目錄

簡介

必要條件

需求

採用元件

慣例

為遠端使用者配置CPE

網路圖表

逐步說明

配置Telco NI2 DSLAM

將HDLC幀轉換為ATM信元

為PPP封裝配置聚合器

配置幀中繼

為幀中繼封裝配置聚合器

排除IDSL PPP連線故障

指令疑難排解

排除IDSL幀中繼連線故障

指令疑難排解

問題和錯誤

相關資訊

簡介

ISDN數位使用者線路(IDSL)是未交換且不包含訊號（D通道）的租用線路ISDN基本速率介面(BRI)。IDSL和ISDN BRI使用相同的2B1Q線路調制。在路由器上，這等同於在租用線路配置中放置BRI介面。您可以將線路的速度配置為64 kbps、128 kbps或144 kbps。

通過線路傳輸的幀是標準的高級資料鏈路控制(HDLC)幀。您可以為租用線路BRI介面配置PPP或幀中繼封裝。將BRI介面視為以慢速運行的同步串列埠。

必要條件

需求

要使用IDSL，需要以下專案：

- 支援isdn leased-line全域性配置命令並具有BRI介面的路由器。

- 一種數字使用者線接入複用器(DSLAM)，具有IDSL介面以終止連線的另一端。

目前，思科在Cisco 6160 DSLAM中使用八埠IDSL卡。計畫支援6130 DSLAM。不同之處在於，Cisco 6130僅支援每個IDSL卡四個埠。

- 與DSLAM配置匹配的速度和封裝。

IDSL DSLAM只有幾種型別。因此，很容易連線到其他供應商的裝置。

- 只有一個管道速度為64 kbps、128 kbps或144 kbps。

思科不支援通過通道化到兩個租用線路管道中的BRI介面。

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- Cisco 804使用者端裝置(CPE)IOS ®軟體版本12.0(7)T

- Cisco 6400 UAC節點路由處理器(NRP)IOS軟體版本12.0(7)DC

- Cisco 6400 UAC節點交換處理器(NSP)IOS軟體版本12.0(4)DB

- Cisco 6130 DSLAM-NI2 IOS軟體版本12.1(1)DA

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

為遠端使用者配置CPE

本節介紹如何為遠端使用者配置CPE。

本節提供可用於設定本檔案中所述功能的資訊。

注意：若要查詢有關本文檔中使用的命令的其他資訊，請使用命令查詢工具(僅限註冊客戶)。

網路圖表

本檔案會使用以下網路設定：

逐步說明

要為IDSL配置帶BRI介面的路由器，請完成以下步驟：

1. 新增以下命令：

isdn leased-line bri [#] [128|144]

!

interface bri [#]

no shut

!

此時線路會啟動，但線路協定不會啟動（如串列埠）。

不要發出show isdn status命令。它無關緊要，因為沒有D通道。有時，它會顯示第1層處於關閉狀態。

2. 發出show int bri[#]命令，並根據線路協定和線路狀態遵循串列介面的規則。

3. 新增PPP或幀中繼配置。

此示例顯示PPP配置：

isdn leased-line bri 0 128

!

username b-nrp password 0 cisco

!--- b-nrp is the username assigned to the ISDN router !--- to authenticate with the ISP. !--- cisco is the password assigned to the ISDN router !--- to authenticate with the ISP.

!

!

interface BRI0

ip address 7.7.7.2 255.255.255.0

encapsulation ppp

ppp authentication chap

!

這兩個示例顯示了幀中繼配置。確保使用Internet工程任務組(IETF)封裝。

範例 1

!

interface BRI0/0

ip address 10.0.0.1 255.255.255.0

no ip directed-broadcast

encapsulation frame-relay IETF

fair-queue 64 16 0

frame-relay map ip 10.0.0.2 300 broadcast IETF

frame-relay lmi-type ansi

!

範例 2

!

interface BRI0/0

no ip address

no ip directed-broadcast

encapsulation frame-relay IETF

fair-queue 64 16 0

frame-relay lmi-type ansi

!

interface BRI0/0.300 point-to-point

ip address 10.0.0.2 255.255.255.0

no ip directed-broadcast

frame-relay interface-dlci 300 IETF

!

