目錄

簡介

必要條件

需求

採用元件

設定

確定路由器上的當前韌體版本

升級VDSL韌體

驗證

疑難排解

簡介

本檔案介紹如何在Cisco 800系列路由器上升級超高位速率數位使用者線路(VDSL)韌體。

必要條件

需求

思科建議您在完成此升級過程之前檢視韌體版本的發行說明。

採用元件

本檔案中的資訊是根據Cisco 897VAB路由器。但是本檔案所述內容不限於特定軟體和硬體版本。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

設定

附註：使用命令查詢工具(僅供已註冊客戶使用)可獲取本節中使用的命令的更多資訊。

確定路由器上的當前韌體版本

輸入show controller vdsl命令以確定Cisco 800系列路由器上當前韌體的版本。在此示例輸出中查詢以粗體顯示的輸出條目：

Router# show controller vdsl 0

Controller VDSL 0 is UP

Daemon Status: Up

XTU-R (DS) XTU-C (US)

Chip Vendor ID: 'BDCM' 'BDCM'

Chip Vendor Specific: 0x0000 0xA31E

Chip Vendor Country: 0xB500 0xB500

Modem Vendor ID: 'CSCO' ' '

Modem Vendor Specific: 0x4602 0x0000

Modem Vendor Country: 0xB500 0x0000

Serial Number Near: FHK144672GQ 886VA-K 15.2(4)M

Serial Number Far:

Modem Version Near: 15.2(4)M

Modem Version Far: 0xa31e

Modem Status: TC Sync (Showtime!)

DSL Config Mode: AUTO

Trained Mode: G.992.5 (ADSL2+) Annex J

TC Mode: ATM

Selftest Result: 0x00

DELT configuration: disabled

DELT state: not running

Trellis: ON ON

SRA: disabled disabled

SRA count: 0 0

Bit swap: enabled enabled

Bit swap count: 0 1

Line Attenuation: 0.0 dB 4.9 dB

Signal Attenuation: 3.3 dB 4.4 dB

Noise Margin: 9.8 dB 6.3 dB

Attainable Rate: 26332 kbits/s 2952 kbits/s

Actual Power: 7.1 dBm 11.9 dBm

Total FECC: 0 0

Total ES: 9721 42

Total SES: 9714 4

Total LOSS: 1086 0

Total UAS: 2670101 2670101

Total LPRS: 0 0

Total LOFS: 8342 0

Total LOLS: 0 0

Full inits: 2511

Failed full inits: 815

Short inits: 174

Failed short inits: 1353

Firmware Source File Name (version)

-------- --------- ------------------

VDSL user config flash:VA_A_39h_B_38h3_24h_j.bin (10)

Modem FW Version: 140305_1531-4.02L.03.B2pvC038h3_J.d24h

Modem PHY Version: B2pvC038h3_J.d24h

Vendor Version: Bpv38h3.24h 68

DS Channel1 DS Channel0 US Channel1 US Channel0

Speed (kbps): 0 25346 0 2832

SRA Previous Speed: 0 0 0 0

Previous Speed: 0 25866 0 1264

Total Cells: 0 35481077 0 3942410

User Cells: 0 0 0 0

Reed-Solomon EC: 0 0 0 0

CRC Errors: 0 220155 0 0

Header Errors: 0 0 0 0

Interleave (ms): 0.00 0.08 0.00 11.11

Actual INP: 0.00 0.00 0.00 0.69

Training Log: Stopped

Training Log Filename: flash:vdsllog.bin

附註：預設韌體放在flash:/firmware/<filename>中。如果VDSL控制器下沒有給定韌體路徑，並且重置VDSL控制器(shut/no-shut)或重新載入路由器；vdsl控制器採用此預設韌體。請勿從flash:/firmware/<filename>中刪除基本韌體。

升級VDSL韌體

1. 從Cisco.com軟體中心下載新的VDSL2韌體。

2. 選擇Routers > Branch Routers > Cisco 800 Series Routers > Cisco 887V Integrated Services Router > Very High Bitrate DSL(VDSL)Firmware。

