coherentDSP 0/6/0/0

RP/0/RP0/CPU0:NCS-5508(config-CoDSP)#fec ?

CFEC                 Forward Error Correction C_FEC

EnhancedHG20         Forward Error Correction Enhanced_HG20

EnhancedHG7          Forward Error Correction Enhanced_HG7

EnhancedI4           Forward Error Correction Enhanced_I_4

EnhancedI7           Forward Error Correction Enhanced_I_7

EnhancedSD15         Forward Error Correction Soft-Decision 15

EnhancedSD15DE       Forward Error Correction Soft-Decision 15 with DE

EnhancedSD20         Forward Error Correction Soft-Decision 20

EnhancedSD27         Forward Error Correction Soft-Decision 27

EnhancedSD7          Forward Error Correction Soft-Decision 7

EnhancedStaircaseDE  Forward Error Correction Enhanced Staircase FEC with DE

EnhancedSwizzle      Forward Error Correction Enhanced_Swizzle

OFEC                 Forward Error Correction O_FEC

Standard             Forward Error Correction Standard

none                 No Forward Error Correction

詳細故障排除

本節從光學角度介紹基本的調試/技術。

首先要檢查的事項

檢查光學器件是否顯示在清單中。如果未顯示光纖，請檢查是否將光纖正確插入到R/S/I/P中，並且使用的電纜沒有問題。

++++++++++ show inventory details [18:06:56.572 UTC Thu Apr 06 2023] ++++++++++

NAME: "0/RP0", DESCR: "NC55A1 24Q6H SS Route Processor Card"

PID: NCS-55A1-24Q6H-SS , VID: V01, SN: FOC2528002Q

MFG_NAME: Cisco Systems, Inc., SNMP_IDX: 1 , Type: Module

PN: 73-20057-02

NAME: "TenGigE0/0/0/0", DESCR: "Cisco SFP+ 10G ZR Pluggable Optics Module"

PID: SFP-10G-ZR , VID: V02, SN: BD211218N1T

MFG_NAME: CISCO-PRE , SNMP_IDX: 2129921 , Type: Module

PN: TSFP10G-1558.17

NAME: "TenGigE0/0/0/1", DESCR: "Cisco SFP+ 10G ZR Pluggable Optics Module"

PID: SFP-10G-ZR , VID: V02, SN: BD211218N3K

MFG_NAME: CISCO-PRE , SNMP_IDX: 2134017 , Type: Module

PN: TSFP10G-1557.36

RP/0/RP0/CPU0:NCS-5501#show controllers te0/0/0/14 internal

Internal data for interface: TenGigE0/0/0/14

Subport Number      : 255

Port Number         : 14 *

Bay Number          : 0 *

Board Type          : 0x60020201 *

Port Type           : 10GE *

Bandwidth(Kbps)     : 10000000 *

Transport mode      : LAN *

BIA MAC addr        : 008a:9617:4838

Oper. MAC addr      : 008a:9617:4838

Egress MAC addr     : 008a:9617:4838

Port Available      : true *

Status polling is   : disabled *

Status events are   : disabled

I/F Handle          : 0x00000158 *

Cfg Link Enabled    : enabled

H/W Tx Enable       : yes

MTU                 : 1514 *

H/W Speed           : 10 Gbps *

H/W Duplex          : Full *

H/W Loopback Type   : None *

FEC                 : Not Configured *

H/W FlowCtrl Type   : Disabled *

H/W AutoNeg Enable  : Off *

H/W Link Defects    : No Fault *

Link Up             : yes *

Link Led Status     : Green ON *

Pluggable Present   : Yes *

Pluggable Type      : SFP+ 10G CU3M

Pluggable PID       : SFP-H10GB-CU3M *

Pluggable Compl.    : Failed - Bad Vendor CRC

如果無法識別收發器，請在此處檢查是否支援收發器型別：https://tmgmatrix.cisco.com/。

供應商CRC應正確。

檢查訊號強度。

要求收發器支援DOM（數字光纖監控）！

RP/0/RP0/CPU0:BRU-SPCORE-P2#show controllers hundredGigE0/0/0/10 phy

QSFP8636 EEPROM port: 10

Xcvr Type: QSFP28

Ext Type: 3.5W, CLEI, TX CDR, RX CDR,

Connector Type: MPO

Ethernet Compliance Codes: 100G BASE-SR4,

BR, nominal: 25500 Mbps

Length SMF: 0KM, OM3: 70M, OM2: 0M, OM1: 0M, Cable: 50M

Deice Tech: 850nm VCSEL,

Vendor Name: CISCO-FINISAR

Vendor OUI: 00.90.65

Vendor Part Number: FTLC9555REPM-C1   (rev.: A )

