目錄

簡介

必要條件

需求

採用元件

設定

網路圖表

組態

SSM

ASM

源暫存器優先

接收者優先

最短路徑樹(SPT)切換

驗證

疑難排解

來源

簡介

本檔案將說明在透過Locator/ID分隔通訊協定(LISP)進行多點傳送實作的階段1中使用輸入複製。這意味著單播路由定位器(RLOC)核心用於傳輸身份資訊(EID)組播。

必要條件

需求

思科建議您瞭解LISP和組播。

採用元件

本文件所述內容不限於特定軟體和硬體版本。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

設定

網路圖表

組態

階段1支援組播資料包的單播頭端複製。

- 第1階段支援開始於XE 3.13和Cisco IOS® 15.4(2)T。

- 第1階段支援通過IPv4的IPv4 EID RLOC（傳輸）開始於XE 3.13和Cisco IOS® 15.4(2)T。

- 第1階段支援基於IPv4的IPv6 EID RLOC（傳輸）僅在預設vrf中從Polaris 16.6.1開始，僅適用於具有用於軟體定義接入(SDA)的VXLAN封裝的LISP。

- 第1階段支持使用IID的EID虛擬路由和轉發(VRF)（分段）（通過PIM VRF支援）。

- 階段1支援任何源組播(ASM)和源特定組播(SSM)模型。

- 第1階段僅支援靜態路由處理器(RP)配置。

- 第1階段不支援RP冗餘。

- 階段1支援LISP和非LISP功能的源站點和接收站點的各種組合。

- 不支援將LISP組播作為LISP移動資料中心互聯(DCI)解決方案。

假設在網路上配置了組播(pim sparse-mode/rp)。

為了啟用通過LISP的組播，您必須在LISP0或LISP0.xx介面下新增「ip pim sparse-mode」。通過在LISP介面上啟用PIM，它包含在RPF中。通過LISP站點可到達的字首的RPF資訊包括LISP隧道和由上游站點的RLOC地址表示的鄰居。

僅允許通過LISP隧道傳送加入/修剪消息。站點之間不交換PIM Hello消息。PIM加入/修剪消息被單播封裝到上游xTR（RP或源）。 其他xTR/PxTR看不到加入/修剪消息。MVPN中沒有與預設MDT類似的功能。

必須在LISP隧道介面下啟用PIM以進行組播處理。

EID虛擬化將LISP例項ID與EID VRF結合使用。介面LISP0.x，其中x=IID為每個EID VRF/LISP例項ID建立。

xTR1#sh run

!

interface LISP0

ip pim sparse-mode <<<< PIM under the LISP interface

!

interface LISP0.20

ip pim sparse-mode <<<< PIM under the LISP interface

end

xTR1#sh ip pim int

Address          Interface                Ver/   Nbr    Query  DR         DR

Mode   Count  Intvl  Prior

172.16.11.1      GigabitEthernet3.10      v2/S   1      30     1          172.16.11.2

10.1.255.1       LISP0                    v2/S   0      30     1          10.1.255.1

沒有通過LISP介面看到鄰居，因為沒有活動源/接收器，對等體之間不會交換PIM Hello。

xTR1#sh ip pim nei

PIM Neighbor Table

Mode: B - Bidir Capable, DR - Designated Router, N - Default DR Priority,

P - Proxy Capable, S - State Refresh Capable, G - GenID Capable,

L - DR Load-balancing Capable

Neighbor          Interface                Uptime/Expires    Ver   DR

Address                                                            Prio/Mode

172.16.11.2       GigabitEthernet3.10      01:43:52/00:01:34 v2    1 / DR S P G

SSM

讓我們配置CE2上的介面lo10以加入組。它觸發(S，G)連線，因為已指定組和源。

CE2#conf t

Enter configuration commands, one per line.  End with CNTL/Z.

CE2(config)#int lo10

CE2(config-if)#ip igmp join-group 232.1.1.10 source 172.16.251.1

*Nov 26 18:28:55.471: PIM(0): Insert (172.16.251.1,232.1.1.10) join in nbr 172.16.12.1's queue

*Nov 26 18:28:55.491: PIM(0): Building Join/Prune packet for nbr 172.16.12.1

*Nov 26 18:28:55.491: PIM(0):  Adding v2 (172.16.251.1/32, 232.1.1.10), S-bit Join

*Nov 26 18:28:55.492: PIM(0): Send v2 join/prune to 172.16.12.1 (GigabitEthernet0/1.10)

*Nov 26 18:28:56.856: PIM(0): Send v2 join/prune to 172.16.12.1 (GigabitEthernet0/1.1

在CE2上建立(S，G)mroute。

CE2#sh ip mro 232.1.1.10

<…skip…>

(172.16.251.1, 232.1.1.10), 00:00:16/00:02:45, flags: sLTI

Incoming interface: GigabitEthernet0/1.10, RPF nbr 172.16.12.1

Outgoing interface list:

Loopback10, Forward/Sparse, 00:00:14/00:02:45

檢查xTR2上發生了什麼情況。

Debug ip pim is enabled on xTR2。

接收來自CE2的(S，G)連線。

*Nov 26 18:38:19.641: PIM(0): Received v2 Join/Prune on GigabitEthernet3.10 from 172.16.12.2, to us

*Nov 26 18:38:19.641: PIM(0): Join-list: (172.16.251.1/32, 232.1.1.10), S-bit set

172.16.251.1是來自xTR1的EID，尚未出現在RIB中。因此，源IP 172.16.251.1的RPF查詢失敗。它觸發LISP查詢。因此，RPF介面是LISP隧道。

*Nov 26 18:38:19.641: PIM(0): RPF Lookup failed for 172.16.251.1

*Nov 26 18:38:19.643: PIM(0): Add GigabitEthernet3.10/172.16.12.2 to (172.16.251.1, 232.1.1.10), Forward state, by PIM SG Join

*Nov 26 18:38:19.650: PIM(0): Insert (172.16.251.1,232.1.1.10) join in nbr 10.1.11.1's queue

xTR2#sh ip rpf 172.16.251.1

RPF information for ? (172.16.251.1)

RPF interface: LISP0

RPF neighbor: ? (10.1.11.1)

RPF route/mask: 172.16.251.1/32

RPF type: unicast ()

Doing distance-preferred lookups across tables

RPF topology: ipv4 multicast base

然後，建立(S，G)連線，並通過LISP介面通過RLOC 10.1.11.1傳送到源。

*Nov 26 18:38:19.650: PIM(0): Building Join/Prune packet for nbr 10.1.11.1

*Nov 26 18:38:19.650: PIM(0):  Adding v2 (172.16.251.1/32, 232.1.1.10), S-bit Join

*Nov 26 18:38:19.650: PIM(0): Adding LISP Unicast transport attribute in join/prune to 10.1.11.1 (LISP0)

*Nov 26 18:38:19.650: PIM(0): Send v2 join/prune to 10.1.11.1 (LISP0)

加入被封裝到單播LISP報頭中。封裝資料包的源IP是傳送資料包所經過的介面的RLOC。目的IP是xTR的RLOC地址，該xTR可到達組播源的EID。

xTR2#sh ip lisp map-cache 172.16.251.1

LISP IPv4 Mapping Cache for EID-table default (IID 0), 4 entries

172.16.251.1/32, uptime: 02:18:16, expires: 21:41:44, via map-reply, complete

Sources: map-reply

State: complete, last modified: 02:18:16, map-source: 10.1.11.1

Idle, Packets out: 41(4838 bytes) (~ 01:21:15 ago)

