目錄

簡介

必要條件

需求

採用元件

驗證

相關思科支援社群討論

簡介

本檔案將說明在OSPF（開放最短路徑優先）網域中，ASBR（自治系統邊界路由器）為外部LSA（連結狀態通告）選擇轉送位址所使用的概念。

必要條件

需求

本文檔的讀者應瞭解以下主題：

- 基本IP路由。

- OSPF路由協定概念和術語。

採用元件

本文件所述內容不限於特定軟體和硬體版本。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

驗證

以下影象將用作文檔其餘部分的示例拓撲。

R3正在使用路由對映將網路192.168.20.0/24重分發到OSPF NSSA（非純末梢區域）。您可以使用任何將路由重分發到OSPF域的方法。

R3的相關配置：

router ospf 1

router-id 192.168.3.3

area 1 nssa

redistribute connected metric-type 1 subnets route-map CONN

network 10.143.31.0 0.0.0.255 area 1

route-map CONN, permit, sequence 10

Match clauses:

interface Ethernet0/1

Set clauses:

Policy routing matches: 0 packets, 0 bytes

interface Ethernet0/1

ip address 192.168.20.1 255.255.255.0

不同路由器之間的OSPF鄰居關係：

R1#sh ip ospf neighbor

Neighbor ID     Pri   State           Dead Time   Address         Interface

192.168.3.3       0   FULL/  -        00:00:38    10.143.31.234   Ethernet0/2

R2#sh ip ospf neighbor

Neighbor ID     Pri   State           Dead Time   Address         Interface

192.168.3.3       0   FULL/  -        00:00:36    10.143.31.230   Ethernet0/0

R3#sh ip ospf neighbor

Neighbor ID     Pri   State           Dead Time   Address         Interface

192.168.1.1       0   FULL/  -        00:00:34    10.143.31.233   Ethernet0/2

192.168.2.2       0   FULL/  -        00:00:30    10.143.31.229   Ethernet0/0

如果檢視R1和R2上外部路由「192.168.20.0」的度量，您會發現在R1上看到度量為30，在R2上看到度量為40。即使它們以相同的方式連線到R3，兩者也存在差異。

R1#sh ip route 192.168.20.0

Routing entry for 192.168.20.0/24

Known via "ospf 1", distance 110, metric 30, type NSSA extern 1

Last update from 10.143.31.234 on Ethernet0/2, 00:00:31 ago

Routing Descriptor Blocks:

* 10.143.31.234, from 192.168.3.3, 00:00:31 ago, via Ethernet0/2

Route metric is 30, traffic share count is 1

R2#sh ip route 192.168.20.0

Routing entry for 192.168.20.0/24

Known via "ospf 1", distance 110, metric 40, type NSSA extern 1

Last update from 10.143.31.230 on Ethernet0/0, 00:00:26 ago

Routing Descriptor Blocks:

* 10.143.31.230, from 192.168.3.3, 00:00:26 ago, via Ethernet0/0

Route metric is 40, traffic share count is 1

R1和R2上此字首的LSA資訊：

R1#sh ip ospf database nssa-external

OSPF Router with ID (192.168.1.1) (Process ID 1)

Type-7 AS External Link States (Area 1)

Routing Bit Set on this LSA in topology Base with MTID 0

LS age: 334

Options: (No TOS-capability, Type 7/5 translation, DC, Upward)

LS Type: AS External Link

Link State ID: 192.168.20.0 (External Network Number )

Advertising Router: 192.168.3.3

LS Seq Number: 80000003

Checksum: 0xA0E3

Length: 36

Network Mask: /24

Metric Type: 1 (Comparable directly to link state metric)

MTID: 0

Metric: 20

Forward Address: 10.143.31.234

External Route Tag: 0

R2#sh ip ospf database nssa-external

OSPF Router with ID (192.168.2.2) (Process ID 1)

Type-7 AS External Link States (Area 1)

Routing Bit Set on this LSA in topology Base with MTID 0

LS age: 352

Options: (No TOS-capability, Type 7/5 translation, DC, Upward)

