目錄

簡介

必要條件

需求

採用元件

設定

網路圖表

組態

驗證

疑難排解

簡介

本檔案介紹執行NX-OS作業系統的Cisco Nexus系列交換器上的邊界閘道通訊協定(BGP)中的dampen-igp-metric命令的目的。

必要條件

需求

思科建議您瞭解以下主題：

- Nexus NX-OS軟體。

- BGP路由協定。

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- Cisco N9K-C9508

- NXOS 7.0(3)I7(6)版

本文件所述內容不限於特定軟體和硬體版本。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路運作中，請確保您瞭解任何指令可能造成的影響。

設定

預設情況下，Nexus系列交換機在BGP配置部分將命令dampen-igp-metric設定為預設值600秒。

這會影響BGP處理為重分發路由報告的內部網關協定(IGP)度量更改的方式。BGP在以10分鐘延遲的分批方式處理更改時抑制這些更改。

此命令允許您調整該延遲或將其完全刪除，以更快響應這些更改。

計時器到期後，BGP MED（多出口鑑別器）屬性將使用重新分佈的IGP路由的新開銷更新。

Nexus - Nexus NX-OS

Nexus# configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

Nexus(config)# router bgp 65535

Nexus(config-router)# address-family ipv4 unicast

Nexus(config-router-af)# dampen-igp-metric ?

<20-3600>  Time interval in seconds

*Default value is 600

Nexus(config-router-af)# no dampen-igp-metric

同樣可以在BGP配置部分中為地址系列ipv6單播和每VRF例項配置此命令。

附註：使用BGP將IGP路由洩漏到其他VRF時，dampen-igp-metric命令還控制更新其他BGP屬性（如下一跳屬性）的延遲時間。

網路圖表

在此案例中，Nexus交換機配置為將開放最短路徑優先(OSPF)路由從路由表重分發到BGP表。

組態

R1 - Cisco IOS

configure terminal

!

hostname R1

!

router ospf 1

router-id 10.255.255.1

!

interface Loopback0

ip address 10.255.255.1 255.255.255.255

ip ospf 1 area 0

!

interface GigabitEthernet0/0

ip address 10.1.2.1 255.255.255.0

ip ospf network point-to-point

ip ospf 1 area 0

no shutdown

!

end

Nexus - NX-OS

configure terminal

!

hostname Nexus

!

feature ospf

feature bgp

!

route-map ALL

!

router ospf 1

router-id 10.255.255.2

!

router bgp 65535

router-id 10.255.255.2

address-family ipv4 unicast

redistribute ospf 1 route-map ALL

neighbor 10.2.3.3

remote-as 65535

address-family ipv4 unicast

!

interface Ethernet1/1

ip address 10.1.2.2/24

ip ospf network point-to-point

ip router ospf 1 area 0.0.0.0

no shutdown

!

interface Ethernet1/2

ip address 10.2.3.2/24

no shutdown

R3 - Cisco IOS

configure terminal

!

hostname R3

!

router bgp 65535

bgp log-neighbor-changes

neighbor 10.2.3.2 remote-as 65535

!

interface GigabitEthernet0/0

ip address 10.2.3.3 255.255.255.0

no shutdown

!

end

驗證

運行命令show bgp internal af。確保行IGP Metric Dampening Interval指示所需的值。

預設值為600（秒）。

Nexus - NX-OS

Nexus# show bgp internal af

. . .

BGP Address Family Information for VRF: default

Import Pending               : No

Import Pending               : never

Import Pending Reset         : never

Table Context Address : 0xcfa08bf4

Address family: IPv4 Unicast

. . .

IGP Metric Dampening Interval  : 600

如果路由表中的OSPF路由更新其開銷，則會在BGP MED路徑屬性中延遲反映此新值。

Nexus - NX-OS

Nexus# show ip route 10.255.255.1

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

10.255.255.1/32, ubest/mbest: 1/0

*via 10.1.2.1, Eth1/1, [110/41], 01:58:41, ospf-1, intra

Nexus#

* There is an update in the Cost of the OSPF route 10.255.255.1/32

Nexus# show ip route 10.255.255.1

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

10.255.255.1/32, ubest/mbest: 1/0

*via 10.1.2.1, Eth1/1, [110/190], 00:00:02, ospf-1, intra

Nexus#

Nexus# show bgp ipv4 unicast

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 4, Local Router ID is 10.255.255.2

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-i

njected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup

Network            Next Hop            Metric     LocPrf     Weight Path

*>r10.255.255.1/32    0.0.0.0                 41        100      32768 ?