Locator    Uptime    State      Pri/Wgt

10.1.11.1  02:18:16  up         100/100

Last up-down state change:         02:18:16, state change count: 1

Last route reachability change:    02:18:16, state change count: 1

Last priority / weight change:     never/never

RLOC-probing loc-status algorithm:

Last RLOC-probe sent:            never

為了能夠傳送加入，您需要有一個PIM鄰居。一旦獲取了RPF資訊，PIM將顯式建立到相應RLOC的鄰居。鄰居不是以常規方式建立的，因為PIM Hello不會通過LISP隧道。

xTR2#sh ip pim nei

PIM Neighbor Table

Mode: B - Bidir Capable, DR - Designated Router, N - Default DR Priority,

P - Proxy Capable, S - State Refresh Capable, G - GenID Capable,

L - DR Load-balancing Capable

Neighbor          Interface                Uptime/Expires    Ver   DR

Address                                                            Prio/Mode

172.16.12.2       GigabitEthernet3.10      01:57:04/00:01:30 v2    1 / DR S P G

10.1.11.1         LISP0                    00:00:48/00:01:10 v2    0 /

組播資料包的wireshark捕獲如下圖所示。

外部源IP和目標IP是本地和遠端RLOC。這是您使用單播複製時的預期結果。

內部源IP從LISP0介面獲取。

xTR2#sh int LISP0 | i unn

Interface is unnumbered. Using address of Loopback0 (10.1.255.2)

內部目標IP是用於PIM消息的組播地址224.0.0.13。

在(172.16.251.1, 232.1.1.10)的xTR2上，IIL是LISP0介面和OIL指向CE2。

xTR2#show ip mroute

<…skip…>

(172.16.251.1, 232.1.1.10), 00:00:36/00:02:55, flags: sT

Incoming interface: LISP0, RPF nbr 10.1.11.1

Outgoing interface list:

GigabitEthernet3.10, Forward/Sparse, 00:00:36/00:02:55

xTR2#sh ip mfib

<…skip…>

(172.16.251.1,232.1.1.10) Flags: HW

SW Forwarding: 0/0/0/0, Other: 0/0/0

HW Forwarding:   0/0/0/0, Other: 0/0/0

LISP0 Flags: A

GigabitEthernet3.10 Flags: F NS

Pkts: 0/0

在xTR1上，收到來自xTR2的加入，並建立了(S，G)mroute。

*Nov 26 18:38:19.464: PIM(0): Received v2 Join/Prune on LISP0 from 10.1.255.2

*Nov 26 18:38:19.464: PIM(0): J/P Transport Attribute, Transport Type: Unicast, to us

*Nov 26 18:38:19.464: PIM(0): Join-list: (172.16.251.1/32, 232.1.1.10), S-bit set

*Nov 26 18:38:19.467: PIM(0): Add LISP0/10.1.12.1 to (172.16.251.1, 232.1.1.10), Forward state, by PIM SG Join

*Nov 26 18:38:19.467: PIM(0): Insert (172.16.251.1,232.1.1.10) join in nbr 172.16.11.2's queue

*Nov 26 18:38:19.467: PIM(0): Building Join/Prune packet for nbr 172.16.11.2

*Nov 26 18:38:19.467: PIM(0):  Adding v2 (172.16.251.1/32, 232.1.1.10), S-bit Join

*Nov 26 18:38:19.467: PIM(0): Send v2 join/prune to 172.16.11.2 (GigabitEthernet3.10)

xTR1#sh ip mroute

<…skip…>

(172.16.251.1, 232.1.1.10), 00:01:00/00:03:28, flags: sT

Incoming interface: GigabitEthernet3.10, RPF nbr 172.16.11.2

Outgoing interface list:

LISP0, 10.1.12.1, Forward/Sparse, 00:01:00/00:03:28 <<<< LISP in OIL

上游xTR1必須跟蹤已收到加入消息的每個下游RLOC。

xTR必須記住要向其複製資料包的RLOC集。

因此，上游xTR上的(EIDs,G)條目對於單播封裝如下所示：

(EID)s,G)

Eth0/0

F LISP0,nexthop = RLOC1

F LISP0,nexthop = RLOC2

xTR1#sh ip mfib

<…skip…>

(172.16.251.1,232.1.1.10) Flags: HW

SW Forwarding: 0/0/0/0, Other: 0/0/0

HW Forwarding:   0/0/0/0, Other: 0/0/0

GigabitEthernet3.10 Flags: A

LISP0, 10.1.12.1 Flags: F NS <<<<

Pkts: 0/0

附註：xTR1沒有通過介面LISP0的PIM鄰居。

xTR1# sh ip pim nei

PIM Neighbor Table

Mode: B - Bidir Capable, DR - Designated Router, N - Default DR Priority,

P - Proxy Capable, S - State Refresh Capable, G - GenID Capable,

L - DR Load-balancing Capable

Neighbor          Interface                Uptime/Expires    Ver   DR

Address                                                            Prio/Mode

172.16.11.2       GigabitEthernet3.10      04:25:32/00:01:37 v2    1 / DR S P G

在CE1上，接收了(S，G)的加入，並建立了mroute。

CE1#sh ip mro

<…skip…>

(172.16.251.1, 232.1.1.10), 02:16:45/00:03:08, flags: sT

Incoming interface: Loopback10, RPF nbr 0.0.0.0

Outgoing interface list:

GigabitEthernet0/1.10, Forward/Sparse, 02:16:45/00:03:08

組播流量像預期一樣流動。

CE1#ping 232.1.1.10 so lo10 rep 5

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 232.1.1.10, timeout is 2 seconds:

Packet sent with a source address of 172.16.251.1

Reply to request 0 from 172.16.251.2, 11 ms

Reply to request 0 from 172.16.251.2, 15 ms

Reply to request 1 from 172.16.251.2, 14 ms

Reply to request 1 from 172.16.251.2, 15 ms

Reply to request 2 from 172.16.251.2, 12 ms

Reply to request 2 from 172.16.251.2, 16 ms

Reply to request 3 from 172.16.251.2, 9 ms

Reply to request 3 from 172.16.251.2, 13 ms

Reply to request 4 from 172.16.251.2, 9 ms

Reply to request 4 from 172.16.251.2, 9 ms

讓我們在CE3上再新增一個接收器。

在MRIB和MFIB中新增用於新RLOC的附加入口在油中。

xTR1#sh ip mro 232.1.1.10

<…skip…>

(172.16.251.1, 232.1.1.10), 02:28:36/00:03:25, flags: sT

Incoming interface: GigabitEthernet3.10, RPF nbr 172.16.11.2

Outgoing interface list:

LISP0, 10.1.13.1, Forward/Sparse, 00:01:34/00:02:57

LISP0, 10.1.12.1, Forward/Sparse, 02:28:36/00:03:25

xTR1#sh ip mfib 232.1.1.10

<…skip…>

(172.16.251.1,232.1.1.10) Flags: HW

SW Forwarding: 0/0/0/0, Other: 0/0/0

HW Forwarding:   10/0/118/0, Other: 0/0/0

GigabitEthernet3.10 Flags: A

LISP0, 10.1.13.1 Flags: F NS

Pkts: 0/0

LISP0, 10.1.12.1 Flags: F NS

Pkts: 0/0

如果您開始將流量傳送到核心介面上的232.1.1.10，如下圖所示。

封裝封包的目的地是xTR2的RLOC，如下圖所示。

資料包的目的IP是xTR3的RLOC。

組播流被複製到兩個單播流中，並通過核心傳送。

ASM

附註：僅支援靜態RP。不支援RP冗餘。

源暫存器優先

讓我們將組播從CE1傳送到組225.1.1.10。CE1是第一跳路由器(FHR)，因此它會觸發到RP(CE4)的單播註冊消息。 由於沒有接收器，CE1收到一個Register-Stop並建立mroute條目。

CE1#ping 225.1.1.10 so lo10

Type escape sequence to abort.

