目錄

簡介

必要條件

需求

採用元件

慣例

背景資訊

原因1：網路型別不匹配

解決方案

原因2：雙串列鏈路設定中的地址分配錯誤

解決方案

原因3：錯誤的主網或子網中包含點對點鏈路的一端

原因4：一側未編號，另一側已編號

解決方案

原因5：全網狀幀中繼環境中的PVC斷開

原因6：通過外部路由已知的轉發地址

原因7：路由被分發清單阻止

解決方案

相關資訊

簡介

本文說明當資料庫中的路由不在路由資訊庫 (RIB) 或路由表中時，如何修復 OSPF 問題。

必要條件

需求

本文檔的讀者必須瞭解以下主題：

- 開放最短路徑優先(OSPF)協定的基本知識

- Cisco IOS®中的OSPF配置基礎知識

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- Cisco IOS軟體版本12及更新版本

- 所有思科路由器平台都支援此功能

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路運作中，請確保您瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

背景資訊

本文描述開放最短路徑優先(OSPF)的一個常見問題，即資料庫中的路由不會出現在路由資訊庫(RIB)或路由表中。在大多數情況下，OSPF會發現資料庫中的差異，因此不會在路由表中安裝路由。通常，當發生此問題時，您會在資料庫的鏈路狀態通告(LSA)上看到Adv Router is not-reachable消息（這意味著通告LSA的路由器無法通過OSPF到達）。以下是範例：

Router#show ip ospf database router 172.16.32.2

Adv Router is not-reachable LS age: 418

Options: (No TOS-capability, DC)

LS Type: Router Links

Link State ID: 172.16.32.2

Advertising Router: 172.16.32.2

LS Seq Number: 80000002

Checksum: 0xFA63

Length: 60

Number of Links: 3

造成此問題的原因有多種，其中大多數的原因都是配置錯誤或拓撲斷開。更正配置後，OSPF資料庫差異消失，路由顯示在路由表中。本文檔解釋了可能導致資料庫中存在差異的一些更常見原因。

本文檔中用於驗證OSPF行為的一些命令包括show ip ospf interface、show ip ospf database router、show ip ospf neighbor和show ip ospf database external。如果您的Cisco裝置輸出了這些命令中的任意一個，則可以使用Cisco CLI Analyzer顯示潛在的問題和解決方法。

原因1：網路型別不匹配

下一個網路圖用作示例：

R4-4K

R1-7010

interface Loopback0

ip address 172.16.33.1 255.255.255.255

!

interface Serial2

ip address 172.16.32.1 255.255.255.0

ip ospf network broadcast

!

router ospf 20

network 172.16.0.0 0.0.255.255 area 0

interface Loopback0

ip address 172.16.30.1 255.255.255.255

!

interface Serial1/0

ip address 172.16.32.2 255.255.255.0

clockrate 64000

!

router ospf 20

network 172.16.0.0 0.0.255.255 area 0

R4-4K(4)#show ip ospf interface serial 2

Serial2 is up, line protocol is up

Internet Address 172.16.32.1/24, Area 0

Process ID 20, Router ID 172.16.33.1, Network Type BROADCAST, Cost: 64

Transmit Delay is 1 sec, State DR, Priority 1

Designated Router (ID) 172.16.33.1, Interface address 172.16.32.1

Backup Designated router (ID) 172.16.32.2, Interface address 172.16.32.2

Timer intervals configured, Hello 10, Dead 40, Wait 40, Retransmit 5

Hello due in 00:00:08

Neighbor Count is 1, Adjacent neighbor count is 1

Adjacent with neighbor 172.16.32.2  (Backup Designated Router)

Suppress hello for 0 neighbor(s)

R1-7010(5)#show ip ospf interface serial 1/0

Serial1/0 is up, line protocol is up

Internet Address 172.16.32.2/24, Area 0

Process ID 20, Router ID 172.16.32.2, Network Type POINT_TO_POINT, Cost: 64

Transmit Delay is 1 sec, State POINT_TO_POINT,

Timer intervals configured, Hello 10, Dead 40, Wait 40, Retransmit 5

Hello due in 00:00:02

Neighbor Count is 1, Adjacent neighbor count is 1

Adjacent with neighbor 172.16.33.1

Suppress hello for 0 neighbor(s)

