目錄

簡介

NCS1001中的強制網橋SMU安裝從7.10.1升級到25.4.1

簡介

本文檔介紹將NCS1001從7.10.1軟體升級到25.4.1的過程。

NCS1001中的強制網橋SMU安裝從7.10.1升級到25.4.1

如果客戶將節點從7.10.1升級到25.4.1，則如果7.10.1中未安裝這些SMU，他們可能會看到磁碟空間不可用的問題。

ERROR! No enough space to proceed with ADD operation.

此問題不是由於空間問題，如果顯示足夠的可用空間，則必須使用show media location all 命令從CLI進行確認。但是，錯誤還是出現了。

RP/0/RP0/CPU0:Node1#show media location all

Mon Feb 16 19:15:25.546 CET

Media Info for Location: node0_RP0_CPU0

Partition                            Size     Used  Percent    Avail

--------------------------------------------------------------------

rootfs:                              3.9G     1.5G      39%     2.3G

apphost:                             3.7G     7.7M       1%     3.5G

harddisk:                            2.9G      18M       1%     2.8G

log:                                 992M     100M      11%     826M

config:                              459M     1.9M       1%     423M

disk0:                               992M     3.1M       1%     922M

有一個橋接器SMU用於將NCS1001從7.10.1升級到25.4.1，在升級到Cisco IOS®之前需要安裝在7.10.1版中。

在此提供升級矩陣的「ro reference」作為參考，表「Software upgrade matrix」說明您需要新增SMU的缺陷。

https://www.cisco.com/c/en/us/td/docs/optical/ncs1001/ncs1001-system-setup-guide/perform-system-upgrade-and-install-feature-packages.html

如果您想瞭解有關該缺陷的更多資訊，請按一下以下連結：

https://bst.cloudapps.cisco.com/bugsearch/bug/CSCwq24232

https://bst.cloudapps.cisco.com/bugsearch/bug/CSCwq24218

可以從以下門戶下載SMU:

SMU Portal 7.10.1

https://software.cisco.com/download/home/286315098/type/280867577/release/7.10.1

You need to install the SMU before upgrading to 25.4.1

ncs1001-7.10.1..tar

ncs1001-7.10.1..tar

ncs1001-sysadmin-7.10.1..tar

ncs1001-sysadmin-7.10.1..tar

提交兩個網橋SMU後，您可以繼續安裝機箱中的目標軟體版本25.4.1 Cisco IOS。