Sending 1, 100-byte ICMP Echos to 225.1.1.10, timeout is 2 seconds:

Packet sent with a source address of 172.16.251.1

*Nov 27 14:29:04.083: PIM(0): Check RP 172.16.251.4 into the (*, 225.1.1.10) entry

*Nov 27 14:29:04.084: PIM(0): Building Triggered (*,G) Join / (S,G,RP-bit) Prune message for 225.1.1.10

*Nov 27 14:29:04.089: PIM(0): Adding register encap tunnel (Tunnel0) as forwarding interface of (172.16.251.1, 225.1.1.10).

*Nov 27 14:29:04.112: PIM(0): Received v2 Register-Stop on GigabitEthernet0/1.10 from 172.16.251.4

*Nov 27 14:29:04.112: PIM(0):   for source 172.16.251.1, group 225.1.1.10

*Nov 27 14:29:04.113: PIM(0): Removing register encap tunnel (Tunnel0) as forwarding interface of (172.16.251.1, 225.1.1.10).

*Nov 27 14:29:04.113: PIM(0): Clear Registering flag to 172.16.251.4 for (172.16.251.1/32, 225.1.1.10).

CE1#sh ip mro 225.1.1.10

<…skip…>

(*, 225.1.1.10), 00:02:16/stopped, RP 172.16.251.4, flags: SPF

Incoming interface: GigabitEthernet0/1.10, RPF nbr 172.16.11.1

Outgoing interface list: Null

(172.16.251.1, 225.1.1.10), 00:02:16/00:00:43, flags: PFT

Incoming interface: Loopback10, RPF nbr 0.0.0.0

Outgoing interface list: Null

在RP端也預期圖片。收到來自CE1的Register消息後，RP(CE4)將傳送Register-Stop消息並建立必要的路由。

CE4#

*Nov 27 14:24:06.810: PIM(0): Received v2 Register on GigabitEthernet0/1.10 from 172.16.251.1

*Nov 27 14:24:06.810:      for 172.16.251.1, group 225.1.1.10

*Nov 27 14:24:06.811: PIM(0): Check RP 172.16.251.4 into the (*, 225.1.1.10) entry

*Nov 27 14:24:06.812: PIM(0): Adding register decap tunnel (Tunnel0) as accepting interface of (*, 225.1.1.10).

*Nov 27 14:24:06.814: PIM(0): Adding register decap tunnel (Tunnel0) as accepting interface of (172.16.251.1, 225.1.1.10).

*Nov 27 14:24:06.815: PIM(0): Send v2 Register-Stop to 172.16.251.1 for 172.16.251.1, group 225.1.1.10

CE4#

*Nov 27 14:24:11.207: PIM(0): Building Periodic (*,G) Join / (S,G,RP-bit) Prune message for 224.0.1.40

CE4#sh ip mro 225.1.1.10

<…skip…>

(*, 225.1.1.10), 00:00:31/stopped, RP 172.16.251.4, flags: SP

Incoming interface: Null, RPF nbr 0.0.0.0

Outgoing interface list: Null

(172.16.251.1, 225.1.1.10), 00:00:31/00:02:28, flags: P

Incoming interface: GigabitEthernet0/1.10, RPF nbr 172.16.14.1

Outgoing interface list: Null

考慮註冊源介面應位於EID範圍內，否則將不會觸發LISP。預設情況下，它是傳出介面的IP地址。

CE1#sh run | i source

ip pim register-source Loopback10

對於xTR1和xTR4，由於尚未接收組播流量，因此未進行任何更改。

接收者優先

讓我們配置裝置CE3上的介面Lo10上的接收器。

CE3#conf t

Enter configuration commands, one per line.  End with CNTL/Z.

CE3(config)#int lo10

CE3(config-if)#ip igmp join-group 225.1.1.10

CE3(config-if)#end

將觸發(*,Join)並建立mroute。一切都是意料之中。

CE3#

*Nov 27 14:48:46.271: PIM(0): Check RP 172.16.251.4 into the (*, 225.1.1.10) entry

*Nov 27 14:48:46.272: PIM(0): Building Triggered (*,G) Join / (S,G,RP-bit) Prune message for 225.1.1.10

*Nov 27 14:48:46.272: PIM(0): Upstream mode for (*, 225.1.1.10) changed from 0 to 1

*Nov 27 14:48:46.274: PIM(0): Insert (*,225.1.1.10) join in nbr 172.16.13.1's queue

*Nov 27 14:48:46.275: PIM(0): Building Triggered (*,G) Join / (S,G,RP-bit) Prune message for 225.1.1.10

*Nov 27 14:48:46.284: PIM(0): Building Join/Prune packet for nbr 172.16.13.1

*Nov 27 14:48:46.284: PIM(0):  Adding v2 (172.16.251.4/32, 225.1.1.10), WC-bit, RPT-bit, S-bit Join

*Nov 27 14:48:46.285: PIM(0): Send v2 join/prune to 172.16.13.1 (GigabitEthernet0/1.10)

CE3#sh ip mro

< …skip…>

(*, 225.1.1.10), 00:26:23/00:02:42, RP 172.16.251.4, flags: SJCL

Incoming interface: GigabitEthernet0/1.10, RPF nbr 172.16.13.1

Outgoing interface list:

Loopback10, Forward/Sparse, 00:26:23/00:02:42

(*, 224.0.1.40), 21:32:32/00:02:03, RP 172.16.251.4, flags: SJPCL

Incoming interface: GigabitEthernet0/1.10, RPF nbr 172.16.13.1

Outgoing interface list: Null

xTR3接收(*,225.1.1.10)加入。將(*,G)加入傳送到RP。 xTR3檢查RLOC以查詢RP(172.16.251.4)。 由於可以通過LISP訪問，因此會建立到相應RLOC的PIM鄰居。在本例中為10.1.14.1。

xTR3#

*Nov 27 14:30:23.229: PIM(0): Received v2 Join/Prune on GigabitEthernet0/2.10 from 172.16.13.2, to us

*Nov 27 14:30:23.229: PIM(0): Join-list: (*, 225.1.1.10), RPT-bit set, WC-bit set, S-bit set

*Nov 27 14:30:23.231: PIM(0): Check RP 172.16.251.4 into the (*, 225.1.1.10) entry

