目錄

簡介

必要條件

需求

採用元件

慣例

設定

網路圖表

組態

安裝和升級指南

dsl equipment-type

dsl linerate

dsl operating-mode(g.shdsl)

驗證

疑難排解

疑難排解指令

相關資訊

簡介

本檔案將提供兩個路由器通過多速率對稱高速數位使用者線路(G.SHDSL)連線埠來背對背設定的範例設定。本章介紹G.SHDSL Cisco路由器如何配置為作為從另一個遠端G.SHDSL CPE裝置終止連線的中央辦公室(CO)DSL裝置。

必要條件

需求

本文件沒有特定需求。

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- 運行Cisco IOS®軟體版本12.2(8)T1的828客戶端裝置(CPE)

- 運行Cisco IOS軟體版本12.2(8)T的2612路由器

- 使用WAN介面卡(WIC)的2612路由器–1SHDSL

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

設定

本節提供用於設定本文件中所述功能的資訊。

註：使用Command Lookup Tool(僅限註冊客戶)查詢有關本文檔中使用的命令的更多資訊。

網路圖表

本檔案會使用以下網路設定：

組態

本檔案會使用以下設定：

注意：在此配置中，828A配置裝置型別「CO」，該型別模擬來自CO的信令。而G.SHDSL WIC的2612配置裝置型別「CPE」。

- DSL5-828A

- DSL4-2612A

DSL5-828A（思科828 CPE充當CO）

DSL5-828A#show run

Building configuration...

Current configuration : 769 bytes

!

version 12.2

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname DSL5-828A

!

!

ip subnet-zero

!

!

!

!

!

interface Ethernet0

ip address 192.168.1.1 255.255.255.0

hold-queue 100 out

!

interface ATM0

no ip address

no atm ilmi-keepalive

pvc 0/35

encapsulation aal5snap

!

pvc 8/35

encapsulation aal5mux ppp dialer

dialer pool-member 1

!

dsl equipment-type CO

dsl operating-mode GSHDSL symmetric annex A

dsl linerate AUTO

!

interface Dialer0

ip address 1.1.1.1 255.255.255.0

encapsulation ppp

dialer pool 1

dialer-group 1

!

ip classless

ip http server

ip pim bidir-enable

!

!

dialer-list 1 protocol ip permit

!

line con 0

stopbits 1

line vty 0 4

!

scheduler max-task-time 5000

end

DSL4-2612A（Cisco 2612路由器充當CPE）

dsl4-2612a#show run

Building configuration...

Current configuration : 927 bytes

!

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname dsl4-2612a

!

!

ip subnet-zero

!

!

!

!

!

!

!

!

!

!

fax interface-type fax-mail

mta receive maximum-recipients 0

!

!

!

!

interface ATM0/0

no ip address

no atm ilmi-keepalive

pvc 0/35

encapsulation aal5snap

!

pvc 8/35

encapsulation aal5mux ppp dialer

dialer pool-member 1

!

dsl equipment-type CPE

dsl operating-mode GSHDSL symmetric annex A

dsl linerate AUTO

!

interface Ethernet0/0

ip address 172.16.1.2 255.255.255.0

shutdown

half-duplex

!

interface TokenRing0/0

no ip address

shutdown

ring-speed 16

!

interface Dialer0

ip address 1.1.1.2 255.255.255.0

encapsulation ppp

dialer pool 1

dialer-group 1

!

ip classless

ip http server

ip pim bidir-enable

!

!

dialer-list 1 protocol ip permit

!

call rsvp-sync

!

!

mgcp profile default

!

dial-peer cor custom

!

!

!

!

line con 0

line aux 0

line vty 0 4

!