Wavelength: 850.000 nm

Wavelength Tolerance: 10.000 nm

Vendor Serial Number: FIW2638016W

Date Code (yy/mm/dd): 22/09/13  lot code:

Diagnostic Monitoring Type: RX Avg, TX,

Enhanced Options: Init Complete Flag Impl,

Extended Module Codes:

Options:

L-Tx/Rx LOS:

L-Tx Fault:

L-Tx/Rx LOL:

Module DDM: Volt, Temp, TX Power, TX Bias, RX Power,

MSA Data (Lower Memory)

0x0000: 11 07 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

0x0010: 00 00 00 00 00 00 1d 75 : 00 00 81 2f 00 00 00 00

0x0020: 00 00 20 b6 2e 9a 2d ba : 27 44 0d ed 0e 0c 0e 0c

0x0030: 0e 0c 28 46 2a dc 29 1f : 2a 72 00 00 00 00 00 00

0x0040: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

0x0050: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 01 00 00

0x0060: 00 00 ff 00 00 00 00 00 : 00 01 1f 00 00 00 00 00

0x0070: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

MSA Data (Upper Memory Page 00)

0x0080: 11 dc 0c 80 00 00 00 00 : 00 00 00 05 ff 00 00 23

0x0090: 00 00 32 00 43 49 53 43 : 4f 2d 46 49 4e 49 53 41

0x00a0: 52 20 20 20 00 00 90 65 : 46 54 4c 43 39 35 35 35

0x00b0: 52 45 50 4d 2d 43 31 20 : 41 20 42 68 07 d0 46 ef

0x00c0: 02 07 ff f6 46 49 57 32 : 36 33 38 30 31 36 57 20

0x00d0: 20 20 20 20 32 32 30 39 : 31 33 20 20 0c 10 68 3a

0x00e0: 00 00 02 3c c0 ff c6 b6 : 3b 05 e6 30 86 bb 80 05

0x00f0: df 65 71 00 00 00 00 00 : 00 00 00 00 79 eb c1 06

CLEI Code: CMUIATKCAA

Part Number: FTLC9555REPM-C1 (ver.: V03)

Product Id: QSFP-100G-SR4-S

MSA Data (Upper Memory Page 02)

0x0180: 43 4d 55 49 41 54 4b 43 : 41 41 31 30 2d 33 31 34

0x0190: 32 2d 30 33 56 30 33 20 : 01 00 00 31 20 20 20 20

0x01a0: 20 66 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

0x01b0: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 aa aa

0x01c0: 51 53 46 50 2d 31 30 30 : 47 2d 53 52 34 2d 53 20

0x01d0: 20 20 20 20 00 00 00 00 : 00 00 00 00 00 00 00 65

0x01e0: 31 33 33 39 39 37 31 36 : 31 d8 00 00 00 00 00 00

0x01f0: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

Module

Thresholds:                   Alarm High          Warning High          Warning Low          Alarm Low

Temperature:            +75.000 C             +70.000 C              +0.000 C              -5.000 C

Voltage:           3.630 Volt            3.465 Volt            3.135 Volt            2.970 Volt

Temperature: +29.457 C

Voltage: 3.315 Volt

Lanes

Thresholds:                   Alarm High          Warning High          Warning Low          Alarm Low

Bias:         15.000 mAmps          14.000 mAmps           3.000 mAmps           2.000 mAmps

Transmit Power:  3.46740 mW (5.40004 dBm)   1.73780 mW (2.40000 dBm)   0.14450 mW (-8.40132 dBm)   0.05750 mW (-12.40332 dBm)

