目錄

簡介

Nexus 7000平台上的CPU使用率

用於監控進程和CPU的命令和指令碼

指令

show processes命令

show system resources命令

show processes cpu命令

show processes cpu history命令

show process cpu detail 指令

簡介

本文檔介紹用於監視Cisco Nexus 7000系列平台上的CPU使用情況和排除CPU使用率高問題的過程。

Nexus 7000平台上的CPU使用率

Nexus 7000平台是一個基於Linux的系統，它有一個搶佔式排程程式，允許對所有進程的CPU資源進行公平訪問。

與Cisco Catalyst 6500系列不同，它沒有單獨的路由處理器(RP)和交換機處理器(SP)。

- 管理引擎1具有雙核處理器。

- 管理引擎2採用四核處理器。

- 管理引擎2E有兩個四核處理器。

Cisco NX-OS作業系統利用搶先式CPU多工處理，因此進程可以利用空閒CPU更快地完成任務。

因此，history選項報告不一定表示問題的可能的CPU峰值。但是，如果平均CPU使用率與特定網路的基準CPU使用率正常值相比保持較高水準，請調查高CPU使用率。

已啟用預設硬體速率限制器(HWRL)和預設控制平面策略(CoPP)，以幫助保護Nexus 7000平台上的管理引擎帶內介面。

命令和示例EEM指令碼基於Nexus 7000 6.1版及更低版本，可能會在未來版本中更改。

用於監控進程和CPU的命令和指令碼

指令

Cisco CLI Analyzer（僅供已註冊客戶使用）支援某些 show 指令。使用 Cisco CLI Analyzer 檢視 show 指令輸出的分析。

show processes命令

使用此命令可顯示有關活動進程的資訊。

switch# show processes

PID    State  PC        Start_cnt    TTY   Type  Process

-----  -----  --------  -----------  ----  ----  -------------

1      S  41520eb8            1     -     O  init

2      S         0            1     -     O  kthreadd

3      S         0            1     -     O  migration/0

4      S         0            1     -     O  ksoftirqd/0

5      S         0            1     -     O  watchdog/0

6      S         0            1     -     O  migration/1

7      S         0            1     -     O  ksoftirqd/1

8      S         0            1     -     O  watchdog/1

9      S         0            1     -     O  events/0

10      S         0            1     -     O  events/1

11      S         0            1     -     O  khelper

12      S         0            1     -     O  kblockd/0

欄位

說明

PID

進程ID

狀態

進程狀態

PC

十六進位制格式的當前程式計數器

啟動_cnt

進程已啟動或重新啟動的次數

TTY

控制進程的終端。連字元(—)通常表示守護程式不在任何特定終端上運行。

流程

進程的名稱

進程狀態

說明

D

不間斷睡眠（通常為I/O）

R

可運行（在運行隊列上）

S

睡覺

T

已跟蹤或已停止

Z

已停用（殭屍）進程

NR

未運行

ER

預期正在運行，但當前未運行

show system resources命令

使用此命令可顯示系統相關的CPU和記憶體統計資訊。

switch#show system resources

Load average: 1 minute: 0.36 5 minutes: 0.39 15 minutes: 0.44

Processes : 1068 total, 1 running

CPU states : 0.5% user, 5.5% kernel, 94.0% idle

Memory usage: 8245436K total, 3289920K used, 4955516K free

Current memory status: OK

欄位

說明

載入

正在運行的進程數。平均值反映了過去1、5和15分鐘的系統負載。

流程

系統中的進程數以及發出命令時實際運行的進程數。

CPU狀態

使用者模式、核心模式和上一秒空閒時間中的CPU使用率。對於雙核Supervisor，CPU平均分佈在兩個核心上。

記憶體使用情況

總記憶體、已用記憶體、可用記憶體、用於緩衝區的記憶體和用於快取記憶體的記憶體（以千位元組為單位）。緩衝區和快取記憶體包含在已用記憶體統計資訊中。

show processes cpu命令

使用以下命令以顯示處理層級的CPU使用率：

switch#show processes cpu | ex 0.0

PID Runtime(ms) Invoked uSecs 1Sec Process

----- ----------- -------- ----- ------ -----------

26 66399 269718 246 0.9% kide/1

