目錄

簡介

背景資訊

必要條件

需求

採用元件

CG522-E的一般資訊

硬體安裝過程：

思科蜂窩網關522-E的側面板

CG522-E上的狀態指示燈指示

安裝SIM卡

安裝室內5G天線

開啟CG522-E電源

軟體安裝過程：

通過控制檯訪問CG522-E

通過SSH訪問CG522-E

更改密碼

如何檢視運行配置

簡介

本文檔介紹蜂窩網關522-E的初始配置和安裝過程。

背景資訊

任何複雜的配置過程均超出本出版物的範圍。CG522-E是一種即插即用裝置，但提供的資訊便於使用。以下是所有已發佈的CG522-E文檔的超連結。

必要條件

需求

思科建議您瞭解以下主題的基本知識：

- 5G蜂窩網路基礎知識

- Cisco IOS® XE和Cisco IOS® CG

採用元件

CG522-E(v.17.04.01a)

CG522-E數據機EM9190(v.SWIX55C_01.07.13.00)

WS-C3850-12X48U(v.03.07.04E)

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路運作中，請確保您瞭解任何指令可能造成的影響。

CG522-E的一般資訊

CG522作為NSA（非獨立）裝置工作。這意味著5G頻段位於資料平面上，LTE位於控制平面上。因此，NSA裝置需要從CG522將流量推入和推出，以便從4G頻段聚合到5G頻段。

硬體安裝過程：

思科蜂窩網關522-E的側面板

下圖顯示CG522-E的I/0側面板：

1

PWR插槽

2

Gigabit乙太網路 — WAN

3

雙SIM插槽蓋(SIM 0) | SIM 1)

4

重置按鈕

5

輔助埠

6

控制檯(RJ-45)

CG522-E上的狀態指示燈指示

◉

固體

✺

閃爍

○

off

初始啟動LED

4G

5G

功能

◉

○

- 作業系統已啟動

- 數據機未連線。

- LAN介面開啟

✺ / ○

○

- 作業系統已啟動

- 未定義數據機狀態

- LAN介面關閉

◉

○

- 開機，開機載入器

- 作業系統已啟動，但未找到SIM

✺ / ○

○

- 正在進行系統引導

額定LED

4G

5G

功能

◉

○

- 正常運作

- 最大4G蜂窩訊號 — 3或4條等效線路

- LAN介面開啟

✺ / ○

○

- 正常運作

- 中等4G蜂窩訊號 — 1或2條等效信線

- LAN介面開啟

○

◉

- 正常運作

- 最大5G蜂窩訊號 — 3或4條等效

- LAN介面開啟

○

✺ / ○

- 正常運作

- 中型5G蜂窩訊號 — 1或2條等效信線

- LAN介面開啟

邊緣條件LED

4G

5G

功能

◉

◉

低功率模式

✺ / ○或◉

✺ / ○

熱緩解模式已啟用，帶4G訊號的無線接通

✺ / ○

✺ / ○或◉

散熱模式已啟用，無線開啟，帶5G訊號

✺ / ○

✺ / ○

熱緩解模式已啟用，無線電關閉

安裝SIM卡

在乙太網埠旁邊，CG522-E有一個用於SIM插槽的蓋。蓋子由飛利浦的頭螺釘固定在一起。小心地卸下螺釘，以顯示SIM插槽。

SIM卡的大小僅與MICRO SIM(高度：15毫米，寬度：12毫米，厚度：0.76毫米)。

1

SIM卡蓋

2

MICRO SIM介面卡

3

NANO SIM

附註：使用適用於NANO SIM卡的MICRO SIM卡介面卡。

安裝室內5G天線

有時，需要在CG522-E上安裝5G天線。唯一支援的室內5G天線是5G-ANTM-SMA-D（多頻段旋轉安裝偶極天線）(SMA)。 要插入天線，請確保CG522-E沒有電源，取下天線的SMA凸式聯結器端，然後將聯結器扭曲到CG522-E上的凹式聯結器中，直到稍微擰緊。