!

end

安裝和升級指南

本節介紹已修改的命令。此功能使用的所有其他命令均記錄在Cisco IOS軟體版本12.2命令參考出版物中。

已修改的命令

- dsl equipment-type

- dsl linerate

- dsl operating-mode(g.shdsl)

dsl equipment-type

在ATM介面模式下發出dsl equipment-type命令，將DSL ATM介面配置為充當CO裝置或CPE。使用此命令的no形式恢復預設裝置型別。

- dsl裝置型別{co | cpe}

- no dsl equipment-type

這些命令的語法說明如下：

- co — 將DSL ATM介面配置為充當CO裝置。

- cpe — 將DSL ATM介面配置為作為CPE。

預設值

DSL ATM介面充當CPE。

介面命令模式

G.SHDSL WIC的ATM介面已整合到以下Cisco IOS軟體版本中：

- 12.2(4)XL — 在Cisco 2600系列路由器上

- 12.2(8)T — 在Cisco 2600系列和Cisco 3600系列路由器上

使用指南

此組態命令適用於特定的ATM介面。發出此命令之前，必須指定ATM介面。在您發出此命令之前，ATM介面必須處於shutdown狀態。此示例說明如何將DSL ATM介面1/1配置為充當CO裝置。

Router#configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

Router(config)#interface atm 1/1

Router(config-if)#dsl equipment-type co

Router(config-if)#end

Router# clear interface atm 0/1

Router#

相關命令

- dsl linerate — 指定DSL ATM介面的線路速率。

- dsl operating-mode(g.shdsl) — 指定DSL ATM介面的工作模式。

dsl linerate

在ATM介面模式下發出dsl linerate命令，指定DSL ATM介面的線路速率。使用此命令的no形式恢復預設線速。

- dsl linerate {kbps |自動}

- no dsl linerate

這些命令的語法說明如下：

- kbps — 指定DSL ATM介面的線路速率（以千位每秒為單位）。允許條目為72、136、200、264、392、520、776、1032、1160、1544、2056和2312。

- auto — 將DSL ATM介面配置為通過與遠端DSL接入乘數(DSLAM)或WIC協商自動進行最佳線路速率培訓。

預設值

DSL ATM介面自動將其線路速率與遠端DSLAM或WIC同步。

介面命令模式

G.SHDSL WIC的ATM介面已整合到以下Cisco IOS軟體版本中：

- 12.2(4)XL — 在Cisco 2600系列路由器上

- 12.2(8)T — 在Cisco 2600系列和Cisco 3600系列路由器上

使用指南

此組態命令適用於特定的ATM介面。發出此命令之前，必須指定ATM介面。在您發出此命令之前，ATM介面必須處於shutdown狀態。此示例說明如何配置DSL ATM介面0/1，使其以1040 kbps的線速運行：

Router#configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

Router(config)#interface atm 0/1

Router(config-if)#dsl linerate 1040

Router(config-if)#end

Router#clear interface atm 0/1

Router#

相關命令

- dsl equipment-type — 將DSL ATM介面配置為充當CO裝置或CPE。

- dsl operating-mode(g.shdsl) — 指定DSL ATM介面的工作模式。使用此命令的no形式恢復預設操作模式。

dsl operating-mode(g.shdsl)

發出dsl operating-mode ATM interface命令，為ATM介面指定DSL的工作模式。使用此命令的no形式恢復預設操作模式。

- dsl操作模式gshdsl對稱附件{A | B}

- no dsl operating-mode

這些命令的語法說明如下：

- gshdsl — 根據ITU G.991.2，將DSL ATM介面配置為在多速率高速模式下運行。

- symmetric — 根據ITU G.991.2配置DSL ATM介面以對稱模式運行。

- 附件{A | B} — 指定區域操作引數。輸入A表示北美，輸入B表示歐洲。預設值為A。

預設值

預設工作模式為G.SHDSL對稱annex A。

介面命令模式

G.SHDSL WIC的ATM介面是在Cisco IOS軟體版本12.1(3)X中引入的，並整合到這些Cisco IOS軟體版本中。

- 12.2(2)T — 在Cisco 1700系列路由器上

- 12.2(4)XL — 在Cisco 2600系列路由器上

- 12.2(8)T — 在Cisco 2600系列和Cisco 3600系列路由器上

使用指南

此組態命令適用於特定的ATM介面。發出此命令之前，必須指定ATM介面。輸入此命令之前，ATM介面必須處於shutdown狀態。此示例說明如何將DSL ATM介面0/0配置為在G.SHDSL模式下運行。

