目錄

簡介

快速十六進位制/解碼器轉換

一次執行多個CLI

使用CLI變數

自定義終端設定

根據需要延遲命令執行

訪問路由環境/VRF

連線到LC時為各自VDC運行CLI:N7k特定

在Linux核心和NX-OS之間來回切換，而不退出調試外掛

直接通過VSH載入配置

使用Diffs — 列出計數器之間的差異

使用Watch CLI - 7.0(3)I2(x)後特定於N9k

在內部檢查CPU使用情況

發佈內部生成版本

簡介

本文檔介紹一些可以增強NX-OS故障排除體驗的快速提示和技巧。

快速十六進位制/解碼器轉換

十六進位制表示十進位制，十進位制表示十進位制

NX-OS# dec 0x89

137

NX-OS# hex 137

0x89

一次執行多個CLI

CLI代表命令列介面

N7k-LabSW# show clock ; show switchname ; show license host-id

19:10:59.016 UTC Mon Apr 04 2016

N7k-LabSW

License hostid: VDH=TBM14354170

#也適用於配置：

N7k-LabSW# conf t ; hostname N7k-LabSW-DEFAULT ; end

Enter configuration commands, one per line.  End with CNTL/Z.

N7k-LabSW-DEFAULT#

#完成CLI所用的時間：

N7k-LabSW# show clock ; show run | ex .* ; show clock

07:56:08.709 UTC Tue Apr 05 2016

07:56:08.834 UTC Tue Apr 05 2016

使用CLI變數

N7k-LabSW# show cli variables

VSH Variable List (* = session vars)

-----------------

SWITCHNAME="N7k-LabSW"

TIMESTAMP="2016-04-05-08.34.18"

N7k-LabSW# tac-pac bootflash:$(SWITCHNAME)-$(TIMESTAMP)-show-tech-all.gz

N7k-LabSW# dir bootflash: | i show-tech-all

15091722    Apr 05 08:41:27 2016  N7k-LabSW-2016-04-05-08.35.57-show-tech-all.gz

還可以建立自己的變數：

CCO參考

自定義終端設定

1)避免終端會話超時：

N7k-LabSW# show terminal | i Timeout

Session Timeout: 30 minutes

N7k-LabSW# terminal session-timeout ?

<0-525600>  Enter timeout in minutes, 0 to disable

N7k-LabSW# terminal session-timeout 0

N7k-LabSW# show terminal | i Timeout

Session Timeout: 0 minutes

2)設定顯示終端的寬度/長度：

當不希望長寬輸出中斷到新行時，非常方便

N7k-LabSW# show terminal | i Width

Length: 25 lines, Width: 98 columns

N7k-LabSW# terminal width 300

N7k-LabSW# show terminal | i Width

Length: 25 lines, Width: 300 columns

根據需要延遲命令執行

N7k-LabSW# show clock ; sleep 10 ; show clock

19:27:07.435 UTC Mon Apr 04 2016

19:27:17.445 UTC Mon Apr 04 2016

訪問路由環境/VRF

VRF代表虛擬路由和轉送

運行特定VRF的CLI，而無需每次向命令新增VRF <>:

N7k-LabSW# routing-context vrf management

N7k-LabSW%management# sh ip route

IP Route Table for VRF "management"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

0.0.0.0/0, ubest/mbest: 1/0

*via 10.48.61.129, [1/0], 1w4d, static

10.48.61.128/26, ubest/mbest: 1/0, attached

*via 10.48.61.150, mgmt0, [0/0], 1w4d, direct

10.48.61.150/32, ubest/mbest: 1/0, attached

*via 10.48.61.150, mgmt0, [0/0], 1w4d, local

N7k-LabSW%management#

N7k-LabSW%management# routing-context vrf default

N7k-LabSW# sh ip route

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

連線到LC時為各自VDC運行CLI:N7k特定

VDC代表虛擬裝置環境

LC代表線路卡

N7K代表Nexus 7000

連線到LC後，CLI針對預設VDC運行，或者需要指定相關命令的VDC編號。

相反，您可以像路由環境一樣在VDC #空間中運行CLI。

範例：

N7k-LabSW# attach module 4

Attaching to module 4 ...