注意：請記住，沒有訊號、撥號程式介面、撥號程式清單、撥號程式字串以及撥號程式對映。這是一條專用線路，類似於專用的T1串列線路。唯一的區別是使用2B1Q調制代替用於資料服務單元/通道服務單元(DSU/CSU)的V.35。

如果PPP未啟動線路協定，請發出以下debug命令：

- debug ppp negotiation

- debug ppp authentication

- debug ppp error

配置Telco NI2 DSLAM

NI2 DSLAM組態假設瞭解DSL和ATM組態，包括使用ATM的PPP(PPPoA)。 IDSL配置比非對稱數字使用者線路(ADSL)或單線數字使用者線路(SDSL)設定更深入。

要在DSLAM中使用IDSL卡，必須使用Cisco IOS軟體版本12.1(2)DA或更高版本。

在DSLAM上，ADSL和SDSL介面在配置中顯示為ATM介面。Cisco的ADSL和SDSL實施使用ATM。但是，IDSL使用HDLC幀來傳輸資料。因此，介面在配置中顯示為IDSL介面。

對於Cisco 6160 DSLAM中的一個IDSL卡，配置類似於以下輸出：

!

interface IDSL3/1

no ip address

no logging event link-status

no arp frame-relay

!

interface IDSL3/2

no ip address

no logging event link-status

no arp frame-relay

!

interface IDSL3/3

no ip address

no logging event link-status

no arp frame-relay

!

interface IDSL3/4

no ip address

no logging event link-status

no arp frame-relay

!

interface IDSL3/5

no ip address

no logging event link-status

no arp frame-relay

!

interface IDSL3/6

no ip address

no logging event link-status

no arp frame-relay

!

interface IDSL3/7

no ip address

no logging event link-status

no arp frame-relay

!

interface IDSL3/8

no ip address

no logging event link-status

no arp frame-relay

!

注意：NI1 DSLAM平台不支援IDSL，並且不計畫提供此支援。

將HDLC幀轉換為ATM信元

每個IDSL介面都有一個偽ATM介面。在硬體上，HDLC幀在NI2 ATM交換矩陣交換之前會轉換為ATM信元。

對於PPP，定義具有目標虛擬路徑識別符號(VPI)和虛擬通道識別符號(VCI)的永久虛擬電路(PVC)。源VCI/VPI不是必需的，因為PPP只有一個連線。

對於幀中繼，請設定16個PVC，它們將轉換為16個資料鏈路連線識別符號(DLCI)。 此配置涉及提供源DLCI編號和目標VPI/VCI對。

DSL配置有兩個主要步驟。對於PPP配置，它們是：

1. 設定IDSL DSL配置檔案。

2. 在IDSL介面下設定PVC/SVC。

此外，請為IDSL鏈路設定服務品質(QoS)，以便正確使用轉到IDSL埠的ATM資源。計算ATM成幀的開銷。下表顯示需要為等效IDSL位元率配置的最大ATM峰值信元速率/可持續信元速率(PCR/SCR)。

已配置IDSL位元率(kbps)

最大ATM PCR/SCR(kbps)

56

71

64

81

128

163

144

183

以下PPP選項可用於IDSL配置檔案：

idsl bitrate [56 | 64 | 128 | 144]

idsl encapsulation [cisco-ppp | llc-ppp | mux-ppp ]

位元率必須與CPE的位元率匹配。封裝指定在聚合器終止的PPPoA封裝型別。

以下語法用於建立連線到IDSL PPP終端的PVC:

ppp pvc interface atm 0/x [VPI] [VCI]

沒有輸入PVC，因為PPP鏈路只有一個連線。ATM 0/x是從DSLAM到聚合器的ATM管道。

要設定QoS引數，請使用此全域性命令。使用PCR/SCR表來檢視pcr和scr10值。

atm connection-traffic-table-row index [row #] vbr-nrt pcr [#] scr10 [#]

若要將這些值應用於IDSL PVC，請將ppp pvc interface atm 0/x [VPI] [VCI]更改為ppp pvc interface atm 0/x [VPI] [VCI] rx-cttr [row #] tx-cttr [row #] 。

使用128 Kbps和llc-ppp封裝到聚合器的PPP IDSL配置如下：

atm connection-traffic-table-row index 128 vbr-nrt

pcr 163 scr10 163

!

dsl-profile idsl1

idsl encapsulation llc-ppp

!--- 128 kbps is the default.