Receive Power:  3.46740 mW (5.40004 dBm)   1.73780 mW (2.40000 dBm)   0.09330 mW (-10.30118 dBm)   0.03720 mW (-14.29457 dBm)

TxRxIOMagId:

RxOpAmpSupprt:

Lane            Temp            Bias                   Tx Power                   Rx Power

0             N/A     7.130 mAmps   1.03100 mW (0.13259 dBm)   1.18990 mW (0.75510 dBm)

1             N/A     7.192 mAmps   1.09760 mW (0.40444 dBm)   1.19300 mW (0.76640 dBm)

2             N/A     7.192 mAmps   1.05440 mW (0.23005 dBm)   1.17110 mW (0.68594 dBm)

3             N/A     7.192 mAmps   1.08020 mW (0.33504 dBm)   1.00480 mW (0.02080 dBm)

MSA Data (Upper Memory Page 03)

0x0200: 4b 00 fb 00 46 00 00 00 : 00 00 00 00 00 00 00 00

0x0210: 8d cc 74 04 87 5a 7a 76 : 00 00 00 00 00 00 00 00

0x0220: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

0x0230: 87 72 01 74 43 e2 03 a5 : 1d 4c 03 e8 1b 58 05 dc

0x0240: 87 72 02 3f 43 e2 05 a5 : 00 00 00 00 00 00 00 00

0x0250: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

0x0260: a6 0f 00 00 00 00 00 00 : 00 00 66 66 00 00 33 33

0x0270: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

使用此命令驗證是否有任何問題。

RP/0/RP0/CPU0:BRU-SPCORE-P2#show controllers optics 0/0/0/10 summary

Port                Controller State        Admin State            LED State         Lane   Laser Bias   TX Power     RX Power     Wavelength     Optics Type       Description

(dBm)        (dBm)        (nm)

------------------  ----------------------  ---------------------  ----------------  -----  ------------ -----------  ----------   -----------    --------------    -----------

Optics 0/0/0/10     Up                      In Service             Green             0      7.1mA        0.12         0.75         850.00         QSFP28-100G-SR4

1      7.2mA        0.41         0.75

2      7.2mA        0.22         0.69

3      7.2mA        0.31         0.02

警報

檢查主題條目的警報。

RP/0/RP0/CPU0:NCS#show alarms brief

--------------------------------------------------------------------------------

Active Alarms for 0/0

--------------------------------------------------------------------------------

Location        Severity     Group            Set Time                   Description

--------------------------------------------------------------------------------

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX LOS LANE-0 ALARM

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX LOS LANE-1 ALARM

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX LOS LANE-2 ALARM

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX LOS LANE-3 ALARM

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX LOL LANE-0 ALARM

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX LOL LANE-1 ALARM

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX LOL LANE-2 ALARM

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX LOL LANE-3 ALARM

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX POWER LANE-0 LOW ALARM

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX POWER LANE-1 LOW ALARM

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX POWER LANE-2 LOW ALARM

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX POWER LANE-3 LOW ALARM

0/0/CPU0        Minor        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX POWER LANE-0 LOW WARNING

0/0/CPU0        Minor        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX POWER LANE-1 LOW WARNING

0/0/CPU0        Minor        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX POWER LANE-2 LOW WARNING

0/0/CPU0        Minor        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX POWER LANE-3 LOW WARNING

0/0/CPU0        Major        Software         05/02/2023 11:18:17 CEST    Optics0/0/0/26 - hw_optics:  OPTICS Module is not supported on this port

0/0/CPU0        Major        Software         05/02/2023 11:18:17 CEST    Optics0/0/0/26 - hw_optics: Port speed not supported on the optics

0/0/CPU0        Major        Software         05/02/2023 11:18:23 CEST    Optics0/0/0/26 - hw_optics:  RX LOS LANE-0 ALARM

0/0/CPU0        Major        Software         05/02/2023 11:18:23 CEST    Optics0/0/0/26 - hw_optics:  RX LOS LANE-1 ALARM

