目錄

簡介

必要條件

需求

採用元件

慣例

重要附註

設定

網路圖表

組態

驗證

show命令

show命令輸出示例

疑難排解

相關資訊

簡介

此組態範例示範如何在執行Cisco IOS®系統軟體的Cisco路由器和Cisco Catalyst 6500交換器之間設定第3層(L3)EtherChannel，不含VLAN中繼。EtherChannel可稱為快速EtherChannel(FEC)或Gigabit EtherChannel(GEC);該術語取決於用於形成EtherChannel的介面或埠的速度。在本示例中，來自Cisco路由器和Catalyst 6500交換機的兩個快速乙太網埠已捆綁到FEC中。在本文檔中，術語FEC、GEC、埠通道、通道和埠組都引用EtherChannel。

本文僅包含交換機和路由器的配置檔案，以及相關show命令樣例的輸出。

必要條件

需求

嘗試此組態之前，請確保符合以下要求：

- 執行Cisco IOS軟體的Catalyst 6500/6000和4500/4000系列交換器：

- 執行Cisco IOS軟體的Catalyst 6500/6000和4500/4000系列交換器支援第2層(L2)和第3層EtherChannel，且任何模組上最多具有八個相容設定的乙太網路介面。每個EtherChannel中的所有介面都必須具有相同的速度。所有介面必須配置為L2或L3介面。

- EtherChannel負載平衡可以使用MAC地址、IP地址或TCP埠號。

注意：所選模式適用於交換機上配置的所有EtherChannel。

- Catalyst 6500/6000 Cisco IOS軟體版本12.1E或更高版本和Catalyst 4500/4000 Cisco IOS軟體版本12.1(8a)EW或更高版本。

- 思科路由器：

- IP流量分佈通過埠通道介面，而來自其他路由協定的流量則通過單個鏈路傳送。橋接流量根據資料包中的L3資訊分佈。如果資料包中不存在L3資訊，則流量會通過第一個鏈路傳送。

- 許多Cisco路由器都支援EtherChannel。要查詢在Cisco路由器上支援EtherChannel的平台或代碼版本，請使用Cisco Feature Navigator II (僅限註冊客戶)。支援EtherChannel的路由器和Cisco IOS軟體版本的清單可在FEC功能下找到。

如需其他Cisco產品上EtherChannel的硬體和軟體要求，請參閱在Catalyst交換器上實作EtherChannel的系統要求。

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- 執行Cisco IOS軟體版本12.1(8b)E10的Catalyst 6500交換器

- 執行Cisco IOS軟體版本12.1(21)的Cisco 7500路由器

本檔案中的交換器組態適用於執行Cisco IOS軟體的任何Catalyst 6500/6000和任何Catalyst 4500/4000系列交換器。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

注意：使用write erase命令清除所有裝置上的配置，以確保它們具有預設配置。發出write erase指令以清除所有非預設組態後，請務必重新載入裝置。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

重要附註

如果最初在物理介面下發出channel-group命令，它將自動建立port-channel介面。如果在通道化物理介面之前配置了埠通道介面，請先刪除埠通道介面。這隻適用於Catalyst交換器。7500路由器上的配置更改順序。在物理介面下配置通道組之前，必須配置埠通道介面。

Catalyst 6500/6000和4500/4000 Cisco IOS軟體中的連線埠通道組態順序非常重要。在實體介面中發出channel-group命令之前，最好先發出任何switchport命令。

在實體介面（介面Gigabit Ethernet 1/1）上發出switchport命令之前的channel-group命令時，會自動建立連線埠通道介面，並會成為第3層介面。如果隨後在物理介面下發出switchport命令，則物理介面將成為L2介面。此外，之前建立的埠通道介面沒有與其關聯的物理介面。請注意，物理介面下沒有channel-group命令。在這種情況下，您首先必須在新配置的埠通道介面下發出switchport命令。然後，實體連線埠再次接受channel-group命令。在這種情況下，連線埠通道已從L3介面變更為L2介面。

相反，如果首先在物理介面上發出switchport命令，然後新增channel-group命令，請考慮此情況。在這種情況下，埠通道介面會自動建立並繼承所有已配置的switchport命令。

在執行Cisco IOS軟體的Catalyst 6500/6000交換器上，預設所有連線埠都是L3連線埠。在執行Cisco IOS軟體的Catalyst 4500/4000交換器上，預設所有連線埠都是L2連線埠。

設定

本節提供用於設定本文件中所述功能的資訊。

註：使用Command Lookup Tool(僅限註冊客戶)查詢有關本文檔中使用的命令的更多資訊。

網路圖表

本檔案會使用以下網路設定：

組態

本檔案會使用以下設定：

- Catalyst 6500交換器（無VLAN中繼）

- Cisco 7500路由器（無VLAN中繼）

注意：評論和解釋以藍色斜體顯示。

Catalyst 6500交換器（無VLAN中繼）

Building configuration...

Current configuration : 5869 bytes

!

version 12.1

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname cat6500

!

boot buffersize 126968

boot system flash slot0:c6sup11-jsv-mz.121-8b.E15.bin

boot bootldr bootflash:c6msfc-boot-mz.121-8b.E15

enable password ww

!

redundancy

main-cpu

auto-sync standard

ip subnet-zero

!