To exit type 'exit', to abort type '$.'

module-4# show hardware mac address-table

FE | Valid| PI|  BD  |      MAC      |  Index| Stat| SW  | Modi| Age| Tmr| GM| Sec| TR| NT| RM| RMA| Cap| Fld|Always| PV | RD| NN| UC|PI_E8| VIF | SWID| SSWID|  LID

|      |   |      |               |       |  ic |     | fied|Byte| Sel|   | ure| AP| FY|   |    |TURE|    | Learn|    |   |   |   |     |     |     |      |

---+------+---+------+---------------+-------+-----+-----+-----+----+----+---+----+---+---+---+----+----+----+------|----|---|---|---|-----|-----|-----|------|-------

4    1     1   2     0023.ac66.1dc1  0x010c7   1   0x000   0    0     0    1    0   0   0   0    0    0    0    0   0x00  0   0   0    0   0x000 0x000  0x000 0x010c7

5    1     1   2     0023.ac66.1dc1  0x010c7   1   0x000   0    0     0    1    0   0   0   0    0    0    0    0   0x00  0   0   0    0   0x000 0x000  0x000 0x010c7

Command outputs from Default VDC are pulled here

module-4# vdc 6  >>>>>>> switches LC to pull this VDC specific outputs only

module-4# show hardware mac address-table

FE | Valid| PI|  BD  |      MAC      |  Index| Stat| SW  | Modi| Age| Tmr| GM| Sec| TR| NT| RM| RMA| Cap| Fld|Always| PV | RD| NN| UC|PI_E8| VIF | SWID| SSWID|  LID

|      |   |      |               |       |  ic |     | fied|Byte| Sel|   | ure| AP| FY|   |    |TURE|    | Learn|    |   |   |   |     |     |     |      |

---+------+---+------+---------------+-------+-----+-----+-----+----+----+---+----+---+---+---+----+----+----+------|----|---|---|---|-----|-----|-----|------|-------

0    1     1   92    0023.ac66.1dc6  0x010c7   1   0x000   0    0     0    1    0   0   0   0    0    0    0    0   0x00  0   0   0    0   0x000 0x000  0x000 0x010c7

0    1     0   91    0019.3074.9c02  0x00414   0   0x009   0    118   2    0    0   0   0   0    0    0    0    0   0x00  1   0   1    0   0x000 0x000  0x000 0x00414

在Linux核心和NX-OS之間來回切換，而不退出調試外掛

N5600-Lab# load dplugg

Loading plugin version 7.1(1)N1(1)

###############################################################

Warning: debug-plugin is for engineering internal use only!

For security reason, plugin image has been deleted.

###############################################################

Successfully loaded debug-plugin!!!

Linux(debug)# vsh >>>>> Moves back to NX-OS prompt

Cisco Nexus Operating System (NX-OS) Software

TAC support: http://www.cisco.com/tac

Copyright (c) 2002-2015, Cisco Systems, Inc. All rights reserved.

The copyrights to certain works contained in this software are

owned by other third parties and used and distributed under

license. Certain components of this software are licensed under

the GNU General Public License (GPL) version 2.0 or the GNU

Lesser General Public License (LGPL) Version 2.1. A copy of each

such license is available at

http://www.opensource.org/licenses/gpl-2.0.php and

http://www.opensource.org/licenses/lgpl-2.1.php

N5600-Lab# show clock

20:20:07.468 UTC Mon Apr 04 2016

N5600-Lab# exit >>>>> Moves back to Linux prompt

Linux(debug)#

Linux(debug)# clock

Mon Apr  4 20:20:13 2016   -0.282195 seconds UTC

NOTE: "Debug Plugin" should only be used in presence of Cisco TAC and is not available for customer use.

Please do not modify any setting unless guided by Cisco TAC.

