目錄

簡介

採用元件

背景資訊

光纖傳輸訊號(OTS)控制器對應

初始配置

拓撲

模組組態

光纖傳輸訊號(OTS)控制器配置

配置PSM閾值

驗證放大器操作

檢查警報和情況

驗證光通道(OCH)電源

檢查歷史效能監控(PM)

警報故障排除

自動省電(APR)

訊號丟失或連續性丟失

自動增益集控制停用

不正確或無效的通道電源

更改放大器狀態

切換光纖安全遠端互鎖(OSRI)

切換OTS控制器

重新啟動放大器

重新啟動NCS 1001

相關資訊

簡介

本文檔介紹用於對NCS1001放大器模組NCS1K-EDFA上的各種問題進行故障排除的命令和過程。

採用元件

NCS1001-K9 x2

NCS1K-EDFA x4

NCS1K-PSM x2

NCS1K-CNTLR-K9 x2

NCS1K1-FAN x6

NCS1K-2KW-AC x4

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路運作中，請確保您瞭解任何指令可能造成的影響。

背景資訊

本文假設讀者對XR 6.0.1及更高版本有所瞭解，並了解密集波長分波多工(DWDM)的基本原理，例如光放大。

光纖傳輸訊號(OTS)控制器對應

ots 0/{1|3}/0/0 —> COM

ots 0/{1|3}/0/1 —>行

ots 0/{1|3}/0/2 —>光纖監督通道(OSC)

ots 0/{1|3}/0/3 —> COM-CHK （僅限RX）

ots 0/2/0/0 ------> PSM COM

ots 0/2/0/1 ------> PSM工作正常(W)

ots 0/2/0/2 ------> PSM保護(P)

初始配置

要使NCS1K-EDFA按預期運行，它必須具有特定的最小配置。

拓撲

此示例拓撲表示受PSM保護的標準點對點網路。

NCS1001受保護的拓撲

有關其他拓撲，請參閱Cisco NCS 1000系列解決方案指南。

模組組態

NCS1K-EDFA和NCS1K-PSM（如果存在）需要硬體模組配置。本檔案沒有詳細說明可用的組態選項。有關詳細說明，請參閱Cisco NCS 1001配置指南。

hw-module location 0/RP0/CPU0 slot 1

ampli grid-mode 100GHz

ampli node-type TERM

!

hw-module location 0/RP0/CPU0 slot 2

psm primary-path WORKING

psm section-protection

!

hw-module location 0/RP0/CPU0 slot 3

ampli grid-mode 100GHz

ampli node-type TERM

光纖傳輸訊號(OTS)控制器配置

每個NCS1K-EDFA ots控制器必須配置放大器模式和rx-low-threshold。對於自動控制模式，使用ampli-channel-power配置通道功率設定點。對於手動模式，使用ampli-gain配置放大器增益。端點之間的放大器模式必須匹配。或者，配置safety-control-mode和channel-power-max-delta。

controller Ots0/1/0/0

rx-low-threshold -230

ampli-control-mode automatic

ampli-channel-power 0

channel-power-max-delta 50

safety-control-mode auto

!

controller Ots0/1/0/1

rx-low-threshold -230

ampli-control-mode automatic

ampli-channel-power 30

channel-power-max-delta 50

safety-control-mode auto

!

controller Ots0/1/0/2

rx-low-threshold -280

!

controller Ots0/3/0/3

rx-low-threshold -300

!

controller Ots0/3/0/0

rx-low-threshold -230

ampli-control-mode automatic

ampli-channel-power 0

channel-power-max-delta 50

safety-control-mode auto

!

controller Ots0/3/0/1

rx-low-threshold -230

ampli-control-mode automatic

ampli-channel-power 30

channel-power-max-delta 50

safety-control-mode auto

!

controller Ots0/3/0/2

rx-low-threshold -280

!

controller Ots0/3/0/3

rx-low-threshold -300

!

配置PSM閾值

NCS1K-PSM要求工作(W)和保護(P)接收埠至少具有rx低閾值，才能正常運行。最佳實踐建議配置比當前輸入功率小5 dBm的閾值。

controller Ots0/2/0/1

rx-low-threshold -200

!

controller Ots0/2/0/2

rx-low-threshold -200

!

或者，使用psm auto-threshold讓系統自動配置閾值。

hw-module location 0/RP0/CPU0 slot 2

psm primary-path WORKING

psm auto-threshold

psm section-protection

!