*Nov 27 14:30:23.233: PIM(0): Add GigabitEthernet0/2.10/172.16.13.2 to (*, 225.1.1.10), Forward state, by PIM *G Join

*Nov 27 14:30:23.247: PIM(0): Building Triggered (*,G) Join / (S,G,RP-bit) Prune message for 225.1.1.10

*Nov 27 14:30:23.247: PIM(0): Upstream mode for (*, 225.1.1.10) changed from 0 to 1

*Nov 27 14:30:23.248: PIM(0): Insert (*,225.1.1.10) join in nbr 10.1.14.1's queue

xTR3#

*Nov 27 14:30:23.259: PIM(0): Building Join/Prune packet for nbr 10.1.14.1

*Nov 27 14:30:23.259: PIM(0):  Adding v2 (172.16.251.4/32, 225.1.1.10), WC-bit, RPT-bit, S-bit Join

*Nov 27 14:30:23.260: PIM(0): Send v2 join/prune to 10.1.14.1 (LISP0)

xTR3#sh ip pim nei

PIM Neighbor Table

Mode: B - Bidir Capable, DR - Designated Router, N - Default DR Priority,

P - Proxy Capable, S - State Refresh Capable, G - GenID Capable,

L - DR Load-balancing Capable

Neighbor          Interface                Uptime/Expires    Ver   DR

Address                                                            Prio/Mode

172.16.13.2       GigabitEthernet0/2.10    21:54:17/00:01:27 v2    1 / DR S P G

10.1.14.1         LISP0                    00:26:16/00:01:35 v2    0 /

如下圖所示，讓我們檢查wireshark捕獲。

外部IP來源是本地RLOC，而外部IP目的地是遠端RLOC。內部來源是為LISP0介面獲取的IP地址。內部目標IP地址是常規PIM組播地址224.0.0.13。

將建立一個(*,G)mroute。RP的傳入介面/RPF是LISP0介面。

xTR3#sh ip mro 225.1.1.10

<…skip…>

(*, 225.1.1.10), 00:42:51/00:03:25, RP 172.16.251.4, flags: S

Incoming interface: LISP0, RPF nbr 10.1.14.1

Outgoing interface list:

GigabitEthernet0/2.10, Forward/Sparse, 00:42:51/00:03:25

xTR3#sh int LISP0 | i address

Interface is unnumbered. Using address of Loopback0 (10.1.255.3)

在xTR4上，從LISP隧道接收一個(*,G)連線。建立適當的mroute。

xTR4#

*Nov 27 14:38:20.880: PIM(0): Received v2 Join/Prune on LISP0 from 10.1.255.3, to us

*Nov 27 14:38:20.881: PIM(0): Join-list: (*, 225.1.1.10), RPT-bit set, WC-bit set, S-bit set

*Nov 27 14:38:20.883: PIM(0): Check RP 172.16.251.4 into the (*, 225.1.1.10) entry

*Nov 27 14:38:20.883: PIM(0): Building Triggered (*,G) Join / (S,G,RP-bit) Prune message for 225.1.1.10

*Nov 27 14:38:20.884: PIM(0): Add LISP0/10.1.13.1 to (*, 225.1.1.10), Forward state, by PIM *G Join

*Nov 27 14:38:20.885: PIM(0): Building Triggered (*,G) Join / (S,G,RP-bit) Prune message for 225.1.1.10

*Nov 27 14:38:20.885: PIM(0): Upstream mode for (*, 225.1.1.10) changed from 0 to 1

xTR4#

*Nov 27 14:38:20.885: PIM(0): Insert (*,225.1.1.10) join in nbr 172.16.14.2's queue

*Nov 27 14:38:20.886: PIM(0): Building Join/Prune packet for nbr 172.16.14.2

*Nov 27 14:38:20.886: PIM(0):  Adding v2 (172.16.251.4/32, 225.1.1.10), WC-bit, RPT-bit, S-bit Join

*Nov 27 14:38:20.887: PIM(0): Send v2 join/prune to 172.16.14.2 (GigabitEthernet0/2.10)

xTR4#sh ip mro 225.1.1.10

<…skip…>

(*, 225.1.1.10), 00:45:05/00:02:56, RP 172.16.251.4, flags: S

Incoming interface: GigabitEthernet0/2.10, RPF nbr 172.16.14.2

Outgoing interface list:

LISP0, 10.1.13.1, Forward/Sparse, 00:45:05/00:02:56

在這種情況下，不會在xTR4上建立PIM鄰居。只有CE4的PIM鄰居存在。

xTR4#sh ip pim nei

PIM Neighbor Table

Mode: B - Bidir Capable, DR - Designated Router, N - Default DR Priority,

P - Proxy Capable, S - State Refresh Capable, G - GenID Capable,

L - DR Load-balancing Capable

Neighbor          Interface                Uptime/Expires    Ver   DR

Address                                                            Prio/Mode

172.16.14.2       GigabitEthernet0/2.10    22:00:37/00:01:20 v2    1 / DR S P G

從RP的角度來看，一切都是預期的。建立一個(*,G)mroute。

CE4#

*Nov 27 14:41:55.907: PIM(0): Building Periodic (*,G) Join / (S,G,RP-bit) Prune message for 224.0.1.40

CE4#

*Nov 27 14:42:11.841: PIM(0): Received v2 Join/Prune on GigabitEthernet0/1.10 from 172.16.14.1, to us

*Nov 27 14:42:11.841: PIM(0): Join-list: (*, 225.1.1.10), RPT-bit set, WC-bit set, S-bit set

*Nov 27 14:42:11.844: PIM(0): Check RP 172.16.251.4 into the (*, 225.1.1.10) entry

*Nov 27 14:42:11.845: PIM(0): Adding register decap tunnel (Tunnel0) as accepting interface of (*, 225.1.1.10).

*Nov 27 14:42:11.846: PIM(0): Add GigabitEthernet0/1.10/172.16.14.1 to (*, 225.1.1.10), Forward state, by PIM *G Join

CE4#sh ip mro

<…skip…>

(*, 225.1.1.10), 00:00:11/00:03:18, RP 172.16.251.4, flags: S

Incoming interface: Null, RPF nbr 0.0.0.0

Outgoing interface list:

GigabitEthernet0/1.10, Forward/Sparse, 00:00:11/00:03:18

(*, 224.0.1.40), 21:00:55/00:02:53, RP 172.16.251.4, flags: SJCL

Incoming interface: Null, RPF nbr 0.0.0.0

Outgoing interface list:

GigabitEthernet0/1.10, Forward/Sparse, 21:00:55/00:02:53

最短路徑樹(SPT)切換

假設已生成共用樹。

CE1開始將流量從源Lo10(172.16.251.1)傳送到225.1.10。

CE1#ping 225.1.1.10 so lo10

Type escape sequence to abort.