…

顯示控制器光纖

使用「show controller optics <r/s/i/p>」命令檢查是否檢測到SFP/QSFP。

檢查以下專案：

- 檢查是否正確顯示插入的光纖（檢查PID和VID）。

- 檢查是否已啟用鐳射。

- 檢查電源級別是否正常。

- 檢查是否出現任何警報/故障。

如果檢測到光纖並已投入使用，則這是輸出示例。

檢查「Controller State（控制器狀態）」是「Up or Down（開啟或關閉）」。

檢查鐳射狀態是否為「On（開啟）」或「Off（關閉）」。當介面關閉時，會看到狀態Off。如果情況並非如此，請收集以下內容：

- show tech-support optics

- show tech-support of

RP/0/RP0/CPU0:ios#show controllers optics 0/0/0/12

Controller State: Up

Transport Admin State: In Service

Laser State: Off

檢查LED狀態。當介面關閉時，會看到狀態Off。當介面未關閉時，狀態可以是Down-Yellow或Up-Green。

如果存在埠斷開：即使有一個子埠處於開啟狀態，所有子埠都顯示綠色。如果至少一個子埠為admin up(no shut)，則所有子埠都顯示黃色。如果所有子埠均為管理員關閉（關閉），則Led狀態為關閉。

檢查FEC狀態。某些平台型別可能禁用了FEC。則不顯示FEC部分。如果在PHY上啟用了FEC，則它應顯示PHY FEC狀態而不是NPU。如果FEC狀態不正確，請檢查「show controller <speed> <r/s/i/p>」中的FEC狀態。

閱讀本文以瞭解有關FEC的更多資訊：瞭解FEC及其在思科光纖中的實施

下載此表，瞭解每種思科光纖的FEC型別的更多詳細資訊：https://www.cisco.com/c/dam/en/us/products/se/2022/4/Collateral/fec-summary-table.pdf

檢查「Detected Alarms」（檢測到的警報）旁邊是否出現警報。如果出現鏈路問題，請檢查此處是否顯示任何RX-LOS/RX-LOL/TX-LOS/TX-LOL警報，或檢查鏈路交換時是否顯示在「show alarms brief/history」的介面和時間戳中。在出現RX警報的情況下，檢查對等裝置是否有TX警報。如果對等點有TX警報，請轉至下一步。如果沒有對等TX警報，請嘗試重新連線電纜和/或可插拔專案。如果需要，請嘗試用其他裝置替換它們。

檢查TX電源。如果埠預期為Up，但電源為–40 Tx，請轉至下一步。檢查RX電源如果埠預期為Up，但具有–40dBm Rx功率，請檢查對等體是否有TX警報。如果對等路由器沒有TX警報，請嘗試重新連線電纜和/或可插拔專案。如果需要，請嘗試用其他裝置替換它們。

RP/0/RP0/CPU0:ios#show controllers optics 0/0/0/13

Controller State: Down

Transport Admin State: In Service

Laser State: Off

Optics not present

Optics Type: Unavailable

DWDM Carrier Info: Unavailable, MSA ITU Channel= Unavailable, Frequency= Unavailable , Wavelength= Unavailable

TX Power = Unavailable

RX Power = Unavailable

LED State: Off

FEC State: FEC ENABLED

Optics Status

Optics Type: SFP28 25G SR-S

Wavelength = 850.00 nm

Alarm Status:

-------------

Detected Alarms: None

LOS/LOL/Fault Status:

Laser Bias Current = 0.0 mA Actual

TX Power = -40.00 dBm

RX Power = -0.93

Performance Monitoring: Disable

THRESHOLD VALUES

----------------

Parameter                           High Alarm  Low Alarm  High Warning  Low Warning

------------------------            ----------  ---------  ------------  -----------

Rx Power Threshold(dBm)                 5.4       -14.2              2.3       -10.3

Tx Power Threshold(dBm)                 5.4       -12.4              2.3        -8.4

LBC Threshold(mA)                     10.00        2.00             8.00         3.00

Temp. Threshold(celsius)              75.00       -5.00            70.00         0.00

Voltage Threshold(volt)                3.63        2.97             3.46         3.13

