目錄

簡介

錯誤消息

疑難排解

記憶體洩漏

Ltrace

提供輸出

簡介

本文檔介紹如何對Cisco IOS® XR路由器上的「OS-SHMWIN-2-ERROR_ENCOUNTERED」錯誤進行故障排除。

錯誤消息

錯誤訊息的範例如下：

"%OS-SHMWIN-2-ERROR_ENCOUNTERED"

LC/0/0/CPU0:Dec 16 09:45:58 : fib_mgr[260]: %OS-SHMWIN-2-ERROR_ENCOUNTERED : SHMWIN: Error encountered: System memory state is severe, please check the availability of the system memory

LC/0/0/CPU0:Dec 16 09:45:39 : l2fib[328]: %OS-SHMWIN-2-ERROR_ENCOUNTERED : SHMWIN: Error encountered: System memory state is severe, please check the availability of the system memory

RP/0/RSP0/CPU0:Aug 11 21:15:47.174 IST: show_ip_interface[65961]: %OS-SHMWIN-2-ERROR_ENCOUNTERED : SHMWIN: Error encountered: 'shmwin' detected the 'fatal' condition 'mutex operation failed'

此錯誤表示系統的記憶體狀態很嚴重。具體來說，在多個進程之間儲存動態資料的共用記憶體存在問題。

疑難排解

首先確定線卡（或RP/RSP）和頂級記憶體使用者。

錯誤訊息可能會內嵌一個程式或命令。然而，如果記憶體不足，如果沒有足夠的可用記憶體，任何事情都可能失敗。您需要確定導致可用記憶體不足的原因。

錯誤訊息本身會指示線路卡。 嘗試找出記憶體的頂級使用者。

show memory location 0/x/CPUx

show memory summary location 0/x/CPUx

show watchdog memory-state location 0/x/CPUx

show processes memory location 0/x/CPUx

附註：可能有其他錯誤訊息指出問題處理為何。

舉例來說：

RP/0/RSP0/CPU0:Apr 24 11:34:33.599 EST: wdsysmon[450]: %HA-HA_WD-4-MEMORY_ALARM : Memory threshold crossed: Normal with 892.125MB free

RP/0/RSP0/CPU0:Apr 24 13:23:12.947 EST: wdsysmon[450]: %HA-HA_WD-4-MEMORY_ALARM : Memory threshold crossed: Minor with 819.199MB free

RP/0/RSP0/CPU0:Apr 24 14:32:10.086 EST: wdsysmon[450]: %HA-HA_WD-4-MEMORY_STATE_CHANGE : New memory state: Severe

RP/0/RSP0/CPU0:Apr 24 14:32:10.086 EST: wdsysmon[450]: %HA-HA_WD-4-TOP_MEMORY_USERS_WARNING : Top 5 consumers of system memory (671084 Kbytes free):

RP/0/RSP0/CPU0:Apr 24 14:32:10.086 EST: wdsysmon[450]: %HA-HA_WD-4-TOP_MEMORY_USER_WARNING : 0: Process Name: eth_server[61], pid: 57385, Heap usage 54632 Kbytes, Virtual Shared memory usage: 73116 Kbytes.

RP/0/RSP0/CPU0:Apr 24 14:32:10.086 EST: wdsysmon[450]: %HA-HA_WD-4-TOP_MEMORY_USER_WARNING : 1: Process Name: bgp[1051], pid: 553285, Heap usage 28556 Kbytes, Virtual Shared memory usage: 90512 Kbytes.

RP/0/RSP0/CPU0:Apr 24 14:32:10.087 EST: wdsysmon[450]: %HA-HA_WD-4-TOP_MEMORY_USER_WARNING : 2: Process Name: instdir[252], pid: 184387, Heap usage 24808 Kbytes, Virtual Shared memory usage: 24800 Kbytes.

RP/0/RSP0/CPU0:Apr 24 14:32:10.087 EST: wdsysmon[450]: %HA-HA_WD-4-TOP_MEMORY_USER_WARNING : 3: Process Name: parser_server[352], pid: 204908, Heap usage 21896 Kbytes, Virtual Shared memory usage: 4184784 Kbytes.

RP/0/RSP0/CPU0:Apr 24 14:32:10.087 EST: wdsysmon[450]: %HA-HA_WD-4-TOP_MEMORY_USER_WARNING : 4: Process Name: ipv6_rib[1144], pid: 549174, Heap usage 21600 Kbytes, Virtual Shared memory usage: 24688 Kbytes.