Sending 1, 100-byte ICMP Echos to 225.1.1.10, timeout is 2 seconds:

Packet sent with a source address of 172.16.251.1

Reply to request 0 from 172.16.251.3, 77 ms

第一個組播資料包被封裝到單播註冊消息中並傳送到RP。

.Nov 30 00:00:50.931: PIM(0): Check RP 172.16.251.4 into the (*, 225.1.1.10) entry

.Nov 30 00:00:50.932: MRT(0): (*,225.1.1.10), RPF change from  /0.0.0.0 to GigabitEthernet0/1.10/172.16.11.1

.Nov 30 00:00:50.932: PIM(0): Building Triggered (*,G) Join / (S,G,RP-bit) Prune message for 225.1.1.10

.Nov 30 00:00:50.933: MRT(0): Create (*,225.1.1.10), RPF (GigabitEthernet0/1.10, 172.16.11.1, 90/3072)

.Nov 30 00:00:50.936: MRT(0): Reset the z-flag for (172.16.251.1, 225.1.1.10)

.Nov 30 00:00:50.937: MRT(0): (172.16.251.1,225.1.1.10), RPF install from  /0.0.0.0 to Loopback10/0.0.0.0

.Nov 30 00:00:50.937: PIM(0): Adding register encap tunnel (Tunnel0) as forwarding interface of (172.16.251.1, 225.1.1.10).

暫存器資料包在RP上解封，並通過共用樹傳送到接收器。

.Nov 30 00:00:51.540: PIM(0): Received v2 Register on GigabitEthernet0/1.10 from 172.16.251.1

.Nov 30 00:00:51.541:      for 172.16.251.1, group 225.1.1.10

.Nov 30 00:00:51.542: PIM(0): Adding register decap tunnel (Tunnel0) as accepting interface of (172.16.251.1, 225.1.1.10).

由於(*,G)的傳出介面和(S，G)的傳入介面之間的匹配，為(S，G)啟動代理加入計時器，因此設定標誌X。這是拓撲特定的情況（單臂路由器）。

CE4#sh ip mro

<…skip…>

(*, 225.1.1.10), 00:00:37/stopped, RP 172.16.251.4, flags: S

Incoming interface: Null, RPF nbr 0.0.0.0

Outgoing interface list:

GigabitEthernet0/1.10, Forward/Sparse, 00:00:37/00:02:52

(172.16.251.1, 225.1.1.10), 00:00:26/00:02:33, flags: PX

Incoming interface: GigabitEthernet0/1.10, RPF nbr 172.16.14.1

Outgoing interface list: Null

因此CE4向源裝置傳送(S，G)連線，而不傳送(S，G)修剪。

.Nov 30 00:00:51.544: PIM(0): Insert (172.16.251.1,225.1.1.10) join in nbr 172.16.14.1's queue

.Nov 30 00:00:51.546: PIM(0): Building Join/Prune packet for nbr 172.16.14.1

.Nov 30 00:00:51.546: PIM(0):  Adding v2 (172.16.251.1/32, 225.1.1.10), S-bit Join

.Nov 30 00:00:51.547: PIM(0): Send v2 join/prune to 172.16.14.1 (GigabitEthernet0/1.10)

同時，解除封裝的組播流量通過共用樹傳送到接收器，如圖所示。

在xTR4 g0/1介面上捕獲資料包。

在第一個資料包中，外部IP SRC和DST分別為10.1.11.1和10.1.14.1。

在第二封包中，外部IP SRC和DST分別為10.1.14.1和10.1.13.1。

收到組播資料包後，LHR CE3正在啟動SPT切換。為(S，G)建立Mroute並設定標誌J和T。向源傳送(S，G)連線。

.Nov 30 00:00:51.765: MRT(0): Set 'L' flag for (172.16.251.1, 225.1.1.10)

.Nov 30 00:00:51.766: MRT(0): Reset the z-flag for (172.16.251.1, 225.1.1.10)

.Nov 30 00:00:51.766: MRT(0): (172.16.251.1,225.1.1.10), RPF install from  /0.0.0.0 to GigabitEthernet0/1.10/172.16.13.1

.Nov 30 00:00:51.767: MRT(0): Set the T-flag for (172.16.251.1, 225.1.1.10)

.Nov 30 00:00:51.768: PIM(0): Insert (172.16.251.1,225.1.1.10) join in nbr 172.16.13.1's queue

.Nov 30 00:00:51.768: MRT(0): Create (172.16.251.1,225.1.1.10), RPF (GigabitEthernet0/1.10, 172.16.13.1, 90/3072)

.Nov 30 00:00:51.769: MRT(0): WAVL Insert interface: Loopback10 in (172.16.251.1,225.1.1.10) Successful

.Nov 30 00:00:51.770: MRT(0): set min mtu for (172.16.251.1, 225.1.1.10) 18010->18010

.Nov 30 00:00:51.771: MRT(0): Add Loopback10/225.1.1.10 to the olist of (172.16.251.1, 225.1.1.10), Forward state - MAC not built

.Nov 30 00:00:51.771: MRT(0): Set the J-flag for (172.16.251.1, 225.1.1.10)

.Nov 30 00:00:51.780: PIM(0): Building Join/Prune packet for nbr 172.16.13.1

.Nov 30 00:00:51.780: PIM(0):  Adding v2 (172.16.251.1/32, 225.1.1.10), S-bit Join

.Nov 30 00:00:51.781: PIM(0): Send v2 join/prune to 172.16.13.1 (GigabitEthernet0/1.10)

CE3#sh ip mro

<…skip…>

(*, 225.1.1.10), 00:01:36/stopped, RP 172.16.251.4, flags: SJCL

Incoming interface: GigabitEthernet0/1.10, RPF nbr 172.16.13.1

Outgoing interface list:

Loopback10, Forward/Sparse, 00:01:36/00:02:48

(172.16.251.1, 225.1.1.10), 00:00:25/00:02:34, flags: LJT

Incoming interface: GigabitEthernet0/1.10, RPF nbr 172.16.13.1

Outgoing interface list:

Loopback10, Forward/Sparse, 00:00:25/00:02:48

xTR3正在從CE3接收(S，G)加入。它正在檢查源172.16.251.1的RPF。它觸發LISP查詢，並且建立指向RLOC 10.1.11.1的PIM鄰居，以及指向RLOC 10.1.14.1的PIM鄰居。為(S，G)建立帶標誌T的Mroute。通過LISP0 RLOC 10.1.11.1將(S，G)連線傳送到源172.16.255.1

.Nov 30 00:00:51.104: PIM(0): Received v2 Join/Prune on GigabitEthernet0/2.10 from 172.16.13.2, to us

.Nov 30 00:00:51.105: PIM(0): Join-list: (172.16.251.1/32, 225.1.1.10), S-bit set

.Nov 30 00:00:51.105: PIM(0): RPF Lookup failed for 172.16.251.1

.Nov 30 00:00:51.108: MRT(0): Reset the z-flag for (172.16.251.1, 225.1.1.10)

.Nov 30 00:00:51.108: MRT(0): Create (172.16.251.1,225.1.1.10), RPF (unknown, 0.0.0.0, 0/0)

.Nov 30 00:00:51.109: MRT(0): WAVL Insert interface: GigabitEthernet0/2.10 in (172.16.251.1,225.1.1.10) Successful

.Nov 30 00:00:51.110: MRT(0): set min mtu for (172.16.251.1, 225.1.1.10) 18010->1500

.Nov 30 00:00:51.110: MRT(0): Add GigabitEthernet0/2.10/225.1.1.10 to the olist of (172.16.251.1, 225.1.1.10), Forward state - MAC built

