目錄

簡介

開始之前

慣例

必要條件

採用元件

背景理論

設定

網路圖表

組態

驗證

Catalyst 1900

Catalyst 6000

疑難排解

疑難排解程序

相關資訊

簡介

本檔案將提供執行CatOS映像的Catalyst 1900和Catalyst 6500交換器之間的InterSwitch主幹（ISL主幹）的範例組態。此組態與其他CatOS交換器（例如Catalyst 5500系列交換器）類似。配置的相關命令以及幫助確定ISL中繼是否正常運行的show命令都會突出顯示。

開始之前

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

必要條件

嘗試此配置之前，請確保滿足以下先決條件：

- 瞭解VLAN概念

- 瞭解VLAN中繼線通訊協定(VTP)概念

採用元件

本檔案中的資訊是根據以下軟體版本。

- Catalyst 1924-EN與軟體版本(Enterprise)V9.00.05

- 執行CatOS且軟體版本為7.3(2)的Catalyst 6509

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您在即時網路中工作，請確保在使用任何命令之前瞭解其潛在影響。

背景理論

Catalyst 1900運行兩個版本的映像，即標準版和企業版。只有企業映像支援中繼，並且它僅支援ISL封裝，不支援802.1q。這限制了Catalyst 1900與可支援ISL中繼的其他Catalyst交換機形成中繼的能力。此外，只能在Catalyst 1900上的兩個100 Mbps上行鏈路埠上配置中繼。這是交換器上通常標籤為Ax和Bx的最後兩個連線埠。您可以在Catalyst 1900企業版映像上最多配置1005個VLAN。命令列介面(CLI)(類似於Cisco IOS® CLI)僅可用於Catalyst 1900的企業映像。

注意：帶有Supervisor I和II的Catalyst 4000系列交換機以及Catalyst 2950系列交換機不支援ISL中繼，因此無法連線到Catalyst 1900。Catalyst 5500交換機在某些模組上支援ISL。發出show port capabilities <mod/port>命令，以確定特定模組或埠是否支援ISL中繼。

設定

本節提供用於設定本文件中所述功能的資訊。

可以通過兩種方式完成中繼配置：通過選單或CLI。以下示例列出通過CLI模式的配置命令：

Catalyst 1900 Management Console

Copyright (c) Cisco Systems, Inc. 1993-1999

All rights reserved.

Enterprise Edition Software

Ethernet Address: 00-E0-1E-87-36-C0

PCA Number: 73-2239-01

PCA Serial Number: 6510304

Model Number: WS-C1924-EN

System Serial Number: FAA0135Y00N

-------------------------------------------------

1 user(s) now active on Management Console.

User Interface Menu

[M] Menus

[K] Command Line

Enter Selection: K

CLI session with the switch is open.

To end the CLI session, enter [Exit].

Cat1924-EN>

網路圖表

本文檔使用下圖所示的網路設定。

組態

此配置的基本步驟如下：

1. 配置VTP域名和模式(例如，一台交換機至少應該在VTP伺服器中運行，另一台交換機應該在VTP客戶端模式下運行)。 對於本文檔，將VTP域名設定為「DOC」。

2. 配置中繼埠（轉至介面配置並定義中繼引數）。

3. 在充當VTP伺服器的交換機上定義適當的VLAN。

4. 發出相應的show命令以驗證中繼操作。

域中必須至少有一個VTP伺服器。VTP伺服器可以在Catalyst 6000或Catalyst 1900交換機上配置。在本示例中，Catalyst 6000配置為VTP伺服器，Catalyst 1900配置為VTP客戶端。這是因為Catalyst 6500比Catalyst 1900更強大，因此能夠更好地處理伺服器功能。

本文檔使用如下所示的配置：

- Catalyst 6000

- Catalyst 1924-EN

Catalyst 6000

Cat6000 (enable) show config

This command shows non-default configurations only.

Use 'show config all' to show both default and non-default configurations.

...............

..

begin

!

# ***** NON-DEFAULT CONFIGURATION *****

!

!

#time: Mon Nov 25 2002, 02:53:50

!

#version 7.3(2)

!

set prompt Cat6000

!

#!

#vtp

set vtp domain DOC

set vlan 1 name default type ethernet mtu 1500 said 100001 state active

set vlan 1002 name fddi-default type fddi mtu 1500 said 101002 state active

set vlan 1004 name fddinet-default type fddinet mtu 1500 said 101004 state active

stp ieee

set vlan 1005 name trnet-default type trbrf mtu 1500 said 101005 state active stp

ibm

set vlan 2

set vlan 1003 name token-ring-default type trcrf mtu 1500 said 101003 state active

mode srb aremaxhop 7 stemaxhop 7 backupcrf off

!

!--- Output suppressed.