附註：5G-ANTM-SMA-D用於室內使用。天線設計為連線到裝置上的專用天線埠。安裝天線無需特殊工具。

警告：請使用5G-ANTM-SMA-D安裝指南瞭解安全防範措施和操作規程，以便執行避雷操作。

開啟CG522-E電源

CG522-E可通過多種方式供電，包括PoE+和12V 2.5A電源模組4針聯結器。

要確認CG522-E與PoE相容，請在乙太網埠上查詢閃電符號。

附註：PoE+電纜不得超過100米。如果更換非PoE CG522-E單元，則接收相同的單元。

提示：這是最基本級別的硬體安裝。有關詳細資訊，請使用此硬件安裝指南。

軟體安裝過程：

通過控制檯訪問CG522-E

控制檯會話可以訪問CG522-E。引數包括：

- 波特率：115200位元/秒

- 8個資料位

- 無奇偶校驗

- 1個停止位(8N1)

- 無需流量控制

- 使用者名稱:admin

- 密碼：裝置序列號

通過檢視裝置的底部找到裝置序列號。它也會在啟動序列中顯示。出現以下消息：

Device is using default day0 password: xxxxxxxxxxx

通過SSH訪問CG522-E

CG522-E可通過SSH從交換機/路由器通過第2層介面訪問。確保為介面192.168.1.x子網分配一個IP地址，因為CG522-E預設介面IP地址設定為192.168.1.1。

在上行鏈路裝置（交換機/路由器）上，配置以下命令：

Switch# configure terminal

Switch(config)# interface

Switch(config-if)# no switchport

Switch(config-if)# ip address 192.168.1.2 255.255.255.0

Switch(config-if)# exit

Switch(config)# exit

Switch# ssh -l admin 192.168.1.1

Password:

在CG522-E上，初始引數為：

- IP 位址:192.168.1.1

- 使用者名稱:admin

- 密碼：裝置序列號

通過檢視裝置的底部找到裝置序列號。它也會顯示在啟動序列中。此消息顯示在控制檯上：

Device is using default day0 password: xxxxxxxxxxx

提示：您可以通過SSH連線到交換機的SVI，然後使用這種方法通過SSH連線到CG522-E，但是SVI不足以交換CG522和上行鏈路裝置。您必須在CG522-E的上行鏈路介面內包括L2介面。

更改密碼

一旦有控制檯或SSH訪問，請使用以下命令更改CG522-E的使用者名稱和密碼。

CellularGateway# configure terminal

CellularGateway(config)# aaa authentication users user admin change-password old-password

實施這些命令後，請遵循以下提示：

Value for 'old-password' (

): *********

Value for 'new-password' (

): ********

Value for 'confirm-password' (

): ********

如何檢視運行配置

運行以下命令檢視CG522-E的運行配置：

CellularGateway# show running-config

如何升級CG522-E軟體

在使用前升級CG522-E是最佳選擇。

使用以下步驟上傳和升級CG522-E的軟體版本。

- 擁有可訪問的TFTP伺服器，將軟體映像複製到伺服器上，並確保對檔案的許可權足以使匿名TFTP使用者可以訪問該檔案。

下載和安裝軟體的綜合配置指南；點選此處。

首先，確認CG522-E的版本：

CellularGateway# show version

Active image

Product name       = Cisco Cellular Gateway

Build version      = 17.04.01a.0.211.1608270185..Bengaluru

Software version   = 1.0.0

Build date         = 2023-08-08_23.41

Build path         = /san1/BUILD/workspace/CCO_c174_throttle_EIO/base/build_eio

Built by           = aut

Firmware info

Uboot version      = 2018.03-7.1.0-cwan-0.0.16

Uboot date         = 10/06/2020

Last reboot reason = SoftReset

接下來，使用以下步驟：

CellularGateway# gw-action:request software upgrade

tftp://192.168.1.2/cg-ipservices-17.09.04.SPA.bin

System is about to download and install the selected software, Continue? [no,yes] yes

