目錄

簡介

必要條件

需求

採用元件

背景資訊

設定

網路圖表

地址系列配置模式

地址系列介面配置模式

地址系列拓撲配置模式

比較

可用性

自動轉換為命名EIGRP

驗證

疑難排解

簡介

本檔案介紹命名增強型內部閘道路由通訊協定(EIGRP)模式功能，並藉助於相關組態討論傳統模式和命名模式之間的差異。

必要條件

需求

Cisco建議您瞭解IP路由和EIGRP協定的基本知識。

採用元件

本文件所述內容不限於特定軟體和硬體版本。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

背景資訊

傳統的配置EIGRP的方法要求在介面和EIGRP配置模式下配置各種引數。為了配置EIGRP IPV4和IPv6，需要配置單獨的EIGRP例項。傳統EIGRP在IPv6 EIGRP實施中不支援虛擬路由和轉發(VRF)。

對於命名模式EIGRP，所有配置都在EIGRP配置下的單個位置進行配置，沒有上述限制。

設定

網路圖表

此圖是本文檔其餘部分的拓撲示例。

與傳統方法不同，在路由器上配置此命令時，既不會建立EIGRP例項，也不會啟動：

R1(config)#router eigrp TEST

配置地址系列和自治系統編號後，將建立例項，例如：

R1(config-router)#address-family ipv4 unicast autonomous-system 1

在此命名模式下，只需要建立一個EIGRP例項。它可用於所有地址系列型別。它還支援受可用系統資源限制的多個VRF。在命名模式方面需要注意的一點是，地址系列的配置不會將IPv4路由作為IPv4 EIGRP的傳統配置啟用。需要「no shut」才能啟動進程：

router eigrp [virtual-instance-name | asystem]

[no] shutdown

命名EIGRP有三種模式，在此模式下可以完成大量配置。它們是：

- address-family configuration mode -(config-router-af)#

- address-family interface configuration mode -(config-router-af-interface)#

- address-family topology configuration mode -(config-router-af-topology)#

地址系列配置模式

使用以下命令進入此模式：

R1(config-router)#address-family ipv4 unicast autonomous-system 1

R1(config-router-af)#?

Address Family configuration commands:

af-interface                    Enter Address Family interface configuration

default                         Set a command to its defaults

eigrp                           EIGRP Address Family specific commands

exit-address-family             Exit Address Family configuration mode

help                            Description of the interactive help system

maximum-prefix                  Maximum number of prefixes acceptable in aggregate

metric                          Modify metrics and parameters for advertisement

neighbor                        Specify an IPv4 neighbor router

network                         Enable routing on an IP network

no                              Negate a command or set its defaults

shutdown                        Shutdown address family

timers                          Adjust peering based timers

topology                        Topology configuration mode

在此模式下，可以配置以下引數：網路、EIGRP鄰居和EIGRP路由器ID。命名EIGRP的另外兩種配置模式都在此模式下訪問。

傳統配置

Interface GigabitEthernet 0/0

ip bandwidth-percent eigrp 1 75

ipv6 enable

ipv6 eigrp 1

ip bandwidth-percent eigrp 1 75

no shut

!

router eigrp 1

eigrp router-id 10.10.10.1

network 0.0.0.0 0.0.0.0

ipv6 router eigrp 1

eigrp router-id 10.10.10.1

no shut

命名配置

router eigrp TEST

!

address-family ipv4 unicast autonomous-system 1

!

network 0.0.0.0

eigrp router-id 10.10.10.1

no shutdown

exit-address-family

!

address-family ipv6 unicast autonomous-system 1

!

eigrp router-id 10.10.10.1

no shutdown

exit-address-family

地址系列介面配置模式

此模式採用以前在實際介面（邏輯或物理）上配置的所有介面特定命令。  EIGRP身份驗證、水準分割和摘要地址配置是此處而不是實際介面上配置的一些選項：

R1(config-router-af)#af-interface g0/0

R1(config-router-af-interface)#?

Address Family Interfaces configuration commands:

authentication             authentication subcommands

bandwidth-percent          Set percentage of bandwidth percentage limit

bfd                        Enable Bidirectional Forwarding Detection

dampening-change           Percent interface metric must change to cause update

dampening-interval         Time in seconds to check interface metrics

default                    Set a command to its defaults

exit-af-interface          Exit from Address Family Interface configuration

hello-interval             Configures hello interval

hold-time                  Configures hold time

next-hop-self              Configures EIGRP next-hop-self

no                         Negate a command or set its defaults

passive-interface          Suppress address updates on an interface

shutdown                   Disable Address-Family on interface

split-horizon              Perform split horizon

summary-address            Perform address summarization

附註：您可以使用af-interface default命令將配置一次性應用於所有介面。

地址系列拓撲配置模式

此模式提供了幾個配置選項，它們在EIGRP拓撲表上運行。可以在此模式下配置重分發、距離、偏移清單、差異等內容。您可以從地址系列配置模式進入此模式。

R1(config-router-af)#topology base

R1(config-router-af-topology)#?

Address Family Topology configuration commands:

auto-summary         Enable automatic network number summarization

default              Set a command to its defaults

default-information  Control distribution of default information

default-metric       Set metric of redistributed routes

distance             Define an administrative distance

distribute-list      Filter entries in eigrp updates

eigrp                EIGRP specific commands

exit-af-topology     Exit from Address Family Topology configuration

maximum-paths        Forward packets over multiple paths

metric               Modify metrics and parameters for advertisement

no                   Negate a command or set its defaults

offset-list          Add or subtract offset from EIGRP metrics

redistribute         Redistribute IPv4 routes from another routing proto

summary-metric       Specify summary to apply metric/filtering

timers               Adjust topology specific timers

traffic-share        How to compute traffic share over alternate paths

variance             Control load balancing variance

比較

此處將比較所討論的兩種配置模式：

可用性

以下Cisco IOS® 版本提供EIGRP命名配置：

- 15.0(1)米

- 12.2(33)SRE

- 12.2(33)XNE

- Cisco IOS XE版本2.5

自動轉換為命名EIGRP

這裡有一個自動的方法，可以將配置從傳統方式轉換到新方式。在EIGRP進程內，

需要輸入eigrp upgrade-cli <EIGRP Virtual-Instance Name>。這樣會自動將配置轉換為命名模式，而不會影響已建立的EIGRP對等：

Traditional Configuration

router eigrp 1

network 10.10.10.1 0.0.0.0

!

interface Ethernet0/0

ip address 10.10.10.1 255.255.255.0

ip hello-interval eigrp 1 100

Configuration

R1(config)#router eigrp 1

R1(config-router)#eigrp upgrade-cli TEST

Configuration will be converted from router eigrp 1 to router eigrp TEST.

Are you sure you want to proceed? ? [yes/no]: yes

*Oct 10 14:14:40.684: EIGRP: Conversion of router eigrp 1 to router eigrp TEST -

Completed.

Converted Named Configuration

router eigrp TEST

!

address-family ipv4 unicast autonomous-system 1

!

af-interface Ethernet0/0

hello-interval 100

exit-af-interface

!

topology base

exit-af-topology

network 10.10.10.1 0.0.0.0

exit-address-family

驗證

目前沒有適用於此組態的驗證程序。

疑難排解

目前尚無適用於此組態的具體疑難排解資訊。