目錄

簡介

必要條件

需求

採用元件

慣例

設定

網路圖表

組態

驗證

疑難排解

疑難排解指令

相關資訊

簡介

透過TCP傳輸的X.25(XOT)使您能夠透過TCP/IP網路傳送X.25封包，而不是連結存取程式平衡(LAPB)連結。XOT還允許您通過IP網路傳輸X.25流量。

Cisco IOS®軟體在X.25鏈路和TCP連線之間交換X.25資料包。每個虛電路目標地址都可以對映到單獨的IP地址。XOT keepalive可用於檢測底層TCP。TCP確實能夠通過檢查確認序列號來檢測連線。如果沒有收到任何確認封包，它會保留取消封包並繼續嘗試重新傳輸，直到最終放棄並中斷TCP連線。但是，此過程花費的時間太長。

本檔案將說明如何在TCP連線中斷的情況下使用XOT keepalive功能、加以偵測並更快動作。

必要條件

需求

本文件沒有特定需求。

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- Cisco IOS軟體版本9.21或更新版本，包含任何功能集

- 任何Cisco IOS軟體版本9.21或更高版本的Cisco路由器都支援此功能

- Cisco IOS軟體版本12.2(13)T13和12.2(27)

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

設定

本節提供用於設定本文件中所述功能的資訊。

註：使用Command Lookup Tool(僅限註冊客戶)查詢有關本文檔中使用的命令的更多資訊。

網路圖表

本檔案會使用以下網路設定：

組態

本檔案會使用以下設定：

- R1（思科2500路由器）

- R2（Cisco 2500路由器）

- R3（思科2600路由器）

- R4（思科2600路由器）

R1（思科2500路由器）

Current configuration:

!

version 12.2

service timestamps debug datetime msec

service timestamps log uptime

!

hostname R1

!

x25 routing

!--- The X.25 local switching.

!

interface Serial0

no ip address

no ip directed-broadcast

encapsulation x25

no ip mroute-cache

x25 address 45678

x25 win 5

!--- For testing purposes, the X.25 flow control !--- is set to something other than !--- the default value. In this configuration, !--- win 5 and wout 5, and ips and ops 256 are used.

x25 wout 5

x25 ips 256

x25 ops 256

x25 idle 1

!

line con 0

transport input none

line aux 0

line vty 0 4

password cisco

login

!

end

R2（Cisco 2500路由器）

Current configuration

!

version 12.2

service pad to-xot

!--- Enable this command in order to make a packet assembler/disassembler (PAD) !--- over XOT through the router locally. It is useful for troubleshooting XOT problems.

service timestamps debug datetime msec

service timestamps log uptime

!

hostname R2

!

x25 routing

!--- Enables X.25 switching.

!

!

!

interface Loopback0

ip address 10.1.2.2 255.255.255.0

!

interface Ethernet0

ip address 10.64.9.101 255.255.255.0

no ip route-cache

no ip mroute-cache

!

interface Serial0

no ip address

encapsulation x25 dce

no ip mroute-cache

x25 win 5

x25 wout 5

x25 ips 256

x25 ops 256

!--- Set these flow control parameters since the interface you have connected to !--- also has these parameters set. If not matched, you can reset the link !--- while there are larger packets that go over.

x25 idle 1

clockrate 64000

!

router rip

network 10.0.0.0

!

x25 route ^12 xot 10.64.9.100 xot-keepalive-period

10 xot-keepalive-tries 3 xot-source Loopback0

x25 route ^4 interface Serial0 xot-keepalive-period

10 xot-keepalive-tries 3

!--- By default, xot-keepalives is always enabled, uses the default keepalive !--- period of 60 seconds, and retries four times. Use the !--- loopback as the XOT source to enhance the TCP connection reliability. !--- If you have two interfaces configured for X.25 and one of the !--- interfaces goes down, one interface remains up so that the TCP !--- connection is not interrupted. In order to achieve this redundancy !--- connection, the XOT uses the loopback interface since the !--- source and the TCP connection do not fail. !--- If you want to have redundant interfaces in your router, the !--- X.25 route command is configured as - X.25 route ^12 xot 10.64.9.100 10.64.9.200 !--- where 10.64.9.100 and 10.64.9.200 are the remote destination IP addresses.