Software successfully upgrade

CellularGateway# gw-action:request system reboot

System is about to reload, Continue? [yes,no]

附註：在此案例中，交換器被用作TFTP伺服器。此超連結中包含軟體頁面的連結。

如何在映像分割槽之間檢視和切換：

CellularGateway# show gw-system:system partition

Primary Image

Partition    = image2

File name    = cg-ipservices-17.09.04.SPA.bin

Version      = 17.09.04.0.0.1691563291..Bengaluru

Build Date   = Wed Aug  9 06:41:31 2023

Install Date = Sun Jun  4 02:03:23 2000

Boot Status  = Boot Successful.

Backup Image

Partition    = image1

File name    = cg-ipservices.17.04.01a.SPA.bin

Version      = 17.04.01a.0.211.1608270185..Bengaluru

Build date   = Fri Dec 18 05:43:05 2020

Install Date = Fri Jun 22 11:13:59 2018

Boot Status  = Boot Successful.

CellularGateway# gw-action:request software activate

System is about to reload, Continue? [yes,no]

檢查PID、正常運行時間、記憶體、快閃記憶體大小

提供的資訊對相容性檢查和故障排除非常有用。有關CG522-E故障排除指南，請按一下此超連結。

CellularGateway# show gw-system:system status

SYSTEM INFO

Platform PID                   = CG522-E

Product Serial Number          = FGL2504LB7Y

System Up Time                 = up 15 days

Current Time                   = Thu Aug 24 22:37:22 UTC 2023

Current CPU Usage              = 5%

RAM

Total Memory in KBytes         = 993852

Memory Used in KBytes          = 557760

Memory Free in KBytes          = 436216

STORAGE

Disk type                      = Bootflash

Disk Size in KBytes            = 999320

Disk Used in KBytes            = 88944

Disk Available in KBytes       = 841564

Disk Used Percentage           = 10%

TEMPERATURE

Ambient temperature            = 53 deg C

Power source                   = AC

檢查硬體資訊

這裡提供的資訊對相容性檢查和故障排除非常有用。有關CG522-E故障排除指南，請按一下此超連結。

CellularGateway# show cellular 1 hardware

Modem Firmware Version = SWIX55C_01.07.13.00 000000 jenkins

Device Model ID = EM9190

International Mobile Subscriber Identity (IMSI) = xxxxxxxxxxxxxxx

International Mobile Equipment Identity (IMEI) = yyyyyyyyyyyyyyy

Integrated Circuit Card ID (ICCID) = zzzzzzzzzzzzzzzzzzzz

Mobile Subscriber Integrated Services Digital Network Number (MSISDN) = xxxxxxxxxxx

Factory Serial Number (FSN) = yyyyyyyyyyyyyy

Current Modem Temperature = 43 deg C

PRI SKU ID = zzzzzzz

PRI Version = 016.006_004

Carrier = GENERIC

OEM PRI Version = 001.002

Modem Status = MODEM_STATE_NETWORK_READY

檢查會話連線

此資訊允許您確定連線的APN、會話狀態等。

以下是已中斷連線的作業階段狀態範例：

CellularGateway# show cellular 1 connection

Profile ID = 1

---------------------------

APN = broadband

Connectivity = Attach and Data

Session Status = Disconnected

Call end mode =

Session disconnect reason type = (0)

Session disconnect reason = (0)

Cellular Interface = 1/1

Backoff timer = NOT Running

Back off error count = 0

Back off timer index = 0

Back off timer array (in minutes) = 0 1 1 1 1 5 10 15 30 60

Period of Backoff = 0 minute(s)

