目錄

簡介

必要條件

需求

採用元件

慣例

設定

網路圖表

組態

驗證

顯示命令

相關資訊

簡介

本文檔介紹如何在EIGRP和BGP之間配置相互重分配。

必要條件

需求

思科建議您瞭解以下主題：

- 增強型內部閘道路由通訊協定(EIGRP)

- 邊界閘道通訊協定(BGP)

採用元件

本檔案中的資訊是根據使用Cisco IOS®軟體版本15.0(1)的Cisco 7200系列路由器。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路運作中，請確保您瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

設定

在本示例中，路由器R1和R2使用EIGRP相互通訊。路由器R2和R3使用eBGP。為了將eBGP路由雙向分配到EIGRP，請使用具有EIGRP指標的redistribute bgp命令。同樣，為了將EIGRP路由再分配到BGP，請使用redistribute eigrp AS number  命令。

網路圖表

此文件使用以下網路設定：

網路圖表

組態

本檔案使用下列組態：

- 路由器R1

- 路由器R2

- 路由器R3

路由器R1

!

hostname R1

!

ip cef

!

!

interface Loopback0

ip address 10.30.30.30 255.255.255.255

!

interface FastEthernet0/0

ip address 192.168.1.101 255.255.255.0

duplex auto

speed auto

!

router eigrp 100

network 10.30.0.0

network 192.168.1.0

no auto-summary

!

end

路由器R2

!

hostname R2

!

ip cef

!

!

interface Loopback0

ip address 10.10.10.10 255.255.255.255

!

interface Loopback1

ip address 10.20.20.20 255.255.255.255

!

interface FastEthernet0/0

ip address 192.168.1.100 255.255.255.0

duplex auto

speed auto

!

interface Serial0/0

ip address 172.16.100.50 255.255.255.0

serial restart-delay 0

clock rate 2000000

!

router eigrp 100

redistribute static

redistribute bgp 1000 metric 100 1 255 1 1500

network 10.0.0.0

network 192.168.1.0

no auto-summary

!

router bgp 1000

no synchronization

bgp log-neighbor-changes

network 10.20.20.20 mask 255.255.255.255

redistribute connected

redistribute static

redistribute eigrp 100

neighbor 172.16.100.51 remote-as 2000

neighbor 172.16.100.51 next-hop-self

no auto-summary

!

end

路由器R3

!

hostname R3

!

ip cef

!

interface Loopback0

ip address 10.22.22.22 255.255.255.255

!

interface Serial0/0

ip address 172.16.100.51 255.255.255.0

serial restart-delay 0

clock rate 2000000

!

router bgp 2000

no synchronization

bgp log-neighbor-changes

network 10.22.22.22 mask 255.255.255.255

network 172.16.100.0 mask 255.255.255.0

neighbor 172.16.100.50 remote-as 1000

neighbor 172.16.100.50 default-originate

default-information originate

!--- Default route is configured!

no auto-summary

!

end

驗證

使用本節內容，確認您的組態是否正常運作。

CLI分析器用於檢視show 命令輸出的分析。

附註：只有完成註冊的思科使用者能存取思科內部工具與資訊。

顯示命令

為了驗證EIGRP接收再分配的路由，請使用show ip route eigrp  命令。

show ip route eigrp

在路由器R1中

R1#show ip route eigrp

10.20.0.0/32 is subnetted, 1 subnets

D EX    10.20.20.20

[170/25625856] via 192.168.1.100, 01:00:33, FastEthernet0/0

10.22.0.0/32 is subnetted, 1 subnets

D EX    10.22.22.22

[170/25625856] via 192.168.1.100, 00:59:49, FastEthernet0/0

10.0.0.0/32 is subnetted, 1 subnets

D       10.10.10.10 [90/409600] via 192.168.1.100, 00:55:17, FastEthernet0/0

D*EX 0.0.0.0/0 [170/25625856] via 192.168.1.100, 00:46:24, FastEthernet0/0

!--- Shows the default route from router R3.

!--- EX indicates that the routes are EIGRP external routes.

為了驗證EIGRP路由在BGP中正確再分配，請在路由器R3中使用show ip route bgp命令。

show ip route bgp

在路由器R3中

R3#show ip route bgp

show ip route bgp

10.20.0.0/32 is subnetted, 1 subnets

B       10.20.20.20 [20/0] via 172.16.100.50, 01:03:02

10.0.0.0/32 is subnetted, 1 subnets

B       10.10.10.10 [20/0] via 172.16.100.50, 01:03:02

B    192.168.1.0/24 [20/0] via 172.16.100.50, 01:03:02

10.30.0.0/32 is subnetted, 1 subnets

B       10.30.30.30 [20/409600] via 172.16.100.50, 00:59:06

!--- The output indicates that the EIGRP routes are

!--- redistributed in BGP.

相關資訊

- BGP 支援頁面

- BGP 個案研究

- EIGRP支援頁面

- 思科技術支援與下載