目錄

簡介

必要條件

需求

採用元件

背景資訊

NX-OS裝置上的vPC故障排除

問題#1:vPC成員埠不相容

疑難排解

問題#2：對等鏈路關閉

疑難排解

問題#3：無法通過對等保持連線到達對等點

疑難排解

問題#4：第1類不一致

疑難排解

問題#5：第2類不一致

疑難排解

問題#6：介面編號和vPC ID不一致

疑難排解

相關資訊

簡介

本檔案介紹常見虛擬連線埠通道(vPC)不一致問題以及對其進行疑難排解的步驟。

必要條件

需求

本文件沒有特定需求。

採用元件

本文件所述內容不限於特定軟體和硬體版本。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路運作中，請確保您瞭解任何指令可能造成的影響。

背景資訊

vPC允許物理連線到兩台不同交換機的鏈路顯示為第三台裝置的單個埠通道。

NX-OS裝置上的vPC故障排除

檢查輸出  show vpc brief  並檢視其中一個vPC成員埠是否存在任何相容性問題。

使用列出的命令檢查特定vPC的不一致性：

show vpc consistency-parameters global

show vpc consistency-parameters interface Ethernet x/y

show vpc consistency-parameters vlans

show vpc consistency-parameters vpc vpc-id

問題#1:vPC成員埠不相容

檢查vPC成員埠之間是否存在任何相容性問題，如「 show vpc '

如果存在任何問題，則會報告為「Compatibility check failed」，如以下輸出所示

`show vpc`

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id : 1

Peer status : peer adjacency formed ok

vPC keep-alive status : peer is alive

Configuration consistency status : success

Per-vlan consistency status : success

Type-2 consistency status : success

vPC role : secondary

Number of vPCs configured : 18

Peer Gateway : Enabled

Dual-active excluded VLANs : -

Graceful Consistency Check : Enabled

Auto-recovery status : Enabled, timer is off.(timeout = 240s)

Delay-restore status : Timer is off.(timeout = 50s)

Delay-restore SVI status : Timer is off.(timeout = 10s)

vPC Peer-link status

---------------------------------------------------------------------

id Port Status Active vlans

-- ---- ------ --------------------------------------------------

1  Po100 up    1,5,10,118,121-132,150,160,253

vPC status

----------------------------------------------------------------------

id Port Status Consistency Reason Active vlans

-- ---- ------ ----------- ------ ------------

1  Po1  up     success     success 1,5,10,118, 121-132,150

2  Po2  down*  failed      Compatibility check failed -      <--- for speed

`show vpc consistency-parameters vpc 2`

Legend:

Type 1 : vPC will be suspended in case of mismatch

Name                        Type  Local Value            Peer Value

-------------               ----  ---------------------- -----------------------

delayed-lacp                1     disabled               disabled

mode                        1     active                 active

Switchport Isolated         1     0                      0

Interface type              1     port-channel           port-channel

LACP Mode                   1     on                     on

Virtual-ethernet-bridge     1     Disabled               Disabled

Speed                       1     10 Gb/s                100 Gb/s     <--- speed mismatch

Duplex                      1     full                   full

MTU                         1     9216                   9216

Port Mode                   1     trunk                  trunk

Native Vlan                 1     20                     20

Admin port mode             1     trunk                  trunk

STP Port Guard              1     Default                Default

STP Port Type               1     Edge Trunk Port        Edge Trunk Port

STP MST Simulate PVST       1     Default                Default

lag-id                      1     [(64, 0-23-4-ee-be-6d, [(0,

806b, 0, 0), (ffff,   50-6b-4b-46-3a-fa, 0,

50-6b-4b-46-39-6a, 1,  0, 0), (64,

0, 0)]                 0-23-4-ee-be-6d, 806b,

0, 0)]

Vlan xlt mapping            1     Disabled               Disabled

vPC card type               1     N9K TOR                N9K TOR

Allowed VLANs               -     1,5,10,118             1,5,10,118

Local suspended VLANs       -     -                      -

疑難排解

- 確保vPC介面和遠端端（伺服器/第三交換機）配置了相同的速度。使用 show vpc consistency-parameters vpc vpc-id 檢查與對等vPC介面的速度不匹配。