以下是連線作業階段狀態的範例：

CellularGateway# show cellular 1 connection

Profile ID = 1

---------------------------

APN = broadband

Connectivity = Attach and Data

Session Status = Connected

IPv4 Address = x.x.x.x

IPv4 Gateway Address = y.y.y.y

IPv4 Primary DNS = z.z.z.z

IPv4 Secondary DNS = x.x.x.x

Tx Packets = 6821, Rx Packets = 6

Tx Bytes = 1301756, Rx Bytes = 888

Tx Drops = 0, Rx Drops = 0

Tx Overflow Count = 0, Rx Overflow Count = 0

檢查無線電資訊

提供的資訊對相容性檢查和故障排除非常有用。有關CG522-E故障排除指南，請按一下此超連結。

CellularGateway# show cellular 1 radio

Radio Power Mode = online

Radio Access Technology(RAT) Selected = LTE

LTE Rx Channel Number(PCC) = 0

LTE Tx Channel Number(PCC) = 0

LTE Band = 66

LTE Bandwidth = 20 MHz

Current RSSI = -60 dBm

Current RSRP = -94 dBm

Current RSRQ = -14 dB

Current SNR = 2.8 dB

Physical Cell Id = 119

Network Change Event = activated LTE

CellularGateway# show cellular 1 radio-details

Carrier Aggregation Status = Disabled

LTE RX Channel Number(PCC) = xxx

LTE TX Channel Number(PCC) = yyy

LTE Band = 66

LTE Bandwidth = 20 MHz

PCC CA information:

-------------------

LTE band class = 66

E-UTRA absolute radio frequency channel number of the serving cell = 0

Bandwidth = 20 MHz

Physical Cell Id = 119

Current RSRP in 1/10 dBm as measured by L1 = -94 dBm

Current RSSI in 1/10 dBm as measured by L1 = -63 dBm

Current RSRQ in 1/10 dBm as measured by L1 = -12 dB

Measured SINR in dB = 3.8 dB

Tracking area code information for LTE = 31891

5G CC information:

------------------

Current ENDC RSRP in 1/10 dBm as measured by L1 = -101 dBm

Current ENDC RSRQ in 1/10 dBm as measured by L1 = -14 dB

Measured ENDC SINR in dB = 4 dB

5G CC資訊是使用5G的指示。所選頻段目前顯示LTE的使用率，但作為NSA裝置，由於此特定模擬中沒有流量，因此選擇了LTE頻段。

檢查並配置蜂窩接入點名稱(APN)

CG522-E通常能夠基於其SIM自動配置APN。以下過程介紹如何確認活動的APN配置檔案。有時，需要配置靜態APN配置檔案。

CellularGateway# show cellular 1 profile

PROFILE ID   APN        PDP TYPE   STATE     AUTHENTICATION  USERNAME  PASSWORD

---------------------------------------------------------------------------------

1            Broadband  IPv4       ACTIVE      none            -         -

2            ims        IPv4v6     INACTIVE    none            -         -

如何配置自定義APN:

CellularGateway# configure terminal

CellularGateway(config)# controller cellular 1

CellularGateway(config-cellular-1)# sim slot <# of sim slot in use>

CellularGateway(config-slot-0)# profile id <#> apn

pdn-type IPv4v6 authentication

username

password

CellularGateway(config-slot-0)# attach profile <#>

CellularGateway(config-slot-0)# commit

提示：某些APN不需要身份驗證；這意味著如果不需要則無需定義任何身份驗證。例如：profile id <#> apn pdn-type IPv4v6 < — 這是有效的命令。

如何刪除APN配置檔案：

CellularGateway# config term

Entering configuration mode terminal

CellularGateway(config)# controller cellular 1

CellularGateway(config-cellular-1)# sim slot 1

CellularGateway(config-slot-1)# no attach-profile 1

CellularGateway(config-slot-1)# no profile id 1 apn broadband

CellularGateway(config-slot-1)# commit

附註：LTE無需身份驗證。

附註：Verizon至少需要2個配置檔案；連線配置檔案（通常為vzwims或ims）和資料/預設配置檔案。AT&T只需要一個資料/預設配置檔案和附加配置檔案（寬頻）。

配置主SIM插槽和SIM故障切換命令

運行這些命令以定義主SIM插槽並使用SIM故障切換計時器功能。手動故障切換將重新定義主SIM插槽。

CellularGateway# config term

Entering configuration mode terminal

CellularGateway(config)# controller cellular 1

CellularGateway(config-cellular-1)# sim primary-slot <0/1>

CellularGateway(config-cellular-1)# commit

Commit complete.

