目錄

簡介

必要條件

需求

採用元件

慣例

設定

網路圖表

配置示例

驗證

相關資訊

簡介

本檔案將提供使用IPv6的範例組態，以協助您瞭解邊界閘道通訊協定(BGP)中的路由反射器(RR)功能。 預設情況下，從iBGP對等體接收的路由不會傳送到另一個iBGP對等體，除非AS內的所有BGP路由器之間形成全網狀配置。這會導致可擴充性問題。使用BGP路由反射器可獲得更高級別的可擴充性。

配置路由反射器允許路由器向其他iBGP揚聲器通告或反射iBGP獲知的路由。當使用neighbor route-reflector-client 命令配置路由器時，路由器稱為路由反射器，命令點所在的鄰居是該RR的客戶端。

必要條件

需求

嘗試此組態之前，請確保符合以下要求：

- 瞭解BGP路由協定及其操作

- 瞭解IPv6編址方案

採用元件

本文件所述內容不限於特定軟體和硬體版本。

本檔案中的組態是根據搭載Cisco IOS®軟體版本12.4(15)T1的Cisco 3700系列路由器。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

設定

在本範例中，路由器A設定為RR，而路由器RRClient1和RRClient2是路由器A的客戶端。所有路由器都配置為AS 100，但路由器沒有全網狀配置。相反，它使用BGP RR功能來彼此通訊。

註：使用Command Lookup Tool(僅限註冊客戶)可以查詢有關本文檔中使用的命令的詳細資訊。

網路圖表

本檔案會使用以下網路設定：

配置示例

本檔案會使用以下設定：

- 路由器A

- RRClient1

- RRClient2

路由器A

hostname Router-A

!

ip cef

!

ipv6 unicast-routing

!

interface Loopback0

no ip address

ipv6 address 2011:11:11:11::11/128

ipv6 ospf 10 area 0

!

interface Serial0/0

no ip address

ipv6 address 2011:12:12:12::1/64

ipv6 ospf 10 area 0

clock rate 2000000

!

interface Serial0/1

no ip address

ipv6 address 2011:13:13:13::1/64

ipv6 ospf 10 area 0

clock rate 2000000

!

router bgp 100

bgp router-id 1.1.1.1

no bgp default ipv4-unicast

bgp log-neighbor-changes

neighbor 2011:22:22:22::22 remote-as 100

neighbor 2011:22:22:22::22 update-source Loopback0

neighbor 2011:33:33:33::33 remote-as 100

neighbor 2011:33:33:33::33 update-source Loopback0

!

address-family ipv6

neighbor 2011:22:22:22::22 activate

neighbor 2011:22:22:22::22 route-reflector-client

!--- Configures the router RRClient1 as route reflector client!

neighbor 2011:33:33:33::33 activate

neighbor 2011:33:33:33::33 route-reflector-client

!--- Configures the router RRClient2 as route reflector client!

exit-address-family

!

ip forward-protocol nd

!

ipv6 router ospf 10

router-id 1.1.1.1

!--- Router ID of the route reflector router A!

log-adjacency-changes

!

end

RRClient1

hostname RR-Client1

!

ip cef

!

ipv6 unicast-routing

!

interface Loopback0

no ip address

ipv6 address 2011:22:22:22::22/128

ipv6 ospf 10 area 0

!

interface Loopback10

no ip address

ipv6 address 1010:10:10:10::10/128

!

interface Serial0/0

no ip address

ipv6 address 2011:12:12:12::2/64

ipv6 ospf 10 area 0

clock rate 2000000

!

router bgp 100

bgp router-id 2.2.2.2

!--- Router ID of the RRClient1

no bgp default ipv4-unicast

bgp log-neighbor-changes

neighbor 2011:11:11:11::11 remote-as 100

neighbor 2011:11:11:11::11 update-source Loopback0

!

address-family ipv6

neighbor 2011:11:11:11::11 activate

network 1010:10:10:10::10/128

exit-address-family

!

!

ip forward-protocol nd

!

ipv6 router ospf 10

router-id 2.2.2.2

log-adjacency-changes

!

!

end

RRClient2

hostname RR-Client2

!

ip cef

!

no ip domain lookup

ipv6 unicast-routing

!

!

interface Loopback0

no ip address

ipv6 address 2011:33:33:33::33/128

ipv6 ospf 10 area 0

!

interface Loopback20

no ip address

ipv6 address 2020:20:20:20::20/128

!

interface Serial0/0

no ip address

ipv6 address 2011:13:13:13::2/64

ipv6 ospf 10 area 0

clock rate 2000000

!

router bgp 100

bgp router-id 3.3.3.3

!--- Router ID of the RRClient2

no bgp default ipv4-unicast

bgp log-neighbor-changes

neighbor 2011:11:11:11::11 remote-as 100

neighbor 2011:11:11:11::11 update-source Loopback0

!

address-family ipv6

neighbor 2011:11:11:11::11 activate

network 2020:20:20:20::20/128

exit-address-family

!

ip forward-protocol nd

!

ipv6 router ospf 10

router-id 3.3.3.3

log-adjacency-changes

!