Router#configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

Router(config)#interface atm 0/0

Router(config-if)#dsl operating-mode gshdsl symmetric annex A

Router(config-if)#end

Router#clear interface atm 0/1

Router#

相關命令

- dsl equipment-type — 將DSL ATM介面配置為充當CO裝置或CPE。

- dsl linerate — 指定DSL ATM介面的線路速率。

驗證

您應該會看到此輸出在控制檯會話中傳輸。如果您已通過Telnet連線到路由器，請發出term mon命令來檢視控制檯消息。

00:51:25: %GSI-6-RESET: Interface ATM0/0, bringing up the line.

It may take several seconds for the line to be active.

00:52:09: %ATM-5-UPDOWN: Changing VC 0/35 VC-state to PVC activated.

00:52:09: %ATM-5-UPDOWN: Changing VC 8/35 VC-state to PVC activated.

00:52:10: %LINK-3-UPDOWN: Interface Virtual-Access1, changed state to up

00:52:10: %DIALER-6-BIND: Interface Vi1 bound to profile Di0

00:52:11: %LINK-3-UPDOWN: Interface ATM0/0, changed state to up

00:52:12: %LINEPROTO-5-UPDOWN: Line protocol on Interface ATM0/0, changed state to up

00:52:12: %LINEPROTO-5-UPDOWN: Line protocol on Interface Virtual-Access1, changed state to up

本節提供的資訊可用於確認您的組態是否正常運作。

輸出直譯器工具(僅供已註冊客戶使用)(OIT)支援某些show命令。使用OIT檢視show命令輸出的分析。

- show running-config — 驗證當前配置，並檢視所有控制器的狀態。

- show controllers atm slot/port — 檢視ATM控制器統計資訊。

- show atm vc — 驗證永久虛擬電路(PVC)狀態。

- show dsl interface atm — 檢視G.SHDSL數據機的狀態

- show interface atm — 檢視ATM介面的狀態。

以下是show atm vc命令的輸出範例。確保活動的PVC已啟動。

dsl4-2612a#show atm vc

VCD /                                        Peak  Avg/Min Burst

Interface  Name         VPI   VCI  Type   Encaps   SC   Kbps   Kbps   Cells  Sts

0/0        1              0    35  PVC    SNAP     UBR    2304                UP

0/0        2              8    35  PVC    MUX      UBR    2304                UP

以下是show dsl interface atm指令的輸出範例。如果線路關閉，則線路未啟用。某些值可能不準確。出現語句。您還可以驗證裝置型別和操作模式配置是否適合您的應用。

dsl4-2612a#show dsl interface atm 0/0

Globespan G.SHDSL/SDSL Chipset Information

Equipment Type:         Customer Premise

Operating Mode:         G.SHDSL Annex A

Clock Rate Mode:        Auto rate selection Mode

Reset Count:            1

Actual rate:            2312 Kbps

Modem Status:           Data (0x1)

Received SNR:           39 dB

SNR Threshold:          23 dB

Loop Attenuation:      -0.3400 dB

Transmit Power:         7.5 dBm

Receiver Gain:          4.3900 dB

Last Activation Status: No Failure (0x0)

CRC Errors:             33372

Chipset Version:        1

Firmware Version:       R1.5

dsl4-2612a#show dsl interface atm 0/0

Globespan G.SHDSL/SDSL Chipset Information

Line is not active. Some of the values printed may not be accurate.