如前面的輸出所示，路由器R4-4K配置為廣播，路由器R1-7010配置為點對點。這種網路型別不相符會導致廣告路由器無法連線。

R4-4K(4)#show ip ospf database router 172.16.32.2

Adv Router is not-reachable

LS age: 418

Options: (No TOS-capability, DC)

LS Type: Router Links

Link State ID: 172.16.32.2

Advertising Router: 172.16.32.2

LS Seq Number: 80000002

Checksum: 0xFA63

Length: 60

Number of Links: 3

Link connected to: another Router (point-to-point)

(Link ID) Neighboring Router ID: 172.16.33.1

(Link Data) Router Interface address: 172.16.32.2

Number of TOS metrics: 0

TOS 0 Metrics: 64

Link connected to: a Stub Network

(Link ID) Network/subnet number: 172.16.32.0

(Link Data) Network Mask: 255.255.255.0

Number of TOS metrics: 0

TOS 0 Metrics: 64

R1-7010(5)#show ip ospf database router 172.16.33.1

Adv Router is not-reachable

LS age: 357

Options: (No TOS-capability, DC)

LS Type: Router Links

Link State ID: 172.16.33.1

Advertising Router: 172.16.33.1

LS Seq Number: 8000000A

Checksum: 0xD4AA

Length: 48

Number of Links: 2

Link connected to: a Transit Network

(Link ID) Designated Router address: 172.16.32.1

(Link Data) Router Interface address: 172.16.32.1

Number of TOS metrics: 0

TOS 0 Metrics: 64

您可以看到，對於子網172.16.32.0/24，路由器R1-7010生成一條點對點鏈路，路由器R4-4K生成一條傳輸鏈路。這會導致鏈路狀態資料庫中存在不一致，這意味著路由表中未安裝任何路由。

R1-7010(5)#show ip route

172.16.0.0/16 is variably subnetted, 3 subnets, 2 masks

C       172.16.32.0/24 is directly connected, Serial1/0

C       172.16.30.1/32 is directly connected, Loopback0

解決方案

要解決此問題，請將兩台路由器配置為同一網路型別。您可以將路由器R1-7010的網路型別更改為廣播，或者將路由器R4-4K串列介面更改為點對點。

註：如果出現一端是多點介面而另一端是子介面的情況，請將網路型別更改為兩端廣播。

在本示例中，我們刪除了R4-4K上的network-type broadcast語句，因為兩端都是點對點高級資料鏈路控制(HDLC)封裝的介面。

R4-4K(4)#configure terminal

R4-4K(4)(config)#interface serial 2

R4-4K(4)(config-if)#no ip ospf network broadcast

R4-4K(4)(config-if)#end

R4-4K(4)#show ip ospf interface serial 2

Serial2 is up, line protocol is up

Internet Address 172.16.32.1/24, Area 0

Process ID 20, Router ID 172.16.33.1, Network Type POINT_TO_POINT, Cost: 64

Transmit Delay is 1 sec, State POINT_TO_POINT,

Timer intervals configured, Hello 10, Dead 40, Wait 40, Retransmit 5

Hello due in 00:00:04

Neighbor Count is 1, Adjacent neighbor count is 1

Adjacent with neighbor 172.16.32.2

Suppress hello for 0 neighbor(s)

原因2：雙串列鏈路設定中的地址分配錯誤

請考慮以下網路圖作為範例：

R4-4K

R1-7010

interface loopback 0

ip address 172.16.35.1 255.255.255.255

!

interface Serial2

ip address 172.16.29.1 255.255.255.0

!

interface Serial3

ip address 172.16.32.1 255.255.255.0

!

router ospf 20

network 172.16.0.0 0.0.255.255 area 0

interface loopback 0

ip address 172.16.30.1 255.255.255.255

!

interface Serial1/0

ip address 172.16.32.2 255.255.255.0

clockrate 64000

!

interface Serial1/1

ip address 172.16.29.2 255.255.255.0

clockrate 38400

!

router ospf 20

network 172.16.0.0 0.0.255.255 area 0

您可以看到，IP地址在以前的配置中發生翻轉，導致OSPF資料庫中存在差異。但是，這些路由器仍然在Cisco IOS版本12.1之前形成鄰居，因為在點對點鏈路上，OSPF路由器不會驗證相鄰路由器是否位於同一子網中。