!

no ip finger

!

!

!

!

!--- In this example, you configure L3 EtherChannel. !--- For more details, refer to this document: !--- Configuring EtherChannels. !--- A logical port-channel interface is automatically created  !--- when ports are grouped into a channel group.

interface Port-channel 1

ip address 11.1.1.2 255.255.255.0

duplex full

speed 100

!--- If you specify the speed and duplex setting at the port channel !--- level, these settings pass down to the physical ports. !--- In other words, the physical ports inherit the same speed !--- and duplex settings as the port-channel interface.

hold-queue 300 in

!

interface GigabitEthernet1/1

no ip address

shutdown

!

interface GigabitEthernet1/2

no ip address

shutdown

!

interface FastEthernet3/1

no ip address

duplex full

speed 100

!--- Port is a member of channel group 1. Routers do not support !--- EtherChannel negotiation (Port Aggregation Protocol [PAgP]), so PAgP !--- needs to be disabled. On a Catalyst 4500/4000 switch, all ports are !--- L2 ports by default. Convert this port from a physical L2 port to !--- a physical L3 port with the no switchport command.

channel-group 1 mode on

interface FastEthernet3/2

no ip address

duplex full

speed 100

!--- Port is a member of channel group 1. Routers do not support !--- EtherChannel negotiation (PAgP), so PAgP needs to be disabled. !--- On a Catalyst 4500/4000 switch, all ports are L2 ports by default. !--- Convert this port from a physical L2 port to a physical L3 port !--- with the no switchport command.

channel-group 1 mode on

interface FastEthernet3/3

no ip address

switchport

switchport mode access

!

!--- Output suppressed.

!

ip classless

no ip http server

!

!

!

line con 0

transport input none

line vty 0 4

!

end

Cisco 7500路由器（無VLAN中繼）

!--- Output suppressed.

!

interface Port-channel1

ip address 11.1.1.1 255.255.255.0

full-duplex

hold-queue 300 in

!

interface FastEthernet0/0

no ip address

full-duplex

speed 100

channel-group 1

!

interface FastEthernet0/1

no ip address

full-duplex

speed 100

channel-group 1

!--- Output suppressed.

驗證

本節提供的資訊可用於確認您的組態是否正常運作。

show命令

Output Interpreter Tool (僅供註冊客戶使用)支援某些show命令，這允許您檢視show命令輸出的分析。

- show etherchannel channel-id port-channel — 檢查Cisco IOS交換機中的埠通道。

- show interfaces port-channel channel-id — 檢查Cisco IOS路由器中的埠通道。

show命令輸出示例

Catalyst 6500/6000交換器

- show etherchannel channel-id port-channel

Router#show etherchannel 1 port-channel

Port-channels in the group:

----------------------

Port-channel: Po1

------------

Age of the Port-channel = 01h:56m:20s

Logical slot/port = 10/1 Number of ports in agport = 2

GC = 0x00010001 HotStandBy port = null

Passive port list = Fa3/1 Fa3/2

Port state = Port-channel L3-Ag Ag-Inuse

Ports in the Port-channel:

Index Load Port

-------------------

0 55 Fa3/1

1 AA Fa3/2

Time since last port bundled: 01h:55m:44s Fa3/2

Router#

思科7500路由器

- show interfaces port-channel channel-id

Router#show interfaces port-channel 1

Port-channel1 is up, line protocol is up

Hardware is FastEtherChannel, address is 00e0.1476.7600 (bia 0000.0000.0000)

Internet address is 11.1.1.1/24

MTU 1500 bytes, BW 400000 Kbit, DLY 100 usec, rely 255/255, load 62/255

Encapsulation ARPA, loopback not set, keepalive set (10 sec), hdx

ARP type: ARPA, ARP Timeout 04:00:00

No. of members in this fechannel: 2

Member 0 : FastEthernet0/0

Member 1 : FastEthernet0/1

Last input never, output never, output hang never

Last clearing of "show interface" counters 10:51:55

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/300, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 98281000 bits/sec, 8762 packets/sec

4545 packets input, 539950 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

0 watchdog, 0 multicast

0 input packets with dribble condition detected

342251216 packets output, 3093422680 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

疑難排解

目前尚無適用於此組態的具體疑難排解資訊。

相關資訊

- 在執行CatOS系統軟體的Catalyst 4500/4000、5500/5000和6500/6000交換器之間設定EtherChannel

- 在Catalyst交換機上實施EtherChannel的系統要求

- Cisco Catalyst 4000系列交換器設定指南

- 配置EtherChannel

- 在執行Cisco IOS軟體的XL/2950系列交換器和Catalyst 4500/4000和6500/6000交換器之間設定第2層EtherChannel和主幹

- 執行Cisco IOS系統軟體設定的Catalyst 3550/3750系列交換器和Catalyst交換器之間的EtherChannel範例

- 示例配置：執行CatOS和Cisco IOS的Catalyst交換器之間的EtherChannel

- LAN 產品支援

- LAN 交換技術支援

- 工具與資源

- 技術支援 - Cisco Systems