驗證放大器操作

show controller ots命令提供有關每個控制器的光纖效能的資訊。要檢視光功率、放大器增益和其他引數，請使用萬用字元*。

RP/0/RP0/CPU0:NCS1001-1# show controller ots 0/3/0/* summary

Thu Sep  7 17:08:24.360 UTC

Port          Type         Status       TX Power      TX Total Power    RX Power      RX Total Power    RX Voa Attenuation    TX Voa Attenuation    Ampli Gain     Ampli Tilt

(dBm)         (dBm)             (dBm)         (dBm)             (dBm)                 (dBm)

----          ----         ------       -----------   -------------     ----------    ---------------   ------------------    ------------------    ----------     ----------

Ots0_3_0_0    Com          N/A          5.00          5.09              -4.90         -4.90             Unavailable           Unavailable           5.00           0.00

Ots0_3_0_1    Line         N/A          9.40          9.39              0.00          0.39              Unavailable           Unavailable           14.30          0.00

Ots0_3_0_2    Osc          N/A          -11.30        Unavailable       2.50          Unavailable       Unavailable           Unavailable           Unavailable    Unavailable

Ots0_3_0_3    Com-Check    N/A          Unavailable   Unavailable       -40.00        Unavailable       Unavailable           Unavailable           Unavailable    Unavailable

命令show hw-module slot {1|3} ampli-trail-view all 提供有關放大器狀態和配置的詳細資訊。

RP/0/RP0/CPU0:NCS1001-1# show hw-module slot 3 ampli-trail-view all

Thu Sep  7 17:14:29.956 UTC

Ampli Trail View - BST and PRE Amplifiers

=======================================================

Port: 0/COM                             Port: 1/LINE

--------------                          --------------

Rx Power = -4.90 dBm                    Rx Power = 0.00 dBm

Rx Total Power = -4.90 dBm              Rx Total Power = 0.40 dBm

Rx Low Threshold = -23.0 dBm            Rx Low Threshold = -23.0 dBm

Port: 1/LINE                            Port: 0/COM

--------------                          --------------

Tx Power = 9.40 dBm                     Tx Power = 5.00 dBm

Tx Total Power = 9.40 dBm               Tx Total Power = 5.10 dBm

Tx Low Threshold = -20.0 dBm            Tx Low Threshold = -20.0 dBm

Bst Gain = 14.30 dB                     Pre Gain = 5.00 dB

Bst Tilt = 0.00                         Pre Tilt = 0.00

Bst Channel Power = 3.00 dBm            Pre Channel Power = 0.00 dBm

Bst Control Mode = Auto                 Pre Control Mode = Auto

Bst Safety Mode = ALS Auto              Pre Safety Mode = ALS Disabled

Bst Osri = Off                          Pre Osri = Off

Bst Gain Range = Normal                 Pre Gain Range = Normal

檢查警報和情況

命令show alarms { brief | detailed } system { active | history }提供系統上的當前或歷史（已清除）警報。show logging提供關於系統事件的其他資訊。

RP/0/RP0/CPU0:NCS1001-2# show alarms brief system active

Thu Sep  7 14:05:41.268 UTC

------------------------------------------------------------------------------------

Active Alarms

------------------------------------------------------------------------------------

Location        Severity     Group            Set Time                   Description

------------------------------------------------------------------------------------

0/1             Minor        Controller       09/07/2023 14:05:27 UTC    Ots0/1/0/0 - Auto Ampli Control Disabled

某些警報被抑制到存在較高優先順序警報的情況。例如，LINE-RX上的訊號丟失會取代與同一OTS控制器有關的單個通道上的任何警報。

RP/0/RP0/CPU0:NCS1001-2# show alarms brief system conditions

Thu Sep 7 17:24:42.999 UTC

歷史警報可幫助確定當前警報或狀況的原因，並確定模式。此示例顯示自動放大器控制已停用警報的引發和清除模式。

RP/0/RP0/CPU0:NCS1001-2# show alarms brief system history

Thu Sep  7 17:29:46.386 UTC

------------------------------------------------------------------------------------

History Alarms

------------------------------------------------------------------------------------

Location        Severity     Group            Set Time                   Description

Clear Time

------------------------------------------------------------------------------------

0/1             Minor        Controller       09/07/2023 17:07:50 UTC    Ots0/1/0/0 - Auto Ampli Control Disabled

09/07/2023 17:08:00 UTC

0/1             Minor        Controller       09/07/2023 17:08:40 UTC    Ots0/1/0/0 - Auto Ampli Control Disabled

09/07/2023 17:09:10 UTC

0/1             Minor        Controller       09/07/2023 17:15:20 UTC    Ots0/1/0/1 - Auto Ampli Control Disabled

09/07/2023 17:15:30 UTC

0/1             Minor        Controller       09/07/2023 17:19:30 UTC    Ots0/1/0/0 - Auto Ampli Control Disabled