.Nov 30 00:00:51.111: PIM(0): Add GigabitEthernet0/2.10/172.16.13.2 to (172.16.251.1, 225.1.1.10), Forward state, by PIM SG Join

.Nov 30 00:00:51.111: MRT(0): Add GigabitEthernet0/2.10/225.1.1.10 to the olist of (172.16.251.1, 225.1.1.10), Forward state - MAC built

.Nov 30 00:00:51.112: MRT(0): Set the PIM interest flag for (172.16.251.1, 225.1.1.10)

.Nov 30 00:00:51.128: MRT(0): (172.16.251.1,225.1.1.10), RPF change from  /0.0.0.0 to LISP0/10.1.11.1

.Nov 30 00:00:51.130: MRT(0): Set the T-flag for (172.16.251.1, 225.1.1.10)

.Nov 30 00:00:51.130: PIM(0): Insert (172.16.251.1,225.1.1.10) join in nbr 10.1.11.1's queue

.Nov 30 00:00:51.134: PIM(0): Building Join/Prune packet for nbr 10.1.11.1

.Nov 30 00:00:51.134: PIM(0):  Adding v2 (172.16.251.1/32, 225.1.1.10), S-bit Join

.Nov 30 00:00:51.135: PIM(0): Send v2 join/prune to 10.1.11.1 (LISP0)

xTR3#sh ip pim nei

PIM Neighbor Table

Mode: B - Bidir Capable, DR - Designated Router, N - Default DR Priority,

P - Proxy Capable, S - State Refresh Capable, G - GenID Capable,

L - DR Load-balancing Capable

Neighbor          Interface                Uptime/Expires    Ver   DR

Address                                                            Prio/Mode

172.16.13.2       GigabitEthernet0/2.10    2d16h/00:01:20    v2    1 / DR S P G

10.1.11.1         LISP0                    00:00:19/00:01:39 v2    0 /

10.1.14.1         LISP0                    1d18h/00:01:39    v2    0 /

xTR3#sh ip mro

<…skip…>

(*, 225.1.1.10), 00:01:29/stopped, RP 172.16.251.4, flags: S

Incoming interface: LISP0, RPF nbr 10.1.14.1

Outgoing interface list:

GigabitEthernet0/2.10, Forward/Sparse, 00:01:29/00:02:57

(172.16.251.1, 225.1.1.10), 00:00:19/00:02:40, flags: T

Incoming interface: LISP0, RPF nbr 10.1.11.1

Outgoing interface list:

GigabitEthernet0/2.10, Forward/Sparse, 00:00:19/00:03:10

(*,G)和(S，G)的RPF介面變得不同 — 共用樹(RLOC 10.1.14.1)和SPT(RLOC 10.1.11.1)。  從xTR3到RP觸發(S，G)修整消息，其中包含RPT位和S位連線。

.Nov 30 00:00:51.209: PIM(0): Insert (172.16.251.1,225.1.1.10) sgr prune in nbr 10.1.14.1's queue

.Nov 30 00:00:51.212: PIM(0): Building Join/Prune packet for nbr 10.1.14.1

.Nov 30 00:00:51.212: PIM(0):  Adding v2 (172.16.251.4/32, 225.1.1.10), WC-bit, RPT-bit, S-bit Join

.Nov 30 00:00:51.213: PIM(0):  Adding v2 (172.16.251.1/32, 225.1.1.10), RPT-bit, S-bit Prune

.Nov 30 00:00:51.214: PIM(0): Send v2 join/prune to 10.1.14.1 (LISP0)

xTR3#sh ip pim nei

PIM Neighbor Table

Mode: B - Bidir Capable, DR - Designated Router, N - Default DR Priority,

P - Proxy Capable, S - State Refresh Capable, G - GenID Capable,

L - DR Load-balancing Capable

Neighbor          Interface                Uptime/Expires    Ver   DR

Address                                                            Prio/Mode

172.16.13.2       GigabitEthernet0/2.10    4d09h/00:01:19    v2    1 / DR S P G

10.1.11.1         LISP0                    00:00:58/00:01:02 v2    0 /

10.1.14.1         LISP0                    3d11h/00:01:34    v2    0 /

xTR1收到來自xTR3的(S，G)連線，用於觸發SPT生成。(*,G)的RPF是可通過LISP訪問的RP。為RLOC 10.1.14.1建立了RPF檢查的PIM鄰居。建立了a(*,G)和a(S，G)路由。

.Nov 30 00:00:55.281: PIM(0): Received v2 Join/Prune on LISP0 from 10.1.255.3

.Nov 30 00:00:55.281: PIM(0): J/P Transport Attribute, Transport Type: Unicast, to us

.Nov 30 00:00:55.282: PIM(0): Join-list: (172.16.251.1/32, 225.1.1.10), S-bit set

.Nov 30 00:00:55.283: PIM(0): Check RP 172.16.251.4 into the (*, 225.1.1.10) entry

.Nov 30 00:00:55.283: MRT(0): Create (*,225.1.1.10), RPF (unknown, 0.0.0.0, 0/0)

.Nov 30 00:00:55.284: MRT(0): Reset the z-flag for (172.16.251.1, 225.1.1.10)

.Nov 30 00:00:55.284: MRT(0): (172.16.251.1,225.1.1.10), RPF install from  /0.0.0.0 to GigabitEthernet3.10/172.16.11.2

.Nov 30 00:00:55.284: MRT(0): Create (172.16.251.1,225.1.1.10), RPF (GigabitEthernet3.10, 172.16.11.2, 90/130816)

.Nov 30 00:00:55.285: MRT(0): WAVL Insert LISP interface: LISP0 in (172.16.251.1,225.1.1.10) Next-hop: 10.1.13.1 Outer-source: 0.0.0.0 Successful

.Nov 30 00:00:55.285: MRT(0): set min mtu for (172.16.251.1, 225.1.1.10) 18010->17892

.Nov 30 00:00:55.285: MRT(0): Set the T-flag for (172.16.251.1, 225.1.1.10)

.Nov 30 00:00:55.286: MRT(0): Add LISP0/10.1.13.1 to the olist of (172.16.251.1, 225.1.1.10), Forward state - MAC not built

.Nov 30 00:00:55.286: PIM(0): Add LISP0/10.1.13.1 to (172.16.251.1, 225.1.1.10), Forward state, by PIM SG Join

.Nov 30 00:00:55.286: MRT(0): Add LISP0/10.1.13.1 to the olist of (172.16.251.1, 225.1.1.10), Forward state - MAC not built

此外，xTR1從RP接收(S，G)連線。將經由RLOC 10.1.14.1的油LISP0新增到(S，G)中。

.Nov 30 00:00:55.295: PIM(0): Received v2 Join/Prune on LISP0 from 172.16.251.14

.Nov 30 00:00:55.295: PIM(0): J/P Transport Attribute, Transport Type: Unicast, to us

.Nov 30 00:00:55.295: PIM(0): Join-list: (172.16.251.1/32, 225.1.1.10), S-bit set

.Nov 30 00:00:55.295: MRT(0): WAVL Insert LISP interface: LISP0 in (172.16.251.1,225.1.1.10) Next-hop: 10.1.14.1 Outer-source: 0.0.0.0 Successful