3. 將韌體複製到指定位置。例如，路由器快閃記憶體或TFTP伺服器。
以下示例展示如何將VDSL2韌體從10.76.76.160上的TFTP伺服器複製到路由器快閃記憶體中：

Router#copy tftp flash:

Address or name of remote host []? 10.76.76.160 [Addres of the TFTP Server]

Source filename []? vdsl_bond.bin_39p1 [Name of the downloaded VDSL Firmware]

Destination filename [vdsl_bond.bin_39p1]? [Name of the VDSL firmware on the router flash]

或者，您可以輸入copy ftp://usernamepassword@TFTP-Server-IPAddress flash:VDSL-Firmware-Name命令。以下輸出提供範例：

Router#copy ftp://test:test@10.76.76.160 flash:vdsl_bond.bin_39p1

Source filename []? vdsl_bond.bin_39p1

Destination filename [vdsl_bond.bin_39p1]?

Accessing ftp://test:test@10.76.76.160/vdsl_bond.bin_39p1...

Loading vdsl_bond.bin_39p1 !!!!!!!!!!!

[OK - 2660422/4096 bytes]

4. 將路由器配置為從指定位置載入新的VDSL2韌體。
Router#conf t

Enter configuration commands, one per line. End with CNTL/Z.

Router(config)#controller vdsl 0

Router(config-controller)#firmware filename ?

archive: Download fw file name

cns: Download fw file name

flash: Download fw file name

ftp: Download fw file name

http: Download fw file name

https: Download fw file name

null: Download fw file name

nvram: Download fw file name

rcp: Download fw file name

scp: Download fw file name

system: Download fw file name

tar: Download fw file name

tftp: Download fw file name

tmpsys: Download fw file name

xmodem: Download fw file name

ymodem: Download fw file name

Router(config-controller)#firmware filename flash:vdsl_bond.bin_39p1

5. 重新啟動控制器介面以使新韌體生效：
Router#conf t

Enter configuration commands, one per line. End with CNTL/Z.

Router(config)#controller vdsl 0

Router(config-controller)#shut

Router(config-controller)#no shut

Router(config-controller)#end

驗證

使用本節內容，確認您的組態是否正常運作。

輸出直譯器工具(僅供已註冊客戶使用)支援某些show命令。使用輸出直譯器工具來檢視show命令輸出的分析。

Router#show controller vdsl 0

Controller VDSL 0 is DOWN

Daemon Status:           Establishing Link

XTU-R (DS)              XTU-C (US)

Chip Vendor ID:         'BDCM'                   'BDCM'

Chip Vendor Specific:   0x0000                   0xA39A

Chip Vendor Country:    0xB500                   0xB500

Modem Vendor ID:        'CSCO'                   'BDCM'

Modem Vendor Specific:  0x4602                   0xA39A

Modem Vendor Country:   0xB500                   0xB500

Serial Number Near:    FGL18212393 C897VAB- 15.4(201503

Serial Number Far:

Modem Version Near:    15.4(20150325:160033) [ragvasud

Modem Version Far:     0xa39a

Modem Status:          Unknown

DSL Config Mode:         ADSL2+

Trained Mode:

TC Mode:                 UNKNOWN

Selftest Result:         0x00

DELT configuration:      disabled

DELT state:              not running

Bonded Status:           PTM Bonded<

Number of Ports:         2

Port ID:                 0               1

Link Status:             DOWN            DOWN

Aggr US Rate(kbps):      0

Aggr DS Rate(kbps):      0

Full inits:             3

Failed full inits:      14

Short inits:            2

Failed short inits:     2

Firmware        Source          File Name

--------        ------          ----------

VDSL            user config     flash:vdsl_bond.bin_39p1

Modem FW  Version:      4.14L.04

Modem PHY Version:      A2pv6F039p1.d24m

Line:

XTU-R (DS)              XTU-C (US)

Trellis:                 OFF                      OFF

SRA:                     disabled                disabled

SRA count:              0                       0

Bit swap:                enabled                 enabled

Training Log :  Stopped

Training Log Filename : flash:vdsllog.bin

疑難排解

目前尚無適用於此組態的具體疑難排解資訊。