- 此外，請確認vPC中的所有成員介面都配置了相同的速度。

問題#2：對等鏈路關閉

檢查對等體狀態是否為對等體連結是否處於關閉狀態  show vpc

如果對等鏈路狀態存在任何問題，則對於「對等體狀態」，必須將其報告為「對等鏈路已關閉」，如以下輸出所示：

`show vpc brief`

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 100

Peer status                       : peer link is down      <--- peer-link is down then vPC is down

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : failed

Type-2 inconsistency reason       : SVI type-2 configuration incompatible

vPC role                          : secondary

Number of vPCs configured         : 1

Peer Gateway                      : Disabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Disabled

Delay-restore status              : Timer is off.(timeout = 30s)

Delay-restore SVI status          : Timer is off.(timeout = 10s)

Operational Layer3 Peer-router    : Disabled

Virtual-peerlink mode             : Disabled

vPC Peer-link status

---------------------------------------------------------------------

id    Port   Status Active vlans

--    ----   ------ -------------------------------------------------

1     Po1    down   -

vPC status

----------------------------------------------------------------------------

Id    Port          Status Consistency Reason                Active vlans

--    ------------  ------ ----------- ------                ---------------

123   Po123         down   failed      Peer-link is down     -           <--- Reason: Peer-link down

疑難排解

- 檢查對等鏈路中配置的埠通道介面和成員介面的狀態。如果它們已關閉但未連線，請檢查物理連線，如電纜/SFP等。

- 需要將vPC對等鏈路埠通道配置為生成樹協定(STP)埠型別網路，以便在兩台vPC對等交換機上的所有vPC對等鏈路上啟用網橋保證。

- 驗證vPC對等鏈路是否配置為僅允許vPC VLAN的第2層埠通道中繼。

- 在對等體之間的vPC對等體鏈路最初建立之前，所有vPC埠通道都保持掛起狀態。如果vPC對等鏈路聯機後出現故障一段時間，輔助鏈路上的vPC將暫停，直到對等鏈路恢復。

問題#3：無法通過對等保持連線到達對等點

檢查vPC keep-alive status is peer is not reachable through peer-keepalive in  show vpc

輸出報告vPC對等keepalive已關閉，原因是無法通過對等keepalive到達對等，如下所示：

`show vpc brief`

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 100

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : peer is not reachable through peer-keepalive  <--- keep-alive is down

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : failed

Type-2 inconsistency reason       : SVI type-2 configuration incompatible

vPC role                          : secondary

Number of vPCs configured         : 1

Peer Gateway                      : Disabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Disabled

Delay-restore status              : Timer is off.(timeout = 30s)

Delay-restore SVI status          : Timer is off.(timeout = 10s)

Operational Layer3 Peer-router    : Disabled

Virtual-peerlink mode             : Disabled

vPC Peer-link status

---------------------------------------------------------------------

id    Port   Status Active vlans

--    ----   ------ -------------------------------------------------

1     Po1    up     1,10

vPC status

----------------------------------------------------------------------------

Id    Port          Status Consistency Reason                Active vlans

--    ------------  ------ ----------- ------                ---------------

123   Po123         up     success     success               1,10               <-- vpc is still up

疑難排解

- 驗證第3層介面是否已與用於vPC對等交換器之間對等保持連線的正確虛擬路由轉送(VRF)相關聯。

- 如果用於對等保持連線的管理VRF，請確保將管理交換機連線到兩個vPC對等裝置上的管理埠。

- 驗證用於對等保持連線消息的源IP地址和目標IP地址是否可從與vPC對等保持連線鏈路關聯的VRF訪問。

- 確保已解析地址解析協定(ARP)，並且您可以在對等保持連線地址之間執行ping以測試可達性。  如果不存在可達性，請檢查路徑沿途的問題（L1、STP等）。

問題#4：第1類不一致

檢查Type-1一致性狀態是否在  show vpc

如果檢測到配置一致性問題，命令結果將報告失敗的原因，如下所示：

`show vpc`

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 1

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : peer is alive

Configuration consistency status  : failed      <--- consistency check failed

Per-vlan consistency status       : success

Configuration inconsistency reason: vPC type-1 configuration incompatible - STP Mode inconsistent    <--- reason of inconsistency

Type-2 consistency status         : success

vPC role                          : primary

Number of vPCs configured         : 0

Peer Gateway                      : Enabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled, timer is off.(timeout = 360s)

Delay-restore status              : Timer is on.(timeout = 150s, 30s left)

Delay-restore SVI status          : Timer is off.(timeout = 10s)

