目錄

簡介

必要條件

需求

採用元件

設定

網路圖表

驗證

疑難排解

相關資訊

簡介

本文檔介紹如何使用LACP基於負載的組合識別VMM與ACI整合上的主用 — 主用配置問題。

必要條件

需求

思科建議您瞭解以下主題：

- 連結聚合控制通訊協定(LACP)

- 虛擬機器監視器(VMM)

- 網路介面控制(NIC)

- 以應用程式為中心的基礎架構(ACI)

採用元件

本文件所述內容不限於特定軟體和硬體版本。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路運作中，請確保您瞭解任何指令可能造成的影響。

設定

網路已在兩台伺服器上允許的VM配置上配置了基於主用 — 主用LACP負載的分組NIC，並且已連線到VMM整合上兩個不同枝葉交換機上的ACI。

網路圖表

下一個影象為高級參考，用於說明設計。

vPC 5成員是枝葉1上的介面Eth 1/1和枝葉2上的介面Eth 1/2。

vPC 6成員是枝葉1上的介面Eth 1/3和枝葉2上的介面Eth 1/4。

VM IP:10.10.10.1

虛擬機器MAC:AA.AA.AA.AA.AA.AA

連線：

伺服器1 NIC 1 <->枝葉1 Eth 1/1

伺服器1 NIC 2 <->枝葉2 Eth 1/2

伺服器2 NIC 1 <->枝葉1 Eth 1/3

伺服器2 NIC 2 <->枝葉2 Eth 1/4

驗證

目前沒有適用於此組態的驗證程序。

Cisco CLI Analyzer（僅供已註冊客戶使用）支援某些 show 指令。使用 Cisco CLI Analyzer 檢視 show 指令輸出的分析。

疑難排解

本節提供的資訊用於對組態進行疑難排解。

導航到APIC GUI上的Endpoint Tracker(EP)跟蹤器以跟蹤伺服器的IP，並檢視連線/分離日誌以識別翻動。

步驟 1.登入Cisco APIC GUI

步驟 2.導航到Operations -> EP Tracker

步驟 3.在End Point Search區域中，輸入IP地址

步驟 4.按一下「Search」

識別到交換片後，下一步是在每台枝葉交換機上運行命令。

LEAF1# show endpoint ip 10.10.10.1

Legend:

S - static           s - arp              L - local            O - peer-attached

V - vpc-attached     a - local-aged       p - peer-aged        M - span

B - bounce           H - vtep             R - peer-attached-rl D - bounce-to-proxy

E - shared-service   m - svc-mgr

+-----------------------------------+---------------+-----------------+--------------+-------------+

VLAN/                           Encap           MAC Address       MAC Info/       Interface

Domain                          VLAN            IP Address        IP Info

+-----------------------------------+---------------+-----------------+--------------+-------------+

2                                          vlan-100    aaaa.aaaa.aaaa LV                        po6

common:common-VRF                          vlan-100      10.10.10.1   LV                        po6

LEAF2# show endpoint ip 10.10.10.1

Legend:

S - static           s - arp              L - local            O - peer-attached

V - vpc-attached     a - local-aged       p - peer-aged        M - span

B - bounce           H - vtep             R - peer-attached-rl D - bounce-to-proxy

E - shared-service   m - svc-mgr

+-----------------------------------+---------------+-----------------+--------------+-------------+

VLAN/                           Encap           MAC Address       MAC Info/       Interface

Domain                          VLAN            IP Address        IP Info

+-----------------------------------+---------------+-----------------+--------------+-------------+

1                                          vlan-100    aaaa.aaaa.aaaa LV                        po6

common:common-VRF                          vlan-100      10.10.10.1   LV                        po6

LEAF1# show port-channel summary

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

b - BFD Session Wait

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

5     Po5(SU)     Eth      LACP      Eth1/1(P)

6     Po6(SU)     Eth      LACP      Eth1/3(P)

LEAF2# show port-channel summary

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

b - BFD Session Wait

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

5     Po5(SU)     Eth      LACP      Eth1/2(P)

6     Po6(SU)     Eth      LACP      Eth1/4(P)

LEAF1# show system internal epm endpoint ip 10.10.10.1

MAC : aaaa.aaaa.aaaa ::: Num IPs : 1

IP# 0 : 10.10.10.1 ::: IP# 0 flags :

Output omitted

...

Interface : port-channel6                          <<<<<<<<<<<<<<<< learned on this interface

Output omitted

...

EP Flags : local|vPC|IP|MAC|sclass|timer|mac-ckt|

::::

LEAF1# show system internal epm endpoint mac aaaa.aaaa.aaaa

MAC : aaaa.aaaa.aaaa ::: Num IPs : 1

IP# 0 : 10.10.10.1 ::: IP# 0 flags :  ::: l3-sw-hit: No

Output omitted

...

Interface : port-channel6                         <<<<<<<<<<<<<<<< learned on this interface

Output omitted

...

EP Flags : local|vPC|IP|MAC|sclass|timer|mac-ckt|

::::

LEAF2# show system internal epm endpoint ip 10.10.10.1

MAC : aaaa.aaaa.aaaa ::: Num IPs : 1

IP# 0 : 10.10.10.1 ::: IP# 0 flags :  ::: l3-sw-hit: No

Output omitted

...

Interface : port-channel5                         <<<<<<<<<<<<<<<< learned on this interface

Output omitted

...

EP Flags : local|vPC|IP|MAC|sclass|timer|mac-ckt|

::::

LEAF2# show system internal epm endpoint mac aaaa.aaaa.aaaa

MAC : aaaa.aaaa.aaaa ::: Num IPs : 1

IP# 0 : 10.10.10.1 ::: IP# 0 flags :  ::: l3-sw-hit: No

Output omitted

...

Interface : port-channel6                         <<<<<<<<<<<<<<<< learned on this interface

Output omitted

...

EP Flags : local|vPC|IP|MAC|sclass|timer|mac-ckt|

::::

從上述輸出中，您可以確定ACI由於VMware上的主用 — 主用配置而同時在兩個埠通道上接收相同的資訊。

所有VM將每對上行鏈路用作邏輯上的一條上行鏈路，並且拓撲配置有兩對不同的埠通道，每對使用相同資訊到達ACI。

註意：思科不建議採用這種部署，因為這種型別的配置的工作方式與MAC固定類似，並且每30秒根據鏈路利用率（根據節點或埠之間的MAC/IP擺動派生）重新固定一次。

如果需要類似的拓撲，建議使用鏈路聚合組(LAG)，如LACP或靜態埠通道。

Cisco CLI Analyzer（僅供已註冊客戶使用）支援某些 show 指令。使用 Cisco CLI Analyzer 檢視 show 指令輸出的分析。

使用 debug 指令之前，請先參閱有關 Debug 指令的重要資訊。

相關資訊

- 技術支援與文件 - Cisco Systems