或者，可以直接從調試外掛運行NX-OS CLI:

Linux(debug)# vsh -c "show switchname"

N5600-Lab

Linux(debug)# vsh -c "show module"

Mod Ports Module-Type                         Model                  Status

--- ----- ----------------------------------- ---------------------- -----------

1   52    Nexus 56128P Supervisor             N5K-C56128P-SUP        active *

Mod  Sw              Hw      World-Wide-Name(s) (WWN)

---  --------------  ------  ---------------------------------------------------

1    7.1(1)N1(1)     1.1     --

<snipped>

直接通過VSH載入配置

VSH代表虛擬shell

NEXUS-LABSWICTH# echo "hostname LAB" | vsh

LAB#

Mon Apr  4 20:51:14 2016:type=update:id=10.61.236.97@pts/1:user=admin:cmd=echo "hostname LAB" | vsh (SUCCESS)

Mon Apr  4 20:51:14 2016:type=start:id=vsh.9326:user=admin:cmd=

Mon Apr  4 20:51:14 2016:type=update:id=vsh.9326:user=admin:cmd=configure terminal ; hostname LAB (SUCCESS)

LAB# echo "hostname NEXUS-LABSWITCH" | vsh

NEXUS-LABSWITCH#

Mon Apr  4 20:51:23 2016:type=update:id=10.61.236.97@pts/1:user=admin:cmd=echo "hostname NEXUS-LABSWITCH" | vsh (SUCCESS)

Mon Apr  4 20:51:23 2016:type=start:id=vsh.9390:user=admin:cmd=

Mon Apr  4 20:51:23 2016:type=update:id=vsh.9390:user=admin:cmd=configure terminal ; hostname NEXUS-LABSWITCH (SUCCESS)

N5600-Lab# show run | i hostname | sed "s/N5600-Lab/N56128/" | vsh

N56128#

N56128# show accounting log | last 3

Mon Apr  4 21:23:23 2016:type=start:id=vsh.6762:user=admin:cmd=

Mon Apr  4 21:23:23 2016:type=update:id=vsh.6762:user=admin:cmd=configure terminal ; hostname N56128 (SUCCESS)

Mon Apr  4 21:23:23 2016:type=stop:id=vsh.6762:user=admin:cmd=

N5600-Lab# echo "hostname N56128" > bootflash:CLI

N5600-Lab#

N5600-Lab# show file CLI

hostname N56128

N5600-Lab# show file CLI | vsh

N56128#

使用Diffs — 列出計數器之間的差異

Diff代表差異

N5600-Lab# show int mgmt0 | diff

N5600-Lab# show int mgmt0 | diff

11,12c11,12

<     9393 input packets 829764 bytes

< 141 unicast packets 3715 multicast packets

---

>     9395 input packets 830217 bytes

> 142 unicast packets 3716 multicast packets

15,16c15,16

<     214 output packets 47396 bytes

< 27 unicast packets 181 multicast packets

---

>     215 output packets 47640 bytes

> 27 unicast packets 182 multicast packets

使用Watch CLI - 7.0(3)I2(x)後特定於N9k

N9K代表Nexus 9000

BRU-N9K3-1# watch differences interval 1 show int mgmt0 counter

Every 1.0s:  vsh -c "show int mgmt0 counter"                                                                                                                              Mon Apr  4 23:42:27 2016

CCO reference

在內部檢查CPU使用情況

CPU代表中央處理器

此命令每5秒（可以更改）提供一個輸出，指出哪個進程正在消耗CPU。其輸出與linux top命令相同:

NEXUS# show system internal processes cpu 5 | no-more

top - 12:41:55 up 117 days, 17:00,  5 users,  load average: 0.44, 0.50, 0.55

Tasks: 2883 total,   2 running, 1022 sleeping,   0 stopped, 1859 zombie

Cpu(s):  1.0%us,  0.9%sy,  0.0%ni, 98.0%id,  0.0%wa,  0.0%hi,  0.1%si,  0.0%st

Mem:  32744992k total, 14563132k used, 18181860k free,    61308k buffers

Swap:        0k total,        0k used,        0k free,  4091160k cached

PID USER      PR  NI  VIRT  RES  SHR S %CPU %MEM    TIME+  COMMAND

18465 admin     20   0  5200 3108 1148 R 16.6  0.0   0:00.17 top

6389 root      20   0  699m  53m  14m S  3.3  0.2 113:49.07 netstack

18473 root      20   0 97940 3804 2796 R  3.3  0.0   0:00.02 vsh

10 root      15  -5     0    0    0 S  1.7  0.0   9:10.85 ksoftirqd/2

4876 root      15  -5  369m  27m 6564 S  1.7  0.1  67:33.91 sysmgr

9581 svc-isan  20   0  446m  41m  11m S  1.7  0.1  21:16.15 isis_l2mp

1 root      20   0  1980  652  572 S  0.0  0.0   3:02.73 init

2 root      15  -5     0    0    0 S  0.0  0.0   0:00.03 kthreadd

3 root      RT  -5     0    0    0 S  0.0  0.0   0:00.49 migration/0

4 root      15  -5     0    0    0 S  0.0  0.0  22:48.66 ksoftirqd/0

5 root      -2  -5     0    0    0 S  0.0  0.0   0:00.00 watchdog/0

6 root      RT  -5     0    0    0 S  0.0  0.0   0:00.65 migration/1

7 root      15  -5     0    0    0 S  0.0  0.0   2:27.70 ksoftirqd/1

top - 12:42:01 up 117 days, 17:00,  5 users,  load average: 0.37, 0.48, 0.54

Tasks: 2887 total,   1 running, 1027 sleeping,   0 stopped, 1859 zombie

Cpu(s):  1.0%us,  0.9%sy,  0.0%ni, 98.0%id,  0.0%wa,  0.0%hi,  0.1%si,  0.0%st

Mem:  32744992k total, 14562360k used, 18182632k free,    61308k buffers

Swap:        0k total,        0k used,        0k free,  4091160k cached

PID USER      PR  NI  VIRT  RES  SHR S %CPU %MEM    TIME+  COMMAND

18502 admin     20   0  5200 3112 1148 R 18.5  0.0   0:00.17 top

6389 root      20   0  699m  53m  14m S  1.7  0.2 113:49.08 netstack

6402 root      -2   0  366m  13m 8660 S  1.7  0.0   1032:41 clx

9015 root      20   0  482m  21m  11m S  1.7  0.1 225:45.72 pm

10066 svc-isan  20   0  403m  22m 9.9m S  1.7  0.1 268:31.28 ospf

10487 svc-isan  20   0  354m 9992 6596 S  1.7  0.0 194:52.11 ecp

1 root      20   0  1980  652  572 S  0.0  0.0   3:02.73 init

2 root      15  -5     0    0    0 S  0.0  0.0   0:00.03 kthreadd

3 root      RT  -5     0    0    0 S  0.0  0.0   0:00.49 migration/0

4 root      15  -5     0    0    0 S  0.0  0.0  22:48.66 ksoftirqd/0

5 root      -2  -5     0    0    0 S  0.0  0.0   0:00.00 watchdog/0

6 root      RT  -5     0    0    0 S  0.0  0.0   0:00.65 migration/1

7 root      15  -5     0    0    0 S  0.0  0.0   2:27.70 ksoftirqd/1

發佈內部生成版本

N7k/N9k

N7k-LabSW# show version internal build-identifier

Kickstart image file: bootflash:///n7000-s2-kickstart.6.2.10.bin :  S102

System image file: bootflash:///n7000-s2-dk9.6.2.10.bin :  S102

BRU-N9K3-1# show version internal build-identifier

nxos image file: bootflash:///nxos.7.0.3.I2.2a.bin :  S30

N5k/6k:

N5600-Lab# show platform fwm info global | i FwM

FwM build Details: Built at Sat Apr 18 11:11:18 PDT 2015 on nuo-sw-build40 in directory /auto/n5kiluka/daily_build/iplus/nexus/522/src/build by buildsa)