!

!

interface IDSL3/1

dsl profile idsl1

ppp pvc interface ATM0/1 3 300 rx-cttr 128 tx-cttr 128

!

為PPP封裝配置聚合器

如果DSLAM是在IDSL配置檔案下為encapsulation llc-ppp配置的（或者沒有為封裝設定任何內容，因為這是預設設定），則聚合器需要具有以下配置：

!

interface ATM0/0/0.300 point-to-point

no ip directed-broadcast

pvc 3/300

encapsulation aal5snap

protocol ppp Virtual-Template10

!

!

如果為encapsulation cisco-ppp配置了DSLAM，請將配置更改為：

!

interface ATM0/0/0.300 point-to-point

no ip directed-broadcast

pvc 3/300

encapsulation aal5ciscoppp Virtual-Template10

!

!

如果為IDSL encapsulation mux-ppp配置了DSLAM，請確保聚合器上的配置為：

!

interface ATM0/0/0.300 point-to-point

no ip directed-broadcast

pvc 3/300

encapsulation aal5mux ppp Virtual-Template10

!

!

配置幀中繼

對於幀中繼配置，兩個主要步驟與PPP配置中的步驟相同。

1. 設定IDSL DSL配置檔案。

2. 在IDSL介面下設定PVC/SVC。

對於幀中繼鏈路上的QoS，無需進行特殊轉換。在connection-table-row中設定最大速率，使其與CPE上定義的頻寬相匹配。

對於IDSL配置檔案，以下為幀中繼選項：

idsl bitrate [56 | 64 | 128 | 144]

idsl frame-relay ?

bc-default   Default Bc in bytes

lmi-n392dce  LMI error threshold

lmi-n393dce  set LMI monitored event count

lmi-t392dce  set DCE polling verification timer

lmi-type     Use CISCO-ANSI-CCITT type LMI

upc-intent   UPC to use on Soft-VCs/PVCs

要啟用幀中繼封裝，還必須新增idsl encapsulation frame-relay命令。

此語法建立連線到IDSL幀中繼終端的PVC:

frame-relay pvc [DLCI] service translation interface atm0/1 [VPI] [VCI]

還有一個透明引數未在本文檔中討論。translation關鍵字將定義的幀中繼DLCI轉換為定義的ATM PVC。ATM PVC是AAL5SNAP PVC。

要設定QoS引數，請使用以下全域性命令：

frame-relay connection-traffic-table-row index [row #] [CIR] [Burst] [PIR] vbr-rt

通常，CIR=PIR等於鏈路的IDSL配置檔案中定義的頻寬。突發速率通常最大為32,768 bps。

若要將這些值應用於IDSL PVC，請將frame-relay pvc [DLCI]服務轉換介面atm0/1 [VPI] [VCI]更改為frame-relay pvc [DLCI] rx-cttr [Row #] tx-cttr [Row #] service translation interface atm0/1 [VPI] [VCI]。

使用128 Kbps和lmi-type ANSI的幀中繼IDSL配置為：

!

dsl-profile idslframe

idsl encapsulation frame-relay

idsl frame-relay lmi-type ansi

!

frame-relay connection-traffic-table-row index 128 128000 32768

128000 vbr-rt

!

!

interface IDSL2/2

no ip address

dsl profile idslframe

no arp frame-relay

frame-relay pvc 300 rx-cttr 128 tx-cttr 128 service translation

interface  ATM0/1 3 300

!

為幀中繼封裝配置聚合器

對於CPE端的幀中繼封裝，DSLAM將幀中繼PVC轉換為ATM PVC。ATM PVC封裝在AAL5SNAP中。

對於路由幀中繼PVC:

!

interface ATM0/0/0.300 point-to-point

ip address 10.0.0.1 255.255.255.0

pvc 3/300

encapsulation aal5snap

protocol ip (inarp) broadcast

!

!