R4-4K(4)#show ip ospf neighbor

Neighbor ID     Pri   State           Dead Time   Address         Interface

172.16.32.2       1   FULL/  -        00:00:37    172.16.32.2     Serial2

172.16.32.2       1   FULL/  -        00:00:31    172.16.29.2     Serial3

從上面的輸出中，您可以看到Serial2用於形成IP地址為172.16.32.2的鄰居，該鄰居不在同一個子網中。雖然形成了鄰居，但路由表中未安裝任何路由：

R1-7010(5)#show ip route

172.16.0.0/16 is variably subnetted, 3 subnets, 2 masks

C       172.16.32.0/24 is directly connected, Serial1/0

C       172.16.29.0/24 is directly connected, Serial1/1

C       172.16.30.1/32 is directly connected, Loopback0

解決方案

要解決此問題，請正確分配IP地址或交換串列電纜。我們已更正以下IP地址：

R4-4K

R1-7010

interface loopback 0

ip address 172.16.35.1 255.255.255.255

!

interface Serial2

ip address 172.16.32.1 255.255.255.0

!

interface Serial3

ip address 172.16.29.1 255.255.255.0

!

router ospf 20

network 172.16.0.0 0.0.255.255 area 0

interface loopback 0

ip address 172.16.30.1 255.255.255.255

!

interface Serial1/0

ip address 172.16.32.2 255.255.255.0

clockrate 64000

!

interface Serial1/1

ip address 172.16.29.2 255.255.255.0

clockrate 38400

!

router ospf 20

network 172.16.0.0 0.0.255.255 area 0

R4-4K(4)#show ip ospf neighbor

Neighbor ID     Pri   State           Dead Time   Address         Interface

172.16.32.2       1   FULL/  -        00:00:36    172.16.32.2     Serial2

172.16.32.2       1   FULL/  -        00:00:39    172.16.29.2     Serial3

現在它顯示了Serial 2介面的正確鄰居地址。路由表也包含這些路由：

R1-7010(5)#show ip route

172.16.0.0/16 is variably subnetted, 4 subnets, 2 masks

C       172.16.32.0/24 is directly connected, Serial1/0

O       172.16.35.1/32 [110/65] via 172.16.32.1, 00:03:12, Serial1/0

[110/65] via 172.16.29.1, 00:03:12, Serial1/1

C       172.16.29.0/24 is directly connected, Serial1/1

C       172.16.30.1/32 is directly connected, Loopback0

原因3：錯誤的主網或子網中包含點對點鏈路的一端

請考慮以下網路圖作為範例：

這種情況產生的行為與雙串列鏈路設定中的錯誤地址分配完全相同。要解決此問題，請在兩台路由器上分配同一子網中的IP地址。

原因4：一側未編號，另一側已編號

請考慮下一個網路圖作為範例：

R4-4K

R1-7010

interface Loopback0

ip address 172.16.35.1 255.255.255.255

!

interface Serial2

ip unnumbered Loopback0

router ospf 20

network 172.16.0.0 0.0.255.255 area 0

interface Loopback0

ip address 172.16.30.1 255.255.255.255

!

interface Serial1/0

ip address 172.16.32.2 255.255.255.0

clockrate 64000

!

router ospf 20

network 172.16.0.0 0.0.255.255 area 0

R4-4K(4)#show interface serial 2

Serial2 is up, line protocol is up

Hardware is cxBus Serial

Interface is unnumbered.  Using address of Loopback0 (172.16.35.1)

R1-7010(5)#show interface serial 1/0

Serial1/0 is up, line protocol is up

Hardware is cxBus Serial

Internet address is 172.16.32.2/24

先前的輸出顯示，R4-4K Serial 2介面未編號為Loopback0（使用Loopback0 172.16.35.1的地址），而R1-7010的Serial 1/0介面為編號介面。

R4-4K(4)#show ip ospf interface serial 2

Serial2 is up, line protocol is up

Internet Address 0.0.0.0/24, Area 0

Process ID 20, Router ID 172.16.35.1, Network Type POINT_TO_POINT, Cost: 64

Transmit Delay is 1 sec, State POINT_TO_POINT,

Timer intervals configured, Hello 10, Dead 40, Wait 40, Retransmit 5

Hello due in 00:00:02

Neighbor Count is 1, Adjacent neighbor count is 1

Adjacent with neighbor 172.16.32.2

Suppress hello for 0 neighbor(s)

