目錄

簡介

必要條件

需求

採用元件

慣例

設定

網路圖表

組態

驗證

疑難排解

相關資訊

簡介

此示例配置使連線到Cisco 677非對稱數字使用者線路(ADSL)路由器的PC能夠通過Cisco 6130高級數字使用者線路接入複用器(ADSLAM)連線到一個或多個思科通用接入集中器(UAC)。 此配置使用的特定裝置不是必需的。例如，您可以將Cisco 677替換為Cisco 678。

此示例配置在Cisco 677上啟用了ADSL推廣常見的幾項功能。這些功能包括網路位址轉譯(NAT)、連線埠位址轉譯(PAT)和動態主機設定通訊協定(DHCP)。 這些功能允許CookieCutter推廣。由於所有盒子都具有相同的配置，因此大幅降低了推廣和記錄成本。

您可以將基於Cisco IOS®的節點路由處理器(NRP)和節點交換處理器(NSP)的代碼複製並貼上到您的配置中。但是，Cisco 677使用思科寬頻作業系統(CBOS)，您無法複製和貼上此代碼。用於配置Cisco 677的命令也包含在此示例配置中。

必要條件

需求

本文件沒有特定需求。

採用元件

本文中的資訊係根據以下軟體和硬體版本：

硬體

- PC或工作站

- 思科677 ADSL客戶端裝置(CPE)

- 本地電信提供的ADSL服務

- 採用NI-2、DMT-II ATU-C的Cisco 6130 ADSLAM

- Cisco 6400 UAC，帶1 x NRP和1 x NSP

軟體

- 適用於Cisco 6400 UAC NRP的Cisco IOS軟體版本12.0.7-DC

- 適用於Cisco 6400 UAC NSP的Cisco IOS軟體版本12.0.7-DB

- 適用於Cisco 677 ADSL路由器的CBOS版本2.3.0.012

- 適用於Cisco 6130 ADSLAM的Cisco IOS軟體版本12.0.8-DA1

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

設定

本節提供可用於設定本檔案中所述功能的資訊。

注意：要查詢有關本文檔中使用的命令的其他資訊，請參閱命令查詢工具(僅限註冊客戶)。

網路圖表

本檔案會使用以下網路設定：

組態

疑難排解技術筆記

您必須在Cisco 6130上配置允許測試使用者連線的永久虛擬連線(PVC)。在NSP上配置PVP並終止NRP上的PPP會話時，必須在Cisco 6400上記錄虛擬路徑識別符號/虛擬通道識別符號(VPI/VCI)配置。

此示例配置顯示了NSP上的虛擬路徑。此路徑允許Cisco 6400通過ADSLAM的信元到終端路由器或另一個ATM交換機。在這裡，您可以設定PVP以將ATM信元切換到企業網路或ISP，而無需終止位於中心辦公室的Cisco 6400上的PPP會話。

此示例配置允許遠端使用者透明地訪問其公司網路（如果已連線）以獲得電子郵件、共用檔案/列印內容、公司內部網以及訪問Internet進行Web瀏覽等。而不使用公司網際網路連線。

在Cisco 677上配置多個PVC時，可以通過每個PVC路由流量。ADSLAM和UAC-NSP的配置將這些PVC路由/交換到正確的目的地（ISP/ASP或公司，PPP可在此終止）。此配置可減少流量，從而增加公司網路上的可用頻寬，並使用當前ISP帳戶來傳輸Web流量。

本檔案會使用以下設定：

- PC配置

- 思科67x CPE

- 向Cisco 67x CPE發出的命令

- 61xx ADSLAM

- 6400 NSP

- 6400 NRP（插槽1）

- 6400 NRP（插槽2）

PC配置

設定IP編址，使其自動獲取IP地址。設定WINS，以便使用DHCP進行WINS解析。確保未設定預設網關。因為DHCP無法傳遞此資訊，所以可能需要設定域名。

Cisco 67x CPE(show run)

[[ IP Routing = Section Start ]]

IP NAT = enabled

IP Port Address = 00, 172.22.10.254

IP Default Route for Unnumbered Links = 002, 01, 0

IP Static Route Table Entries for Unnumbered Links = 172.22.32.0, 001, 255.255.2

55.0, 1, 0;

[[ CBOS = Section Start ]]

NSOS Maximum Number of VCs = 2

NSOS Root Password = <

root password

>

NSOS Enable Password = <

enable password

>

[[ PPP Device Driver = Section Start ]]

PPP Port User Name = 00, <

username for wan0-0

>

PPP Port User Password = 00, <

password for wan0-0

>

PPP Port User Name = 01, <

username for wan0-1

>

PPP Port User Password = 01, <

password for wan0-1

>

PPP Port Option = 01, IPCP,IP Address,3,Auto,Negotiation Not Required,Negotiable

,IP,0.0.0.0

[[ DHCP = Section Start ]]

DHCP Server = enabled

DHCP Server Pool IP = 00, 172.22.10.0

DHCP Server Pool Gateway = 00, 172.22.10.254

[[ ATM WAN Device Driver = Section Start ]]

ATM WAN Virtual Connection Parms = 00, 1, 32, 0

ATM WAN Virtual Connection Parms = 01, 2, 63, 0

向Cisco 67x CPE發出的命令

cbos#set nat enabled

NAT is now enabled

You must use "write" then reboot for changes to take effect.

cbos#set int wan0 maxvcs 2

You must use "write" and reboot for changes to take effect.

cbos#write

NVRAM written.

cbos#reboot

Hello! Expanding CBOS image...