如果進程是BGP或任何其他路由協定，請驗證您沒有在導致此過程的網路中進行任何更改。

使用這些指令可取得已使用記憶體的概觀，並辨識佔用記憶體的常用程式。

0/x/CPUx是錯誤中的特定板卡。

show memory summary location 0/x/CPUx

show memory summary location 0/x/CPUx

show shared-memory location 0/x/CPUx

show memory-top-consumers location 0/x/CPUx

show shmwin summary location 0/x/CPUx

範例：

RP/0/RSP1/CPU0:R1#show memory summary location 0/RSP0/CPU0

node:      node0_RSP0_CPU0

Physical Memory: 6144M total--------------------------------------

Application Memory : 5738M (2795M available)

Image: 117M (bootram: 117M)

Reserved: 224M, IOMem: 0, flashfsys: 0

Total shared window: 76M

RP/0/RSP1/CPU0:R1#show memory summary location 0/RSP0/CPU0

node:      node0_RSP0_CPU0

Physical Memory: 6144M total--------------------------------------

Application Memory : 5738M (2797M available)

Image: 117M (bootram: 117M)

Reserved: 224M, IOMem: 0, flashfsys: 0

Total shared window: 76M

RP/0/RSP1/CPU0:R1#show shared-memory location 0/0/cpu0

Total Shared memory: 1527M

ShmWin: 236M

Image: 703M

LTrace: 353M

AIPC: 33M

SLD: 3M

SubDB: 1M

CERRNO: 144K

GSP-CBP: 64M

EEM: 0

XOS: 4M

CHKPT: 2M

CDM: 4M

XIPC: 594K

DLL: 64K

SysLog: 0

Miscellaneous: 119M

LTrace usage details:

Used: 353M, Max: 2075M

Current: default(dynamic)

Configured: dynamic with scale-factor: 8 (changes take effect after reload)

RP/0/RP0/CPU0:R1#show memory-top-consumers location 0/RP0/CPU0

Execute 'show memory-snapshots process <> location <>' to check memory usage trend.

###################################################################

Top memory consumers on 0/RP0/CPU0 (at 2023/Nov/8/15:41:42)

###################################################################

PID             Process   Total(MB)    Heap(MB)      Shared(MB)

7366      mibd_interface       233.2      192.64            37.7

2552                 spp       228.2        9.71           222.1

49132                 bgp       225.9       83.62           165.9

4844               l2rib       211.8       21.12           190.1

2787                 gsp       137.9       24.64           113.1

3869            mpls_lsd       122.8       12.85           107.8

3804             fib_mgr       121.0       13.43           108.7

2975       parser_server       116.7       66.39            44.6

6685           l2vpn_mgr       116.5       43.77            82.3

3310     dpa_port_mapper       114.8        2.96           110.2

RP/0/RSP1/CPU0:R1#show shmwin summary location 0/0/cpu0

----------------------------------------

Shared memory window summary information

----------------------------------------

Data for Window "subdb_sco_tbl":

-----------------------------

Virtual Memory size  : 1536 MBytes

Virtual Memory Range : 0x7c000000 - 0xdc000000

Virtual Memory Group 2 size  : 352 MBytes

Virtual Memory Group 2 Range : 0x66000000 - 0x7c000000

Window Name      ID  GRP #Usrs #Wrtrs Ownr Usage(KB) Peak(KB) Peak Timestamp

---------------- --- --- ----- ------ ---- --------- -------- -------------------

subdb_sco_tbl    70  1   1     1      158  3         0        --/--/---- --:--:--

Data for Window "ptp":

-----------------------------

ptp              131 P   1     1      0    35        35       10/18/2023 11:56:31

Data for Window "cfmd-sla":

-----------------------------

cfmd-sla         53  1   1     1      0    99        99       10/18/2023 11:56:20

Data for Window "cfmd":

-----------------------------

cfmd             36  1   1     1      0    99        99       10/18/2023 11:56:30

Data for Window "vkg_pbr_ea":

-----------------------------

vkg_pbr_ea       83  1   1     1      0    147       147      10/18/2023 11:56:27

Data for Window "span_ea_pd":

-----------------------------

span_ea_pd       40  1   1     1      362  34        34       10/18/2023 11:56:13

Data for Window "vkg_l2fib_vqi":

-----------------------------

vkg_l2fib_vqi    97  1   2     2      0    3         0        --/--/---- --:--:--

Data for Window "statsd_db":

-----------------------------

statsd_db        60  1   1     1      0    3         0        --/--/---- --:--:--

Data for Window "statsd_db_l":

-----------------------------

statsd_db_l      130 P   1     1      0    1131      1131     10/18/2023 11:56:17

Data for Window "arp":

-----------------------------

arp              20  1   1     1      0    227       227      10/18/2023 11:56:37

Data for Window "bm_lacp_tx":

-----------------------------

bm_lacp_tx       54  1   1     1      132  1         0        --/--/---- --:--:--

Data for Window "ether_ea_shm":

