目錄

簡介

必要條件

需求

採用元件

DSL介面上的參考頻寬

相關資訊

簡介

本檔案介紹數位使用者線路(DSL)介面的參考頻寬概念。還討論了在DSL控制器和介面下觀察到的值的差異。

作者：Richika Jain，思科TAC工程師。

必要條件

需求

本文件沒有特定需求。

採用元件

本檔案中的資訊是根據在存取端支援DSL連線的思科路由器，例如超高位元速率數位使用者線路(VDSL)、對稱高速數位使用者線路(SHDSL)非對稱數位使用者線路(ADSL)。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

DSL介面上的參考頻寬

與其他介質不同，在DSL中，上行和下行頻寬存在差異。

例如，對於E1，上游和下游分別為2.048 mb和2.048 mb，當路由器計算負載和過載時，它會將上游和下游的負載都取為2.048 mb的一小部分，然後以255為比例對其進行規範化並顯示出來。因此，如果介面下的輸入速率是204800，您會看到255/255的重新載入。

現在，對於DSL，路由器需要用於相同計算的參考頻寬值。但這裡有兩個頻寬，上行和下行。介面下顯示的頻寬是上行頻寬。

Ethernet0/0/0 is up, line protocol is up

Hardware is VDSL_ETHERNET, address is 3033.199e.1948

MTU 1500 bytes, BW 9998 Kbit/sec, DLY 1000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation 802.1Q Virtual LAN, Vlan ID  1., loopback not set

Keepalive set (10 sec)

ARP type: ARPA, ARP Timeout 05:00:00

Last input 3w6d, output 00:00:00, output hang never

Last clearing of "show interface" counters 06:15:00

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue: 0/1024 (size/max)

5 minute input rate 2850000 bits/sec, 420 packets/sec

5 minute output rate 5749000 bits/sec, 1747 packets/sec

3887957 packets input, 3183892807 bytes, 0 no buffer

Received 0 broadcasts (0 IP multicasts)

0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 input packets with dribble condition detected

1573 packets output, 100231 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 unknown protocol drops

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

之所以選擇上行頻寬作為參考頻寬，是因為大部分時間在輸出方向使用QoS策略，並且它需要準確的參考頻寬。

VDSL控制器的輸出有兩種速度值：上行和下行可達到的速率和速度。速度是使用ISP訓練線路時所依據的值，可達到的速率是VDSL電路的最大速度。

n3-ne-r-hi-435773-01#sh controller vdsl 0/1/0 | i Speed|Attainable

Attainable Rate:        40440 kbits/s            3280 kbits/s

Speed (kbps):             0            25087             0              3192

VDSL控制器的完整輸出：

Router#show controller vdsl 0/1/0

Controller VDSL 0/1/0 is UP

Daemon Status:         Up

XTU-R (DS)        XTU-C (US)

Chip Vendor ID:        'BDCM'             'BDCM'

Chip Vendor Specific:   0x0000             0xA1AA

Chip Vendor Country:    0xB500             0xB500

Modem Vendor ID:        'CSCO'             '    '

Modem Vendor Specific:  0x4602             0x0000

Modem Vendor Country:   0xB500             0x0000

Serial Number Near:     FOC15163V2Q 2911/K9 15.5(1)T

Serial Number Far:

Modem Version Near:     15.5(1)T

Modem Version Far:      0xa1aa

Modem Status:         TC Sync (Showtime!)

DSL Config Mode:     AUTO

Trained Mode:        G.993.2 (VDSL2) Profile 17a

TC Mode:             PTM

Selftest Result:     0x00

DELT configuration:  disabled

DELT state:          not running

Full inits:          1

Failed full inits:   0

Short inits:         0

Failed short inits:  0

Firmware    Source        File Name

--------    ------        ----------

VDSL        embedded       VDSL_LINUX_DEV_01212008

Modem FW  Version:    130205_1433-4.02L.03.B2pvC035j.d23j

Modem PHY Version:    B2pvC035j.d23j

Trellis:         ON              ON

SRA:              disabled         disabled

SRA count:          0             0

Bit swap:          enabled         enabled

Bit swap count:     0             0

Line Attenuation:        0.0 dB          0.0 dB

Signal Attenuation:      0.0 dB          0.0 dB

Noise Margin:           11.1 dB          6.0 dB

Attainable Rate:       40440 kbits/s    3280 kbits/s

Actual Power:           14.5 dBm          4.9 dBm

Per Band Status:        D1      D2      D3      U0     U1     U2     U3

Line Attenuation(dB):   20.0    48.3    73.7    9.4    37.9   56.2   N/A

Signal Attenuation(dB): 20.0    48.3    N/A    10.2    36.2   53.3   N/A

Noise Margin(dB):       10.9    11.3    N/A     5.9    6.0    6.0    N/A

Total FECC:        97252         0

Total ES:          7             0

Total SES:         0             0

Total LOSS:        0             0

Total UAS:        24             24

Total LPRS:        0             0

Total LOFS:        0             0

Total LOLS:        0             0

!--- DSL trained speed can be found below

DSChannel1   DSChannel0    US Channel1   US Channel0

Speed (kbps):              0           25087             0            3192

SRA Previous Speed:        0               0             0               0

Previous Speed:            0               0             0               0

Reed-Solomon EC:           0           97252             0               0

CRC Errors:                0              15             0               0

Header Errors:             0              62             0               0

Interleave (ms):        0.00            8.00          0.00            8.00

Actual INP:             0.00            3.01          0.00            2.00

Training Log :    Stopped

Training Log Filename :    flash:vdsllog.bin

否現在對於txload和rxload計算，它使用相同的參考頻寬（即上游頻寬）。因此，當輸入流量速率(例如998000)為255/255時，您會看到rxload為255/255，而當輸入速率高於(20 mb， 30 mb)時，它會顯示rxload 255/255。因此，使用預設參考頻寬時，顯示的rxload值在所有時間都不會準確。但是，它不會對您接收的實際頻寬/速度或吞吐量有任何影響。

如果希望為QoS目的更改它，可以使用介面下的bandwidth命令更改它。但是，無論bandwidth命令設定為什麼值，介面都不會更改其傳輸速度。

相關資訊

- Cisco DSL路由器配置和故障排除指南 — PPPoA實施選項

- Cisco DSL路由器配置和故障排除指南

- 技術支援與文件 - Cisco Systems