目錄

簡介

背景資訊

問題

解決方案

簡介

本文檔介紹在Cisco ASR5000上執行同步傳輸模組(STM)/OC3卡切換所需的步驟。

背景資訊

ASR5000上的STM1/OC3卡提供STM-1埠，因此需要特別小心處理。

其 STM-1 (級別1)是同步數字體系(SDH)ITU-T光纖網路傳輸標準。它的位元率為155.52 Mbit/s。

SDH與乙太網不同，並且有一些必須考慮的具體事項。

問題

安裝程式具有配置有自動保護交換(APS)模式冗餘的一對STM1/OC3卡 — 卡21和卡37。卡37處於活動狀態，卡21處於備用狀態。埠21/1和21/2處於關閉狀態，APS工作正常。37/1和37/2埠已開啟，APS受到保護。

card 21

redundancy aps-mode

aps 1+1 uni-directional non-revertive

framing sdh e1

initial-e1-framing crc4

service-type frame-relay

#exit

******** show card table all *******

Slot        Card Type                               Oper State   SPOF Attach

----------- -------------------------------------- ------------- ---- ------

21: LC      4 PORT STM1/OC3 Channelized Card       Standby          -    5

37: LC      4 PORT STM1/OC3 Channelized Card       Active          No    5

[local]gre2mme01# show aps info 37/1

Port :37/1

Role : Protected

Mode : 1+1

Revertive : No

State : Active

Direction : Uni

Wait To Restore(sec) : 0

Redundant Port : 21/1

Lockout : No

[local]gre2mme01# show aps info 21/1

Port :21/1

Role : Working

Mode : 1+1

Revertive : No

State : Standby

Direction : Uni

Wait To Restore(sec) : 0

Redundant Port : 37/1

Lockout : No

[local]mme01# show port table

Thursday March 08 11:20:20 CET 2018

Port  Role Type                      Admin   Oper Link State   Pair Redundant

----- ---- ------------------------ -------- ---- ---- ------- ----- ---------

21/1  Srvc STM1/OC3 Channelized     Enabled     - Down Standby 37/1 APS Workn

21/2  Srvc STM1/OC3 Channelized     Enabled     - Down Standby 37/2 APS Workn

37/1  Srvc STM1/OC3 Channelized     Enabled     - Up   Active 21/1 APS Protd

37/2  Srvc STM1/OC3 Channelized     Enabled     - Up   Active 21/2 APS Protd

在卡21和37之間執行切換的嘗試失敗，出現「錯誤冗餘模式」錯誤。

[local]gre2mme01# card switch from 37 to 21

Friday March 09 00:28:10 CET 2018

Failure: wrong redundancy mode

解決方案

STM1/OC3卡具有APS模式冗餘，不支援將卡交換機從X切換到Y。

必須改用APS特定的命令。

aps { clear slot#/port# | exercise slot#/port# | lockout slot#/port# | switch { force | manual } slot#/port# }

switch { force | manual } slot#/port#

Switch to either the working port or the protection port:

force: Forces a switch of ports, even if there is an active alarm state.

manual: Implements a switch of ports if there are no active alarms.

slot#/port# is the CLC2/OLC2 slot number (valid range is 17 - 48) and appropriate port number (CLC2 valid range is 1 - 4; OLC2 valid value is 1)

在這種情況下，問題可通過以下方式解決：

aps switch manual 37/1

aps switch manual 37/2

附註：如果手動切換失敗，則可能是因為連線埠上的錯誤所致。使用「show aps port-status <card/slot>」驗證連線埠狀態。 仍可使用「force」選項強制切換。

[local]gre2mme01# show aps port-status 21/1

Friday March 09 13:19:49 CET 2018

Port                      : 21/1

Role                      : Working

Lockout                   : No

APS  Signal Failure       : No

APS  Signal Degrade       : No

Switch Over               : No

Far End Failiure          : No

Remote Not Compatible     : No

Current Command           : No Request

Switch Status             : No request

[local]gre2mme01#

[local]gre2mme01# show aps port-status 37/1

Friday March 09 13:20:07 CET 2018

Port                      : 37/1

Role                      : Protected

Lockout                   : No

APS  Signal Failure       : No

APS  Signal Degrade       : No

Switch Over               : No

Far End Failiure          : No

Remote Not Compatible     : No

Current Command           : No Request

Switch Status             : No request

Invalid K1 K2             : No

Rx K1                     : Reqest : 0x 0  (--              Channel - 0)

Rx K2                     : Status : 0x 0  (--              Channel - 0)

Tx K1                     : Reqest : 0x 0  (No Request      Channel - 0)

Tx K2                     : Status : 0x 4  (UNI,1+1         Channel - 0)