目錄

簡介

必要條件

必要條件

硬體和軟體版本

慣例

設定

網路圖表

組態

驗證

檢驗OSPFv3配置

驗證BGP設定

相關資訊

簡介

本文檔提供了將開放最短路徑優先3版(OSPFv3)路由重分發到IPv6多協定BGP的示例。OSPFv3擴展了OSPF版本2，以便支援IPv6路由字首和較大尺寸的IPv6地址。多協定BGP是一種增強型BGP，它承載多個網路層協定地址系列（如IPv6地址系列）和IP組播路由的路由資訊。

必要條件

必要條件

嘗試此組態之前，請確保符合以下要求：

- OSPFv3 的範例組態

- 適用於IPv6的多重通訊協定BGP組態範例

- 重新分配路由通訊協定

硬體和軟體版本

本文件所述內容不限於特定軟體和硬體版本。

本檔案中的組態是根據搭載Cisco IOS®軟體版本12.4(15)T1的Cisco 3700系列路由器。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

設定

在本示例中，路由器R2和R3通過串列介面連線，並且配置了多協定BGP。路由器R2和R3使用OSPFv3與其本地路由器R1和R4通訊。在路由器中建立環回地址以生成網路。同時運行BGP和OSPFv3的路由器R2和R3，使用redistribute命令將OSPFv3路由重分發到BGP。所有路由器都配置了IPv6地址。

註：使用Command Lookup Tool(僅限註冊客戶)查詢有關本文檔中使用的命令的更多資訊。

網路圖表

本檔案會使用以下網路設定：

組態

本檔案會使用以下設定：

- 路由器R1

- 路由器R2

- 路由器R3

- 路由器R4

路由器R1

!

version 12.4

!

hostname R1

!

ip cef

!

ipv6 unicast-routing

!--- Enables the forwarding of IPv6 packets.

!

interface Loopback0

no ip address

ipv6 address 2222::1/128

ipv6 ospf 1 area 0

!--- Enables OSPFv3 on the interface and associates !--- the interface loopback0 to area 0.

!

interface FastEthernet0/0

no ip address

duplex auto

speed auto

ipv6 address 1010:1:1:1::1/64

ipv6 ospf 1 area 0

!--- Associates the Interface Fa0/0 to area 0.

!

ipv6 router ospf 1

router-id 1.1.1.1

!--- Router R1 uses 1.1.1.1 as router ID.

log-adjacency-changes

!

end

路由器R2

!

version 12.4

!

hostname R2

!

ip cef

!

ipv6 unicast-routing

!

interface Loopback0

no ip address

ipv6 address 2010::1/128

ipv6 ospf 1 area 1

!

interface Loopback1

no ip address

ipv6 address 2011::1/128

ipv6 ospf 1 area 1

!

interface Loopback99

no ip address

ipv6 address 5050:55:55:55::55/128

!

interface FastEthernet0/0

no ip address

duplex auto

speed auto

ipv6 address 1010:1:1:1::2/64

ipv6 ospf 1 area 0

!

interface Serial0/0

no ip address

ipv6 address 3030:1:1:1::10/64

clock rate 2000000

!

router bgp 65000

bgp router-id 1.1.1.1

no bgp default ipv4-unicast

!--- Without configuring "no bgp default ipv4-unicast" only !--- IPv4 will be advertised.

bgp log-neighbor-changes

neighbor 3030:1:1:1::11 remote-as 65000

neighbor 3030:1:1:1::11 update-source Serial0/0

!

address-family ipv6

neighbor 3030:1:1:1::11 activate

network 5050:55:55:55::55/128

redistribute connected

redistribute ospf 1 match internal external 1 external 2

!--- This redistributes all OSPF routes into BGP.

no synchronization

exit-address-family

!

ipv6 router ospf 1

router-id 2.2.2.2

log-adjacency-changes

!

end

路由器R3

!

version 12.4

!

hostname R3

!

ip cef

!

ipv6 unicast-routing

!

interface Loopback0

no ip address

ipv6 address 1111::1/128

ipv6 ospf 1 area 1

!

interface Loopback1

no ip address

ipv6 address 1112::1/128

ipv6 ospf 1 area 1

!

interface Loopback99

no ip address

ipv6 address 6060:66:66:66::66/128

!

interface FastEthernet0/0

no ip address

duplex auto

speed auto

ipv6 address 2020:1:1:1::2/64

ipv6 ospf 1 area 0

!

interface Serial0/0

no ip address

ipv6 address 3030:1:1:1::11/64

clock rate 2000000

!

router bgp 65000

bgp router-id 2.2.2.2

no bgp default ipv4-unicast

bgp log-neighbor-changes

neighbor 3030:1:1:1::10 remote-as 65000

neighbor 3030:1:1:1::10 update-source Serial0/0

!

address-family ipv6

neighbor 3030:1:1:1::10 activate

network 6060:66:66:66::66/128

redistribute connected

redistribute ospf 1 match internal external 1 external 2

no synchronization

exit-address-family

!