Equipment Type:         Customer Premise

Operating Mode:         G.SHDSL Annex A

Clock Rate Mode:        Auto rate selection Mode

Reset Count:            1

Actual rate:            2312 Kbps

Modem Status:           Idle (0x0)

Received SNR:           38 dB

SNR Threshold:          23 dB

Loop Attenuation:      -0.3400 dB

Transmit Power:         7.5 dBm

Receiver Gain:          4.3900 dB

Last Activation Status: No Failure (0x0)

CRC Errors:             33372

Chipset Version:        1

Firmware Version:       R1.5

如果無法通過ATM電路執行Ping，請透過對兩台路由器上的ATM介面發出show interface指令，確認ATM介面是否為UP/UP。發出show interface atm命令以檢視ATM介面的狀態。確保ATM插槽、連線埠和線路通訊協定已啟動，如以下範例所示。

DSL5-828A#show interfaces atm0

ATM0 is up, line protocol is up

Hardware is PQUICC_SAR (with Globespan G.SHDSL module)

MTU 1500 bytes, sub MTU 1500, BW 2312 Kbit, DLY 80 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ATM, loopback not set

Encapsulation(s): AAL5, PVC mode

10 maximum active VCs, 2 current VCCs

VC idle disconnect time: 300 seconds

Last input never, output 00:00:08, output hang never

Last clearing of "show interface" counters never

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: None

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

261 packets input, 11170 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

264 packets output, 11388 bytes, 0 underruns

0 output errors, 0 collisions, 2 interface resets

0 output buffer failures, 0 output buffers swapped out

疑難排解

本節提供的資訊可用於對組態進行疑難排解。

疑難排解指令

附註：使用 debug 指令之前，請先參閱有關 Debug 指令的重要資訊。

- debug atm events — 在生成ATM相關事件時識別這些事件。

- debug atm errors — 指示哪些介面有故障。

這是來自ATM介面的偵錯資訊範例，執行本節所列的偵錯並聯機（請記住，電路可能需要30秒或更長時間才能啟動）。

01:07:15: ATM0/0 dslsar_1a_reset: PLIM type is 19, Rate is 2304Mbps

01:07:15: ATM0/0 dslsar_1a_shutdown: state=4

01:07:15: dslsar disable ATM0/0

01:07:15: %GSI-6-RESET: Interface ATM0/0, bringing up the line.

It may take several seconds for the line to be active.

01:07:15: Resetting ATM0/0

01:07:15:  dslsar_1a_config(ATM0/0)

01:07:15:  dslsar_1a_enable(ATM0/0)

01:07:15: ATM0/0: dslsar_init(825AD084,FALSE)

01:07:15: dslsar disable ATM0/0

01:07:16: ATM0/0 dslsar_init: DSLSAR TXRX disabled

01:07:16: ATM0/0 dslsar_1a_enable: restarting VCs: 0

01:07:16: (ATM0/0)1a_enable,calling atm_activate_pvc, vcd = 1, vc = 0x82A17BE0adb->flags = 0x4800C

01:07:16: (ATM0/0)1a_enable,calling atm_activate_pvc, vcd = 2, vc = 0x82A1863Cadb->flags = 0x4800C

dsl4-2612a#

dsl4-2612a#

01:07:16: %SYS-5-CONFIG_I: Configured from console by console

01:07:19: dslsar disable ATM0/0

01:08:03: ATM0/0 dslsar_MatchSARTxToLineSpeed(): usbw 2304, clkPerCell 6360 prev_clkPerCell 9702

01:08:03: ATM0/0 dslsar_update_us_bandwidth(): upstream bw =2304 Kbps

01:08:09:  dslsar_periodic: ENABLING DSLSAR

01:08:09: dslsar enable ATM0/0

01:08:09:  dslsar_1a_setup_vc(ATM0/0): vc:1 vpi:0 vci:35 state 2

01:08:09: ATM0/0 dslsar_vc_setup: vcd 1, vpi 0, vci 35, avgrate 0

01:08:09: CONFIGURING VC 1 (0/35) IN TX SCHEDULE TABLE SET 0

01:08:09: Forcing Peakrate and Avgrate to: 2304

01:08:09: Requested QoS: Peakrate = 2304, Avgrate = 2304, Burstsize =0

01:08:09: Configuring VC 1:  slot 0 in TST 5

01:08:09: SUCCESSFUL CONFIGURATION OF  VC 1 (0/35), QOS Type 4

01:08:09: ATM0/0: vcd = 1, bw = 2304, tbds_per_tsi = 15, max_pkt_len = 4470,

max_tx_time = 1862ATM0/0 last_address 0x12E14

01:08:09: %ATM-5-UPDOWN: Changing VC 0/35 VC-state to PVC activated.