Operational Layer3 Peer-router    : Enabled

Virtual-peerlink mode             : Disabled

疑難排解

- 驗證兩台對等交換機是否控制相同的生成樹模式。例如，如果對等交換器使用多重跨距樹狀目錄(MST)跨距樹狀目錄模式，而另一個對等交換器使用快速每個VLAN跨距樹狀目錄（快速PVST）。將兩台交換器的跨距樹狀目錄模式更改為相同，以清除此錯誤。

- 使用以下命令變更生成樹模式：

Switch(config)# spanning-tree mode mst

或

Switch(config)# spanning-tree mode rapid-pvst

要檢視其他型別1型VPC全域性配置故障，請使用此命令確定類別以及本地和對等值：

`show vpc consistency-parameters global`

Legend:

Type 1 : vPC will be suspended in case of mismatch

Name                        Type  Local Value            Peer Value

-------------               ----  ---------------------- -----------------------

STP MST Simulate PVST       1     Enabled                Enabled

STP Port Type, Edge         1     Normal, Disabled,      Normal, Disabled,

BPDUFilter, Edge BPDUGuard        Disabled               Disabled

STP MST Region Name         1     ""                     ""

STP Disabled                1     None                   None

STP Mode                    1     Rapid-PVST             Rapid-PVST

STP Bridge Assurance        1     Enabled                Enabled

STP Loopguard               1     Disabled               Disabled

STP MST Region Instance to  1

VLAN Mapping

STP MST Region Revision     1     0                      0

Interface-vlan admin up     2                            10

Interface-vlan routing      2     1                      1,10

capability

QoS (Cos)                   2     ([0-7], [], [], [],    ([0-7], [], [], [],

[], [])                [], [])

Network QoS (MTU)           2     (1500, 1500, 1500,     (1500, 1500, 1500,

1500, 1500, 1500)      1500, 1500, 1500)

Network Qos (Pause:         2     (F, F, F, F, F, F)     (F, F, F, F, F, F)

T->Enabled, F->Disabled)

Input Queuing (Bandwidth)   2     (0, 0, 0, 0, 0, 0)     (0, 0, 0, 0, 0, 0)

Input Queuing (Absolute     2     (F, F, F, F, F, F)     (F, F, F, F, F, F)

Priority: T->Enabled,

F->Disabled)

Output Queuing (Bandwidth   2     (0, 0, 0, 0, 0, 0)     (0, 0, 0, 0, 0, 0)

Remaining)

Output Queuing (Absolute    2     (T, F, F, F, F, F)     (T, F, F, F, F, F)

Priority: T->Enabled,

F->Disabled)

Allowed VLANs               -     1,10                   1,10

Local suspended VLANs       -     -                      -

此示例展示如何顯示特定vPC埠通道的vPC一致性引數：

`show vpc consistency-parameters interface port-channel 10`

Legend:

Type 1 : vPC will be suspended in case of mismatch

Name                        Type  Local Value            Peer Value

-------------               ----  ---------------------- -----------------------

STP Mode                    1     Rapid-PVST             Rapid-PVST

STP Disabled                1     None                   None

STP MST Region Name         1     ""                     ""

STP MST Region Revision     1     0                      0

STP MST Region Instance to  1

VLAN Mapping

STP Loopguard               1     Disabled               Disabled

STP Bridge Assurance        1     Enabled                Enabled

STP Port Type               1     Normal                 Normal

STP MST Simulate PVST       1     Enabled                Enabled

Allowed VLANs               -     1-10,15-20,30,37,99    1-10,15-20,30,37,9

- 使用全域性和埠通道vPC一致性引數以及當前配置來標識vPC對等體之間的任何差異。

問題#5：第2類不一致

檢查Type-2一致性狀態是否在  show vpc

.

如果檢測到配置不一致，此命令結果將報告失敗原因：

`show vpc`

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 1

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : failed      <--- Type-2 inconsistency found

Type-2 inconsistency reason       : SVI type-2 configuration incompatible    <--- Reason for Type-2 inconsistency

vPC role                          : primary

Number of vPCs configured         : 0

Peer Gateway                      : Enabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled, timer is off.(timeout = 360s)

Delay-restore status              : Timer is off.(timeout = 150s)

Delay-restore SVI status          : Timer is off.(timeout = 10s)

Operational Layer3 Peer-router    : Enabled

Virtual-peerlink mode             : Disabled

此命令可用於深入挖掘，檢視所有型別2的不一致情況，以及對等項和本地值的配置，以檢視配置是否不匹配：

`show vpc consistency-parameters global`

Legend:

Type 1 : vPC will be suspended in case of mismatch

Name                        Type  Local Value            Peer Value

-------------               ----  ---------------------- -----------------------

STP MST Simulate PVST       1     Enabled                Enabled

STP Port Type, Edge         1     Normal, Disabled,      Normal, Disabled,

BPDUFilter, Edge BPDUGuard        Disabled               Disabled

STP MST Region Name         1     ""                     ""

STP Disabled                1     None                   None

STP Mode                    1     Rapid-PVST             Rapid-PVST

STP Bridge Assurance        1     Enabled                Enabled

STP Loopguard               1     Disabled               Disabled

STP MST Region Instance to  1

VLAN Mapping

STP MST Region Revision     1     0                      0

Interface-vlan admin up     2                            10    <--- mismatch for SVIs between peers

Interface-vlan routing      2     1                      1,10    <--- mismatch for SVIs between peers

capability

QoS (Cos)                   2     ([0-7], [], [], [],    ([0-7], [], [], [],

[], [])                [], [])

Network QoS (MTU)           2     (1500, 1500, 1500,     (1500, 1500, 1500,

1500, 1500, 1500)      1500, 1500, 1500)

Network Qos (Pause:         2     (F, F, F, F, F, F)     (F, F, F, F, F, F)

T->Enabled, F->Disabled)

Input Queuing (Bandwidth)   2     (0, 0, 0, 0, 0, 0)     (0, 0, 0, 0, 0, 0)

Input Queuing (Absolute     2     (F, F, F, F, F, F)     (F, F, F, F, F, F)

Priority: T->Enabled,

F->Disabled)

Output Queuing (Bandwidth   2     (0, 0, 0, 0, 0, 0)     (0, 0, 0, 0, 0, 0)

Remaining)

Output Queuing (Absolute    2     (T, F, F, F, F, F)     (T, F, F, F, F, F)

Priority: T->Enabled,

F->Disabled)

Allowed VLANs               -     1,10                   1,10

Local suspended VLANs       -     -                      -

疑難排解

- 交換虛擬介面(SVI)第2類配置不一致可能是由於在vPC對等交換機之間配置的許多SVI不一致。例如，當某台交換機上配置了特定VLAN SVI，但對等交換機上不存在該VLAN SVI。

- 使用  show running-config  命令以識別所配置的SVI之間的任何差異。

- 如果仍需其他幫助來識別配置的SVI中的差異，請開啟TAC案例。

問題#6：介面編號和vPC ID不一致

檢查是否有任何成員埠在vPC狀態下  show vpc  命令結果。

`show vpc`

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 100

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : secondary

Number of vPCs configured         : 1

Peer Gateway                      : Disabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Disabled

Delay-restore status              : Timer is off.(timeout = 30s)

Delay-restore SVI status          : Timer is off.(timeout = 10s)

Operational Layer3 Peer-router    : Disabled

Virtual-peerlink mode             : Disabled

vPC Peer-link status

---------------------------------------------------------------------

id    Port   Status Active vlans

--    ----   ------ -------------------------------------------------

1     Po1    up     1

vPC status

----------------------------------------------------------------------------

Id    Port          Status Consistency Reason                Active vlans

--    ------------  ------ ----------- ------                ---------------

123   Po123         down*  failed      vPC type-1            -                        <---  type-1 inconsistency

configuration

incompatible - STP

interface port type

inconsistent

疑難排解

- 驗證vPC介面與  show vpc consistency-parameters vpc vpc-id.

檢查STP埠型別不匹配的步驟：

`show vpc consistency-parameters vpc 123`

Legend:

Type 1 : vPC will be suspended in case of mismatch

Name                        Type  Local Value            Peer Value

-------------               ----  ---------------------- -----------------------

Interface type              1     port-channel           port-channel

LACP Mode                   1     on                     on

STP Port Guard              1     Default                Default

STP Port Type               1     Edge Trunk Port        Default  <--- this VPC port-channel is configured as Edge Trunk port while peer has Default STP port type.

- 在兩個對等體上配置STP埠型別以匹配vPC介面。可以將生成樹埠配置為邊緣埠、網路埠或普通埠。在指定的時間，連線埠只能處於其中一種狀態。預設跨距樹狀目錄連線埠型別為正常型別。

- STP埠型別可以全域性配置或在介面級別配置。

相關資訊

- 思科技術支援與下載