目錄

簡介

必要條件

需求

採用元件

慣例

設定

網路圖表

組態

驗證

檢查OSPF資料庫

計算最短路徑

疑難排解

相關資訊

簡介

本文顯示兩個開放最短路徑優先(OSPF)路由器，它們通過點對多點鏈路連線。

必要條件

需求

本文件沒有特定需求。

採用元件

本文件所述內容不限於特定軟體和硬體版本。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

設定

本節提供用於設定本文件中所述功能的資訊。

註：使用Command Lookup Tool(僅限註冊客戶)查詢有關本文檔中使用的命令的更多資訊。

網路圖表

本檔案會使用以下網路設定：

組態

本檔案會使用以下設定：

- 路由器1.1.1.1

- 路由器2.2.2.2

路由器1.1.1.1

Current configuration:

hostname r1.1.1.1

interface Loopback0

ip address 1.1.1.1 255.0.0.0

interface Ethernet2/0/0

ip address 4.0.0.1 255.0.0.0

interface Serial2/1/0

ip address 5.0.0.1 255.0.0.0

ip ospf network point-to-multipoint

router ospf 1

network 4.0.0.0 0.255.255.255 area 0

network 5.0.0.0 0.255.255.255 area 0

end

路由器2.2.2.2

Current configuration:

hostname r2.2.2.2

interface Loopback0

ip address 2.2.2.2 255.0.0.0

interface Ethernet0/0/4

ip address 6.0.0.2 255.0.0.0

interface Serial2/1/0

ip address 5.0.0.2 255.0.0.0

ip ospf network point-to-multipoint

router ospf 2

network 6.0.0.0 0.255.255.255 area 0

network 5.0.0.0 0.255.255.255 area 0

end

驗證

本節提供的資訊可用於確認您的組態是否正常運作。

輸出直譯器工具(僅供已註冊客戶使用)(OIT)支援某些show命令。使用OIT檢視show命令輸出的分析。

- show ip ospf database — 顯示鏈路狀態通告(LSA)清單並將其鍵入鏈路狀態資料庫。此清單僅顯示LSA報頭中的資訊。

- show ip ospf database [router] [link-state-id] — 顯示資料庫中路由器的所有LSA的清單。LSA由每台路由器生成。這些基本LSA列出了所有路由器的鏈路或介面，以及鏈路的狀態和傳出成本。它們只被淹沒在它們的源頭地區。

檢查OSPF資料庫

若要檢視給定此網路環境的OSPF資料庫外觀，請檢視show ip ospf database 命令的輸出。

r2.2.2.2#show ip ospf database

OSPF Router with ID (2.2.2.2) (Process ID 2)

Router Link States (Area 0)

Link ID   ADV Router   Age    Seq#           Checksum   Link count

1.1.1.1  1.1.1.1       206    0x8000000A     0x158C       3

2.2.2.2  2.2.2.2       206    0x8000000B     0x791        3

r2.2.2.2#show ip ospf database router 1.1.1.1

OSPF Router with ID (2.2.2.2) (Process ID 2)

Router Link States (Area 0)

LS age: 224

Options: (No TOS-capability, DC)

LS Type: Router Links

Link State ID: 1.1.1.1

!--- For router links, Link State Id is always the same !--- as the Advertising Router (next line).

Advertising Router: 1.1.1.1

!--- This is the router ID of the router that created !--- this LSA.

LS Seq Number: 8000000A

Checksum: 0x158C

Length: 60

Number of Links: 3

Link connected to: another Router (point-to-point)

!--- This line shows that this router(1.1.1.1) is a !--- neighbor with 2.2.2.2.

(Link ID) Neighboring Router ID: 2.2.2.2

(Link Data) Router Interface address: 5.0.0.1

!--- This line shows the interface on this router !--- (1.1.1.1) that connects the neighbor (2.2.2.2).

Number of TOS metrics: 0

TOS 0 Metrics: 64

!--- The OSPF cost of the link is 64.

Link connected to: a Stub Network

!--- This router's (1.1.1.1) interface on the !--- point-to-multipoint network.

(Link ID) Network/subnet number: 5.0.0.1

(Link Data) Network Mask: 255.255.255.255

!--- Notice the mask. Only the interface is advertised, !--- not the whole subnet.

Number of TOS metrics: 0

TOS 0 Metrics: 0

!--- The OSPF cost for this router to reach its !--- own interface is zero.

Link connected to: a Stub Network

!--- Represents the subnet of the Ethernet segment 4.0.0.0/8.

(Link ID) Network/subnet number: 4.0.0.0

(Link Data) Network Mask: 255.0.0.0

Number of TOS metrics: 0

TOS 0 Metrics: 10

!--- The cost of the link is 10.

r2.2.2.2#show ip ospf database router 2.2.2.2

OSPF Router with ID (2.2.2.2) (Process ID 2)

Router Link States (Area 0)

LS age: 253

Options: (No TOS-capability, DC)

LS Type: Router Links

Link State ID: 2.2.2.2

Advertising Router: 2.2.2.2

LS Seq Number: 8000000B

Checksum: 0x791

Length: 60

Number of Links: 3

Link connected to: another Router (point-to-point)

(Link ID) Neighboring Router ID: 1.1.1.1

(Link Data) Router Interface address: 5.0.0.2

Number of TOS metrics: 0

TOS 0 Metrics: 64

Link connected to: a Stub Network

(Link ID) Network/subnet number: 5.0.0.2

(Link Data) Network Mask: 255.255.255.255

Number of TOS metrics: 0

TOS 0 Metrics: 0

Link connected to: a Stub Network

(Link ID) Network/subnet number: 6.0.0.0

(Link Data) Network Mask: 255.0.0.0

Number of TOS metrics: 0

TOS 0 Metrics: 10

計算最短路徑

本節從路由器2.2.2.2的角度計算最短路徑樹。

路由器2.2.2.2在自己的LSA中查詢，發現路由器1.1.1.1是鄰居。路由器2.2.2.2檢視1.1.1.1的路由器LSA，檢驗1.1.1.1將2.2.2.2視為鄰居。如果兩台路由器都視彼此為鄰居，則認為它們是可到達的。

每台路由器還檢查其本地鄰居表(可以使用show ip ospf neighbor命令檢查該表)，以檢驗其介面和鄰居的介面是否位於公用IP子網中。如果是，則路由器為其鄰居的路由器LSA中列出的任何末節網路安裝路由。

在本例中，路由器2.2.2.2在其路由表中安裝4.0.0.0/8的路由，因為路由器1.1.1.1在其自己的路由器LSA中將4.0.0.0/8列為末節網路。路由器1.1.1.1也將5.0.0.1/32列為末節，這是它在點對多點網路上的介面。因此，Router 2.2.2.2在其路由表中安裝用於5.0.0.1/32的OSPF路由。

Router 2.2.2.2#show ip route ospf

O    4.0.0.0/8 [110/74] via 5.0.0.1, 00:09:26, Serial0/1/0

O    5.0.0.1/32 [110/64] via 5.0.0.1, 00:09:26, Serial0/1/0

Router 1.1.1.1#show ip route ospf

O    6.0.0.0/8 [110/74] via 5.0.0.2, 00:00:49, Serial2/1/0

O    5.0.0.2/32 [110/64] via 5.0.0.2, 00:00:49, Serial2/1/0

疑難排解

目前尚無適用於此組態的具體疑難排解資訊。

相關資訊

- OSPF資料庫說明指南

- OSPF技術支援

- IP路由技術支援

- 技術支援與文件 - Cisco Systems