目錄

簡介

必要條件

需求

採用元件

慣例

背景資訊

設定

網路圖表

組態

驗證

show命令輸出示例

Catalyst 2900XL/3500XL交換器

Catalyst 6506交換器

疑難排解

相關資訊

簡介

此範例組態會在執行Catalyst OS(CatOS)的Cisco Catalyst 6500和Catalyst 3500XL交換器之間設定EtherChannel。EtherChannel可稱為快速EtherChannel(FEC)或Gigabit EtherChannel(GEC)。 名稱取決於用來形成EtherChannel的介面或埠的速度。在此案例中，您可以使用任何這些交換器來取得相同的結果：

- 執行CatOS的任何Catalyst 4500/4000、5500/5000或6500/6000系列交換器

- 任何Catalyst第2層(L2)固定設定2900XL或3500XL系列交換器

在本文檔中，將每台交換機的兩個快速乙太網埠捆綁到FEC中。在本檔案中，術語「FEC」、「GEC」、「埠通道」、「通道」和「埠組」均指的是EtherChannel。

必要條件

需求

嘗試此組態之前，請確保符合以下要求：

- 熟悉在Catalyst 2900XL或3500XL交換機上配置EtherChannel要使用的命令

如需命令的詳細資訊，請參閱Catalyst 2900 XL和Catalyst 3500 XL軟體組態設定指南12.0(5)WC5、12.0(5)WC6檔案的設定交換器連線埠一節。

- 熟悉在運行CatOS的交換機上配置EtherChannel要使用的命令

如需命令的詳細資訊，請參閱Catalyst 6500系列軟體組態設定指南8.7檔案的設定EtherChannel一節。

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- 執行Cisco IOS®軟體版本12.0(5)WC9的Catalyst 3500XL交換器（型號WS-C3524-PWR-XL-EN）

- 執行CatOS軟體版本8.2.1的Catalyst 6500交換器（搭載Supervisor引擎II的型號6506）

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

背景資訊

您必須手動建立EtherChannel，因為Catalyst 2900XL/3500XL交換器不支援連線埠聚合通訊協定(PAgP);CatOS交換機支援PAgP。PAgP有助於自動建立FEC和GEC。有關PAgP的詳細資訊，請參閱Catalyst 6500系列軟體配置指南8.7文檔的配置EtherChannel部分。

按以下步驟順序建立埠通道：

注意：按此順序執行步驟時，可避免在配置過程中可能發生的生成樹協定(STP)問題。如果在將CatOS交換器設定為通道之前，將XL交換器設定為通道，則STP可以關閉Catalyst 6500交換器上處於錯誤停用狀態的連線埠。

1. 在CatOS交換器上發出set port disable module/port 命令。

命令將埠設定為禁用模式，用於埠通道化。

2. 在XL交換機上建立埠通道（埠組）。

3. 在CatOS交換機上建立埠通道。

注意：請確保將通道模式設定為「開啟」。 此設定是必需的，用於禁用埠上的PAgP並強制埠形成通道。

4. 在CatOS交換器上發出set port enable module/port 命令。

此命令會重新啟用先前已禁用的連線埠。

設定

本節提供用於設定本文件中所述功能的資訊。

註：使用Command Lookup Tool (僅限註冊客戶)查詢有關本文檔中使用的命令的更多資訊。

網路圖表

本檔案會使用以下網路設定：

組態

本檔案會使用以下設定：

- Catalyst 3524XL

- Catalyst 6506

Catalyst 3524XL

Current configuration:

!

version 12.0

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname cat3500

!

enable password mysecret

!--- This is the privileged mode password for the example.

!

!

!

!

!

ip subnet-zero

!

!

!

interface FastEthernet0/1

port group 1

!--- The port group

command !--- makes this interface a member of channel group 1.

!

interface FastEthernet0/2

port group 1

!--- This interface is also a member of channel group 1.

!

interface VLAN1

ip address 10.10.10.2 255.255.255.0

!--- This is the IP address for management.

no ip directed-broadcast

no ip route-cache

!

!

line con 0

transport input none

stopbits 1

line vty 0 4

password mysecret

!--- This is the Telnet password for the example.

login

line vty 5 15

login

!

end

cat3500#

Catalyst 6506

begin

!

# ***** NON-DEFAULT CONFIGURATION *****

!

