目錄

簡介

必要條件

需求

採用元件

設定

網路圖表

組態

驗證

顯示命令

疑難排解

相關資訊

簡介

本文件說明如何為 IPv6 設定增強型內部閘道通訊協定 (EIGRP)。 EIGRP 是由思科開發的 IGRP 增強版本這是一種增強型遠距向量通訊協定，仰賴擴散更新演算法 (DUAL) 來計算到網路內目的地的最短路徑。EIGRP IPv6 的運作方式與 EIGRP IPv4 相同，可以單獨設定和管理。

必要條件

需求

思科建議您瞭解以下主題：

- EIGRPv4 的基本知識

- IPv6 定址的基本知識

限制

EIGRP IPv6 設定有一些限制；如下：

- 可以直接使用 EIGRP IPv6 設定介面，無需使用全域 IPv6 位址。EIGRP IPv6 中沒有網路聲明。

- EIGRPv6 通訊協定執行個體必須先設定路由器 ID 才能執行。

- EIGRP IPv6 具有關閉功能。確保路由程序處於「不關閉」模式以執行通訊協定。

採用元件

本檔案中的組態是根據Cisco IOS軟體版本12.4(15)T 13上的Cisco 3700系列路由器。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

設定

在本範例中，兩個路由器（R1 和 R2）皆採用 IPv6 位址進行設定。兩個路由器都分配迴路位址，並且設定為 EIGRP1。 使用以下指令在介面層級啟用 EIGRPv6：ipv6 eigrp as-number。

網路圖表

此範例使用以下網路設定：

組態

此示例使用以下配置：

- 路由器R1配置

- 路由器R2配置

R1配置

hostname R1

!

ipv6 unicast-routing

!

interface Loopback0

no ip address

ipv6 address 1010:AB8::/64 eui-64

ipv6 enable

ipv6 eigrp 1

!

interface Loopback1

no ip address

ipv6 address 2020:AB8::/64 eui-64

ipv6 enable

ipv6 eigrp 1

!

interface Loopback2

no ip address

ipv6 address 3030:AB8::/64 eui-64

ipv6 enable

ipv6 eigrp 1

!

interface Serial0/0

no ip address

ipv6 address FE80::1 link-local

ipv6 address 2010:AB8::1/64

ipv6 enable

ipv6 eigrp 1

clock rate 2000000

!

ipv6 router eigrp 1

eigrp router-id 2.2.2.2

no shutdown

!

end

R2配置

hostname R2

!

ipv6 unicast-routing

!

interface Loopback0

no ip address

ipv6 address 1000:AB8::/64 eui-64

ipv6 enable

ipv6 eigrp 1

!

interface Loopback1

no ip address

ipv6 address 2000:AB8::/64 eui-64

ipv6 enable

ipv6 eigrp 1

!

interface Loopback2

no ip address

ipv6 address 3000:AB8::/64 eui-64

ipv6 enable

ipv6 eigrp 1

!

interface Serial0/0

no ip address

ipv6 address FE80::2 link-local

ipv6 address 2010:AB8::2/64

ipv6 enable

ipv6 eigrp 1

clock rate 2000000

!

ipv6 router eigrp 1

eigrp router-id 1.1.1.1

no shutdown

!

end

驗證

使用本節內容，確認您的組態是否正常運作。

Cisco CLI Analyzer（僅供已註冊客戶使用）支援某些 show 指令。使用 Cisco CLI Analyzer 檢視 show 指令輸出的分析。

顯示命令

show ipv6 eigrp neighbor 指令顯示 EIGRPv6 發現的相鄰裝置。

Show ipv6 eigrp neighbors

路由器R1
IPv6-EIGRP neighbors for process 1

H   Address                 Interface       Hold Uptime   SRTT   RTO  Q  Seq

(sec)         (ms)       Cnt Num

0   Link-local address:     Se0/0             13 15:17:58   44   264  0  12

FE80::2

!--- Shows the link local address of router R2.

路由器R2

IPv6-EIGRP neighbors for process 1

H   Address                 Interface       Hold Uptime   SRTT   RTO  Q  Seq

(sec)         (ms)       Cnt Num

0   Link-local address:     Se0/0             14 16:32:05   30   300  0  12

FE80::1

!--- Shows the link local address of router R1.

show ipv6 route eigrp 指令顯示 IPv6 路由表的內容，其中包括 EIGRP 的專用路由。

show ipv6 route eigrp

路由器R1
R1#show ipv6 route eigrp

IPv6 Routing Table - 12 entries

Codes: C - Connected, L - Local, S - Static, R - RIP, B - BGP

U - Per-user Static route, M - MIPv6

I1 - ISIS L1, I2 - ISIS L2, IA - ISIS interarea, IS - ISIS summary

O - OSPF intra, OI - OSPF inter, OE1 - OSPF ext 1, OE2 - OSPF ext 2

ON1 - OSPF NSSA ext 1, ON2 - OSPF NSSA ext 2

D - EIGRP, EX - EIGRP external

D   1000:AB8::/64 [90/2297856]

via FE80::2, Serial0/0

D   2000:AB8::/64 [90/2297856]

via FE80::2, Serial0/0

D   3000:AB8::/64 [90/2297856]

via FE80::2, Serial0/0

!--- This command shows IPv6-specific EIGRP routes.

路由器R2

R2#show ipv6 route eigrp

IPv6 Routing Table - 12 entries

Codes: C - Connected, L - Local, S - Static, R - RIP, B - BGP

U - Per-user Static route, M - MIPv6

I1 - ISIS L1, I2 - ISIS L2, IA - ISIS interarea, IS - ISIS summary

O - OSPF intra, OI - OSPF inter, OE1 - OSPF ext 1, OE2 - OSPF ext 2

ON1 - OSPF NSSA ext 1, ON2 - OSPF NSSA ext 2

D - EIGRP, EX - EIGRP external

D   1010:AB8::/64 [90/2297856]

via FE80::1, Serial0/0

D   2020:AB8::/64 [90/2297856]

via FE80::1, Serial0/0

D   3030:AB8::/64 [90/2297856]

via FE80::1, Serial0/0

show ipv6 eigrp interfaces 指令顯示有關針對 EIGRP 所設定的介面的資訊。

show ipv6 eigrp interfaces

路由器R1
R1#show ipv6 eigrp 1 interface

IPv6-EIGRP interfaces for process 1

Xmit Queue   Mean   Pacing Time   Multicast    Pending

Interface        Peers  Un/Reliable  SRTT   Un/Reliable   Flow Timer   Routes

Se0/0              1        0/0        44       0/15         199           0

Lo0                0        0/0         0       0/1            0           0

Lo1                0        0/0         0       0/1            0           0

Lo2                0        0/0         0       0/1            0           0

!--- This command determines which interface EIGRP is active.

路由器R2

R2#show ipv6 eigrp 1 interface

IPv6-EIGRP interfaces for process 1

Xmit Queue   Mean   Pacing Time   Multicast    Pending

Interface        Peers  Un/Reliable  SRTT   Un/Reliable   Flow Timer   Routes

Se0/0              1        0/0        30       0/15         135           0

Lo0                0        0/0         0       0/1            0           0

Lo1                0        0/0         0       0/1            0           0

Lo2                0        0/0         0       0/1            0           0

疑難排解

目前尚無適用於此組態的具體疑難排解資訊。

相關資訊

- EIGRP支援頁

- Cisco IOS IPv6命令參考

- IPv6技術支援

- 技術支援與文件 - Cisco Systems