驗證光通道(OCH)電源

要驗證線路系統上的活動通道，請使用命令show hw-module slot {1|3} channel-trail-view active。要檢視整個頻譜的所有通道功率水準，請將active替換為all。通道功率必須保持在使用者定義的閾值內，且最高和最低通道功率之間的最大差異必須保持在channel-power-max-delta定義的閾值內。該示例輸出在通道功率電平之間具有3.3 dBm的差異，因此必須至少有4 dBm的channel-power-max-delta。

RP/0/RP0/CPU0:NCS1001-2# show hw-module slot 3 channel-trail-view active

Thu Sep  7 17:47:07.211 UTC

Channel Trail View - Active - dBm

===========================================

BST: 0/COM=>1/LINE              PRE: 1/LINE=>0/COM

Och Name            Wavelength(nm)      Freq(GHz)     Width(GHz)    Rx pwr(dBm)     Tx pwr(dBm)     Rx pwr(dBm)     Tx pwr(dBm)

-------------------------------------------------------------------------------------------------------------------------------

Ots-Och0_3_0_0_6         1532.68        195600.0       100.0         -9.10            5.10          -11.50            0.40

Ots-Och0_3_0_0_7         1533.46        195500.0       100.0        -12.40            1.70          -11.50            0.30

Ots-Och0_3_0_0_8         1534.25        195400.0       100.0        -11.10            3.10          -11.60            0.30

Ots-Och0_3_0_0_9         1535.04        195300.0       100.0        -12.00            2.40          -13.50           -1.40

-------------------------------------------------------------------------------------------------------------------------------

檢查歷史效能監控(PM)

要檢視ots控制器的歷史效能，請使用pm history命令。這有助於辨識系統中不再存在的暫時電源波動或其他暫時性問題。

show controller ots 0/{1|3}/0/{1-3} pm歷史記錄{15-min|24-hour|30-sec|flex-bin} optics 1 [桶[桶]

RP/0/RP0/CPU0:NCS1001_61# show controller ots 0/1/0/0 pm history 15-min optics 1 Bucket 1

Thu Sep  7 17:38:16.744 UTC

Optics in interval 1 [17:15:00 - 17:30:00 Thu Sep 7 2023]

Optics history bucket type : Valid

MIN       AVG       MAX

LBC[% ]    : 9.2       9.2       9.2

OPT[dBm]   : 6.80      6.80      6.80

OPR[dBm]   : -4.40     -4.37     -4.30

AGN[dB]  : 15.2      15.2      15.2

ATL[dB]  : 0.0       0.0       0.0

Last clearing of "show controllers OPTICS" counters never

您還可以使用show controller ots-och 0/{1|3}/0/{1-96} pm history ...命令檢視各個通道的歷史效能。

RP/0/RP0/CPU0:NCS1001-2# show controller ots-och 0/3/0/0/6 pm history 15-min optics 1 Bucket 1

Thu Sep  7 17:54:36.183 UTC

Optics in interval 1 [17:30:00 - 17:45:00 Thu Sep 7 2023]

Optics history bucket type : Valid

MIN       AVG       MAX

OPT[dBm]   : 0.40      0.40      0.40

OPR[dBm]   : -9.10     -9.10     -9.10

Last clearing of "show controllers OPTICS" counters never

警報故障排除

自動省電(APR)

NCS1K-EDFA在某些狀況下進入APR狀態，例如訊號丟失(LOS)，自動降低放大器增益直到狀況消除。在APR期間，EDFA每100秒傳送一個8秒的恢復脈衝。如果在條件清除後放大器仍處於APR狀態，請使用更改放大器狀態部分中描述的恢復步驟。

如果ots控制器配置了safety-control-mode auto，則EDFA可能會由於丟失光監控通道(OSC)或COM-CHK而進入APR。如果這些控制器沒有光纖連線且未使用，您可以關閉控制器以恢復放大器狀態。此示例將0/1 OSC控制器置於關閉狀態。

RP/0/RP0/CPU0:NCS1001_61# configure

Thu Sep 7 18:15:35.544 UTC

RP/0/RP0/CPU0:NCS1001_61(config)# controller ots 0/1/0/2

RP/0/RP0/CPU0:NCS1001_61(config-Ots)# shutdown

RP/0/RP0/CPU0:NCS1001_61(config-Ots)# commit

Thu Sep 7 18:15:48.650 UTC

訊號丟失或連續性丟失

使用show controller ots命令確定光電源故障的原因。

驗證受影響的控制器是否具有功能正常的光纖連線，並使用光功率表確認功率水準。

自動增益集控制停用

當配置為自動放大控制模式時，EDFA可以在出現阻止自動放大控制停用的情況時引發自動放大控制停用的警報。

如果最高和最低通道功率之間的差值超過通道功率最大增量閾值，放大器也會發出此警報。使用show hw-module slot {1|3} channel-trail-view all確定導致閾值交叉的一個或多個通道。

確認輸入功率不能導致放大器超過其最大或最小增益。有關這些詳細資訊，請參閱Cisco網路融合系統1001資料表。

範例：

控制器ots-och 0/3/0/0/6的接收通道功率為2.1 dBm。

控制器ots 0/3/0/1具有以下配置：

controller Ots0/3/0/1

rx-low-threshold -230

ampli-control-mode automatic

ampli-channel-power 0

!