Polarization parameters not supported by optics

Temperature = 28.00 Celsius               Voltage = 3.28 V

Transceiver Vendor Details

Form Factor              : SFP28

Optics type              : SFP28 25G SR-S

Name                      : CISCO-AVAGO

OUI Number               : 00.17.6a

Part Number              : SFBR-725SMZ-CS1

Rev Number               : 01

Serial Number            : AVD2227E1FU

PID                       : SFP-25G-SR-S

VID                       : V01

Date Code(yy/mm/dd) : 18/07/07

如果未檢測到光纖或未在運行，則這是輸出示例。

RP/0/RP0/CPU0:ios# RP/0/RP0/CPU0:ios#show controllers optics 0/0/0/13

UTC Controller State: Down

Transport Admin State: In Service

Laser State: Off

Optics not present

Optics Type: Unavailable

DWDM Carrier Info: Unavailable, MSA ITU Channel= Unavailable, Frequency= Unavailable , Wavelength= Unavailable

TX Power = Unavailable          RX Power = Unavailable

相干DSP

如果QDD-400G-ZR-S / QDD-400G-ZRP-S的鏈路斷開，同時驗證來自「show controller optics」的警報和資料，請檢查「show controller coherentDSP <R/S/I/P>」中的警報。

RP/0/RP0/CPU0:ios#show controllers coherentDSP 0/0/1/0

Port : CoherentDSP 0/0/1/0

Controller State : Up

Inherited Secondary State : Normal

Configured Secondary State : Normal

Derived State : In Service

Loopback mode : None

BER Thresholds : SF = 1.0E-5 SD = 1.0E-7

Performance Monitoring : Enable

Bandwidth : 400.0Gb/s

Alarm Information:LOS = 0 LOF = 0 LOM = 0

OOF = 0 OOM = 0 AIS = 0IAE = 0 B

IAE = 0 SF_BER = 0

SD_BER = 0 BDI = 0 TIM = 0

FECMISMATCH = 0 FEC-UNC = 0 FLEXO_GIDM = 0

FLEXO-MM = 0 FLEXO-LOM = 0 FLEXO-RDI = 0

FLEXO-LOF = 0

Detected Alarms : None

如果看到LOS/LOF/BER，則檢查光纖連線、遠端端TX值以及本地端和對等端ZR/ZRP的操作模式。

ZR/ZRP支援多種操作模式。檢視此連結配置指南。

配置模式、FEC、DAC和調制需要與介面配置和對等配置匹配。

使用以下命令：show optics-driver debug optics port <fp_port> instance <bayinst> location <LC>。

RP/0/RP0/CPU0:ios#show optics-driver debug optics port 0 instance 0 location 0/0/CPU0

flexcoh_hdlr : [0x0]

R_S_I_P : [0.0.1.0]

module_type : [400G-ZRPLUS:Cisco-Qualified-Module]

Traffic-Setup : [Requested/Programmed]

client_rate : [100_GAUI_2_KP4_FEC/100_GAUI_2_KP4_FEC]                      <- needs to match the configured interface speed

trunk_rate : [400G Muxponder/400G Muxponder] line_fec_mode : [oFEC/oFEC]   <- needs to match the peer end for link up

dac_rate : [1x1.25 => pulse_shaping On/1x1.25 => pulse_shaping On]         <- needs to match the peer end for link up

modulation : [16QAM/16QAM]                                                 <- needs to match the peer end for link up

framing_format : [400G_ZR/400G_ZR]

framing_mode : [Enhanced/Enhanced]

hw_cfg_in_progress : [False]

hw transactions : [3]

polling enabled : [True]

pm_notify enabled : [True]

alarms_notify enabled : [True]

sdk laser oper state : [Enabled]

sdk hw laser oper state : [Enabled]

hw laser oper state : [Enabled]

sdk channel-frequency : [1931000]

hw channel-frequency : [1931000]

sdk tx-power : [-100 0.1dBm]

hw tx-power : [-113 0.1dBm]

hw tx-power-range : [-2289, -65135 0.01dBm]

sdk cd-min : [-13000]hw cd-min : [-13000]

sdk cd-max : [13000]hw cd-max : [13000]

sdk baud-rate : [60.138546]

hw baud-rate : [60.138546]

sdk hw thresholds : [Valid]

config-thresh-flags : [0x0]

trf-cfg-lsr-pm-flags : [0x0]

polling_mask : [0xf]

is_fw_dl_in_progress : [False]

is_fw_commit_in_progress: [False]

sdk dsp-internal-loopback: [Disabled]

hw dsp-internal-loopback: [Disabled]

sdk dsp-line-loopback : [Disabled]

hw dsp-line-loopback : [Disabled]