!

line con 0

line aux 0

line vty 0 4

login

!

end

R3（思科2600路由器）

Current configuration : 1427 bytes

!

version 12.2

service timestamps debug datetime msec

service timestamps log uptime

!

hostname R3

!

!

x25 routing

!

!

interface Loopback0

ip address 10.1.3.1 255.255.255.0

!

interface Serial1

bandwidth 384

no ip address

encapsulation x25

no ip route-cache

no ip mroute-cache

x25 win 7

x25 wout 7

x25 ips 1024

x25 ops 1024

x25 idle 1

service-module t1 clock source internal

service-module t1 timeslots 1-6

!

interface Ethernet1/0

ip address 10.64.9.100 255.255.255.0

no ip route-cache

no ip mroute-cache

half-duplex

!

router rip

network 10.0.0.0

!

!

x25 route ^12 interface Serial1 xot-keepalive-period

10 xot-keepalive-tries 3

x25 route ^4 xot 10.64.9.101 xot-keepalive-period

10 xot-keepalive-tries 3 xot-source Loopback0

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

end

R4（思科2600路由器）

Current configuration

!

!

!

version 12.2

service timestamps debug datetime msec

service timestamps log uptime

no service password-encryption

!

hostname R4

!

!

interface Ethernet0/0

ip address 10.64.9.88 255.255.255.0

half-duplex

!

interface Serial1

bandwidth 384

no ip address

encapsulation x25 dce

x25 address 123456

x25 win 7

x25 wout 7

x25 ips 1024

x25 ops 1024

!--- These parameters are set for testing purposes.

x25 idle 1

service-module t1 timeslots 1-6

!

line con 0

line aux 0

line vty 0 4

password cisco

login

!

end

驗證

使用本節內容，確認您的組態是否正常運作。

輸出直譯器工具(僅供已註冊客戶使用)(OIT)支援某些show命令。使用OIT檢視show命令輸出的分析。

- show x25 pad — 顯示有關當前開放連線的資訊，包括封包傳輸、X.3引數設定和虛擬電路的目前狀態。

- show x25 xot — 顯示與給定條件匹配的所有XOT虛電路的資訊。

- show tcp — 顯示TCP連線的狀態。

- pad — 使用此命令登入到PAD。

此輸出顯示了從R1到R4進行PAD呼叫時顯示的調試輸出：

R1#pad 123456

User Access Verification

Password:

1w1d: Serial0: X.25 O R1 Call (15) 8 lci 1024

1w1d: From (5): 45678 To (6): 123456

1w1d: Facilities: (0)

1w1d: Call User Data (4): 0x01000000 (pad)

1w1d: Serial0: X.25 I R1 Call Confirm (5) 8 lci 1024

1w1d: From (0): To (0):

1w1d: Facilities: (0)

R4>

此呼叫通過R2。此輸出是使用debug x25 event和debug ip tcp driver命令捕獲的。

R2#

*Mar 9 07:02:39.982: Serial0: X.25 I R1 Call (15) 8 lci 1024

*Mar 9 07:02:39.986: From (5): 45678 To (6): 123456

*Mar 9 07:02:39.990: Facilities: (0)

*Mar 9 07:02:39.990: Call User Data (4): 0x01000000 (pad)

*Mar 9 07:02:40.006: TCPDRV404EF4: Active async open 10.1.2.2:0

--> 10.64.9.100 :1998 OK, lport 11020

*Mar 9 07:02:40.034: TCPDRV404EF4: disable tcp timeouts

*Mar 9 07:02:40.034: TCPDRV404EF4: enable tcp timeouts

*Mar 9 07:02:40.038: TCPDRV404EF4: keepalive interval set to 10000 ms

!--- The keepalives parameters.