與插入DSLAM機箱中的其它卡類似，可能需要在NI2配置中手動指定IDSL卡。

DSLAM(config)#slot 2 ituc-1-8IDSL

插入IDSL卡後，發出show oir status命令以顯示下載到卡的代碼的狀態。

DSLAM#show oir status 2

Slot 2: timer stopped delay 100

last heard 30348 ms ago, last sent 30348 ms ago

Slot 2: loading. . .         current offset 0x1CFD1, done at 0xBF858

出現此日誌輸出。

00:04:20: %SLOT-3-MODULE_DETECTED: CLEAR INFO Slot 2 Module was

detected

00:04:45: %SLOT-3-MODULE_MISSING: CLEAR MAJOR Slot 2 Provisioned

slot is empty

00:04:45: %SLOT-3-MODULE_DETECTED: ASSERT INFO Slot 2 Module was

detected

00:04:48: %LINK-3-UPDOWN: Interface IDSL2/1 to IDSL2/8, changed

state to down

DSLAM#show hardware

Chassis Type: C6160

Slot 1 : STUC-4-2B1Q-DIR-1                      Slot 18: EMPTY

Slot 2 : ITUC-1-8IDSL                           Slot 19: EMPTY

Slot 3 : EMPTY                                  Slot 20: EMPTY

Slot 4 : EMPTY                                  Slot 21: EMPTY

Slot 5 : EMPTY                                  Slot 22: EMPTY

Slot 6 : EMPTY                                  Slot 23: EMPTY

Slot 7 : EMPTY                                  Slot 24: EMPTY

Slot 8 : EMPTY                                  Slot 25: EMPTY

Slot 9 : EMPTY                                  Slot 26: EMPTY

Slot 10: NI-2-155SM-DS3                         Slot 27: EMPTY

Slot 11: EMPTY                                  Slot 28: EMPTY

Slot 12: EMPTY                                  Slot 29: EMPTY

Slot 13: EMPTY                                  Slot 30: EMPTY

Slot 14: EMPTY                                  Slot 31: EMPTY

Slot 15: EMPTY                                  Slot 32: EMPTY

Slot 16: EMPTY                                  Slot 33: EMPTY

Slot 17: EMPTY                                  Slot 34: EMPTY

Fan Module:  Present

Power Supply Module 1:  Present   2:  Not Present

排除IDSL PPP連線故障

本節提供的資訊用於對組態進行疑難排解。

指令疑難排解

輸出直譯器工具(僅供註冊客戶使用)支援某些show命令，此工具可讓您檢視show命令輸出的分析。

注意：發出debug指令之前，請參閱有關Debug指令的重要資訊。

- debug ppp negotiation — 監視PPP協商事件。

- debug ppp authentication — 確定客戶端是否通過身份驗證。

- show dsl interface idsl 2/2 — 顯示IDSL和連線統計資訊。

- show atm vc interface — 顯示IDSL介面後面的偽ATM介面。

- show users — 顯示有關活動使用者的資訊。

若要對IDSL PPP連線進行故障排除，請發出debug ppp negotiation和debug ppp authentication命令。對於活動連線，這是show users命令的輸出

Router#show users

Line       User      Host(s)             Idle       Location

*  0 con 0              idle                00:00:00

Interface   User      Mode                Idle Peer Address

BR0/0         b-nrp   Sync PPP        00:00:03 10.0.0.2

在DSLAM上，這些命令顯示IDSL統計資訊和連線統計資訊。

DSLAM#show dsl interface idsl 2/2

Port Status:

Subscriber Name:         Circuit ID:

IOS admin: UP     oper: UP    Card status: ITUC-1-8IDSL

Last Change: 00 days, 00 hrs, 07 min, 13 sec  No. of changes: 1

Loopback: none

Firmware version: 961170635

BERT has not been executed on this interface

Configured:

Profile Name:   default

Alarms Enabled: NO

IDSL profile parameters

Bitrate:             128 kbit/sec

Encapsulation:       llc-ppp

Frame Relay parameters:

UPC intent:       pass

Bc default:       32768 bytes

LMI type:         cisco

lmi-n392dce:      2 events

lmi-n393dce:      2 events

lmi-t392dce:      15 seconds

Performance Statistics:

