目錄

簡介

必要條件

需求

採用元件

設定

B2BHA故障轉移觸發器

最低配置

具有基本L2/L3連線的網路圖

驗證

驗證命令和預期輸出

有用的命令

疑難排解

簡介

本檔案將介紹Cisco IOS®-XE裝置上機箱間NAT高可用性(B2B NAT HA)的配置，重點介紹聚合服務路由器(ASR)1000系列。

B2B NAT HA是在ASR 1000系列路由器之間實現高可用性應用的方法，例如基於區域的防火牆(ZBFW)、網路地址轉換(NAT)、VPN、會話邊界控制器(SBC)等。本文檔介紹如何在Cisco ASR 1000平台上配置B2B NAT HA以及驗證。

必要條件

需求

思科建議您瞭解以下主題：

- ASR 1000平台架構的概述知識

- 有關高可用性和NAT技術的基礎知識

採用元件

本檔案中的資訊是根據搭載Cisco IOS版本XE 3.10及更新版本的ASR 1000系列而來。Cisco IOS-XE 3.5版及更新版本支援B2B NAT HA。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

設定

B2BHA故障轉移觸發器

一些常見的故障切換觸發器包括：

- 活動狀態斷電/重新載入（包括崩潰）。

- 重新載入嵌入式服務處理器(ESP)（計畫內或計畫外）。

- 冗餘組(RG)的控制介面關閉/鏈路關閉。

- RG的資料介面關閉/鏈路關閉。

- 跟蹤的對象故障（IP服務級別協定）。

- 協定保持連線失敗。

- 活動的運行時優先順序低於配置的閾值。

- 主用裝置的運行時優先順序低於備用裝置的運行優先順序。

最低配置

本節介紹如何配置B2B NAT HA以及拓撲資訊。

B2 BHA部署可能有以下三種拓撲：

- LAN-LAN

- LAN-WAN

- LAN網狀

附註：平均冗餘資料包大小為256位元組。

具有基本L2/L3連線的網路圖

基本L2/L3連線

組態可分為兩個主要部分。一部分是啟用RG、冗餘協定、計時器、控制和資料介面的基本配置。第二部分涉及實際資料/流量介面及其與RG的關聯。

此示例嘗試在LAN 172.16.1.4的遠端伺服器192.168.5.5的ASR上實現B2B NAT HA。這些配置目前使用靜態NAT配置進行準備。

ip nat pool POOL1 200.200.200.200 200.200.200.200 netmask 255.255.255.252

ip nat inside source list NAT pool POOL1 redundancy 1 mapping-id 252

Extended IP access list NAT

10 permit ip host 172.16.1.4 host 192.168.5.5

ASR-1

redundancy

mode none

application redundancy

group 1

name TEST

preempt

priority 150

control GigabitEthernet0/0/2

protocol 1

data GigabitEthernet0/0/3

ASR-2

redundancy

mode none

application redundancy

group 1

name TEST

preempt

priority 50

control GigabitEthernet0/0/2

protocol 1

data GigabitEthernet0/0/3

兩個ASR都應該能夠到達ISP提供的公共IP地址。

ASR-1#ping 200.200.200.200

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 200.200.200.200, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/1/1 ms

ASR-2#ping 200.200.200.200

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 200.200.200.200, timeout is 2 seconds:

!!!!!