01:08:09:  dslsar_1a_setup_vc(ATM0/0): vc:2 vpi:8 vci:35 state 2

01:08:09: ATM0/0 dslsar_vc_setup: vcd 2, vpi 8, vci 35, avgrate 0

01:08:09: CONFIGURING VC 1 (0/35) IN TX SCHEDULE TABLE SET 1

01:08:09: Forcing Peakrate and Avgrate to: 2304

01:08:09: Requested QoS: Peakrate = 2304, Avgrate = 2304, Burstsize =0

01:08:09: Configuring VC 1:  slot 0 in TST 5

01:08:09: SUCCESSFUL CONFIGURATION OF  VC 1 (0/35), QOS Type 4

01:08:09: ATM0/0: vcd = 1, bw = 1152, tbds_per_tsi = 15, max_pkt_len = 4470, max_tx_time = 3725

01:08:09: CONFIGURING VC 2 (8/35) IN TX SCHEDULE TABLE SET 1

01:08:09: Forcing Peakrate and Avgrate to: 2304

01:08:09: Requested QoS: Peakrate = 2304, Avgrate = 2304, Burstsize =0

01:08:09: Configuring VC 2:  slot 1 in TST 5

01:08:09: SUCCESSFUL CONFIGURATION OF  VC 2 (8/35), QOS Type 4

01:08:09: ATM0/0: vcd = 2, bw = 1152, tbds_per_tsi = 15, max_pkt_len = 4470, max_tx_time = 3725

01:08:09: %ATM-5-UPDOWN: Changing VC 8/35 VC-state to PVC activated.

01:08:09: CONFIGURING VC 1 (0/35) IN TX SCHEDULE TABLE SET 0

01:08:09: Forcing Peakrate and Avgrate to: 2304

01:08:09: Requested QoS: Peakrate = 2304, Avgrate = 2304, Burstsize =0

01:08:09: Configuring VC 1:  slot 0 in TST 5

01:08:09: SUCCESSFUL CONFIGURATION OF  VC 1 (0/35), QOS Type 4

01:08:09: ATM0/0: vcd = 1, bw = 1152, tbds_per_tsi = 15, max_pkt_len = 4470, max_tx_time = 3725

01:08:09: CONFIGURING VC 2 (8/35) IN TX SCHEDULE TABLE SET 0

01:08:09: Forcing Peakrate and Avgrate to: 2304

01:08:09: Requested QoS: Peakrate = 2304, Avgrate = 2304, Burstsize =0

01:08:09: Configuring VC 2:  slot 1 in TST 5

01:08:09: SUCCESSFUL CONFIGURATION OF  VC 2 (8/35), QOS Type 4

01:08:09: ATM0/0: vcd = 2, bw = 1152, tbds_per_tsi = 15, max_pkt_len = 4470, max_tx_time = 3725

01:08:10: %LINK-3-UPDOWN: Interface Virtual-Access1, changed state to up

01:08:10: %DIALER-6-BIND: Interface Vi1 bound to profile Di0

01:08:11: %LINK-3-UPDOWN: Interface ATM0/0, changed state to up

01:08:11:  dslsar_atm_lineaction(ATM0/0): state=4

01:08:12: %LINEPROTO-5-UPDOWN: Line protocol on Interface ATM0/0, changed state to up

01:08:13: %LINEPROTO-5-UPDOWN: Line protocol on Interface Virtual-Access1, changed state to up

相關資訊

- DSL技術支援

- 在Cisco 1700/2600/3600系列路由器上安裝G.SHDSL ATM WIC

- Cisco DSL路由器配置和故障排除指南

- 思科826/827/828/831/837和SOHO 76/77/78/91/96的網路方案

- 思科826/827/828/831/837和SOHO 76/77/78/91/96的高級配置

- Cisco 826/827/828/831/837和SOHO 76/77/78/91/96故障排除

- 技術支援與文件 - Cisco Systems