LS Type: AS External Link

Link State ID: 192.168.20.0 (External Network Number )

Advertising Router: 192.168.3.3

LS Seq Number: 80000003

Checksum: 0xA0E3

Length: 36

Network Mask: /24

Metric Type: 1 (Comparable directly to link state metric)

MTID: 0

Metric: 20

Forward Address: 10.143.31.234

External Route Tag: 0

您可以看到，第7類LSA的轉發地址在R1和R2上相同。此外，此轉發地址屬於R3和R1之間的介面。此轉發地址對於R1是直接連線的，但是對於R2，可以通過R3到達。這意味著對於R2，轉發地址是額外的一跳。

如果R3選擇R3和R2之間鏈路的IP地址作為轉發地址，則R1上會出現類似的情況。

使用以下規則在ASBR上選擇轉發地址：

1. 如果區域中配置了環回，則會選擇環回的IP地址作為轉發地址。

2. 如果不滿足第一個條件，則選擇OSPF介面清單上第一個介面的IP地址作為轉發地址。您可以使用「show ip ospf interface brief」命令檢視OSPF介面清單。頂部介面是連線到OSPF的最後一個介面。

R3#sh ip ospf interface brief

Interface    PID   Area            IP Address/Mask    Cost  State Nbrs F/C

Et0/2        1     1               10.143.31.234/30   10    P2P   1/1

Et0/0        1     1               10.143.31.230/30   10    P2P   1/1

Et0/2顯示在「show ip ospf interface brief」的頂部，這就是選擇其IP地址作為轉發地址的原因。

將Et0/0的配置更改為預設配置會使其從OSPF分離。再次新增配置會將其連線回OSPF。  在此之後，Et0/0將列在「show ip ospf interface brief」輸出的頂部。

R3#conf t

Enter configuration commands, one per line.  End with CNTL/Z.

R3(config)#

R3(config)#default interface e0/0

Interface Ethernet0/0 set to default configuration

*Aug  3 11:25:47.625: %OSPF-5-ADJCHG: Process 1, Nbr 192.168.2.2 on Ethernet0/0 from FULL to DOWN, Neighbor Down: Interface down or detached

R3(config)#interface Ethernet0/0

R3(config-if)# ip address 10.143.31.230 255.255.255.252

R3(config-if)# ip ospf network point-to-point

R3(config-if)#end

R3#*Aug  3 11:26:03.995: %OSPF-5-ADJCHG: Process 1, Nbr 192.168.2.2 on Ethernet0/0 from LOADING to FULL, Loading Done

R3#sh ip ospf interface brief

Interface    PID   Area            IP Address/Mask    Cost  State Nbrs F/C

Et0/0        1     1               10.143.31.230/30   10    P2P   1/1

Et0/2        1     1               10.143.31.234/30   10    P2P   1/1

此更改將導致轉發地址重新計算為Et0/0上配置的IP地址的地址。

R1#sh ip ospf database nssa-external

OSPF Router with ID (192.168.1.1) (Process ID 1)

Type-7 AS External Link States (Area 1)

Routing Bit Set on this LSA in topology Base with MTID 0

LS age: 284

Options: (No TOS-capability, Type 7/5 translation, DC, Upward)

LS Type: AS External Link

Link State ID: 192.168.20.0 (External Network Number )

Advertising Router: 192.168.3.3

LS Seq Number: 80000004

Checksum: 0x6621

Length: 36

Network Mask: /24

Metric Type: 1 (Comparable directly to link state metric)

MTID: 0

Metric: 20

Forward Address: 10.143.31.230

External Route Tag: 0

R2#sh ip ospf database nssa-external

OSPF Router with ID (192.168.2.2) (Process ID 1)

Type-7 AS External Link States (Area 1)

Routing Bit Set on this LSA in topology Base with MTID 0

LS age: 303

Options: (No TOS-capability, Type 7/5 translation, DC, Upward)

LS Type: AS External Link

Link State ID: 192.168.20.0 (External Network Number )