2908 115550 11310 10216 2.9% platform

3223 7248 9208 787 0.9% R2D2_usd

CPU util : 1.0% user, 3.0% kernel, 96.0% idle

Please note that only processes from the requested vdc are shown above

欄位

說明

運行時（毫秒）

進程已使用的CPU時間（毫秒）

已呼叫

已呼叫進程的次數

秒

每個進程呼叫的平均CPU時間（微秒）

1秒

最近一秒的CPU使用率

要查詢屬於特定進程ID(PID)的所有執行緒的CPU使用情況，請使用show process cpu detail <pid>命令，該命令在NX-OS版本6.2x中提供。

show processes cpu history命令

使用此命令可以顯示過去60秒、60分鐘和72小時的CPU使用率。請務必檢查平均CPU使用率(#)和峰值(*)。

switch# show processes cpu history

1  131         12     1 1  1      1 2       1         1  1

195388933456577607393535376775867507294877653564353456145546

100

90

80

70

60

50

40     #

30     #

20     ##         ##          #        #                    #

10 #######   ######## # ################# ########  #  ### ## #

0....5....1....1....2....2....3....3....4....4....5....5....

0    5    0    5    0    5    0    5    0    5

CPU% per second (last 60 seconds)

# = average CPU%

222222224221222212222222222642222112221222222222222121221412

523210211239434396322261541608790993139620151432210949597392

100

90

80

70                            *

60                            *

50                            *

40         *                  **                            *

30 *       *        *    * *  *****       *   *          ** *

20 ************************************************************

10 ############################################################

0....5....1....1....2....2....3....3....4....4....5....5....

0    5    0    5    0    5    0    5    0    5

CPU% per minute (last 60 minutes)

* = maximum CPU%   # = average CPU%

1

666765454544445544555669844465554466654464446069464554545555665544444474

459056619185613722269482096333506853055519639003005209696949867484693724

100                                              *

90                        *                     * *

80                        **                    * *

70  ****                 ***         *         ** *            **        *

60 ******         *   ******   * *   ****  *   **** *    * ** ****       *

50 ************* **  ********* *************** **** **************** ** **

40 ************************************************************************

30 ************************************************************************

20 ************************************************************************

10 ########################################################################

0....5....1....1....2....2....3....3....4....4....5....5....6....6....7.

0    5    0    5    0    5    0    5    0    5    0    5    0

CPU% per hour (last 72 hours)