-----------------------------

ether_ea_shm     26  1   4     4      406  227       227      10/18/2023 11:56:27

Data for Window "vkg_l2fib_evpn":

-----------------------------

vkg_l2fib_evpn   100 1   3     3      0    3         0        --/--/---- --:--:--

Data for Window "l2fib":

-----------------------------

l2fib            14  1   10    10     262  45265     45265    11/08/2023 15:03:18

Data for Window "ether_ea_tcam":

-----------------------------

ether_ea_tcam    58  1   5     5      313  595       595      10/18/2023 11:55:55

Data for Window "vkg_vpls_mac":

-----------------------------

vkg_vpls_mac     35  1   3     3      0    6291      6291     10/25/2023 13:15:04

Data for Window "prm_stats_svr":

-----------------------------

prm_stats_svr    24  1   21    21     0    12419     12419    10/18/2023 11:56:24

Data for Window "prm_srh_main":

-----------------------------

prm_srh_main     66  1   31    31     0    60163     60163    10/18/2023 11:56:31

Data for Window "prm_tcam_mm_svr":

-----------------------------

prm_tcam_mm_svr  23  1   1     1      0    22067     22163    10/18/2023 12:04:59

Data for Window "prm_ss_lm_svr":

-----------------------------

prm_ss_lm_svr    65  1   1     1      0    3233      3233     10/18/2023 11:56:33

Data for Window "prm_ss_mm_svr":

-----------------------------

prm_ss_mm_svr    22  1   5     5      0    3867      3867     10/18/2023 11:55:52

Data for Window "vkg_gre_tcam":

-----------------------------

vkg_gre_tcam     63  1   2     2      388  35        35       10/18/2023 11:55:54

Data for Window "tunl_gre":

-----------------------------

tunl_gre         62  1   2     2      388  39        39       10/18/2023 11:55:38

Data for Window "pd_fib_cdll":

-----------------------------

pd_fib_cdll      28  1   1     1      0    35        35       10/18/2023 11:55:36

Data for Window "SMW_TEST_2":

-----------------------------

SMW_TEST_2       86  1   1     1      0    1067      1067     10/18/2023 11:55:35

Data for Window "ifc-mpls":

-----------------------------

ifc-mpls         13  1   18    18     188  7161      9057     11/02/2023 18:32:41

Data for Window "ifc-ipv6":

-----------------------------

ifc-ipv6         17  1   18    18     188  25249     25665    11/02/2023 18:33:13

Data for Window "ifc-ipv4":

-----------------------------

ifc-ipv4         16  1   18    18     188  24205     24893    10/31/2023 18:12:27

Data for Window "ifc-protomax":

-----------------------------

ifc-protomax     18  1   18    18     188  6057      6297     10/18/2023 11:56:06

Data for Window "bfd_offload_shm":

-----------------------------

bfd_offload_shm  94  1   1     1      0    2         0        --/--/---- --:--:--

Data for Window "netio_fwd":

-----------------------------

netio_fwd        34  1   1     1      0    0         0        --/--/---- --:--:--

Data for Window "mfwd_info":

-----------------------------

mfwd_info        1   1   2     2      254  1373      1373     10/18/2023 11:56:24

Data for Window "mfwdv6":

-----------------------------

mfwdv6           15  1   1     1      258  737       737      10/18/2023 11:55:57

Data for Window "vkg_bmp_adj":

-----------------------------

vkg_bmp_adj      30  1   2     2      129  235       235      10/18/2023 11:55:55

Data for Window "rewrite-db":

-----------------------------

rewrite-db       101 1   3     3      0    4115      4115     10/18/2023 11:55:32

Data for Window "inline_svc":

-----------------------------

inline_svc       88  1   1     1      0    755       755      10/18/2023 11:55:33

Data for Window "im_rd":

-----------------------------

im_rd            33  1   75    75     217  1131      1131     10/18/2023 11:55:32

Data for Window "ipv6_pmtu":

-----------------------------

ipv6_pmtu        98  1   1     1      256  3         0        --/--/---- --:--:--

Data for Window "im_db_private":

-----------------------------

im_db_private    129 P   1     1      0    1131      1131     10/18/2023 11:55:34

Data for Window "infra_ital":

-----------------------------

infra_ital       19  1   3     3      340  387       387      10/18/2023 11:55:41

Data for Window "infra_statsd":

-----------------------------

infra_statsd     8   1   5     5      370  3         0        --/--/---- --:--:--

Data for Window "ipv6_nd_pkt":

-----------------------------

ipv6_nd_pkt      128 P   1     1      0    107       107      10/18/2023 11:55:30

Data for Window "aib":

-----------------------------

aib              2   1   10    10     114  2675      2675     10/18/2023 11:56:42

Data for Window "vkg_pm":

