目錄

簡介

必要條件

需求

採用元件

慣例

錯誤代碼

相關資訊

簡介

本檔案顯示TFTP錯誤碼。

必要條件

需求

本文件沒有特定需求。

採用元件

本文件所述內容不限於特定軟體和硬體版本。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

錯誤代碼

0         Not defined, see error message (if any).

1         File not found.

2         Access violation.

3         Disk full or allocation exceeded.

4         Illegal TFTP operation.

5         Unknown transfer ID.

6         File already exists.

7         No such user.

如需TFTP通訊協定的詳細資訊，請參閱修訂的RFC 1350 。

相關資訊

- 技術支援 - Cisco Systems