* = maximum CPU%   # = average CPU%

show process cpu detail <pid> 指令

此命令（在6.2版中新增）顯示屬於特定PID的所有執行緒的CPU使用資訊。

switch# show processes cpu sorted | grep cli

3965        23734     17872   1328    0.0%    0.1%   0.7%   -    clis

4024         3047      1256   2426    0.0%    0.0%   0.0%   -    diagclient

4094          787       258   3052    0.0%    0.0%   0.0%   -    cardclient

4728          227       209   1088    0.0%    0.0%   0.0%   -    port_client

4729         1351       499   2708    0.0%    0.0%   0.0%   -    statsclient

4730         2765       550   5028    0.0%    0.0%   0.0%   -    xbar_client

switch# show processes cpu sorted | grep clis

3965        23734     17872   1328    0.0%    0.1%   0.7%   -    clis

switch# show process cpu detailed 3965

CPU utilization for five seconds: 3%/3%; one minute: 0%; five minutes: 1%

PID    Runtime(ms)  Invoked   uSecs  5Sec    1Min    5Min    TTY  Process

-----  -----------  --------  -----  ------  ------  ------  ---  -----------

3965        23734     17873   1327    0.0%    0.1%   0.6%   -    clis

4227           45       334    135    0.0%    0.0%   0.0%   -    clis:clis-cli-t

4228           24       153    162    0.0%    0.0%   0.0%   -    clis:clis-nvdb-

4760           75       224    335    0.0%    0.0%   0.0%   -    clis:clis-seria

switch# show processes cpu sorted | grep netstack

4133          353       892    395    0.0%    0.0%   0.0%   -    netstack

switch# show process cpu detailed 4133

CPU utilization for five seconds: 5%/5%; one minute: 1%; five minutes: 1%

PID    Runtime(ms)  Invoked   uSecs  5Sec    1Min    5Min    TTY  Process

-----  -----------  --------  -----  ------  ------  ------  ---  -----------

4133          353       892    395    0.0%    0.0%   0.0%   -    netstack

4145          322      6492     49    0.0%    0.0%   0.0%   -    netstack:active

4151          239       247    971    0.0%    0.0%   0.0%   -    netstack:ip-sys

4153            0         3    162    0.0%    0.0%   0.0%   -    netstack:mplsda

4155            2         3    717    0.0%    0.0%   0.0%   -    netstack:mplsct

4163            0         2    240    0.0%    0.0%   0.0%   -    netstack:ipv6-d

4164           97       957    101    0.0%    0.0%   0.0%   -    netstack:netsta

4166           15       628     25    0.0%    0.0%   0.0%   -    netstack:ip-sys

4167            0         3    224    0.0%    0.0%   0.0%   -    netstack:ip-pm-

4170            1        12    154    0.0%    0.0%   0.0%   -    netstack:ip-uri

4171            9        30    323    0.0%    0.0%   0.0%   -    netstack:ip-ipc

4173            0         5    167    0.0%    0.0%   0.0%   -    netstack:ip-ipc

4175            0         2    305    0.0%    0.0%   0.0%   -    netstack:ip-ret

4176           12         7   1838    0.0%    0.0%   0.0%   -    netstack:ip-ppf

4178            4        15    289    0.0%    0.0%   0.0%   -    netstack:ipv6-c

4179           41       445     93    0.0%    0.0%   0.0%   -    netstack:disp

4180            0         6     98    0.0%    0.0%   0.0%   -    netstack:worker

4181           33       501     66    0.0%    0.0%   0.0%   -    netstack:worker

4182            0         2    232    0.0%    0.0%   0.0%   -    netstack:worker

4183            0         2    227    0.0%    0.0%   0.0%   -    netstack:worker