Flexcoh SDK API execution status

--------------------------------------------------------------------------------------------------

traffic | tx-power | cd-min | cd-max | frequency | laser-set | pm-set | alarm-set | poll_set |

==================================================================================================

Success | Success  | Success| Success| Success   | Success   | Success| Success   | Success  |      <- No failure to be seen in any of the status

--------------------------------------------------------------------------------------------------

Show Controllers PHY

收集正確介面的資訊。此命令轉儲EEPROM資訊。

RP/0/RP0/CPU0:ios#show controllers tenGigE 0/0/1/0 phy

SFP EEPROM port: 32

Xcvr Type: SFP

Xcvr Code: SFP+ 10G SR

Encoding: 64B66B

Bit Rate: 10300 Mbps

Link Reach 50u fiber: 80 meter

Link Reach 62.5u fiber: 20 meter

Vendor Name: CISCO-SUMITOMO

Vendor OUI: 00.00.5f

Vendor Part Number: SPP5100SR-C5 (rev.: A )

Laser wavelength: 850 nm (fraction: 0.00 nm)

Optional SFP Signal: Tx_Disable, Tx_Fault, LOS

Vendor Serial Number: SPC17050AZ0

Date Code (yy/mm/dd): 13/01/31 lot code: MA

Diagnostic Monitoring: DOM, Int. Cal.,

Enhanced Options: SW RX LOS Mon., SW TX Fault Mon, SW TX Disable, Alarm/Warning Flags

MSA Data

0x0000: 03 04 07 10 00 00 00 00 : 00 00 00 06 67 00 00 00

0x0010: 08 02 00 1e 43 49 53 43 : 4f 2d 53 55 4d 49 54 4f

0x0020: 4d 4f 20 20 00 00 00 5f : 53 50 50 35 31 30 30 53

0x0030: 52 2d 43 35 20 20 20 20 : 41 20 20 20 03 52 00 e6

0x0040: 00 1a 00 00 53 50 43 31 : 37 30 35 30 41 5a 30 20

0x0050: 20 20 20 20 31 33 30 31 : 33 31 4d 41 68 f0 03 7a

0x0060: 00 00 0b ea 11 8a 3a 43 : 9d 9c 2b 0d 84 89 fd c5

0x0070: a4 0e 5b 00 00 00 00 00 : 00 00 00 00 8b 64 8d fc

Thresholds: Alarm High Warning High Warning Low Alarm Low

Temperature: +75.000 C +70.000 C +0.000 C -5.000 C

Voltage: 3.630 Volt 3.465 Volt 3.135 Volt 2.970 Volt

Bias: 10.500 mAmps 9.000 mAmps 2.500 mAmps 2.000 mAmps

Transmit Power: 1.47910 mW (1.69998 dBm) 0.74130 mW (-1.30006 dBm) 0.18620 mW (-7.30020 dBm) 0.07410 mW (-11.30182 dBm)

Receive Power: 1.58490 mW (2.00002 dBm) 0.79430 mW (-1.00015 dBm) 0.10230 mW (-9.90124 dBm) 0.04070 mW (-13.90406 dBm)

Temperature: 24.012

Voltage: 3.304 Volt

Tx Bias: 0.000 mAmps

Tx Power: 0.000 mW (<-40.00 dBm)

Rx Power: 0.000 mW (<-40.00 dBm)

Oper. Status/Control: Tx Disabled, Rx Rate Select, LOS,

EEPROM Memory (A2 lower)