end

驗證

使用本節內容，確認您的組態是否正常運作。

輸出直譯器工具(僅供已註冊客戶使用)(OIT)支援某些show命令。使用OIT檢視show命令輸出的分析。

以下show命令用於驗證設定：

- show ipv6 route bgp

- show bgp ipv6 unicast

在RR客戶端中：

show ipv6 route bgp

在RRClient1中

RRClient1#sh ipv6 route bgp

IPv6 Routing Table - 9 entries

Codes: C - Connected, L - Local, S - Static, R - RIP, B - BGP

U - Per-user Static route, M - MIPv6

I1 - ISIS L1, I2 - ISIS L2, IA - ISIS interarea, IS - ISIS summary

O - OSPF intra, OI - OSPF inter, OE1 - OSPF ext 1, OE2 - OSPF ext 2

ON1 - OSPF NSSA ext 1, ON2 - OSPF NSSA ext 2

D - EIGRP, EX - EIGRP external

B   2020:20:20:20::20/128 [200/0]

via 2011:33:33:33::33

!--- The iBGP route from RRClient2 is reflected

RRClient1#ping 2011:33:33:33::33

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 2011:33:33:33::33, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 16/24/32 ms

!--- Ping to the RRClient2 from RRClient1 is successful

在RRClient2中

RRCLlient2#sh ipv6 route bgp

IPv6 Routing Table - 9 entries

Codes: C - Connected, L - Local, S - Static, R - RIP, B - BGP

U - Per-user Static route, M - MIPv6

I1 - ISIS L1, I2 - ISIS L2, IA - ISIS interarea, IS - ISIS summary

O - OSPF intra, OI - OSPF inter, OE1 - OSPF ext 1, OE2 - OSPF ext 2

ON1 - OSPF NSSA ext 1, ON2 - OSPF NSSA ext 2

D - EIGRP, EX - EIGRP external

B   1010:10:10:10::10/128 [200/0]

via 2011:22:22:22::22

!--- The iBGP route from RRClient1 is reflected

RRCLlient2#ping 1010:10:10:10::10

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 1010:10:10:10::10, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 40/50/76 ms

!--- Ping to the RRClient1 from RRClient2 is successful

在路由器A中：

show bgp ipv6 unicast IPv6 prefix

RouterA#sh bgp ipv6 unicast 1010:10:10:10::10/128

BGP routing table entry for 1010:10:10:10::10/128, version 3

Paths: (1 available, best #1, table Global-IPv6-Table)

Advertised to update-groups:

1

Local, (Received from a RR-client)

!--- Indicates that the route was received from a route-reflector client router RRClient1

2011:22:22:22::22 (metric 64) from 2011:22:22:22::22 (2.2.2.2)

Origin IGP, metric 0, localpref 100, valid, internal, best

RouterA#show bgp ipv6 unicast 2020:20:20:20::20/128

BGP routing table entry for 2020:20:20:20::20/128, version 2

Paths: (1 available, best #1, table Global-IPv6-Table)

Advertised to update-groups:

1

Local, (Received from a RR-client)

!--- Indicates that the route was received from a route-reflector client router RRClient2

2011:33:33:33::33 (metric 64) from 2011:33:33:33::33 (3.3.3.3)

Origin IGP, metric 0, localpref 100, valid, internal, best

在RR客戶端中：

每當iBGP路由被反射（即傳播到另一個iBGP對等體）時，實現路由反射器的路由器（在本例中是路由器A）會附加2個非傳遞屬性：

- 建立者ID:

這是非傳遞的可選BGP屬性。反射的iBGP路由將具有從其接收該路由的iBGP對等體的路由器ID作為其發起者ID。在我們的示例中，從RRClient 2發出的路由2020:20:20::20/128由路由器A(RR)反射到RRClient1。因此，此路由將具有RRClient2的路由器ID(路由器ID:3.3.3.3)作為建立者ID。

- Cluster-ID:

這是非傳遞的可選BGP屬性。如果未配置cluster-id值，則反映的iBGP路由將將RR的路由器ID作為Cluster-ID。在我們的示例中，路由2020:20:20:20::20/128沒有配置集群ID，因此沒有配置路由器ID(路由器ID :路由器A(RR)的1.1.1)將是Cluster-ID。

show bgp ipv6 unicast ipv6-prefix

在RRClient1中

show bgp ipv6 unicast 2020:20:20:20::20/128

BGP routing table entry for 2020:20:20:20::20/128, version 3

Paths: (1 available, best #1, table Global-IPv6-Table)

Not advertised to any peer

Local

2011:33:33:33::33 (metric 128) from 2011:11:11:11::11 (1.1.1.1)

Origin IGP, metric 0, localpref 100, valid, internal, best

Originator: 3.3.3.3, Cluster list: 1.1.1.1

!--- Originator ID 3.3.3.3 is the router id of the RRClient2 from which the route is received!

!--- Similarly, Cluster ID 1.1.1.1 is the router ID of the router reflector Router A!

在RRClient2中

show bgp ipv6 unicast 1010:10:10:10::10/128

BGP routing table entry for 1010:10:10:10::10/128, version 3

Paths: (1 available, best #1, table Global-IPv6-Table)

Not advertised to any peer

Local

2011:22:22:22::22 (metric 128) from 2011:11:11:11::11 (1.1.1.1)

Origin IGP, metric 0, localpref 100, valid, internal, best

Originator: 2.2.2.2, Cluster list: 1.1.1.1

!--- Originator ID 2.2.2.2 is the router ID of the RRClient1 from which the route is received!

!--- Similarly, Cluster ID 1.1.1.1 is the router ID of the router reflector Router A!

相關資訊

- BGP 支援頁面

- IP第6版支援頁面

- BGP 個案研究

- 技術支援與文件 - Cisco Systems