Physical layer

Coding violations        : 0

Errored seconds          : 0

Severely errored seconds : 0

Physical layer (far end)

Coding violations        : 0

Errored seconds          : 0

Severely errored seconds : 0

HDLC layer

Coding violations        : 0

Aborts                   : 0

Aligns                   : 0

Shorts                   : 5

Longs                    : 0

Discards                 : 42

Alarm Status: NONE

請注意，每個IDSL介面後面都有一個關聯的偽ATM介面。

DSLAM#show atm vc interface atm-p 2/2

Interface     VPI   VCI   Type   X-Interface  X-VPI  X-VCI   Encap

Status

ATM-P2/2      0    37     PVC     ATM0/1        3      300     UP

DSLAM#show atm vc interface atm-p 2/2 0 37

Interface: ATM-P2/2, Type: ATM-PSEUDO

VPI = 0  VCI = 37

Status: UP

Time-since-last-status-change: 00:02:24

Connection-type: PVC

Cast-type: point-to-point

Packet-discard-option: disabled

Usage-Parameter-Control (UPC): pass

Number of OAM-configured connections: 0

OAM-configuration: disabled

OAM-states:  Not-applicable

Cross-connect-interface: ATM0/1, Type: suni_dual

Cross-connect-VPI = 3

Cross-connect-VCI = 300

Cross-connect-UPC: pass

Cross-connect OAM-configuration: disabled

Cross-connect OAM-state:  Not-applicable

Rx cells: 27, Tx cells: 0

Rx connection-traffic-table-index: 128

Rx service-category: VBR-NRT (Non-Realtime Variable Bit Rate)

Rx pcr-clp01: 163

Rx scr-clp01: 163

Rx mcr-clp01: none

Rx      cdvt: none

Rx       mbs: 1024 (from default for interface)

Tx connection-traffic-table-index: 128

Tx service-category: VBR-NRT (Non-Realtime Variable Bit Rate)

Tx pcr-clp01: 163

Tx scr-clp01: 163

Tx mcr-clp01: none

Tx      cdvt: none

Tx       mbs: none

您也可以從另一端（從聚合器到CPE）檢視PVC。

DSLAM#show atm vc interface atm 0/1 3 300

Interface: ATM0/1, Type: suni_dual

VPI = 3  VCI = 300

Status: UP

Time-since-last-status-change: 00:03:20

Connection-type: PVC

Cast-type: point-to-point

Packet-discard-option: disabled

Usage-Parameter-Control (UPC): pass

Number of OAM-configured connections: 0

OAM-configuration: disabled

OAM-states:  Not-applicable

Cross-connect-interface: ATM-P2/2, Type: ATM-PSEUDO

Cross-connect-VPI = 0

Cross-connect-VCI = 37

Cross-connect-UPC: pass

Cross-connect OAM-configuration: disabled

Cross-connect OAM-state:  Not-applicable

Rx cells: 0, Tx cells: 68

Rx connection-traffic-table-index: 128

Rx service-category: VBR-NRT (Non-Realtime Variable Bit Rate)

Rx pcr-clp01: 163

Rx scr-clp01: 163

Rx mcr-clp01: none

Rx      cdvt: none

Rx       mbs: 1024 (from default

for interface)

Tx connection-traffic-table-index: 128

Tx service-category: VBR-NRT (Non-Realtime Variable Bit Rate)

Tx pcr-clp01: 163

Tx scr-clp01: 163

Tx mcr-clp01: none

Tx      cdvt: none

Tx       mbs: none

排除IDSL幀中繼連線故障

本節提供的資訊可用於對組態進行疑難排解。

指令疑難排解

輸出直譯器工具(僅供註冊客戶使用)支援某些show命令，此工具可讓您檢視show命令輸出的分析。

注意：發出debug指令之前，請參閱有關Debug指令的重要資訊。

- show frame lmi — 顯示有關本地管理介面(LMI)的統計資訊。

- debug frame lmi — 確定是否正確傳送和接收LMI資料包。

- show frame-relay pvc — 顯示幀中繼介面的PVC統計資訊。

- show frame map — 顯示當前對映條目和有關連線的資訊。

- show frame-relay interface resource — 顯示QoS引數。

- show interface idsl — 顯示幀中繼統計資訊。

- show atm vc interface — 顯示IDSL介面後面的偽ATM介面。

要排除IDSL BRI埠連線故障，請使用用於排除串列埠故障的相同命令。

Router#show frame lmi

!--- Check for status messages received and Enq. sent.