R1-7010(5)#show ip ospf interface serial 1/0

Serial1/0 is up, line protocol is up

Internet Address 172.16.32.2/24, Area 0

Process ID 20, Router ID 172.16.32.2, Network Type POINT_TO_POINT, Cost: 64

Transmit Delay is 1 sec, State POINT_TO_POINT,

Timer intervals configured, Hello 10, Dead 40, Wait 40, Retransmit 5

Hello due in 00:00:02

Neighbor Count is 1, Adjacent neighbor count is 1

Adjacent with neighbor 172.16.33.1

Suppress hello for 0 neighbor(s)

正如前面所看到的，這兩種情況中的network-type都是點對點的。問題是一端未編號，而另一端未編號，這樣會在資料庫中產生差異，如下所示。

R4-4K(4)#show ip ospf database router 172.16.30.1

OSPF Router with ID (172.16.35.1) (Process ID 20)

Router Link States (Area 0)

LS age: 202

Options: (No TOS-capability, DC)

LS Type: Router Links

Link State ID: 172.16.30.1

Advertising Router: 172.16.30.1

LS Seq Number: 80000002

Checksum: 0xC899

Length: 60

Number of Links: 3

Link connected to: another Router (point-to-point)

(Link ID) Neighboring Router ID: 172.16.35.1

(Link Data) Router Interface address: 172.16.32.2

Number of TOS metrics: 0

TOS 0 Metrics: 64

Link connected to: a Stub Network

(Link ID) Network/subnet number: 172.16.32.0

(Link Data) Network Mask: 255.255.255.0

Number of TOS metrics: 0

TOS 0 Metrics: 64

Link connected to: a Stub Network

(Link ID) Network/subnet number: 172.16.30.1

(Link Data) Network Mask: 255.255.255.255

Number of TOS metrics: 0

TOS 0 Metrics: 1

R1-7010(5)#show ip ospf database router 172.16.35.1

OSPF Router with ID (172.16.30.1) (Process ID 20)

Router Link States (Area 0)

Adv Router is not-reachable

LS age: 396

Options: (No TOS-capability, DC)

LS Type: Router Links

Link State ID: 172.16.35.1

Advertising Router: 172.16.35.1

LS Seq Number: 80000003

Checksum: 0xBEA1

Length: 48

Number of Links: 2

Link connected to: another Router (point-to-point)

(Link ID) Neighboring Router ID: 172.16.30.1

(Link Data) Router Interface address: 0.0.0.3

!--- In case of an unnumbered link we use MIB-II IfIndex value which usually starts with 0.

Number of TOS metrics: 0

TOS 0 Metrics: 64

Link connected to: a Stub Network

(Link ID) Network/subnet number: 172.16.35.1

(Link Data) Network Mask: 255.255.255.255

Number of TOS metrics: 0

TOS 0 Metrics: 1

R1-7010(5)#

您可以看到，R1-7010使用包含其介面地址的Link Data欄位為此點對點鏈路生成LSA，而R4-4K使用包含MIB-II IfIndex值的Link Data欄位為同一鏈路生成LSA(RFC 2328)。這會導致鏈路狀態資料庫中存在不一致，這意味著路由表中未安裝任何路由。

R1-7010(5)#show ip route

172.16.0.0/16 is variably subnetted, 3 subnets, 2 masks

C       172.16.32.0/24 is directly connected, Serial1/0

C       172.16.30.1/32 is directly connected, Loopback0

解決方案

要解決此問題，請將兩台路由器的串列介面配置為已編號或未編號。在本例中，我們對路由器R4-4K的串列2介面進行了編號。

R4-4K(4)#configure terminal

R4-4K(4)(config)#interface serial 2

R4-4K(4)(config-if)#no ip unnumbered loopback 0

R4-4K(4)(config-if)#ip address 172.16.32.1 255.255.255.0

R4-4K(4))#show ip ospf interface serial 2

Serial2 is up, line protocol is up

Internet Address 172.16.32.1/24, Area 0

Process ID 20, Router ID 172.16.33.1, Network Type POINT_TO_POINT, Cost: 64

Transmit Delay is 1 sec, State POINT_TO_POINT,

Timer intervals configured, Hello 10, Dead 40, Wait 40, Retransmit 5

Hello due in 00:00:02

Neighbor Count is 1, Adjacent neighbor count is 1

Adjacent with neighbor 172.16.32.2

Suppress hello for 0 neighbor(s)