.Nov 30 00:00:55.296: MRT(0): set min mtu for (172.16.251.1, 225.1.1.10) 17892->17892

.Nov 30 00:00:55.296: MRT(0): Add LISP0/10.1.14.1 to the olist of (172.16.251.1, 225.1.1.10), Forward state - MAC not built

.Nov 30 00:00:55.296: PIM(0): Add LISP0/10.1.14.1 to (172.16.251.1, 225.1.1.10), Forward state, by PIM SG Join

.Nov 30 00:00:55.297: MRT(0): Add LISP0/10.1.14.1 to the olist of (172.16.251.1, 225.1.1.10), Forward state - MAC not built

xTR1#sh ip mro

(*, 225.1.1.10), 00:00:27/stopped, RP 172.16.251.4, flags: SP

Incoming interface: LISP0, RPF nbr 10.1.14.1

Outgoing interface list: Null

(172.16.251.1, 225.1.1.10), 00:00:27/00:02:31, flags: T

Incoming interface: GigabitEthernet3.10, RPF nbr 172.16.11.2

Outgoing interface list:

LISP0, 10.1.14.1, Forward/Sparse, 00:00:27/00:03:01

LISP0, 10.1.13.1, Forward/Sparse, 00:00:27/00:03:01

xTR4收到來自xTR3的(S，G)修剪。LISP0到10.1.13.1不包括在油中。

Nov 30 00:00:50.771: PIM(0): Received v2 Join/Prune on LISP0 from 10.1.255.3, to us

Nov 30 00:00:50.772: PIM(0): Join-list: (*, 225.1.1.10), RPT-bit set, WC-bit set, S-bit set

Nov 30 00:00:50.774: PIM(0): Update LISP0/10.1.13.1 to (*, 225.1.1.10), Forward state, by PIM *G Join

Nov 30 00:00:50.774: MRT(0): Update LISP0/10.1.13.1 in the olist of (*, 225.1.1.10), Forward state - MAC not built

Nov 30 00:00:50.775: PIM(0): Prune-list: (172.16.251.1/32, 225.1.1.10) RPT-bit set

Nov 30 00:00:50.776: PIM(0): Prune LISP0/10.1.13.1 from (172.16.251.1/32, 225.1.1.10)

Nov 30 00:00:50.776: MRT(0): Delete LISP0/10.1.13.1 from the olist of (172.16.251.1, 225.1.1.10) - deleted

xTR4#sh ip mro

<…skip…>

(*, 225.1.1.10), 00:07:47/00:03:04, RP 172.16.251.4, flags: S

Incoming interface: GigabitEthernet0/2.10, RPF nbr 172.16.14.2

Outgoing interface list:

LISP0, 10.1.13.1, Forward/Sparse, 00:07:47/00:03:04

(172.16.251.1, 225.1.1.10), 00:00:26/00:02:33, flags:

Incoming interface: LISP0, RPF nbr 10.1.11.1

Outgoing interface list:

GigabitEthernet0/2.10, Forward/Sparse, 00:00:26/00:03:03

xTR4#sh ip pim nei

PIM Neighbor Table

Mode: B - Bidir Capable, DR - Designated Router, N - Default DR Priority,

P - Proxy Capable, S - State Refresh Capable, G - GenID Capable,

L - DR Load-balancing Capable

Neighbor          Interface                Uptime/Expires    Ver   DR

Address                                                            Prio/Mode

172.16.14.2       GigabitEthernet0/2.10    4d09h/00:01:16    v2    1 / DR S P G

10.1.11.1         LISP0                    00:00:26/00:01:33 v2    0 /

RP(CE4)接收已設定RPT位的(S，G)修剪。RP應該修剪共用樹中的源。RP向源啟動(S，G)修剪。

.Nov 30 00:01:34.811: PIM(0): Received v2 Join/Prune on GigabitEthernet0/1.10 from 172.16.14.1, to us

.Nov 30 00:01:34.813: PIM(0): Prune-list: (172.16.251.1/32, 225.1.1.10) RPT-bit set

.Nov 30 00:01:34.818: MRT(0): Set the T-flag for (172.16.251.1, 225.1.1.10)

.Nov 30 00:01:34.818: PIM(0): Removing register decap tunnel (Tunnel0) as accepting interface of (172.16.251.1, 225.1.1.10).

.Nov 30 00:01:34.819: PIM(0): Installing GigabitEthernet0/1.10 as accepting interface for (172.16.251.1, 225.1.1.10).

.Nov 30 00:01:34.899: PIM(0): Insert (172.16.251.1,225.1.1.10) join in nbr 172.16.14.1's queue

.Nov 30 00:01:34.902: PIM(0): Building Join/Prune packet for nbr 172.16.14.1

.Nov 30 00:01:34.903: PIM(0):  Adding v2 (172.16.251.1/32, 225.1.1.10), S-bit Join

.Nov 30 00:01:34.903: PIM(0): Send v2 join/prune to 172.16.14.1 (GigabitEthernet0/1.10)

.Nov 30 00:01:39.398: PIM(0): Insert (172.16.251.1,225.1.1.10) prune in nbr 172.16.14.1's queue

.Nov 30 00:01:39.399: PIM(0): Building Join/Prune packet for nbr 172.16.14.1

.Nov 30 00:01:39.401: PIM(0):  Adding v2 (172.16.251.1/32, 225.1.1.10), S-bit Prune

.Nov 30 00:01:39.402: PIM(0): Send v2 join/prune to 172.16.14.1 (GigabitEthernet0/1.10)

CE4#sh ip mro

<…skip…>

(172.16.251.1, 225.1.1.10), 00:00:57/00:02:45, flags: PT

Incoming interface: GigabitEthernet0/1.10, RPF nbr 172.16.14.1

Outgoing interface list: Null

xTR4收到RP發起的(S，G)修剪，並將其傳送到FHR(CE1)。 Gi0/2.10不屬於OIL。

Nov 30 00:01:38.620: PIM(0): Received v2 Join/Prune on GigabitEthernet0/2.10 from 172.16.14.2, to us

Nov 30 00:01:38.621: PIM(0): Prune-list: (172.16.251.1/32, 225.1.1.10)

Nov 30 00:01:38.622: PIM(0): Prune GigabitEthernet0/2.10/225.1.1.10 from (172.16.251.1/32, 225.1.1.10)

Nov 30 00:01:38.622: MRT(0): Delete GigabitEthernet0/2.10/225.1.1.10 from the olist of (172.16.251.1, 225.1.1.10)

Nov 30 00:01:38.624: MRT(0): Reset the PIM interest flag for (172.16.251.1, 225.1.1.10)

Nov 30 00:01:38.625: MRT(0): set min mtu for (172.16.251.1, 225.1.1.10) 1500->18010

Nov 30 00:01:38.626: PIM(0): Insert (172.16.251.1,225.1.1.10) prune in nbr 10.1.11.1's queue - deleted

Nov 30 00:01:38.628: PIM(0): Building Join/Prune packet for nbr 10.1.11.1

Nov 30 00:01:38.629: PIM(0):  Adding v2 (172.16.251.1/32, 225.1.1.10), S-bit Prune

