目錄

簡介

必要條件

需求

採用元件

背景資訊

單步映像升級

多步驟映像升級

Cisco CG522-E資料機韌體升級

結論

簡介

本檔案介紹升級Cisco 5G行動閘道(CG)CG522-E及其資料機韌體的程式。

必要條件

基本瞭解Cisco 5G產品組合和Cisco IOS®升級過程。

需求

思科建議您瞭解：

- CG522-E操作和設定。

採用元件

- CG522-E(17.9.6)

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路運作中，請確保您瞭解任何指令可能造成的影響。

背景資訊

CG522-E支援2種型別的Cisco IOS®、Cisco IOS® XE（17.6.x之前）和Cisco IOS CG（17.6.x之前）。Cisco IOS XE和CG(CG522-E上的Cisco IOS CG之間的主要區別是Cisco IOS XE支援IPv6和GUI（從17.10.1a開始同樣受支援），而Cisco IOS CG不支援這些功能功能。同樣的方法和步驟也可以用於升級CG418-E蜂窩網關。

單步映像升級

1.將映像檔複製到CG裝置所連線的交換器。

2.在CG上，輸入命令：

gw-action:request software upgrade tftp://tftp_IP/image_name

3.重新啟動CG:

CellularGateway# gw-action:request system reboot

System is about to reload, Continue? [no,yes] yes

4.檢查升級的映像：

CellularGateway# show gw-system:system partition

Primary Image

Partition    = image2

File name    = cg-ipservices-17.15.1a.SPA.bin

Version      = 17.15.1a.0.240234.1724203070..Bengaluru

Build Date   = Wed Aug 21 01:17:50 2024

Install Date = Wed Aug  9 04:21:20 2023

Boot Status  = Boot Successful.

Backup Image

Partition    = image1

File name    = cg-ipservices-17.09.04.SPA.bin

Version      = 17.09.04.0.0.1691563291..Bengaluru

Build date   = Wed Aug 09 06:41:31 2023

Install Date = Fri Jun 22 11:13:22 2018

Boot Status  = Boot Successful.

多步驟映像升級

1.將映像下載到CG:

gw-action:request software download tftp://tftp_IP/image_name

2.安裝映像：

gw-action:request software install image_file

3.啟用影象：

gw-action:request software activate image_file

4.重新啟動CG:

CellularGateway# gw-action:request system reboot

System is about to reload, Continue? [no,yes] yes

5.檢查升級的映像：

CellularGateway# show gw-system:system partition

Primary Image

Partition    = image2

File name    = cg-ipservices-17.15.1a.SPA.bin

Version      = 17.15.1a.0.240234.1724203070..Bengaluru

Build Date   = Wed Aug 21 01:17:50 2024

Install Date = Wed Aug  9 04:21:20 2023

Boot Status  = Boot Successful.

Backup Image

Partition    = image1

File name    = cg-ipservices-17.09.04.SPA.bin

Version      = 17.09.04.0.0.1691563291..Bengaluru

Build date   = Wed Aug 09 06:41:31 2023

Install Date = Fri Jun 22 11:13:22 2018

Boot Status  = Boot Successful.

Cisco CG522-E資料機韌體升級

1.識別數據機型號：

show cellular 1 hardware

範例：

CellularGateway# show cellular 1 hardware

Modem Firmware Version = SWIX55C_03.09.11.00 7bf975 jenkins

Device Model ID = EM9190

International Mobile Subscriber Identity (IMSI) = 268069668483162

International Mobile Equipment Identity (IMEI) = 356805515034835

Integrated Circuit Card ID (ICCID) = 89351060001115740710

Mobile Subscriber Integrated Services Digital Network Number (MSISDN) =

Factory Serial Number (FSN) = 4H4282826003B1

Current Modem Temperature = 46 deg C

PRI SKU ID = 1104703

PRI Version = 030.044_006

Carrier = GENERIC

OEM PRI Version = 001.009

Modem Status = MODEM_STATE_DNS_ACQUIRED

2.從software.cisco.com下載正確的檔案。

在本例中：

對於EM9190數據機，有3個可用於韌體升級的檔案：

1. CWE（基於韌體檔案）

2. NVU（運營商PRI檔案）

3. NVU（OEM PRI檔案）

範例：

在下一頁中，您可以在左側看到可用的軟體版本。在右側，您可以看到適用於同一軟體版本的多個檔案。根據所使用的載體選擇適當的影象。如果清單中不存在已用載波，則必須使用Generic映像。