面向區域網的介面連線到分佈層交換機，分佈層交換機又連線到主機。

ASR-1#show run int GigabitEthernet0/0/0

interface GigabitEthernet0/0/0

ip address 172.16.1.2 255.255.255.248

ip nat inside

negotiation auto

cdp enable

redundancy rii 100

redundancy group 1 ip 172.16.1.5

exclusive decrement 100

end

ASR-2#show run int GigabitEthernet0/0/0

interface GigabitEthernet0/0/0

ip address 172.16.1.3 255.255.255.248

ip nat inside

negotiation auto

cdp enable

redundancy rii 100

redundancy group 1 ip 172.16.1.5

exclusive decrement 100

end

面向ISP的介面具有以下配置：

ASR-1#show run int gi0/0/1

interface GigabitEthernet0/0/1

ip address 192.168.3.2 255.255.255.252

ip nat outside

negotiation auto

cdp enable

redundancy rii 101

redundancy asymmetric-routing enable

redundancy group 1 decrement 20

end

ASR-2#show run int gi0/0/1

interface GigabitEthernet0/0/1

ip address 192.168.4.2 255.255.255.252

ip nat outside

negotiation auto

cdp enable

redundancy rii 101

redundancy asymmetric-routing enable

redundancy group 1 decrement 20

end

ASR之間的「資料」和「控制」介面已配置如以下各節所示。

控制介面

ASR-1#show run int gi0/0/2

interface GigabitEthernet0/0/2

description CONTROL-INTERFACE

ip address 10.10.10.1 255.255.255.252

negotiation auto

cdp enable

end

ASR-2#show run int gi0/0/2

interface GigabitEthernet0/0/2

description CONTROL INTERFACE

ip address 10.10.10.2 255.255.255.252

negotiation auto

cdp enable

end

資料介面

ASR-1#show run int gi0/0/3

interface GigabitEthernet0/0/3

description DATA INTERFACE

encapsulation dot1Q 10

ip address 10.11.11.1 255.255.255.252

end

ASR-2#show run int gi0/0/3

interface GigabitEthernet0/0/3

description DATA INTERFACE

encapsulation dot1Q 10

ip address 10.11.11.2 255.255.255.252

end

附註：

— 不得在配置為資料介面或控制介面的介面上配置冗餘介面識別符號(RII)。

— 您必須在活動裝置和備用裝置上配置RII和非對稱路由。

— 不能在已配置虛擬IP地址的介面上啟用非對稱路由。

驗證

驗證命令和預期輸出

Cisco CLI Analyzer（僅供已註冊客戶使用）支援某些 show 指令。使用 Cisco CLI Analyzer 檢視 show 指令輸出的分析。

ASR-1#show redundancy application group

Group ID    Group Name                      State

--------    ----------                      -----

1           TEST                           ACTIVE

ASR-2#show redundancy application group

Group ID    Group Name                      State

--------    ----------                      -----

1           TEST                           STANDBY

ASR-1#show redundancy application group 1

Group ID:1

Group Name:TEST

Administrative State: No Shutdown

Aggregate operational state : Up

My Role: ACTIVE

Peer Role: STANDBY

Peer Presence: Yes

Peer Comm: Yes

Peer Progression Started: Yes

RF Domain: btob-one

RF state: ACTIVE

Peer RF state: STANDBY HOT

ASR-2#show redundancy application group 1

Group ID:1

Group Name:TEST

Administrative State: No Shutdown

Aggregate operational state : Up

My Role: STANDBY

Peer Role: ACTIVE

Peer Presence: Yes

Peer Comm: Yes

Peer Progression Started: Yes

RF Domain: btob-one

RF state: STANDBY HOT

Peer RF state: ACTIVE

ASR-1#show ip nat translations

Pro  Inside global         Inside local          Outside local         Outside global

---  200.200.200.200       172.16.1.4            ---                   ---

icmp 200.200.200.200:98    172.16.1.4:98         192.168.5.5:98        192.168.5.5:98

Total number of translations: 2

ASR-2#show ip nat translations

Pro  Inside global         Inside local          Outside local         Outside global

---  200.200.200.200       172.16.1.4            ---                   ---

icmp 200.200.200.200:98    172.16.1.4:98         192.168.5.5:98        192.168.5.5:98

Total number of translations: 2

ASR-1#show redundancy application protocol group 1

RG Protocol RG 1

------------------

Role: Active

Negotiation: Enabled

Priority: 150

Protocol state: Active

Ctrl Intf(s) state: Up

Active Peer: Local

Standby Peer: address 10.10.10.2, priority 50, intf Gi0/0/2

Log counters:

role change to active: 7

role change to standby: 7

disable events: rg down state 7, rg shut 0

ctrl intf events: up 7, down 8, admin_down 7

reload events: local request 0, peer request 0

RG Media Context for RG 1

--------------------------

Ctx State: Active

Protocol ID: 1

Media type: Default

Control Interface: GigabitEthernet0/0/2

Current Hello timer: 3000

Configured Hello timer: 3000, Hold timer: 9000

Peer Hello timer: 3000, Peer Hold timer: 9000

Stats:

Pkts 386597, Bytes 23969014, HA Seq 0, Seq Number 386597, Pkt Loss 0

Authentication not configured

Authentication Failure: 0

Reload Peer: TX 0, RX 0

Resign: TX 0, RX 1

Standby Peer: Present. Hold Timer: 9000

Pkts 386589, Bytes 13144026, HA Seq 0, Seq Number 1503658, Pkt Loss 0

ASR-2#show redundancy application protocol group 1

RG Protocol RG 1

------------------

Role: Standby

Negotiation: Enabled

Priority: 50

Protocol state: Standby-hot

Ctrl Intf(s) state: Up

Active Peer: address 10.10.10.1, priority 150, intf Gi0/0/2

Standby Peer: Local

Log counters:

role change to active: 8

role change to standby: 16009

disable events: rg down state 1, rg shut 0

ctrl intf events: up 9, down 10, admin_down 1

reload events: local request 15999, peer request 2

RG Media Context for RG 1

--------------------------

Ctx State: Standby

Protocol ID: 1

Media type: Default

Control Interface: GigabitEthernet0/0/2

Current Hello timer: 3000

Configured Hello timer: 3000, Hold timer: 9000

Peer Hello timer: 3000, Peer Hold timer: 9000

Stats:

Pkts 1503674, Bytes 93227788, HA Seq 0, Seq Number 1503674, Pkt Loss 0

Authentication not configured

Authentication Failure: 0

Reload Peer: TX 2, RX 2

Resign: TX 8, RX 7

Active Peer: Present. Hold Timer: 9000

Pkts 386603, Bytes 13144502, HA Seq 0, Seq Number 386613, Pkt Loss 0

ASR-1#show platform hardware qfp active system rg 1

Redundancy Group 1

State:        RG_ACTIVE

Bulksync:    NO BULKSYNC REQ

Transport:

SYNC_B2B    LISTEN

cp hdl 0x01013e8d dp hdl 0x03010006, platfm hdl 0x0000fa35

L3_IPV4

src addr 10.11.11.1    dest addr 10.11.11.2

L4_UDP_RELIABLE

src port   19510    dest port   3497

AR transport not available

Stats:

RG Request:

CREATE        0

UPDATE        32048

DELETE        0

RG State:

RG_PREINIT        0

RG_INIT            7

RG_STANDBY        21

RG_ACTIVE        32020

RG Transport Request:

NA            0

OPEN            16014

CLOSE            0

RG Transport Status:

CONN_ESTB        7

CONN_FAIL        0

TRANS_DOWN        0

TRANS_DOWN_GRACEFUL    8

Bulksync:

Request            7

Success            7

Fail            0

ASR-1#show platform hardware qfp active system rg 1 stats

trans index:    00000006  Trans Type:    00000001  RG    1

mf_flags    0x40000000  seq_flags    0x700003ff

ha_control_state    0x5

pending ack        00000000

keepalive_timeout    00000100

rx_seq_flags        0x8000000

rx_seq_num    0x2c0d4a44

tx_seq        0xb4965908

tx_ack_tail    0xb4965908

tx_seq_flags    0x700003ff

tx    0000000000580126

rx    0000000000580089

retx    0000000000000000

rx dropped    0000000000000000

records dropped    0000000000000000

tx dropped    0000000000000000

ack dropped    00000000  oob pkts dropped 00000000

send dropped 00000000  rx_control_msgs 00580090

tx control_msgs 00580078   for_us_hits 01160217

sync_alloc_failures 00000000  status_notifications 00000001

sync_msgs_received 00580093  sync_msgs_sent 00580133

for_us_udp_checksum_drops 00000000

acks sent 00580089 rcvd 00580126  nacks sent 00000000 rcvd 00000000

有用的命令

- 在exec模式下，使用redundancy application reload group <rg-number> self命令重新載入處於活動狀態的RG。

- 活動狀態的RG在冗餘配置模式下使用以下CLI命令關閉：
ISR1(config-red-app)#group 1

ISR1(config-red-app-grp)#shutdown

疑難排解

目前尚無適用於此組態的具體疑難排解資訊。