!

#time: Sun Feb 1 2004, 14:03:48

!

#version 8.2(1)

!

!--- Output suppressed.

!

#ip

set interface sc0 1 10.10.10.3/255.255.255.0 10.10.10.255

!--- This is the IP address for management.

!

!--- Output suppressed.

!

#port channel

set port channel 2/1-2 15

!--- The set port channel

command !--- creates an EtherChannel on switches that run CatOS. !--- The admin group (15, in this case) is not configured, !--- but is a number that the system assigns randomly.

# default port status is enable

!

!

#module 1 : 2-port 1000BaseX Supervisor

!

#module 2 : 48-port 10/100BaseTX Ethernet

set port channel 2/1-2 mode on

!--- The set port channel

mode on

command disables PAgP. !--- The disablement forces the ports to form a channel with the XL switch !--- that does not support PAgP.

!

#module 3 empty

!

#module 4 empty

!

#module 5 empty

!

#module 6 empty

!

#module 15 : 1-port Multilayer Switch Feature Card

!

#module 16 empty

end

cat6506> (enable)

驗證

使用本節內容，確認您的組態是否正常運作。

輸出直譯器工具 (僅供已註冊客戶使用)(OIT)支援某些show命令。使用OIT檢視show命令輸出的分析。

- 檢查Catalyst 2900XL/3500XL交換器中的連線埠通道：

- show port group

- show port group group-number

- 檢查Catalyst 2900XL/3500XL交換器中的跨距樹狀目錄狀態：

- show spanning-tree

- 檢查CatOS交換器中的連線埠通道：

- show port capabilities module

- show port channel

- show port channel module/port

- show port channel info

- 檢查CatOS交換器中的跨距樹狀目錄狀態：

- show spantree

- show spantree vlan

- show spantree module/port

show命令輸出示例

Catalyst 2900XL/3500XL交換器

- show port group

cat3500# show port group

Group       Interface           Transmit Distribution

-----   ---------------------   ---------------------

1       FastEthernet0/1         source address

1       FastEthernet0/2         source address

cat3500#

- show spanning-tree

cat3500# show spanning-tree

Spanning tree 1 is executing the IEEE compatible Spanning Tree protocol

Bridge Identifier has priority 32768, address 00d0.5868.f180

Configured hello time 2, max age 20, forward delay 15

Current root has priority 32768, address 00d0.020e.2c00

Root port is 1, cost of root path is 12

Topology change flag not set, detected flag not set, changes 10

Times:  hold 1, topology change 35, notification 2

hello 2, max age 20, forward delay 15

Timers: hello 0, topology change 0, notification 0

Interface Fa0/1 (port 1) in Spanning tree 1 is FORWARDING

Port path cost 12, Port priority 128

Designated root has priority 32768, address 00d0.020e.2c00

Designated bridge has priority 32768, address 00d0.020e.2c00

Designated port is 33, path cost 0

Timers: message age 2, forward delay 0, hold 0

BPDU: sent 4, received 633

Interface Fa0/3 (port 15) in Spanning tree 1 is down

Port path cost 100, Port priority 128

Designated root has priority 32768, address 00d0.020e.2c00

Designated bridge has priority 32768, address 00d0.5868.f180

!--- Output suppressed.

注意：此輸出不顯示介面Fa0/2，因為該介面與埠通道中的Fa0/1捆綁在一起。請參見輸出中的（埠1）。

Catalyst 6506交換器

- show port capabilities module — 使用此命令檢查模組是否支援EtherChannel。

cat6506> (enable) show port capabilities 2

Model                    WS-X6348-RJ-45

Port                     2/1

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1Q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  yes

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off)

Security                 yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(1q4t),tx-(2q2t)

CoS rewrite              yes

ToS rewrite              DSCP

UDLD                     yes

Inline power             auto,off

AuxiliaryVlan            1..1000,1025..4094,untagged,dot1p,none

SPAN                     source,destination

COPS port group          2/1-48

Link debounce timer      yes

Dot1q-all-tagged         yes

--------------------------------------------------------------

Model                    WS-X6348-RJ-45

Port                     2/2

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1Q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  yes

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off)

Security                 yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(1q4t),TX(2q2t)

COs rewrite              yes

ToS rewrite              DSCP

UDLD                     yes

Inline power             auto,off

AuxiliaryVlan            1..1000,1025..4094,untagged,dot1p,none

SPAN                     source,destination

COPS port group          2/1-48

Link debounce timer      yes

Dot1q-all-tagged         yes

--------------------------------------------------------------

!--- Output suppressed.