R1-7010(5)#show ip route

172.16.0.0/16 is variably subnetted, 3 subnets, 2 masks

C       172.16.32.0/24 is directly connected, Serial1/0

O       172.16.33.1/32 [110/65] via 172.16.32.1, 00:03:08, Serial1/0

C       172.16.30.1/32 is directly connected, Loopback0

原因5：全網狀幀中繼環境中的PVC斷開

請考慮以下網路圖作為範例：

R9-2500

interface Loopback0

ip address 10.50.50.50 255.255.255.255

!

interface Serial0

ip address 10.10.10.5 255.255.255.0

encapsulation frame-relay

ip ospf network broadcast

frame-relay map ip 10.10.10.6 102 broadcast

frame-relay map ip 10.10.10.7 101 broadcast

!

router ospf 10

network 10.10.10.0 0.0.0.255 area 0

network 10.50.50.0 0.0.0.255 area 0

R4-4K

interface Loopback0

ip address 10.70.70.70 255.255.255.255

!

interface Serial0

ip address 10.10.10.7 255.255.255.0

encapsulation frame-relay

ip ospf network broadcast

frame-relay map ip 10.10.10.5 101 broadcast

frame-relay map ip 10.10.10.6 100 broadcast

!

router ospf 10

network 10.10.10.0 0.0.0.255 area 0

network 10.70.70.0 0.0.0.255 area 0

R3-4K

interface Loopback0

ip address 10.60.60.60 255.255.255.255

!

interface Serial0

no ip address

encapsulation frame-relay

!

interface Serial0.1 multipoint

ip address 10.10.10.6 255.255.255.0

ip ospf network broadcast

frame-relay map ip 10.10.10.5 102 broadcast

frame-relay map ip 10.10.10.7 100 broadcast

!

router ospf 10

network 10.10.10.0 0.0.0.255 area 0

network 10.60.60.0 0.0.0.255 area 0

只要幀中繼網雲是全網狀的，幀中繼上的廣播模型就可以正常工作。如果任何永久虛擬電路(PVC)損壞，它可能會在OSPF資料庫中出現問題，從而產生Adv路由器無法訪問消息。

在本示例中，R9-2500和R4-4K之間的PVC斷開，通往指定路由器(DR)的R9-2500鏈路斷開。因此，R9-2500宣告來自R3-4K（不是DR）的所有LSA不可達。您可以看到，R9-2500不會為連線到R3-4K的串列介面生成傳輸鏈路；而是生成末節鏈路，因為對於R9-2500而言，此鏈路上沒有DR。

R9-2500(3)#show ip ospf database router

OSPF Router with ID (10.50.50.50) (Process ID 10)

Router Link States (Area 0)

LS age: 148

Options: (No TOS-capability, DC)

LS Type: Router Links

Link State ID: 10.50.50.50

Advertising Router: 10.50.50.50

LS Seq Number: 8000000B

Checksum: 0x55A

Length: 48

Number of Links: 2

Link connected to: a Stub Network

(Link ID) Network/subnet number: 10.10.10.0

(Link Data) Network Mask: 255.255.255.0

Number of TOS metrics: 0

TOS 0 Metrics: 64

Link connected to: a Stub Network

(Link ID) Network/subnet number: 10.50.50.50

(Link Data) Network Mask: 255.255.255.255

Number of TOS metrics: 0

TOS 0 Metrics: 1

Adv Router is not-reachable

LS age: 1081

Options: (No TOS-capability, DC)

LS Type: Router Links

Link State ID: 10.60.60.60

Advertising Router: 10.60.60.60

LS Seq Number: 80000006

Checksum: 0x4F72

Length: 48

Number of Links: 2

Link connected to: a Stub Network

(Link ID) Network/subnet number: 10.60.60.60

(Link Data) Network Mask: 255.255.255.255

Number of TOS metrics: 0

TOS 0 Metrics: 1

Link connected to: a Transit Network

(Link ID) Designated Router address: 10.10.10.7

(Link Data) Router Interface address: 10.10.10.6

Number of TOS metrics: 0

TOS 0 Metrics: 64

Adv Router is not-reachable

LS age: 306

Options: (No TOS-capability, DC)