0x0100: 4b 00 fb 00 46 00 00 00 : 8d cc 74 04 87 5a 7a 75

0x0110: 14 82 03 e8 11 94 04 e2 : 39 c7 02 e5 1c f5 07 46

0x0120: 3d e9 01 97 1f 07 03 ff : 00 00 00 00 00 00 00 00

0x0130: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

0x0140: 00 00 00 00 3f 80 00 00 : 00 00 00 00 01 00 00 00

0x0150: 01 00 00 00 01 00 00 00 : 01 00 00 00 00 00 00 27

0x0160: 18 03 81 13 00 00 00 00 : 00 00 00 00 00 00 b2 00

0x0170: 00 40 00 00 00 40 00 00 : 00 00 00 00 00 00 00 00

CLEI Code: COUIA8NCAA

Part Number: 10-2415-03 (ver.: V03 )

Temp/Alarm/Power Flags: COM, commercial 0C to 70C

Minimum Temperature: 0

Maximum Temperature: 70

Calibration Constants: LBC Scale, Temperature, Laser bias current, Output power,

Product Id: SFP-10G-SR

EEPROM Memory (A2 upper)

0x0180: 43 4f 55 49 41 38 4e 43 : 41 41 31 30 2d 32 34 31

0x0190: 35 2d 30 33 56 30 33 20 : 01 00 46 00 00 00 00 c6

0x01a0: 00 00 00 00 00 00 00 00 : 00 00 85 99 8f 00 a8 3b

0x01b0: d4 4b 00 00 1e 00 0a ff : 16 93 0f 8e 00 00 aa aa

0x01c0: 53 46 50 2d 31 30 47 2d : 53 52 20 20 20 20 20 20

0x01d0: 20 20 20 20 32 33 00 00 : 00 00 00 00 00 00 00 35

0x01e0: 14 1b 20 20 20 26 20 26 : 00 00 00 00 00 00 00 00

0x01f0: 00 00 00 00 00 fb 00 00 : ff ff ff ff 00 00 00 aa

MSA Data LOWER PAGE (QSA)

0x0000: 0d 00 02 01 00 00 01 00 : 00 00 00 00 00 00 00 00

0x0010: 00 00 00 00 00 01 00 00 : 00 00 00 00 00 00 00 00

0x0020: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

0x0030: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

0x0040: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

0x0050: 00 00 44 32 50 30 0f 00 : 00 00 00 00 00 00 00 00

0x0060: 00 00 00 00 01 01 00 00 : 00 00 00 00 00 00 00 00

0x0070: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

MSA Data UPPER PAGE (QSA)

0x0080: 0d 9b 80 00 00 00 00 00 : 00 00 00 00 00 00 00 00

0x0090: 00 00 00 00 43 49 53 43 : 4f 2d 44 4e 49 20 20 20

0x00a0: 20 20 20 20 00 30 30 30 : 43 41 5a 41 44 45 52 4f

0x00b0: 2d 30 32 20 20 20 20 20 : 30 33 00 00 00 00 46 32

0x00c0: 00 00 00 00 44 54 59 32 : 32 32 31 30 36 47 38 20

0x00d0: 20 20 20 20 32 30 31 38 : 30 35 33 30 00 00 f2 c2

0x00e0: f2 00 07 d0 45 c2 18 57 : 2b 29 67 3f 51 03 49 be

0x00f0: 37 c4 da 00 00 00 00 00 : 00 00 00 00 81 96 b0 b1

NPU

本節介紹當介面直接連線到NPU時的具體情況。所以，沒有PHY。這些連線埠是無PHY連線埠。

RP/0/RP0/CPU0:ios#show controllers twentyFiveGigE 0/0/0/12 (partial output)

Operational data for interface TwentyFiveGigE0/0/0/12:

State:    Administrative state: disabled                ==> Check if admin state display is correct

Operational state: Down (Reason: Link is shutdown)  ==> Check if link state display is correct. If interface is down with Remote fault/Link Loss (local fault), verify the peer.

MAC address information:

Operational address: fc58.9a01.8e10

Burnt-in address: fc58.9a01.8e10

Autonegotiation disabled.

Priority flow control information for interface TwentyFiveGigE0/0/0/12:

Forward error correction: Standard (Reed-Solomon)  ==> Check if FEC status is correct.

RP/0/RP0/CPU0:ios#show controllers tenGigE 0/0/0/14

Operational data for interface TenGigE0/0/0/14:

State:    Administrative state: enabled

Operational state: Down (Reason: Link loss or low light, no loopback) ==> This router has a Local Fault/Down.