CellularGateway(config-cellular-1)# end

CellularGateway# config term

Entering configuration mode terminal

CellularGateway(config)# controller cellular 1

CellularGateway(config-cellular-1)# sim max-retry 5

CellularGateway(config-cellular-1)# sim failovertimer 7

CellularGateway(config-cellular-1)# commit

Commit complete.

CellularGateway(config-cellular-1)# end

CellularGateway#

檢查並配置CG522-E數據機韌體

使用以下步驟上傳和升級CG522-E數據機的韌體版本。

- 擁有可訪問的TFTP伺服器，將軟體映像複製到伺服器上，並確保對檔案的許可權足以使匿名TFTP使用者可以訪問該檔案。

- 建立一個子目錄以儲存數據機韌體。

- 根據SIM托架確認正確的韌體(可在軟體頁面中查看)。

- 將韌體檔案(.cwe和.nvu)複製到該目錄中。

下載和安裝韌體的綜合配置指南；點選此處。

請按以下步驟操作：

CellularGateway# gw-action:request file download tftp://192.168.1.2/EM9190_01.07.13.00.cwe create_dir

INFO: Created folder

INFO: Accessing file EM9190_01.07.13.00.cwe from tftp://192.168.1.2/EM9190_01.07.13.00.cwe

INFO: Please wait while the file is being downloaded to /flash/

/EM9190_01.07.13.00.cwe

file received /flash/

/EM9190_01.07.13.00.cwe size(Bytes): 88960399

CellularGateway# gw-action:request file download tftp://192.168.1.2/EM9190_01.07.13.00_GENERIC_016.006_004.nvu create_dir

INFO:

Directory already exists

INFO: Accessing file EM9190_01.07.13.00_GENERIC_016.006_004.nvu from tftp://192.168.1.2/EM9190_01.07.13.00_GENERIC_016.006_004.nvu

INFO: Please wait while the file is being downloaded to /flash/

/EM9190_01.07.13.00_GENERIC_016.006_004.nvu

file received /flash/

/EM9190_01.07.13.00_GENERIC_016.006_004.nvu size(Bytes): 69051

CellularGateway# cellular 1 upgrade firmware

用於檢查韌體狀態的命令：

CellularGateway# show cellular 1 firmware

Firmware Activation Mode = AUTO

INDEX  CARRIER  FW VERSION       PRI VERSION  STATUS

------------------------------------------------------

1      GENERIC  01.07.13.00_GEN  016.006_004  ACTIVE

CellularGateway# show cellular 1 hardware

Modem Firmware Version = SWIX55C_01.07.13.00 000000 jenkins

Device Model ID = EM9190

International Mobile Subscriber Identity (IMSI) = xxxxxxxxxxxxxxx

International Mobile Equipment Identity (IMEI) = yyyyyyyyyyyyyyy

Integrated Circuit Card ID (ICCID) = zzzzzzzzzzzzzzzzzzzz

Mobile Subscriber Integrated Services Digital Network Number (MSISDN) = xxxxxxxxxxx

Factory Serial Number (FSN) = yyyyyyyyyyyyyy

Factory Serial Number (FSN) = 4H0355006001A1

Current Modem Temperature = 43 deg C

PRI SKU ID = 1104703

PRI Version = 016.006_004

Carrier = GENERIC

OEM PRI Version = 001.002

Modem Status = MODEM_STATE_NETWORK_READY

附註：在此案例中，網路交換器被用作TFTP伺服器。對於韌體頁面，此處為超連結。

如何重置數據機

數據機重置不會擦除任何配置集。重新開機就能成功。

CellularGateway# cellular 1 modem-reset

cellular_modem_reset :

您還可以使用AT命令重置數據機。

CellularGateway# cellular 1 modem-at-command

at!reset