*Mar 9 07:02:40.038: TCPDRV404EF4: keepalive attempts set to 3

*Mar 9 07:02:40.042: TCPDRV404EF4: keepalives turned on

*Mar 9 07:02:40.046: [10.64.9.100,1998/10.1.2.2,11020]: XOT O P2 Call (21) 8 lc i 1

*Mar 9 07:02:40.050: From (5): 45678 To (6): 123456

*Mar 9 07:02:40.054: Facilities: (6)

*Mar 9 07:02:40.054: Packet sizes: 256 256

*Mar 9 07:02:40.058: Window sizes: 5 5

*Mar 9 07:02:40.058: Call User Data (4): 0x01000000 (pad)

*Mar 9 07:02:40.182: [10.64.9.100,1998/10.1.2.2,11020]: XOT I P2 Call Confirm (11) 8 lci 1

*Mar 9 07:02:40.182: From (0): To (0):

*Mar 9 07:02:40.186: Facilities: (6)

*Mar 9 07:02:40.186: Packet sizes: 256 256

*Mar 9 07:02:40.190: Window sizes: 5 5

*Mar 9 07:02:40.194: Serial0: X.25 O R1 Call Confirm (5) 8 lci 1024

*Mar 9 07:02:40.194: From (0): To (0):

*Mar 9 07:02:40.198: Facilities: (0)

R3通過XOT接收來自R2的呼叫，然後將其傳遞到R4。此輸出是使用debug x25 event和debug ip tcp driver命令捕獲的。

R3#

*Mar 9 07:00:41.338: TCPDRV27693C: Passive open 10.64.9.100:1998 <-- 10.1.2.2:1 1020

*Mar 9 07:00:41.342: TCPDRV27693C: disable tcp timeouts

*Mar 9 07:00:41.342: TCPDRV27693C: enable tcp timeouts

*Mar 9 07:00:41.370: [10.1.2.2,11020/10.64.9.100,1998]: XOT I P/Inactive Call (21) 8 lci 1

*Mar 9 07:00:41.370: From (5): 45678 To (6): 123456

*Mar 9 07:00:41.374: Facilities: (6)

*Mar 9 07:00:41.378: Packet sizes: 256 256

*Mar 9 07:00:41.378: Window sizes: 5 5

*Mar 9 07:00:41.382: Call User Data (4): 0x01000000 (pad)

*Mar 9 07:00:41.394: TCPDRV27693C: keepalive interval set to 10000 ms

*Mar 9 07:00:41.394: TCPDRV27693C: keepalive attempts set to 3

*Mar 9 07:00:41.398: TCPDRV27693C: keepalives turned on

*Mar 9 07:00:41.402: Serial1: X.25 O R1 Call (21) 8 lci 1024

*Mar 9 07:00:41.402: From (5): 45678 To (6): 123456

*Mar 9 07:00:41.406: Facilities: (6)

*Mar 9 07:00:41.410: Packet sizes: 256 256

*Mar 9 07:00:41.410: Window sizes: 5 5

*Mar 9 07:00:41.414: Call User Data (4): 0x01000000 (pad)

*Mar 9 07:00:41.454: Serial1: X.25 I R1 Call Confirm (5) 8 lci 1024

*Mar 9 07:00:41.454: From (0): To (0):

*Mar 9 07:00:41.458: Facilities: (0)

*Mar 9 07:00:41.462: [10.1.2.2,11020/10.64.9.100,1998]: XOT O P3 Call Confirm (11) 8 lci 1

*Mar 9 07:00:41.462: From (0): To (0):

R4收到該呼叫並將其連線到vty埠：

R4#

*Mar 9 06:57:16.598: Serial1: X.25 I R1 Call (21) 8 lci 1024

*Mar 9 06:57:16.602: From (5): 45678 To (6): 123456

*Mar 9 06:57:16.606: Facilities: (6)

*Mar 9 06:57:16.606: Packet sizes: 256 256

*Mar 9 06:57:16.610: Window sizes: 5 5

*Mar 9 06:57:16.610: Call User Data (4): 0x01000000 (pad)

*Mar 9 06:57:16.622: Serial1: X.25 O R1 Call Confirm (5) 8 lci 1024

*Mar 9 06:57:16.626: From (0): To (0):

*Mar 9 06:57:16.626: Facilities: (0)

