目錄

簡介

必要條件

需求

採用元件

疑難排解

裝置未連線到5G頻段

確認裝置的蜂窩介面未分配IP地址

確認裝置檢測到SIM

確認裝置主動使用所需的SIM

驗證是否已更新數據機韌體並填充SIM卡資訊

檢查單選值

有效無線電範圍

確認PS狀態是否已連線

檢查配置檔案配置，並且正在使用正確的APN

確認檢測到的網路、MCC和MNC值正確

強制更改以更正MCC和MNC值

檢查可用的PLMN

相關資訊

簡介

本文檔介紹在部署PIM模組時如何對其進行預檢查，以及確認為蜂窩介面分配了IP地址。

必要條件

需求

思科建議您瞭解以下主題的基本知識：

- 5G蜂窩網路基礎知識

- 思科P-5GS6-GL模組

- Cisco IOS® XE和Cisco IOS® CG

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- 思科C8300，採用Cisco IOS® XE版本17.06.03a，並插入P-5GS6-GL模組。

這適用於在SD-WAN中以控制器模式連線到路由器的P-5GS6-GL模組。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路運作中，請確保您瞭解任何指令可能造成的影響。

疑難排解

裝置未連線到5G頻段

1. 確保為運營商啟用所獲取的5G頻段網路計畫。

2. 與運營商確認有關5G裝置所在區域的5G覆蓋區域。

確認裝置的蜂窩介面未分配IP地址

ISR#sh ip int brief

Interface              IP-Address      OK? Method Status                Protocol

GigabitEthernet0/0/0   172.16.173.10  YES other  up                    up

GigabitEthernet0/0/1   unassigned      YES unset  up                    up

Gi0/0/1.2989           10.10.22.74     YES other  up                    up

GigabitEthernet0/0/2   unassigned      YES unset  down                  down

GigabitEthernet0/0/3   10.244.182.1    YES other  up                    up

GigabitEthernet0/0/4   unassigned      YES unset  down                  down

GigabitEthernet0/0/5   unassigned      YES unset  down                  down

Cellular0/2/0 unassigned YES IPCP up up Cellular0/2/1 unassigned YES IPCP administratively down down

Sdwan-system-intf      10.244.182.1    YES unset  up                    up

Loopback65528          192.168.1.1     YES other  up                    up

NVI0                   unassigned      YES unset  up                    up

Tunnel0                172.16.173.138  YES TFTP   up                    up

Tunnel2989001          10.10.22.74     YES TFTP   up                    up

確認裝置檢測到SIM

ISR#sh controllers cellular 0/X/0 details

Cellular Dual SIM details:

---------------------------

SIM 0 is present

SIM 1 is not present

SIM 0 is active SIM

ISR#sh cellular 0/X/0 security

Active SIM = 0

SIM switchover attempts = 0

Card Holder Verification (CHV1) = Disabled

SIM Status = OK

SIM User Operation Required = None

Number of CHV1 Retries remaining = 3

確認裝置主動使用所需的SIM

ISR#sh controllers cellular 0/2/0 details

Cellular Dual SIM details:

---------------------------

SIM 0 is present

SIM 1 is not present

SIM 0 is active SIM

驗證是否已更新數據機韌體並填充SIM卡資訊

如果未填充SIM卡資訊，請確保已插入SIM卡且沒有故障：

isr#show cellular 0/X/0 all

Hardware Information

====================

Modem Firmware Version = M0H.020202

Host Firmware Version = A0H.000292

Device Model ID = FN980

International Mobile Subscriber Identity (IMSI) = XXXXXXXXXXXXXXX

International Mobile Equipment Identity (IMEI) = XXXXXXXXXXXXXXX

Integrated Circuit Card ID (ICCID) = XXXXXXXXXXXXXXXXXXXX

Mobile Subscriber Integrated Services

Digital Network-Number (MSISDN) = XXXXXXXXXX

*

*

檢查單選值

如果無線電值超出有效範圍，請確保所有天線均已連線且無故障。

有效無線電範圍

RSSI:「良好」值大於–80 dBm（例如79大於–80）

RSRP:「良好」值大於–105 dBm（例如–104大於–105）

RSRQ:「良好」值大於–12 dBm（例如11大於–12）

SNR:「良好」值大於5 dBm（6大於5）

RSSI = -128 dBm通常表示數據機已關閉或天線未連線。完全沒有無線電訊號。

Isr#sh cellular 0/2/0 radio

*

Current RSSI = -65 dBm

Current RSRP = -94 dBm

Current RSRQ = -12 dB

Current SNR = 8.4  dB

*

*

確認PS狀態是否已連線

如果未連線PS狀態，請確保使用正確的APN並在運營商端進行調配：

isr#sh cellular 0/2/0 network

Current System Time = Sun Jan 6 3:11:7 1980

Current Service Status = No service

Current Service = Unknown

Current Roaming Status = Home

Network Selection Mode = Automatic

Network = 420 212

Mobile Country Code (MCC) = 420

Mobile Network Code (MNC) = 4

Packet switch domain(PS) state = Not attached

Registration state(EMM) = Searching/Not Registered

EMM Sub State = No IMSI

Tracking Area Code (TAC) = 0

Cell ID = 0

Network MTU = Not Available

檢查配置檔案配置，並且正在使用正確的APN

isr#show cellular 0/x/0 profile

Profile password Encryption level =  7

Profile 1 = INACTIVE* **

--------

PDP Type = IPv4

Access Point Name (APN) = SAMIS.M2M

Authentication = None

Profile 2 = INACTIVE

--------

PDP Type = IPv4v6

Access Point Name (APN) = ims

Authentication = None

Profile 5 = INACTIVE

--------

PDP Type = IPv4

Access Point Name (APN) = SAMIS.M2M

Authentication = None

* - Default profile

** - LTE attach profile

Configured default profile for active SIM 0 is profile 1.

確認檢測到的網路、MCC和MNC值正確

isr#sh cellular 0/2/0 network

Current System Time = Sun Jan 6 3:11:7 1980

Current Service Status = No service

Current Service = Unknown

Current Roaming Status = Home

Network Selection Mode = Automatic

Network = 420 212

Mobile Country Code (MCC) = 420

Mobile Network Code (MNC) = 4

Packet switch domain(PS) state = Not attached

Registration state(EMM) = Searching/Not Registered

EMM Sub State = No IMSI

Tracking Area Code (TAC) = 0

Cell ID = 0

Network MTU = Not Available

如果顯示的值不正確，請使用https://www.mcc-mnc.com/確認：

強制更改以更正MCC和MNC值

1.關閉手機網路介面：

conf t

int cellular 0/X/0

shut

2.執行PLMN搜尋，這會強制數據機搜尋區域中的可用網路：

cellular 0/X/0 lte plmn search    //This command is entered in PRIV mode, no config mode.

3.完成PLMN搜尋後，請參閱具有以下內容的可用網路：

show cellular 0/X/0 network

4.選擇所需網路，其方式為：

cellular 0/X/0 lte plmn select manual MCC MNC INDX RAT    //Enter the desired MCC,MNC,INDX and RAT from above output

5.要強制選擇所需的網路：

cellular 0/X/0 lte plmn select force MCC MNC INDX RAT   //Enter the desired MCC,MNC,INDX and RAT from above output

檢查可用的PLMN

isr#sh cellular 0/2/0 network

Current System Time = Tue Jan 8 23:43:48 1980

Current Service Status = No service

Current Service = Unknown

Current Roaming Status = Roaming

Network Selection Mode = Automatic

Network = Zain KSA

Mobile Country Code (MCC) = 420

Mobile Network Code (MNC) = 4

Packet switch domain(PS) state = Not attached

Registration state(EMM) = Not registered

EMM Sub State = Attach needed

Tracking Area Code (TAC) = 0

Cell ID = 0

Available PLMNs at  =  11:31:30 AST Thu Nov 21 2024

Idx MCC MNC RAT     Desc

1   420 1   lte     stc

2   420 3   lte     Mobily

3   420 4   lte     Zain KSA

相關資訊

- 硬體安裝指南

- PIM軟體配置指南

- 數據機韌體升級指南（CG和PIM）