舉例來說：

c. NVU（OEM PRI檔案）

範例：

要更新所有3個版本（基於韌體、運營商PRI和OEM PRI），需要分別執行2次韌體升級過程：

1. 第一次使用.CWE（基於韌體檔案）和.NVU（運營商PRI檔案）在一個資料夾中。

2. 第二次使用.NVU（OEM PRI檔案），位於1個資料夾中。

3.確保CG已升級到最新的Cisco IOS。

4.下載用於EM9190數據機的最新.CWE和.NVU（電信級PRI）檔案，並確保這些檔案儲存在CG上。

5.在flash中創建資料夾。名稱必須與韌體或韌體不同：

gw-action:request file create_dir firm_new

範例：

CellularGateway# gw-action:request file create_dir firm_new

Created Directory at: firm_new

6.將.CWE和.NVU（運營商PRI）檔案複製到CG快閃記憶體：

gw-action:request file copy source tftp://

/

destination/storage/firm_new/

範例：

CellularGateway# gw-action:request file copy source tftp://192.168.1.2/fw.bin destination/storage/firm_new/fw.bin

7.驗證.CWE和.NVU（運營商PRI）檔案是否正確下載到新建立的資料夾中：

CellularGateway# gw-action:request file list fw_folder

-rw-r--r-- 50575 May 19 06:57 EM9190_03.09.11.00-001_GENERIC_030.044_006.nvu

-rw-r--r-- 91579911 May 19 06:50 EM9190_03.09.11.00-002.cwe

CellularGateway#

8.驗證當前韌體和運營商PRI版本：

CellularGateway# show cellular 1 hardware

Modem Firmware Version = SWIX55C_01.07.13.00 000000 jenkins

Device Model ID = EM9190

International Mobile Subscriber Identity (IMSI) = 123456700004023

International Mobile Equipment Identity (IMEI) = 356805510129085

Integrated Circuit Card ID (ICCID) = 8952530076180184023

Mobile Subscriber Integrated Services Digital Network Number (MSISDN) =

Factory Serial Number (FSN) = 4H1531500901A1

Current Modem Temperature = 35 deg C

PRI SKU ID = 1104703

PRI Version = 016.006_004 Carrier = GENERIC

OEM PRI Version = 001.006

Modem Status = MODEM_STATE_NETWORK_READY

CellularGateway#

CellularGateway#

CellularGateway# show cellular 1 firmware Firmware

Activation Mode = AUTO

INDEX CARRIER FW VERSION PRI VERSION STATUS

------------------------------------------------------

1 GENERIC 01.07.13.00_GEN 016.006_004 ACTIVE

CellularGateway#

9.使用以下命令啟動數據機韌體升級：

cellular 1 upgrade firmware <created_earlier_folder_directory>

注意：在韌體升級過程中，請勿關閉電源或重新載入路由器。

範例：

CellularGateway# cellular 1 upgrade firmware /flash/firm_new

status inprogress response

Firmware upgrade is in progress!!!

CellularGateway#

注意：請確保只在建立的資料夾中保留所需的韌體檔案，以避免多個版本儲存在同一資料夾中時發生衝突。

註：對於SWI EM9190數據機，如果當前版本為01.07.08，請先升級到01.07.13，然後再升級到最新版本。

10.驗證數據機韌體和運營商PRI是否已成功升級：

CellularGateway# show cellular 1 hardware

Modem Firmware Version = SWIX55C_03.09.11.00 7bf975 jenkins

Device Model ID = EM9190

International Mobile Subscriber Identity (IMSI) = 123456700004023

International Mobile Equipment Identity (IMEI) = 356805510129085

Integrated Circuit Card ID (ICCID) = 8952530076180184023

Mobile Subscriber Integrated Services Digital Network Number (MSISDN) =

Factory Serial Number (FSN) = 4H1531500901A1

Current Modem Temperature = 35 deg C

PRI SKU ID = 1104703

PRI Version = 030.044_006

Carrier = GENERIC

OEM PRI Version = 001.006

Modem Status = MODEM_STATE_NETWORK_READY

CellularGateway#

CellularGateway#

CellularGateway#show cellular 1 firmware

Firmware Activation Mode = AUTO

INDEX CARRIER FW VERSION PRI VERSION STATUS

--------------------------------------------------------

1 GENERIC 03.09.11.00_GEN 030.044_006 ACTIVE

CellularGateway#

11.對於OEM PRI升級，請對.NVU檔案重複相同步驟，以便進行OEM PRI升級。

結論

建議始終運行蜂窩網關可用的最新軟體版本以及最新的數據機韌體，因為它包含蜂窩運營商支援所需的最新PRI檔案。