目錄

簡介

背景

採用元件

拓撲

配置ITD

驗證ITD

簡介

本檔案將介紹Nexus 9000平台上的智慧流量導向器(ITD)的組態和基本疑難排解

背景

Cisco Intelligent Traffic Director(ITD)如下所示

- 使用Cisco Nexus 5/6/7/9K交換機為第3層和第4層服務和應用提供基於ASIC（硬體）的流量分配。

- 它執行L3和L4流量分配，但不取代第7層負載均衡器。

- 執行負載平衡伺服器的運行狀況監控和自動故障處理。

- 它會自動建立ACL、路由對映策略以執行PBR功能來重定向和負載均衡流量。

採用元件

硬體 — C9372PX

軟體 — 7.0(3)I7(2)

許可證要求

Cisco NX-OS-ITD需要網路服務許可證。

在啟用「功能ITD」且我們沒有所需的許可證時，出現以下日誌。

VDC-1 %$ iscm[31793]:!!!!!!  警告：未在系統中找到「NETWORK_SERVICES_PKG」許可證  !!!!!!。你試過了

VDC-1 %$ iscm[31793]:系統支援基於榮譽的許可證。功能將啟用並完全正常工作。許可證使用

VDC-1 %$ iscm[31793]:如果您錯誤地啟用此功能，請禁用此功能。如果您沒有購買

為使用ITD需要啟用的功能

- 功能ITD

- 功能PBR

- 功能Sla發件人

- 功能SLA響應器*

拓撲

配置ITD

配置ITD服務的四個主要步驟

- 建立裝置組

- 建立ITD服務

- 將裝置組連線到ITD服務

- 將服務附加到入口介面

N9K_ITD

version 7.0(3)I7(2)

feature itd

itd device-group Test

probe icmp

node ip 192.168.1.1

node ip 192.168.1.2

itd Telnet

device-group Test ( Call the device group )

virtual ip 192.168.2.2 255.255.255.255 tcp 23 ( Optional )

ingress interface Vlan20 ( Assign ingress interface )

no shut

interface Vlan20

no shutdown

ip address 192.168.2.2/24

ip policy route-map Telnet_itd_pool ( This line gets automatically added when we “no shut” the ITD service )

附註：將此方法應用於L2介面會產生以下錯誤。建立L3介面或SVI。

N9K_ITD(config-itd)# ingress interface ethernet 1/3

ERROR: Interface:Ethernet1/3 is not a layer-3 interface

請注意，以下配置會自動新增，這些是通過PBR為定義為LB的每個節點建立的儲存桶。

Show run | section ITD

feature itd

ip access-list Telnet_itd_vip_1_bucket_1

10 permit tcp 1.1.1.0 255.255.255.127 192.168.2.4/32 eq telnet

ip access-list Telnet_itd_vip_1_bucket_2

10 permit tcp 1.1.1.128 255.255.255.127 192.168.2.4/32 eq telnet

route-map Telnet_itd_pool permit 10

description auto generated route-map for ITD service Telnet

match ip address Telnet_itd_vip_1_bucket_1

set ip next-hop verify-availability 192.168.1.1 track 2

route-map Telnet_itd_pool permit 11

description auto generated route-map for ITD service Telnet

match ip address Telnet_itd_vip_1_bucket_2

set ip next-hop verify-availability 192.168.1.2 track 3

ip policy route-map Telnet_itd_pool

switch(config)# show route-map Telnet_itd_pool

route-map Telnet_itd_pool, permit, sequence 10

Description: auto generated route-map for ITD service Telnet

Match clauses:

ip address (access-lists): Telnet_itd_bucket_1

Set clauses:

ip next-hop verify-availability 192.168.1.1 track 2 [ UP ]

route-map Telnet_itd_pool, permit, sequence 11

Description: auto generated route-map for ITD service Telnet

Match clauses:

ip address (access-lists): Telnet_itd_bucket_2

Set clauses:

ip next-hop verify-availability 192.168.1.2 track 3 [ UP ]

驗證ITD

N9K_ITD(config)# show itd Telnet statistics

Service                        Device Group                            VIP/mask

#Packets

-------------------------------------------------------------------------------------

Telnet                             Test                            192.168.2.2 /

255.255.255.255                                   0          (0%)

Traffic Bucket                                   Assigned to

Mode                Original Node                   #Packets

---------------                                  --------------

Telnet_itd_vip_1_bucket_1                        192.168.1.1

Bypass            192.168.1.1                     0          (0%) <<<<<<<<<<

Traffic Bucket                                   Assigned to

Mode                Original Node                   #Packets

---------------                                  --------------

Telnet_itd_vip_1_bucket_2                        192.168.1.2

Bypass            192.168.1.2                     0          (0%) <<<<<<<<<<

switch(config)# show itd Telnet brief

Legend:

C-S(Config-State): A-Active,S-Standby,F-Failed

ST(Status): ST-Standby,LF-Link Failed,PF-Probe Failed,PD-Peer Down,IA-Inactive

Name           LB Scheme  Interface  Status   Buckets

-------------- ---------- ---------- -------- --------

Telnet         src-ip     Vlan20     ACTIVE   2    <<<<<<

Exclude ACL

-------------------------------

Device Group                                       Probe  Port

-------------------------------------------------- ----- ------

Test                                                ICMP

Virtual IP                              Netmask/Prefix Protocol     Port

------------------------------------------------------ ------------ ----------

192.168.2.2 / 255.255.255.255                          TCP          23

Node  IP           C-S WGT Probe Port     Probe-IP   STS

------------------- -- --- ---- ----- --------------- --

1       192.168.1.1  A   1 ICMP                       OK<<<<

2       192.168.1.2  A   1 ICMP                       OK<<<<

Telnet至Vlan 20負載均衡器VIP(SVI)

Laptop - telnet 192.168.2.2

Trying 192.168.2.2...

Connected to 192.168.2.2.

由VIP接收並轉發到節點(192.168.1.1)的資料包為31個。

N9K_ITD(config)# show it Telnet statistics

Service                        Device Group                            VIP/mask

#Packets

--------------------------------------------------------------------------------

Telnet                             Test                            192.168.2.2 /

255.255.255.255                                   31       (100.00%)

Traffic Bucket                                   Assigned to

Mode                Original Node                   #Packets

---------------                                  --------------

Telnet_itd_vip_1_bucket_1                        192.168.1.1

Redirect            192.168.1.1                     31       (100.00%)

Traffic Bucket                                   Assigned to

Mode                Original Node                   #Packets

---------------                                  --------------

Telnet_itd_vip_1_bucket_2                        192.168.1.2

Redirect            192.168.1.2                     0        (0.00%)

已知瑕疵:

https://bst.cloudapps.cisco.com/bugsearch/bug/CSCvc73162/?reffering_site=dumpcr