Advertising Router: 192.168.3.3

LS Seq Number: 80000004

Checksum: 0x6621

Length: 36

Network Mask: /24

Metric Type: 1 (Comparable directly to link state metric)

MTID: 0

Metric: 20

Forward Address: 10.143.31.230

External Route Tag: 0

現在，「show ip route」的輸出將顯示到達R1上外部路由的度量是40,R2上是30。這與前面的輸出相反。

R1#sh ip route 192.168.20.0

Routing entry for 192.168.20.0/24

Known via "ospf 1", distance 110, metric 40, type NSSA extern 1

Last update from 10.143.31.234 on Ethernet0/2, 00:06:14 ago

Routing Descriptor Blocks:

* 10.143.31.234, from 192.168.3.3, 00:06:14 ago, via Ethernet0/2

Route metric is 40, traffic share count is 1

R2#sh ip route 192.168.20.0

Routing entry for 192.168.20.0/24

Known via "ospf 1", distance 110, metric 30, type NSSA extern 1

Last update from 10.143.31.230 on Ethernet0/0, 00:06:29 ago

Routing Descriptor Blocks:

* 10.143.31.230, from 192.168.3.3, 00:06:29 ago, via Ethernet0/0

Route metric is 30, traffic share count is 1

這種更改可能是不可預測的，並且會導致網路收斂，因此建議使用環回IP地址作為轉發地址。

R3(config)#int lo0

R3(config-if)#ip address 192.168.3.3 255.255.255.255

R3(config-if)#router ospf 1

R3(config-router)#network 192.168.3.3 0.0.0.0 area 1

R3(config-router)#end

這也會導致R1和R2上的度量相等：

R1#sh ip ospf database nssa-external

OSPF Router with ID (192.168.1.1) (Process ID 1)

Type-7 AS External Link States (Area 1)

Routing Bit Set on this LSA in topology Base with MTID 0

LS age: 1

Options: (No TOS-capability, Type 7/5 translation, DC, Upward)

LS Type: AS External Link

Link State ID: 192.168.20.0 (External Network Number )

Advertising Router: 192.168.3.3

LS Seq Number: 80000005

Checksum: 0x872F

Length: 36

Network Mask: /24

Metric Type: 1 (Comparable directly to link state metric)

MTID: 0

Metric: 20

Forward Address: 192.168.3.3

External Route Tag: 0

R1#sh ip route 192.168.20.0

Routing entry for 192.168.20.0/24

Known via "ospf 1", distance 110, metric 31, type NSSA extern 1

Last update from 10.143.31.234 on Ethernet0/2, 00:01:27 ago

Routing Descriptor Blocks:

* 10.143.31.234, from 192.168.3.3, 00:01:27 ago, via Ethernet0/2

Route metric is 31, traffic share count is 1

R2#sh ip ospf database nssa-external

OSPF Router with ID (192.168.2.2) (Process ID 1)

Type-7 AS External Link States (Area 1)

Routing Bit Set on this LSA in topology Base with MTID 0

LS age: 6

Options: (No TOS-capability, Type 7/5 translation, DC, Upward)

LS Type: AS External Link

Link State ID: 192.168.20.0 (External Network Number )

Advertising Router: 192.168.3.3

LS Seq Number: 80000005

Checksum: 0x872F

Length: 36

Network Mask: /24

Metric Type: 1 (Comparable directly to link state metric)

MTID: 0

Metric: 20

Forward Address: 192.168.3.3

External Route Tag: 0

R2#sh ip route 192.168.20.0

Routing entry for 192.168.20.0/24

Known via "ospf 1", distance 110, metric 31, type NSSA extern 1

Last update from 10.143.31.230 on Ethernet0/0, 00:01:57 ago

Routing Descriptor Blocks:

* 10.143.31.230, from 192.168.3.3, 00:01:57 ago, via Ethernet0/0

Route metric is 31, traffic share count is 1

附註：有關外部LSA的非零轉發地址的詳細資訊，請參閱OSPF轉發地址的常見路由問題。