-----------------------------

vkg_pm           5   1   34    1      313  307       307      11/03/2023 11:25:06

Data for Window "subdb_fai_tbl":

-----------------------------

subdb_fai_tbl    75  2   11    1      0    51        51       10/18/2023 11:55:26

Data for Window "subdb_ifh_tbl":

-----------------------------

subdb_ifh_tbl    74  2   2     1      0    35        35       10/18/2023 11:55:26

Data for Window "subdb_ao_tbl":

-----------------------------

subdb_ao_tbl     72  2   1     1      0    43        43       10/18/2023 11:55:26

Data for Window "subdb_do_tbl":

-----------------------------

subdb_do_tbl     73  2   11    1      0    35        35       10/18/2023 11:55:26

Data for Window "subdb_co_tbl":

-----------------------------

subdb_co_tbl    71  2   11    1      0    4107      4107     10/18/2023 11:55:26

Data for Window "rspp_ma":

-----------------------------

rspp_ma          3   1   14    14     0    3         0        --/--/---- --:--:--

Data for Window "cluster_dlm":

-----------------------------

cluster_dlm      61  1   26    26     0    3         0        --/--/---- --:--:--

Data for Window "pfm_node":

-----------------------------

pfm_node         29  1   1     1      0    195       195      10/18/2023 11:56:11

Data for Window "im_rules":

-----------------------------

im_rules         31  1   85    85     217  453       453      10/18/2023 11:55:32

Data for Window "im_db":

-----------------------------

im_db            32  1   85    1      0    2065      2065     10/18/2023 11:56:26

Data for Window "spp":

-----------------------------

spp              27  1   51    51     88   1403      1403     10/18/2023 11:56:29

Data for Window "qad":

-----------------------------

qad              6   1   1     1      0    134       134      01/01/1970 02:00:08

Data for Window "pcie-server":

-----------------------------

pcie-server      39  1   1     1      0    39        39       01/01/1970 02:00:07

---------------------------------------------

Total SHMWIN memory usage : 235 MBytes

記憶體洩漏

確定任何進程都沒有記憶體洩漏：

您可以進行「記憶體比較」。此程式會顯示每個程式一段期間內，記憶體的增加或減少（您所指定的）。這是一個示例；請注意「difference」列。

RP/0/RSP0/CPU0:R1#show memory compare start

Successfully stored memory snapshot /harddisk:/malloc_dump/memcmp_start.out

RP/0/RSP0/CPU0:R1#show memory compare end

Successfully stored memory snapshot /harddisk:/malloc_dump/memcmp_end.out

RP/0/RSP0/CPU0:R1#show memory compare report

JID   name                 mem before   mem after    difference mallocs restart/exit/new

---   ----                 ----------   ---------    ---------- ------- ----------------

376   parser_server        32069512     32070976     1464       1

463   sysdb_svr_local      10064204     10065084     880        20

459   sysdb_shared_nc      4103104      4103560      456        12

66013 exec                 209964       210052       88         3

1241  xtc_agent            4796436      4796432      -4         0

1087  bgp                  51646552     51646120     -432       -3

457   sysdb_mc             5094852      5094188      -664       -8

358   netio                19185724     19183804     -1920      -45

334   lpts_pa              76234948     76228484     -6464      -97

1031  ospf                 9107084      9098232      -8852      -1

476   tcp                  5725148      5708444      -16704     -8

254   gsp                  9473460      9424452      -49008     14

1153  mdtd                 25206084     24750076     -456008    -25

You are now free to remove snapshot memcmp_start.out and memcmp_end.out under /harddisk:/malloc_dump

Ltrace

如果ltrace是佔用大量記憶體的進程，並且是記憶體消耗量最大的進程之一，請考慮降低其使用的記憶體量。

這是配置ltrace以減少記憶體佔用的方法：在ASR9K路由處理器和板卡上配置ltrace縮放係數以實現高效的記憶體管理

提供輸出

如果您在本文檔中沒有找到問題的解決方案，請提供以下輸出：

0/x/CPUx是錯誤中的特定板卡。進程的作業ID (JID)可以使用命令show processes找到。

show tech-support

show hw-module fpd

show memory location 0/x/CPUx

show memory summary location all

show watchdog memory-state location all

show watchdog trace location all

show processes memory location all

show shmwin all header location 0/x/CPUx

show shmwin all bands location 0/x/CPUx

show shmwin all banks location 0/x/CPUx

show shmwin all list all location 0/x/CPUx

show shmwin all malloc-stats location 0/x/CPUx

show shmwin all mutexlocation 0/x/CPUx

show shmwin all participants all-stats location 0/x/CPUx

show shmwin all pool all-pools location

show shmwin trace all location all

show memory <job id process> location 0/x/CPUx