Nexus#

* After 600 seconds.

Nexus# show bgp ipv4 unicast

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 5, Local Router ID is 10.255.255.2

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-i

njected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup

Network            Next Hop            Metric     LocPrf     Weight Path

*>r10.255.255.1/32    0.0.0.0                190        100      32768 ?

在BGP address-family configuration部分下運行命令no dampen-igp-metric，以在路由表中的OSPF開銷發生更改時立即更新BGP表中的MED屬性。

Nexus - NX-OS

Nexus# configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

Nexus(config)# router bgp 65535

Nexus(config-router)#   address-family ipv4 unicast

Nexus(config-router-af)# no dampen-igp-metric

* There is an update in the Cost of the OSPF route 10.255.255.1/32

Nexus# show ip route 10.255.255.1

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

10.255.255.1/32, ubest/mbest: 1/0

*via 10.1.2.1, Eth1/1, [110/190], 00:00:02, ospf-1, intra

Nexus# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 7, Local Router ID is 10.255.255.2

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-i

njected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup

Network            Next Hop            Metric     LocPrf     Weight Path

*>r10.255.255.1/32    0.0.0.0                190        100      32768 ?

疑難排解

為了確認dampen-igp-metric命令在NX-OS上的功能，請開啟下一個調試。

- debug-filter bgp prefix <PREFIX/MASK>

- debug logfile <FILE_NAME>

- debug bgp dampening brib

Nexus - NX-OS

Nexus# debug-filter bgp prefix 10.255.255.1/32

Nexus# debug logfile bgpdebug.log

Nexus# debug bgp dampening brib

Nexus#

Nexus# show debug logfile bgpdebug.log

2019 Jul 23 21:13:27.676328 bgp: [25368] (default) BRIB: [IPv4 Unicast] Setting the update pending flag for 10.255.255.1/32

Nexus# show debug logfile bgpdebug.log

2019 Jul 23 21:13:27.676328 bgp: [25368] (default) BRIB: [IPv4 Unicast] Setting the update pending flag for 10.255.255.1/32

2019 Jul 23 21:20:47.641987 bgp: [25368] (default) BRIB: [IPv4 Unicast] Clearing the update pending flag for 10.255.255.1/32

2019 Jul 23 21:20:47.642013 bgp: [25368] (default) BRIB: [IPv4 Unicast] Originating prefix 10.255.255.1/32, route type redist

2019 Jul 23 21:20:47.642075 bgp: [25368] (default) BRIB: [IPv4 Unicast] Installing prefix 10.255.255.1/32 (redist) via 0.0.0.0 (0x0/0x0) into BRIB with extcomm Extcommunity: OSPF RT:0.0.0.0:0:0

2019 Jul 23 21:20:47.642395 bgp: [25368] (default) BRIB: [IPv4 Unicast] Path to 10.255.255.1/32 via 0.0.0.0 already exists, dflags=0x80002

2019 Jul 23 21:20:47.642415 bgp: [25368] (default) BRIB: [IPv4 Unicast] (10.255.255.1/32 (local)): bgp_brib_add: handling nexthop, path->flags2: 0x1

2019 Jul 23 21:20:47.642447 bgp: [25368] (default) BRIB: [IPv4 Unicast] (10.255.255.1/32 (local)): returning from bgp_brib_add, reeval=0new_path: 0, change: 1, undelete: 0, history: 0, force: 0, (pflags=0x2408) rnh_flag_change 0

2019 Jul 23 21:20:47.642475 bgp: [25368] (default) BRIB: [IPv4 Unicast] Cleanup for dest 10.255.255.1/32 exits since it's on newlist

Nexus#

完成後，使用以下命令禁用調試：

- 取消全部調試

- no debug-filter all

- clear debug logfile <FILE_NAME>