放大器無法到達通道功率設定點0 dBm，因為傳入的通道功率超過設定點。在ots 0/3/0/0/6接收功率降低到ots 0/3/0/1設定點以下之前，放大器無法提供增益。

同樣，ots-och 0/3/0/0/6上的-26.0 dBm接收功率和控制器ots 0/3/0/1上的ampli-channel功率30 dBm超過線路放大器的最大增益24 dB，導致AMPLI-GAIN-LOW警報，因為它無法到達配置的設定點。

不正確或無效的通道電源

show hw-module slot 3 channel-trail-view all的ots-och通道上存在意外通道功率，這可能表明已配置的網格模式和通道頻譜寬度之間不匹配。確保傳入通道的頻譜寬度小於配置的網格模式配置。例如，400G通道超過網格模式50GHz配置的間距，這導致相鄰ots-och控制器的光功率讀數。請改用網格模式75GHz或100GHz。或者，使用flex-channel-id命令配置自定義通道寬度。有關配置Flex通道的完整說明，請參閱Cisco NCS 1001配置指南。

hw-module location 0/RP0/CPU0 slot 3

ampli grid-mode gridless

ampli flex-mode flex-spectrum

ampli flex-channel-id [ id ] chan-central-freq [ frequency ] chan-width [ width ]

!

更改放大器狀態

注意：這些命令會造成服務影響。

驗證show run controller ots 0/{1|3}/0/{1-3}的配置是否生效。

切換光纖安全遠端互鎖(OSRI)

將OSRI設定為on會停用ots控制器的傳輸功率。

RP/0/RP0/CPU0:NCS1001_61# configure

Thu Sep 7 19:45:01.638 UTC

RP/0/RP0/CPU0:NCS1001_61(config)# controller ots 0/3/0/1

RP/0/RP0/CPU0:NCS1001-2(config-Ots)# osri on

RP/0/RP0/CPU0:NCS1001-2(config-Ots)# commit

Thu Sep 7 19:45:15.772 UTC

RP/0/RP0/CPU0:NCS1001-2(config-Ots)# do show run controller ots 0/3/0/1

Thu Sep 7 19:45:28.214 UTC

controller Ots0/3/0/1

osri on

rx-low-threshold -230

ampli-control-mode automatic

ampli-channel-power 30

!

RP/0/RP0/CPU0:NCS1001-2(config-Ots)# no osri on

RP/0/RP0/CPU0:NCS1001-2(config-Ots)# commit

Thu Sep 7 19:45:57.608 UTC

切換OTS控制器

RP/0/RP0/CPU0:NCS1001-2# configure

Thu Sep 7 19:45:01.638 UTC

RP/0/RP0/CPU0:NCS1001-2(config)# controller ots 0/3/0/1

RP/0/RP0/CPU0:NCS1001-2(config-Ots)# shutdown

RP/0/RP0/CPU0:NCS1001-2(config-Ots)# commit

RP/0/RP0/CPU0:NCS1001-2(config-Ots)# no shutdown

RP/0/RP0/CPU0:NCS1001-2(config-Ots)# commit

重新啟動放大器

從管理情景執行模組重新載入。

RP/0/RP0/CPU0:NCS1001-2# admin

Thu Sep 7 19:52:50.273 UTC

Last login: Wed Sep 6 01:33:34 2023 from 192.0.0.4

root connected from 192.0.0.4 using ssh on sysadmin-vm:0_RP0

sysadmin-vm:0_RP0# hw-module location 0/3 reload

Thu Sep 7 19:53:01.988 UTC+00:00

Reload hardware module ? [no,yes] yes

result Card graceful reload request on 0/3 succeeded.

重新啟動NCS 1001

要完全重啟機箱和所有模組，請使用hw-module location all reload。裝置在重新啟動後將在幾分鐘內無法訪問。

RP/0/RP0/CPU0:NCS1001-2# admin

Thu Sep 7 19:52:50.273 UTC

Last login: Wed Sep 6 01:33:34 2023 from 192.0.0.4

root connected from 192.0.0.4 using ssh on sysadmin-vm:0_RP0

sysadmin-vm:0_RP0# hw-module location all reload

Thu Sep 7 19:53:01.988 UTC+00:00

Reload hardware module ? [no,yes] yes

相關資訊

有關NCS1001上的警報故障排除的其他資訊，請參閱Cisco NCS 1001故障排除指南。