4184            0         3    152    0.0%    0.0%   0.0%   -    netstack:worker

4185            0         2    278    0.0%    0.0%   0.0%   -    netstack:worker

4186            0         2    254    0.0%    0.0%   0.0%   -    netstack:worker

4187            0         3    168    0.0%    0.0%   0.0%   -    netstack:worker

4188            0         2    266    0.0%    0.0%   0.0%   -    netstack:worker

4189            0         2    248    0.0%    0.0%   0.0%   -    netstack:worker

4190            0         2    254    0.0%    0.0%   0.0%   -    netstack:worker

4191            0         3    201    0.0%    0.0%   0.0%   -    netstack:worker

4192            0         2    258    0.0%    0.0%   0.0%   -    netstack:worker

4193            0         7    111    0.0%    0.0%   0.0%   -    netstack:worker

4194            0         8     78    0.0%    0.0%   0.0%   -    netstack:worker

4195            0         2    313    0.0%    0.0%   0.0%   -    netstack:worker

4196           15       632     23    0.0%    0.0%   0.0%   -    netstack:ptacti

4197            0         5    120    0.0%    0.0%   0.0%   -    netstack:tcp_ip

4198            4        11    390    0.0%    0.0%   0.0%   -    netstack:ipv6-m

4199            0         3    240    0.0%    0.0%   0.0%   -    netstack:ipv6-c

4200            0         1    561    0.0%    0.0%   0.0%   -    netstack:ipv6-c

4201            0         3    246    0.0%    0.0%   0.0%   -    netstack:icmpv6

4513            0         5    112    0.0%    0.0%   0.0%   -    netstack:ipv6-m

4514            0         2    291    0.0%    0.0%   0.0%   -    netstack:ipv6-m

註：所有流程資訊均基於NX-OS中的「proc」。在NX-OS中，所有執行緒共用由任何其他執行緒分配的記憶體，因此不可能顯示每個執行緒的資訊。

show system internal processes cpu命令

此命令等效於Linux中的top命令，可即時檢視處理器活動。

switch# show system internal processes cpu

top - 23:51:41 up 51 min, 3 users, load average: 0.56, 0.49, 0.46

Tasks: 433 total, 1 running, 431 sleeping, 0 stopped, 1 zombie

Cpu(s): 5.9%us, 7.8%sy, 0.0%ni, 81.9%id, 3.6%wa, 0.1%hi, 0.6%si, 0.0%st

Mem: 8245436k total, 3531776k used, 4713660k free, 5360k buffers

Swap: 0k total, 0k used, 0k free, 1458188k cached

PID USER PR NI VIRT RES SHR S %CPU %MEM TIME+ COMMAND

3589 svc-isan 25 5 112m 8864 4572 S 5.7 0.1 0:21.60 stats_client

10881 sjlan 20 0 3732 1648 1140 R 3.8 0.0 0:00.04 top

26 root 20 0 0 0 0 S 1.9 0.0 1:07.07 kide/1

3280 root -2 0 101m 6104 3680 S 1.9 0.1 0:32.57 octopus

3570 root 20 0 123m 19m 6456 S 1.9 0.2 0:06.07 diag_port_lb

5151 root 20 0 205m 45m 9.8m S 1.9 0.6 0:02.61 netstack

1 root 20 0 1988 604 524 S 0.0 0.0 0:03.75 init

2 root 15 -5 0 0 0 S 0.0 0.0 0:00.00 kthreadd

3 root RT -5 0 0 0 S 0.0 0.0 0:00.00 migration/0

4 root 15 -5 0 0 0 S 0.0 0.0 0:00.61 ksoftirqd/0

5 root -2 -5 0 0 0 S 0.0 0.0 0:00.06 watchdog/0

6 root RT -5 0 0 0 S 0.0 0.0 0:00.00 migration/1

7 root 15 -5 0 0 0 S 0.0 0.0 0:04.80 ksoftirqd/1

欄位

說明

PID

進程ID

使用者

擁有進程的使用者的名稱

公關

分配給進程的優先順序

NI

此流程有很好的價值

VIRT

進程使用的虛擬記憶體量

RES

進程正在使用的物理RAM大小（駐留大小）（千位元組）

SHR

進程使用的共用記憶體量

S

進程的狀態。可能的值包括：

- D — 不間斷睡眠

- R — 正在運行

- S — 睡眠

- T — 已跟蹤或已停止

- Z — 殭屍

%CPU

進程使用的CPU時間百分比

%MEM

進程使用的可用物理RAM的百分比

時間+

進程自啟動以來已消耗的CPU時間總量

指令

為啟動進程而輸入的命令的名稱

「{#seconds} | no-more」選項允許每天自動執行命令#seconds直到輸入Ctrl-C。以下是輸出範例：

switch# show system internal processes cpu  5 | no-more

top - 17:31:12 up 4 days, 18:31,  3 users,  load average: 0.52, 0.40, 0.32