R4#show x25 vc

SVC 1024, State: D1, Interface: Serial1

Started 00:02:15, last input 00:02:12, output 00:02:12

Line: 2 vty 0 Location: Host: 45678

45678 connected to 123456 PAD <--> X25

Window size input: 5, output: 5

Packet size input: 256, output: 256

PS: 4 PR: 0 ACK: 0 Remote PR: 4 RCNT: 0 RNR: no

P/D state timeouts: 0 timer (secs): 0

data bytes 47/60 packets 4/8 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

R2#show tcp

Stand-alone TCP connection to host 10.64.9.100

Connection state is ESTAB, I/O status: 1, unread input bytes: 0

Local host: 10.1.2.2, Local port: 11020

Foreign host: 10.64.9.100, Foreign port: 1998

Enqueued packets for retransmit: 0, input: 0 mis-ordered: 0 (0 bytes)

TCP driver queue size 0, flow controlled FALSE

Event Timers (current time is 0x2AB893F0):

Timer Starts Wakeups Next

Retrans 11 0 0x0

TimeWait 0 0 0x0

AckHold 10 0 0x0

SendWnd 0 0 0x0

KeepAlive 50 0 0x2AB8A290

!--- Sends keepalive packets and increments.

GiveUp 0 0 0x0

PmtuAger 0 0 0x0

DeadWait 0 0 0x0

iss: 1072933807 snduna: 1072933977 sndnxt: 1072933977 sndwnd: 8023

irs: 1206945087 rcvnxt: 1206945244 rcvwnd: 8036 delrcvwnd: 156

SRTT: 231 ms, RTTO: 769 ms, RTV: 538 ms, KRTT: 0 ms

minRTT: 8 ms, maxRTT: 300 ms, ACK hold: 200 ms

Flags: higher precedence, retransmission timeout, keepalive running

!--- The keepalive status.

Datagrams (max data segment is 536 bytes):

Rcvd: 40 (out of order: 0), with data: 10, total data bytes: 156

Sent: 41 (retransmit: 0, fastretransmit: 0), with data: 10, total data bytes: 16 9

如需詳細資訊，請參閱X.25 Route命令XOT Keepalive選項。

疑難排解

使用本節內容，對組態進行疑難排解。

疑難排解指令

輸出直譯器工具(僅供已註冊客戶使用)(OIT)支援某些show命令。使用OIT檢視show命令輸出的分析。

附註：使用 debug 指令之前，請先參閱有關 Debug 指令的重要資訊。

- debug x25 events — 顯示除資料和資源記錄資料包之外的所有X.25流量的資訊。

- debug ip tcp driver — 顯示有關TCP驅動程式事件的資訊。

如果R2和R3之間的連線斷開，TCP連線將在保持連線期間後斷開。然後，show tcp命令的輸出在R2和R3路由器中都是空的。

當R2和R3的XOT介面關閉時，您可以觀察此調試輸出：

R2#debug x25 events

*Mar 10 05:36:24.685: [10.64.9.100,1998/10.1.2.2,11037]: XOT cx closed

*Mar 10 05:36:24.689: Serial0: X.25 O R1 Clear (5) 8 lci 1024

*Mar 10 05:36:24.693: Cause 9, Diag 0 (Out of order/No additional information)

*Mar 10 05:36:24.709: Serial0: X.25 I R1 Clear Confirm (3) 8 lci 1024

R2#debug ip tcp driver

*Mar 10 05:41:08.800: TCPDRV205B44: 10.1.2.2:11038 --> 10.64.9.100:1998 DoClose

(Cookie 402718) tcp close

R3#debug x25 events

*Mar 10 05:34:27.241: [10.1.2.2,11037/10.64.9.100,1998]: XOT cx closed

*Mar 10 05:34:27.245: Serial1: X.25 O R1 Clear (5) 8 lci 1024

*Mar 10 05:34:27.245: Cause 0, Diag 0 (DTE originated/No additional information)

*Mar 10 05:34:27.261: Serial1: X.25 I R1 Clear Confirm (3) 8 lci 1024

R3#debug ip tcp driver

*Mar 10 05:39:11.321: TCPDRV354BB8: 10.64.9.100:1998 --> 10.1.2.2:11038 DoClose

(Cookie 354B5C) tcp close

相關資訊

- X.25和LAPB命令

- X.25通訊協定技術支援

- 技術支援與文件 - Cisco Systems