ipv6 router ospf 1

router-id 3.3.3.3

log-adjacency-changes

!

end

路由器R4

!

version 12.4

!

hostname R4

!

ip cef

!

ipv6 unicast-routing

!

interface Loopback0

no ip address

ipv6 address 3333::1/128

ipv6 ospf 1 area 0

!

interface FastEthernet0/0

no ip address

duplex auto

speed auto

ipv6 address 2020:1:1:1::1/64

ipv6 ospf 1 area 0

!

ipv6 router ospf 1

router-id 5.5.5.5

log-adjacency-changes

!

end

驗證

使用本節內容，確認您的組態是否正常運作。

輸出直譯器工具(僅供已註冊客戶使用)(OIT)支援某些show命令。使用OIT檢視show命令輸出的分析。

以下show命令用於驗證設定：

- show ipv6 route ospf

- show ipv6 route bgp

檢驗OSPFv3配置

為了檢驗OSPFv3配置是否正確，請在路由器R1和R4中使用show ipv6 route ospf 命令。

show ipv6 route ospf

在路由器R1中

R1#show ipv6 route ospf

IPv6 Routing Table - 6 entries

Codes: C - Connected, L - Local, S - Static, R - RIP, B - BGP

U - Per-user Static route, M - MIPv6

I1 - ISIS L1, I2 - ISIS L2, IA - ISIS interarea, IS - ISIS summary

O - OSPF intra, OI - OSPF inter, OE1 - OSPF ext 1, OE2 - OSPF ext 2

ON1 - OSPF NSSA ext 1, ON2 - OSPF NSSA ext 2

D - EIGRP, EX - EIGRP external

OI  2010::1/128 [110/10]

via FE80::C001:16FF:FEDC:0, FastEthernet0/0

OI  2011::1/128 [110/10]

via FE80::C001:16FF:FEDC:0, FastEthernet0/0

路由器R4中

R4#show ipv6 route ospf

IPv6 Routing Table - 6 entries

Codes: C - Connected, L - Local, S - Static, R - RIP, B - BGP

U - Per-user Static route, M - MIPv6

I1 - ISIS L1, I2 - ISIS L2, IA - ISIS interarea, IS - ISIS summary

O - OSPF intra, OI - OSPF inter, OE1 - OSPF ext 1, OE2 - OSPF ext 2

ON1 - OSPF NSSA ext 1, ON2 - OSPF NSSA ext 2

D - EIGRP, EX - EIGRP external

OI  1111::1/128 [110/10]

via FE80::C002:16FF:FEDC:0, FastEthernet0/0

OI  1112::1/128 [110/10]

via FE80::C002:16FF:FEDC:0, FastEthernet0/0

驗證BGP設定

要驗證OSPFv3路由是否重新分發到BGP，請在路由器R2和R3中使用show ipv6 route bgp 命令。

show ipv6 route bgp

在路由器R2中
R2#show ipv6 route bgp

IPv6 Routing Table - 14 entries

Codes: C - Connected, L - Local, S - Static, R - RIP, B - BGP

U - Per-user Static route, M - MIPv6

I1 - ISIS L1, I2 - ISIS L2, IA - ISIS interarea, IS - ISIS summary

O - OSPF intra, OI - OSPF inter, OE1 - OSPF ext 1, OE2 - OSPF ext 2

ON1 - OSPF NSSA ext 1, ON2 - OSPF NSSA ext 2

D - EIGRP, EX - EIGRP external

B   1111::1/128 [200/0]

via 3030:1:1:1::11

B   1112::1/128 [200/0]

via 3030:1:1:1::11

B   2020:1:1:1::/64 [200/0]

via 3030:1:1:1::11

B   3333::1/128 [200/10]

via 3030:1:1:1::11

!--- The above routes are OSPFv3 routes !--- that are redistributed in to BGP.

B   6060:66:66:66::66/128 [200/0]

via 3030:1:1:1::11

在路由器R3中

R3#show ipv6 route bgp

IPv6 Routing Table - 14 entries

Codes: C - Connected, L - Local, S - Static, R - RIP, B - BGP

U - Per-user Static route, M - MIPv6

I1 - ISIS L1, I2 - ISIS L2, IA - ISIS interarea, IS - ISIS summary

O - OSPF intra, OI - OSPF inter, OE1 - OSPF ext 1, OE2 - OSPF ext 2

ON1 - OSPF NSSA ext 1, ON2 - OSPF NSSA ext 2

D - EIGRP, EX - EIGRP external

B   1010:1:1:1::/64 [200/0]

via 3030:1:1:1::10

B   2010::1/128 [200/0]

via 3030:1:1:1::10

B   2011::1/128 [200/0]

via 3030:1:1:1::10

B   2222::1/128 [200/10]

via 3030:1:1:1::10

!--- The above routes are OSPFv3 routes !--- that are redistributed in to BGP.

B   5050:55:55:55::55/128 [200/0]

via 3030:1:1:1::10

相關資訊

- IPv6支援頁面

- OSPF支援頁

- BGP 支援頁面

- 技術支援與文件 - Cisco Systems