LS Type: Router Links

Link State ID: 10.70.70.70

Advertising Router: 10.70.70.70

LS Seq Number: 80000007

Checksum: 0xC185

Length: 48

Number of Links: 2

Link connected to: a Stub Network

(Link ID) Network/subnet number: 10.70.70.70

(Link Data) Network Mask: 255.255.255.255

Number of TOS metrics: 0

TOS 0 Metrics: 1

Link connected to: a Transit Network

(Link ID) Designated Router address: 10.10.10.7

(Link Data) Router Interface address: 10.10.10.7

Number of TOS metrics: 0

TOS 0 Metrics: 64

有關此問題的詳細資訊，請參閱幀中繼上的NBMA和廣播模式中的OSPF問題。

原因6：通過外部路由已知的轉發地址

請考慮以下網路圖作為範例：

R2507

interface GigabitEthernet0/0

ip address 10.1.1.1 255.255.255.0

!

interface GigabitEthernet0/1

ip address 10.7.7.1 255.255.255.0

!

router ospf 1

network 10.1.1.1 0.0.0.0 area 0

default-information originate metric 20

!

ip route 0.0.0.0 0.0.0.0 10.7.7.2

R2504

interface GigabitEthernet0/0

ip address 10.1.1.2 255.255.255.0

!

interface GigabitEthernet0/1

ip address 10.3.4.2 255.255.255.0

!

router ospf 1

network 10.1.1.0 0.0.0.255 area 0

network 10.0.0.0 0.255.255.255 area 1

area 1 range 10.0.0.0 255.0.0.0

R2515

interface GigabitEthernet0/0

ip address 10.3.4.3 255.255.255.0

!

interface GigabitEthernet0/2

ip address 10.44.66.3 255.255.255.0

!

interface GigabitEthernet0/3

ip address 10.22.88.3 255.255.255.0

!

router ospf 1

redistribute eigrp 1 metric 20 subnets

network 0.0.0.0 255.255.255.255 area 1

!

router eigrp 1

network 10.3.4.0 0.0.0.255

R2513

interface GigabitEthernet0/0

ip address 10.3.4.4 255.255.255.0

!

interface GigabitEthernet0/1

ip address 10.200.1.4 255.255.255.0

!

router eigrp 1

network 10.3.4.0 0.0.0.255

network 10.200.1.0 0.0.0.255

R2507#show ip ospf database external 10.200.1.0

OSPF Router with ID (10.7.7.1) (Process ID 1)

Type-5 AS External Link States

LS age: 954

Options: (No TOS-capability, DC, Upward)

LS Type: AS External Link

Link State ID: 10.200.1.0 (External Network Number )

Advertising Router: 10.44.66.3

LS Seq Number: 80000007

Checksum: 0x46EF

Length: 36

Network Mask: /24

Metric Type: 2 (Larger than any link state path)

MTID: 0

Metric: 20

Forward Address: 10.3.4.4

External Route Tag: 0

R2507的資料庫中包含10.200.1.0/24，但它尚未將其安裝在路由表中，因為通過OSPF外部路由獲知10.3.4.4。

R2507#show ip route 10.3.4.4

Routing entry for 10.3.4.0/24

Known via "ospf 1", distance 110, metric 20,type extern 2, forward metric 70

Redistributing via ospf 1

Last update from 10.1.1.2 on GigabitEthernet0/0, 00:00:40 ago

Routing Descriptor Blocks:

* 10.1.1.2, from 10.44.66.3, 00:00:40 ago, via GigabitEthernet0/0

Route metric is 20, traffic share count is 1

注意：在此案例中，通過外部路由獲知轉發地址的原因在於下一個警告。在修復「Cisco bug ID CSCdp72526」（僅限註冊客戶）後，OSPF不會生成重疊外部網路的5類鏈路狀態通告(LSA)；因此，R2507僅顯示10.0.0.0/8的區域間總結路由。然後，R2507會安裝帶有轉發地址的10.200.1.0/24，並且可以通過區域間路由10.0.0.0/8到達，因此符合RFC 2328。