LED state: Yellow On

RP/0/RP0/CPU0:ios#show controllers tenGigE 0/0/0/15

Operational data for interface TenGigE0/0/0/15:

State:

Administrative state: enabled

Operational state: Down (Reason: Remote Fault)   ==> The peer has a Fault

LED state: Yellow On

摘要

- 檢查介面的管理狀態是否為down。如果是，則使用命令「no shut」在介面上使其進入管理開啟狀態。

- 檢查路由器和對等裝置上的FEC狀態。如果存在任何不匹配，請嘗試更正它們。

- 檢查路由器和對等裝置上的自動交涉狀態。如果存在任何不匹配，請嘗試更正它們。

- 如果正確設定了FEC和自動交涉，請在「show controller optics」輸出中檢查路由器和對等體上的警報狀態。

RX-LOS、RX-LOL：訊號接收方向的問題。

TX-LOS、TX-LOL:SFP/QSFP從NPU或PHY接收的訊號存在問題。

如果存在具有RX-LOL/RX-LOS的鏈路關閉/翻動：

- 檢查對等點是否具有TX-LOS/TX-LOL。

- 如果沒有TX警報，請嘗試更改電纜/可插拔(SFP/QSFP)。

如果有使用TX-LOL/TX-LOS的連結關閉/翻動：

您可以應用外部環回來排除遠端對等體，並將光纖應用到遠端對等體。在本地使用光纖纜線將傳輸(Tx)訊號實際回送到接收(Rx)連線埠。可選地使用衰減器來實現此目的：

RP/0/RSP0/CPU0:NCS(config)#int Hu0/3/0/31

RP/0/RSP0/CPU0:NCS(config-if)#loopback ?

external Enable external loopback (requires loopback connector)

internal Enable internal loopback

line Enable line loopback

RP/0/RSP0/CPU0:NCS(config-if)#loopback external ?

<cr>

RP/0/RSP0/CPU0:NCS(config-if)#loopback external

RP/0/RSP0/CPU0:NCS(config-if)#commit

您可以在路由器和對等裝置上應用環回內部配置，以通過光纖/光纖的旁路來檢驗光纖。這表示如果介面仍未啟動，則表明問題不是與光纖部件有關！

RP/0/RP0/CPU0:BRU-SPCORE-P2(config)#int hundredGigE 0/0/0/10

RP/0/RP0/CPU0:BRU-SPCORE-P2(config-if)#loopback internal ?

<cr>

RP/0/RP0/CPU0:BRU-SPCORE-P2(config-if)#loopback internal

RP/0/RP0/CPU0:BRU-SPCORE-P2(config-if)#commit

收集日誌

路由器和對等路由器上的這些命令都可能提供問題的原因。

- show ip interface brief

- show alarms brief

- show controller optics <r/s/i/p>與問題相關的介面

- show tech-support optics

這將顯示警報、LED狀態、鐳射狀態和其他光學資訊

- show controller <tengige/hundredgige/other> <r/s/i/p>介面內部出現問題。

顯示FEC、AN、Up/Down、本地故障/遠端故障等。

- show controllers npu voq-usage interface all instance all location all

提供前面板埠到pp埠、npu和核心對映。

介面問題的完整日誌集合：

- 顯示版本

- show running-config

- show install active

- show platform

- show tech-support ethernet platform location 0/x/CPU0

- show tech-support ethernet interface

- show tech-support ethernet controllers location 0/x/CPU0

- show tech-support dpa location 0/x/CPU0

- 顯示位置0/x/CPU0的技術支援

- show tech-support optics location 0/x/CPU0

- show tech-support coherent location 0/x/CPU0

- show tech-support pfi location all

- show tech-support qos platform location 0/x/CPU0

- 顯示技術支援交換矩陣

- show controllers npu voq-usage interface all instance 0 location all

- show optics trace all

- show ethernet infra trace location 0/x/cpu0

- show ethernet v-ether trace location 0/x/CPU0

- show vether-ea trace all location 0/x/CPU0

- show portmapper trace all location 0/0/CPU0