LMI Statistics for interface BRI0/0 (Frame Relay DTE) LMI TYPE = CISCO

Invalid Unnumbered info 0             Invalid Prot Disc 0

Invalid dummy Call Ref 0              Invalid Msg Type 0

Invalid Status Message 0              Invalid Lock Shift 0

Invalid Information ID 0              Invalid Report IE Len 0

Invalid Report Request 0              Invalid Keep IE Len 0

Num Status Enq. Sent 71               Num Status msgs Rcvd 0

Num Update Status Rcvd 0              Num Status Timeouts 70

超時表示沒有來自NI2交換機的通訊。

若要偵錯，請以與用於序列介面相同的方式發出debug frame lmi命令。您也可以發出show frame-relay pvc和show frame map命令。

Router#show frame lmi

LMI Statistics for interface BRI0/0 (Frame Relay DTE) LMI TYPE = ANSI

Invalid Unnumbered info 0             Invalid Prot Disc 0

Invalid dummy Call Ref 0              Invalid Msg Type 0

Invalid Status Message 0              Invalid Lock Shift 0

Invalid Information ID 0              Invalid Report IE Len 0

Invalid Report Request 0              Invalid Keep IE Len 0

Num Status Enq. Sent 17               Num Status msgs Rcvd 18

Num Update Status Rcvd 0              Num Status Timeouts 0

Router#show frame-relay pvc

PVC Statistics for interface BRI0/0 (Frame Relay DTE)

Active      Inactive      Deleted      Static

Local         1            0             0            0

Switched      0            0             0            0

Unused        0            0             0            0

DLCI = 300, DLCI USAGE = LOCAL, PVC STATUS = ACTIVE, INTERFACE = BRI0/0

input pkts 0             output pkts 0            in bytes 0

out bytes 0              dropped pkts 0           in FECN pkts 0

in BECN pkts 0           out FECN pkts 0          out BECN pkts 0

in DE pkts 0             out DE pkts 0

out bcast pkts 0         out bcast bytes 0

pvc create time 00:02:30, last time pvc status changed 00:02:30

Router#show frame map

BRI0/0 (up): ip 10.0.0.2 dlci 300(0x12C,0x48C0), static,

broadcast,

IETF, status defined, active

在DSLAM端，您還可以發出show frame lmi命令。

DSLAM#show frame-relay lmi interface idsl2/2

LMI Statistics for interface IDSL2/2 (Frame Relay DCE) LMI TYPE = ANSI

Invalid Unnumbered info 0             Invalid Prot Disc 0

Invalid dummy Call Ref 0              Invalid Msg Type 0

Invalid Status Message 0              Invalid Lock Shift 0

Invalid Information ID 0              Invalid Report IE Len 0

Invalid Report Request 0              Invalid Keep IE Len 0

Num Status Enq. Rcvd 2                Num Status msgs Sent 2

Num Update Status Sent 0              Num St Enq. Timeouts 0

若要檢視QoS引數，請發出show frame-relay interface resource命令。

DSLAM#show frame-relay interface resource idSL 2/1

Encapsulation: FRAME-RELAY

Resource Management state:

Available bit rates (in bps):

128000 vbr-nrt RX, 128000 vbr-nrt TX

128000 vbr-rt RX,  128000 vbr-rt TX

128000 ubr RX,

128000 ubr TX

Allocated bit rates (in bps):

0 vbr-nrt RX, 0 vbr-nrt TX

0 vbr-rt RX,  0 vbr-rt TX

0 ubr RX,     0 ubr TX

當介面配置為幀中繼模式時，發出show interface idsl命令以顯示幀中繼統計資訊。

DSLAM#show interface idsl2/2

IDSL2/2 is up, line protocol is up

Hardware is idsl

MTU 1500 bytes, BW 128 Kbit, DLY 0 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation FRAME-RELAY IETF, loopback not set

Keepalive set (10 sec)