CBOS v2.3.5.012 - Release Software

User Access Verification

Password:<

root password

>

cbos>en

Password:<

enable password

>

cbos#set ppp wan0-0 login

User name for wan0-0 has been set to router.

cbos#set ppp wan0-0 password

Password for wan0-0 has been set to <password for wan0-0>

cbos#set ppp wan0-1 login

Password for wan0-1 has been set to <username for wan0-1>

cbos#set ppp wan0-1 password

Password for wan0-1 has been set to <password for wan0-1>

cbos#set ppp wan0-0 ipcp 0.0.0.0

PPP wan0-0 IPCP Address set to 0.0.0.0

cbos#set ppp wan0-1 ipcp 0.0.0.0

PPP wan0-1 IPCP Address set to 0.0.0.0

cbos#set int eth0 address 172.22.10.254

eth0 ip address changed from 10.0.0.1 to 172.22.10.254

cbos#set int eth0 netmask 255.255.255.0

eth0 netmask changed from 255.255.255.0 to 255.255.255.0

You must use "write" then reboot for changes to take effect

cbos#set dhcp server enable

DHCP Server enabled

cbos#set dhcp server pool 0 ip 172.22.10.0

Pool 0 IP parameter is now 172.22.10.0

cbos#set dhcp server pool 0 netmask 255.255.255.0

Pool 0 netmask parameter is now 255.255.255.0

Size of pool 0 is automatically changed to max size 252

cbos#set dhcp server pool 0 gateway 172.22.10.254

Pool 0 gateway parameter is now 172.22.10.254

cbos#set password exec

Exec Password Change Successful!

cbos#set password enable

Enable Password Change Successful!

cbos#set route default wan0-1

Default Route set

cbos#set route add ip 172.22.32.0 mask 255.255.255.0 gw wan0-0

Route added

cbos#set int wan0-0 close

Closing connection wan0-0

cbos#set int wan0-1 close

Closing connection wan0-1

cbos#set int wan0-0 vpi 1

Change completed.

cbos#set int wan0-0 vc1 32

Change completed.

cbos#set int wan0-1 vpi 2

Change completed.

cbos#set int wan0-1 vci 63

Change completed.

cbos#set int wan0-0 open

Opening connection wan0-0

cbos#set int wan0-1 open

Opening connection wan0-1

cbos#write

NVRAM written

cbos#reboot

61xx ADSLAM

interface ATM 1/1

no ip address

no ip directed-broadcast

no atm ilmi-keepalive

pvc 1 32 int atm 0/1 40 40

pvc 2 63 int atm 0/1 50 51

6400 NSP（插槽8）

interface ATM 8/0/1

no ip address

no ip directed-broadcast

no atm ilmi-keepalive

atm pvp 40 interface ATM 1/0/0 40

atm pvp 50 interface ATM 2/0/0 50

6400 NRP（插槽1）

aaa new-model

aaa authentication ppp default local

!

!

username <username for wan0-0> password <password for wan0-0>

!

!

interface ATM 0/0/0.200 multipoint

no ip directed-broadcast

pvc 40/40

encapsulation aal5ciscoppp Virtual-Template 2

!

!

interface FastEthernet 0/0/0

ip address 172.22.32.1 255.255.255.0

no ip directed-broadcast

!

!

interface Virtual-Template 2

ip unnumbered FastEthernet 0/0/0

no ip directed-broadcast

peer default ip address pool <pool name A>

ppp authentication pap

!

!

ip local pool <pool name A> 172.22.40.25 172.22.40.50

6400 NRP（插槽2）

aaa new-model

aaa authentication ppp default local

!

!

username <username for wan0-1> password <password for wan0-1>

!

!

interface ATM 0/0/0.300 multipoint

no ip directed-broadcast

pvc 50/51

encapsulation aal5ciscoppp Virtual-Template 21

!

!

interface FastEthernet 0/0/0

ip address 172.16.32.1 255.255.255.0

no ip directed-broadcast

!

!

interface Virtual-Template 21

ip unnumbered FastEthernet 0/0/0

no ip directed-broadcast

peer default ip address pool <pool name B>

ppp authentication pap

!

!

ip local pool <pool name B> 172.16.100.10 172.16.100.25

驗證

本節提供的資訊可用於確認您的組態是否正常運作。

輸出直譯器工具(僅供註冊客戶使用)支援某些show命令，此工具可讓您檢視show命令輸出的分析。

在Cisco 675 CPE上使用以下命令：

- show interface wan0 — 顯示ADSL鏈路經過培訓的加速速度。

- show interface wan0-0 — 顯示wan0-0上的PPP會話資訊。

- show interface wan0-1 — 顯示wan0-1上的PPP會話資訊。

- show dhcp server pool 0 — 顯示客戶端站點的DHCP資訊。

在Cisco 6400 UAC上使用以下命令：

- show atm pvc — 顯示是否已建立正確的PVC。

疑難排解

本節提供的資訊可用於對組態進行疑難排解。

在Cisco 6400 UAC上使用以下命令：

- debug ppp negotiation — 顯示PPP協商調試消息。

- debug ppp authentication — 顯示客戶端是否通過身份驗證。

- debug ppp error — 顯示與PPP連線協商和操作相關的協定錯誤和錯誤統計資訊。

在嘗試任何debug指令之前，請參閱有關Debug指令的重要資訊。

相關資訊

- Cisco DSL技術支援資訊

- 產品支援資訊

- 技術支援 - Cisco Systems