Nov 30 00:01:38.630: PIM(0): Send v2 join/prune to 10.1.11.1 (LISP0)

xTR4#sh ip mro

<…skip…>

(*, 225.1.1.10), 00:08:19/00:02:32, RP 172.16.251.4, flags: S

Incoming interface: GigabitEthernet0/2.10, RPF nbr 172.16.14.2

Outgoing interface list:

LISP0, 10.1.13.1, Forward/Sparse, 00:08:19/00:02:32

(172.16.251.1, 225.1.1.10), 00:00:57/00:02:02, flags: PT

Incoming interface: LISP0, RPF nbr 10.1.11.1

Outgoing interface list: Null

xTR1從xTR4收到(S，G)修剪，並從OIL中通過RLOC 10.1.14.1移除LISP0。

.Nov 30 00:01:47.450: PIM(0): Received v2 Join/Prune on LISP0 from 172.16.251.14

.Nov 30 00:01:47.450: PIM(0): J/P Transport Attribute, Transport Type: Unicast, to us

.Nov 30 00:01:47.450: PIM(0): Prune-list: (172.16.251.1/32, 225.1.1.10)

.Nov 30 00:01:47.451: PIM(0): Prune LISP0/10.1.14.1 from (172.16.251.1/32, 225.1.1.10)

.Nov 30 00:01:47.451: MRT(0): Delete LISP0/10.1.14.1 from the olist of (172.16.251.1, 225.1.1.10) – deleted

xTR1#sh ip mro

<…skip…>

(*, 225.1.1.10), 00:01:02/stopped, RP 172.16.251.4, flags: SP

Incoming interface: LISP0, RPF nbr 10.1.14.1

Outgoing interface list: Null

(172.16.251.1, 225.1.1.10), 00:01:02/00:01:57, flags: T

Incoming interface: GigabitEthernet3.10, RPF nbr 172.16.11.2

Outgoing interface list:

LISP0, 10.1.13.1, Forward/Sparse, 00:01:02/00:02:27

現在，你有一個最終狀態。

FHR(CE1)

CE1#sh ip mro

<…skip…>

(*, 225.1.1.10), 00:01:46/stopped, RP 172.16.251.4, flags: SPF

Incoming interface: GigabitEthernet0/1.10, RPF nbr 172.16.11.1

Outgoing interface list: Null

(172.16.251.1, 225.1.1.10), 00:01:46/00:03:09, flags: FT

Incoming interface: Loopback10, RPF nbr 0.0.0.0

Outgoing interface list:

GigabitEthernet0/1.10, Forward/Sparse, 00:01:46/00:02:39, A

xTR1

xTR1#sh ip mro

<…skip…>

(*, 225.1.1.10), 00:01:02/stopped, RP 172.16.251.4, flags: SP

Incoming interface: LISP0, RPF nbr 10.1.14.1

Outgoing interface list: Null

(172.16.251.1, 225.1.1.10), 00:01:02/00:01:57, flags: T

Incoming interface: GigabitEthernet3.10, RPF nbr 172.16.11.2

Outgoing interface list:

LISP0, 10.1.13.1, Forward/Sparse, 00:01:02/00:02:27

xTR1#sh ip pim nei

PIM Neighbor Table

Mode: B - Bidir Capable, DR - Designated Router, N - Default DR Priority,

P - Proxy Capable, S - State Refresh Capable, G - GenID Capable,

L - DR Load-balancing Capable

Neighbor          Interface                Uptime/Expires    Ver   DR

Address                                                            Prio/Mode

172.16.11.2       GigabitEthernet3.10      16:23:01/00:01:29 v2    1 / DR S P G

10.1.14.1         LISP0                    00:01:02/00:01:55 v2    0 /

LHR(CE3)

CE3#sh ip mro

<…skip…>

(*, 225.1.1.10), 00:10:10/stopped, RP 172.16.251.4, flags: SJCL

Incoming interface: GigabitEthernet0/1.10, RPF nbr 172.16.13.1

Outgoing interface list:

Loopback10, Forward/Sparse, 00:10:10/00:02:24

(172.16.251.1, 225.1.1.10), 00:01:46/00:01:13, flags: LJT

Incoming interface: GigabitEthernet0/1.10, RPF nbr 172.16.13.1

Outgoing interface list:

Loopback10, Forward/Sparse, 00:01:46/00:02:24

xTR3

xTR3#sh ip mro

<…skip…>

(*, 225.1.1.10), 00:09:05/00:03:15, RP 172.16.251.4, flags: S

Incoming interface: LISP0, RPF nbr 10.1.14.1

Outgoing interface list:

GigabitEthernet0/2.10, Forward/Sparse, 00:09:05/00:03:15

(172.16.251.1, 225.1.1.10), 00:01:44/00:01:15, flags: T

Incoming interface: LISP0, RPF nbr 10.1.11.1

Outgoing interface list:

GigabitEthernet0/2.10, Forward/Sparse, 00:01:44/00:03:15

xTR3#sh ip pim nei

PIM Neighbor Table

Mode: B - Bidir Capable, DR - Designated Router, N - Default DR Priority,

P - Proxy Capable, S - State Refresh Capable, G - GenID Capable,

L - DR Load-balancing Capable

Neighbor          Interface                Uptime/Expires    Ver   DR

Address                                                            Prio/Mode

172.16.13.2       GigabitEthernet0/2.10    4d09h/00:01:30    v2    1 / DR S P G

10.1.11.1         LISP0                    00:01:44/00:01:14 v2    0 /

10.1.14.1         LISP0                    3d11h/00:01:46    v2    0 /

RP(CE4)

CE4#sh ip mro

<…skip…>

(*, 225.1.1.10), 00:09:10/00:03:17, RP 172.16.251.4, flags: S

Incoming interface: Null, RPF nbr 0.0.0.0

Outgoing interface list:

GigabitEthernet0/1.10, Forward/Sparse, 00:09:10/00:03:17

(172.16.251.1, 225.1.1.10), 00:01:45/00:02:35, flags: PT

Incoming interface: GigabitEthernet0/1.10, RPF nbr 172.16.14.1

Outgoing interface list: Null

xTR4

xTR4#sh ip mro

<…skip…>

(*, 225.1.1.10), 00:09:05/00:02:44, RP 172.16.251.4, flags: S

Incoming interface: GigabitEthernet0/2.10, RPF nbr 172.16.14.2

Outgoing interface list:

LISP0, 10.1.13.1, Forward/Sparse, 00:09:05/00:02:44

(172.16.251.1, 225.1.1.10), 00:01:44/00:01:15, flags: PT

Incoming interface: LISP0, RPF nbr 10.1.11.1

Outgoing interface list: Null

xTR4#sh ip pim nei

PIM Neighbor Table

Mode: B - Bidir Capable, DR - Designated Router, N - Default DR Priority,

P - Proxy Capable, S - State Refresh Capable, G - GenID Capable,

L - DR Load-balancing Capable

Neighbor          Interface                Uptime/Expires    Ver   DR

Address                                                            Prio/Mode

172.16.14.2       GigabitEthernet0/2.10    4d09h/00:01:25    v2    1 / DR S P G

10.1.11.1         LISP0                    00:01:44/00:01:47 v2    0 /

驗證

目前沒有適用於此組態的驗證程序。

疑難排解

目前尚無適用於此組態的具體疑難排解資訊。

來源

- RFC 6831用於組播環境的LISP