修正提及的錯誤後，輸出如下所示：

R2507#show ip route 10.3.4.4

Routing entry for 10.0.0.0/8

Known via "ospf 1", distance 110, metric 2, type inter area

Last update from 10.1.1.2 on GigabitEthernet0/0, 00:01:02 ago

Routing Descriptor Blocks:

* 10.1.1.2, from 10.3.4.2, 00:01:02 ago, via GigabitEthernet0/0

Route metric is 2, traffic share count is 1

R2507#show ip route

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, H - NHRP, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

Gateway of last resort is 10.7.7.2 to network 0.0.0.0

S*    0.0.0.0/0 [1/0] via 10.7.7.2

10.0.0.0/8 is variably subnetted, 6 subnets, 3 masks

O IA     10.0.0.0/8 [110/2] via 10.1.1.2, 00:01:41, GigabitEthernet0/0

C        10.1.1.0/24 is directly connected, GigabitEthernet0/0

L        10.1.1.1/32 is directly connected, GigabitEthernet0/0

C        10.7.7.0/24 is directly connected, GigabitEthernet0/1

L        10.7.7.1/32 is directly connected, GigabitEthernet0/1

O E2 10.200.1.0/24 [110/20] via 10.1.1.2, 03:30:47, GigabitEthernet0/0

如果轉發地址也通過外部路由得知，OSPF不會將該路由安裝到路由表中。有關此問題的更多詳細資訊，請參閱OSPF轉發地址的常見路由問題。

原因7：路由被分發清單阻止

下一個網路圖用作示例：

R4-4K

R1-7010

interface Loopback0

ip address 172.16.33.1 255.255.255.255

!

interface Serial2

ip address 172.16.32.1 255.255.255.0

!

router ospf 20

network 172.16.0.0 0.0.255.255 area 0

interface Loopback0

ip address 172.16.30.1 255.255.255.255

!

interface Serial1/0

ip address 172.16.32.2 255.255.255.0

clockrate 64000

!

router ospf 20

network 172.16.0.0 0.0.255.255 area 0

distribute-list 1 in

!

access-list 1 permit 172.16.32.0. 0.0.0.255

如前所述，R1-7010配置了distribute-list命令，它僅允許在路由表中安裝172.16.32.0/24地址範圍。在鏈路狀態協定中，您實際上無法使用distribute-list命令篩選LSA。LSA仍存在於資料庫中；但是LSA未安裝在路由表中。

R1-7010(5)#show ip ospf database router 172.16.33.1

LS age: 357

Options: (No TOS-capability, DC)

LS Type: Router Links

Link State ID: 172.16.33.1

Advertising Router: 172.16.33.1

LS Seq Number: 8000000A

Checksum: 0xD4AA

Length: 48

Number of Links: 3

Link connected to: another Router (point-to-point)

(Link ID) Neighboring Router ID: 172.16.32.2

(Link Data) Router Interface address: 172.16.32.1

Number of TOS metrics: 0

TOS 0 Metrics: 64

R1-7010上的distribute-list配置命令過濾172.16.33.1/32網路並阻止將子網安裝到路由表中。

R1-7010(5)#show ip route

172.16.0.0/16 is variably subnetted, 3 subnets, 2 masks

C       172.16.32.0/24 is directly connected, Serial1/0

C       172.16.30.1/32 is directly connected, Loopback0

解決方案

要解決此問題，請在訪問控制清單(ACL)中配置R1-7010並允許172.16.33.0/24，以便將此網路安裝到路由表中。

R1-7010(5)#configure terminal

R1-7010(5)(config)#access-list 1 permit 172.16.33.0 0.0.0.255

R1-7010(5)(config)#end

R1-7010(5)#show ip access-list 1

Standard IP access list 1

permit 172.16.32.0, wildcard bits 0.0.0.255

permit 172.16.33.0, wildcard bits 0.0.0.255

R1-7010(5)#show ip route

172.16.0.0/16 is variably subnetted, 3 subnets, 2 masks

C       172.16.32.0/24 is directly connected, Serial1/0

O       172.16.33.1/32 [110/65] via 172.16.32.1, 00:00:08, Serial1/0

C       172.16.30.1/32 is directly connected, Loopback0

相關資訊

- OSPF 支援頁面

- 思科技術支援和下載