- show port channel

cat6506> (enable) show port channel

Port  Status     Channel              Admin Ch

Mode                 Group Id

----- ---------- -------------------- ----- -----

2/1  connected  on                      15  1762

2/2  connected  on                      15  1762

Port  Device-ID                       Port-ID                   Platform

----- ------------------------------- ------------------------- ----------------

2/1  cat3500                         FastEthernet0/1           cisco WS-C3524-PWR-XL

2/2  cat3500                         FastEthernet0/2           cisco WS-C3524-PWR-XL

cat6506> (enable)

- show port channel info

cat6506> (enable) show port channel info

Switch Frame Distribution Method: ip both

Port  Status     Channel              Admin Channel Speed Duplex Vlan

mode                 group id

----- ---------- -------------------- ----- ------- ----- ------ ----

2/1  connected  on                      15    1762 a-100 a-full    1

2/2  connected  on                      15    1762 a-100 a-full    1

Port  Channel Oper-group Neighbor   Oper-Distribution PortSecurity/

ifIndex            Oper-group Method            Dynamic port

----- ------- ---------- ---------- ----------------- -------------

2/1  67             241            ip both

2/2  67             241            ip both

Port  Device-ID                       Port-ID                   Platform

----- ------------------------------- ------------------------- ----------------

2/1  cat3500                         FastEthernet0/1           cisco WS-C3524-PWR-XL

2/2  cat3500                         FastEthernet0/2           cisco WS-C3524-PWR-XL

!--- Output suppressed.

- show spantree vlan

cat6506> (enable) show spantree 1

VLAN 1

Spanning tree mode          RAPID-PVST+

Spanning tree type          ieee

Spanning tree enabled

Designated Root             00-04-9b-bf-04-00

Designated Root Priority    32768

Designated Root Cost        0

Designated Root Port        1/0

Root Max Age   20 sec   Hello Time 2  sec   Forward Delay 15 sec

Bridge ID MAC ADDR          00-04-9b-bf-04-00

Bridge ID Priority          32768

Bridge Max Age 20 sec   Hello Time 2  sec   Forward Delay 15 sec

Port                     State         Role Cost      Prio Type

------------------------ ------------- ---- --------- ---- --------------------

1/1                     not-connected  -           4   32

1/2                     not-connected  -           4   32

2/1-2                    forwarding    DESG        12   32 P2P, PEER(STP)

2/3                     not-connected  -         100   32

2/4                     not-connected  -         100   32

2/5                     not-connected  -         100   32

2/6                     not-connected  -         100   32

!--- Output suppressed.

- show spantree module/port

cat6506> (enable) show spantree 2/1

Edge Port:          No, (Configured) Default

Link Type:         P2P, (Configured) Auto

Port Guard:    Default

Port                     Vlan State         Role Cost      Prio Type

------------------------ ---- ------------- ---- --------- ---- -----------------

2/1-2                    1    forwarding    DESG        12   32 P2P, PEER(STP)

cat6506> (enable)

cat6506> (enable) show spantree 2/2

Edge Port:          No, (Configured) Default

Link Type:         P2P, (Configured) Auto

Port Guard:    Default

Port                     Vlan State         Role Cost      Prio Type

------------------------ ---- ------------- ---- --------- ---- -----------------

2/1-2                    1    forwarding    DESG        12   32 P2P, PEER(STP)

cat6506> (enable)

註：連線埠2/1和2/2的show spantree module/port 命令的輸出會顯示相同的結果，因為這些連線埠都歸組在一個通道中。

疑難排解

目前尚無適用於此組態的具體疑難排解資訊。

相關資訊

- 在Catalyst 2900XL/3500XL和Catalyst 2940、2950/2955和2970交換機之間配置EtherChannel和802.1Q中繼

- 在執行Cisco IOS軟體的2900XL/3500XL/2950系列交換器和Catalyst交換器之間設定第2層EtherChannel和主幹

- LAN 產品支援頁面

- LAN 交換支援頁面

- 技術支援與文件 - Cisco Systems