LMI enq sent  0, LMI stat recvd 0, LMI upd recvd 0

LMI enq recvd 8, LMI stat sent  8, LMI upd sent  0, DCE LMI up

LMI DLCI 0  LMI type is ANSI Annex D  frame relay DCE

Broadcast queue 0/64, broadcasts sent/dropped 0/0, interface broadcasts 0

Last input 00:00:03, output 00:00:03, output hang never

Last clearing of "show interface" counters 00:01:20

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

8 packets input, 112 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

8 packets output, 117 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

DSLAM#show dsl interface idsl 2/2

Port Status:

Subscriber Name:           Circuit ID:

IOS admin: UP      oper: UP    Card status: ITUC-1-8IDSL

Last Change: 00 days, 00 hrs, 06 min, 09 sec  No. of changes: 64

Loopback: none

Firmware version: 961170635

BERT has not been executed on this interface

Configured:

Profile Name:   idslframe

Alarms Enabled: NO

IDSL profile parameters

Bitrate:            128 kbit/sec

Encapsulation:      frame-relay

Frame Relay parameters:

UPC intent:      pass

Bc default:      32768 bytes

LMI type:        ansi

lmi-n392dce:     2 events

lmi-n393dce:     2 events

lmi-t392dce:     15 seconds

Performance Statistics:

Physical layer

Coding violations        : 0

Errored seconds          : 0

Severely errored seconds : 0

Physical layer (far end)

Coding violations        : 0

Errored seconds          : 0

Severely errored seconds : 0

HDLC layer

Coding violations        : 0

Aborts                   : 0

Aligns                   : 0

Shorts                   : 0

Longs                    : 0

Discards                 : 0

Alarm Status: NONE

DSLAM#show atm vc interface atm-p 2/2

Interface     VPI   VCI   Type   X-Interface  X-VPI X-VCI   Encap

Status

ATM-P2/2      0    37     PVC     ATM0/1        3     300    UP

DSLAM#show atm vc interface atm-p 2/2 0 37

Interface: ATM-P2/2, Type: ATM-PSEUDO

VPI = 0  VCI = 37

Status: UP

Time-since-last-status-change: 00:06:59

Connection-type: PVC

Cast-type: point-to-point

Packet-discard-option: disabled

Usage-Parameter-Control (UPC): pass

Number of OAM-configured connections: 2

OAM-configuration: Ais-on

OAM-states:  OAM-Up

OAM-Loopback-Tx-Interval: 5

Cross-connect-interface: ATM0/1, Type: suni_dual

Cross-connect-VPI = 3

Cross-connect-VCI = 300

Cross-connect-UPC: pass

Cross-connect OAM-configuration: Ais-on

Cross-connect OAM-state:  OAM-Up

OAM-Loopback-Tx-Interval: 5

Rx cells: 0, Tx cells: 0

Rx connection-traffic-table-index: 100

Rx service-category: VBR-NRT (Non-Realtime Variable Bit Rate)

Rx pcr-clp01: 106

Rx scr-clp0 : 106

Rx mcr-clp01: none

Rx      cdvt: none

Rx       mbs: 50

Tx connection-traffic-table-index: 100

Tx service-category: VBR-NRT (Non-Realtime Variable Bit Rate)

Tx pcr-clp01: 106

Tx scr-clp0 : 106

Tx mcr-clp01: none

Tx      cdvt: none

Tx       mbs: 50

問題和錯誤

Cisco 800系列IDSL不支援使用訊框中繼的PPP。

如果您希望將Cisco路由器用於IDSL應用，並且路由器運行早於12.1的Cisco IOS軟體版本，則必須配置ISDN交換機型別。如需詳細資訊，請參閱設定Cisco路由器以用於IDSL。

如果不配置ISDN交換機型別，則在IDSL線路關閉並恢復後，路由器的BRI介面可能不會恢復。若要防止此問題，請在全域組態模式下發出isdn switch-type basic-ni指令。

如果Cisco路由器運行Cisco IOS軟體版本12.1或更高版本，則不會發生此問題。

相關資訊

- Cisco DSL技術支援資訊

- Cisco DSL產品支援資訊

- 技術支援與文件 - Cisco Systems