#module 6 : 48-port 10/100BaseTX Ethernet

set trunk 6/1  desirable isl 1-1005,1025-4094

!--- Output suppressed.

end

註：中繼模式可以是802.1q或ISL。ISL模式用於Catalyst 6000的中繼埠，因為Catalyst 1900僅支援ISL。

Catalyst 1924-EN

Cat1924-EN#configure terminal

!--- Setup the VTP domain name. Note that this is

!--- case sensitive and it must be identical with the domain

!--- name configured on the VTP server (Catalyst 6000).

Cat1924-EN(config)#vtp domain DOC

!--- To change the VTP mode to client. There are three VTP modes supported:

!--- server, transparent, and client.

Cat1924-EN(config)#vtp client

!--- Set the interface up as a trunk port (this is interface Bx).

Cat1924-EN(config)#int fast0/27

Cat1924-EN(config-if)#trunk desirable

Cat1924-EN#show run

Building configuration...

Current configuration:

!

vtp domain "DOC"

!

vtp client

!

vlan 2 name "VLAN0002" sde 100002 state Operational mtu 1500

!

!

hostname "Cat1924-EN"

!

interface Ethernet 0/27

trunk Desirable

line console

end

驗證

本節提供的資訊可用於確認您的組態是否正常運作。

Cisco CLI Analyzer 支援某些 show 指令（僅限註冊客戶） ，它允許您查看 show 指令輸出的分析。

Catalyst 1900

- show vtp — 此命令用於檢驗VTP設定，如下面的輸出所示。

Cat1924-EN#show vtp

VTP version: 1

Configuration revision: 0

Maximum VLANs supported locally: 1005

Number of existing VLANs: 5

VTP domain name : DOC

VTP password :

VTP operating mode : Client

VTP pruning mode : Disabled

VTP traps generation : Enabled

Configuration last modified by: 0.0.0.0 at 11-24-2002 19:41:22

- show vtp statistics — 此命令檢查VTP通告，如下面的輸出所示。

Cat1924-EN#show vtp statistics

Receive Statistics Transmit Statistics

----------------------------------- -----------------------------------

Summary Adverts 4 Summary Adverts 1

Subset Adverts 3 Subset Adverts 0

Advert Requests 0 Advert Requests 3

Configuration Errors:

Revision Errors 0  !non zero values indicates non-propagation of vlan changes (ie add/delete)

Digest Errors 0    !non zero values indicates mismatch in vtp password

VTP Pruning Statistics:

Port Join Received Join Transmitted Summary Adverts received

with no pruning support

---- ------------- ---------------- ------------------------

A 0 0 0

B 0 0 0

Cat1924-EN#

Catalyst 6000

- show trunk 6/1 — 此命令驗證中繼配置，如輸出所示：

Cat6000 (enable) show trunk 6/1

* - indicates vtp domain mismatch

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

6/1       desirable    isl            trunking      1

Port      Vlans allowed on trunk

--------  ---------------------------------------------------------------------

6/1       1-1005,1025-4094

Port      Vlans allowed and active in management domain

--------  ---------------------------------------------------------------------

6/1       1-3

Port      Vlans in spanning tree forwarding state and not pruned

--------  ---------------------------------------------------------------------

6/1       1-3

- show vtp domain — 此命令用於檢驗VTP配置，如輸出所示：

Cat6000 (enable) show vtp domain

Domain Name                      Domain Index VTP Version Local Mode  Password

-------------------------------- ------------ ----------- ----------- ----------

DOC                              1            2           server      -

Vlan-count Max-vlan-storage Config Revision Notifications

---------- ---------------- --------------- -------------

8          1023             2               disabled

Last Updater    V2 Mode  Pruning  PruneEligible on Vlans

--------------- -------- -------- -------------------------

192.168.1.2     disabled disabled 2-1000

- show vtp statistics - 此命令用於檢驗VTP統計資訊，如輸出所示：

Cat6000 (enable) show vtp statistics

VTP statistics:

summary advts received 1

subset advts received 0

request advts received 1

summary advts transmitted 89

subset advts transmitted 5

request advts transmitted 0

No of config revision errors 0

No of config digest errors 0

VTP pruning statistics:

Trunk    Join Transmitted Join Received Summary advts received from GVRP PDU

non-pruning-capable device  Received

-------- ---------------- ------------- --------------------------- ----------

15/1     0                0             0                           0

疑難排解

本節提供的資訊可用於對組態進行疑難排解。

疑難排解程序

以下是與此組態相關的疑難排解資訊。完成這些步驟，對交換機之間的中繼進行故障排除。

1. VTP域名必須相同（VTP域名區分大小寫）。

2. VTP口令必須相同。

3. 在VTP域中，必須至少有一台交換機配置為VTP伺服器。

4. VTP域中可以有多個VTP客戶端。

注意：如果發出show vtp domain命令，則可驗證步驟1和步驟2。如果任何步驟的結果都不匹配，則VTP中繼不起作用。

相關資訊

- InterSwitch連結訊框格式

- 交換器產品支援

- LAN 交換技術支援

- 技術支援與文件 - Cisco Systems