Tasks: 449 total,   3 running, 446 sleeping,   0 stopped,   0 zombie

Cpu(s):  3.5%us,  4.5%sy,  0.0%ni, 91.2%id,  0.1%wa,  0.1%hi,  0.5%si,  0.0%st

Mem:   8245436k total,  4192740k used,  4052696k free,    27644k buffers

Swap:        0k total,        0k used,        0k free,  1919612k cached

PID USER      PR  NI  VIRT  RES  SHR S %CPU %MEM    TIME+  COMMAND

2908 root      20   0  112m 8516 5516 S  7.5  0.1 264:44.25 pfm

31487 sjlan     20   0  3732 1652 1140 R  5.6  0.0   0:00.05 top

3059 svc-isan  20   0 80288 7536 4440 S  3.8  0.1  65:44.59 diagmgr

3192 root      20   0  334m  47m  11m S  1.9  0.6  25:36.52 netstack

3578 svc-isan  20   0  118m  13m 6952 S  1.9  0.2  24:57.36 stp

5119 svc-isan  20   0  139m  14m 7028 S  1.9  0.2   3:48.60 urib

5151 root      20   0  209m  46m  11m S  1.9  0.6  38:53.39 netstack

5402 svc-isan  20   0  117m  15m 9140 S  1.9  0.2  36:07.13 stp

6175 svc-isan  20   0  118m  16m 9580 S  1.9  0.2  47:09.41 stp

1 root      20   0  1988  604  524 S  0.0  0.0   0:06.51 init

2 root      15  -5     0    0    0 S  0.0  0.0   0:00.00 kthreadd

3 root      RT  -5     0    0    0 S  0.0  0.0   0:00.08 migration/0

4 root      15  -5     0    0    0 S  0.0  0.0   1:07.77 ksoftirqd/0

top - 17:31:18 up 4 days, 18:31,  3 users,  load average: 0.48, 0.39, 0.32

Tasks: 449 total,   1 running, 448 sleeping,   0 stopped,   0 zombie

Cpu(s):  3.5%us,  4.5%sy,  0.0%ni, 91.2%id,  0.1%wa,  0.1%hi,  0.5%si,  0.0%st

Mem:   8245436k total,  4192592k used,  4052844k free,    27644k buffers

Swap:        0k total,        0k used,        0k free,  1919612k cached

PID USER      PR  NI  VIRT  RES  SHR S %CPU %MEM    TIME+  COMMAND

2908 root      20   0  112m 8516 5516 S  7.5  0.1 264:44.47 pfm

31490 sjlan     20   0  3732 1656 1140 R  3.8  0.0   0:00.04 top

1 root      20   0  1988  604  524 S  0.0  0.0   0:06.51 init

2 root      15  -5     0    0    0 S  0.0  0.0   0:00.00 kthreadd

3 root      RT  -5     0    0    0 S  0.0  0.0   0:00.08 migration/0

4 root      15  -5     0    0    0 S  0.0  0.0   1:07.77 ksoftirqd/0

5 root      -2  -5     0    0    0 S  0.0  0.0   0:13.74 watchdog/0

6 root      RT  -5     0    0    0 S  0.0  0.0   0:00.10 migration/1

7 root      15  -5     0    0    0 S  0.0  0.0   0:54.47 ksoftirqd/1

8 root      -2  -5     0    0    0 S  0.0  0.0   0:00.20 watchdog/1

9 root      15  -5     0    0    0 S  0.0  0.0   0:02.94 events/0

10 root      15  -5     0    0    0 S  0.0  0.0   0:02.58 events/1

11 root      15  -5     0    0    0 S  0.0  0.0   0:00.00 khelper

top - 17:31:23 up 4 days, 18:31,  3 users,  load average: 0.44, 0.39, 0.32

Tasks: 449 total,   1 running, 448 sleeping,   0 stopped,   0 zombie

Cpu(s):  3.5%us,  4.5%sy,  0.0%ni, 91.2%id,  0.1%wa,  0.1%hi,  0.5%si,  0.0%st

Mem:   8245436k total,  4192584k used,  4052852k free,    27644k buffers

Swap:        0k total,        0k used,        0k free,  1919612k cached

PID USER      PR  NI  VIRT  RES  SHR S %CPU %MEM    TIME+  COMMAND

31493 sjlan     20   0  3732 1656 1140 R  3.8  0.0   0:00.04 top

5004 svc-isan  20   0  118m  13m 6852 S  1.9  0.2  41:35.81 stp

10337 svc-isan  20   0  133m  11m 7948 S  1.9  0.1   1:42.81 mcecm

1 root      20   0  1988  604  524 S  0.0  0.0   0:06.51 init

2 root      15  -5     0    0    0 S  0.0  0.0   0:00.00 kthreadd

3 root      RT  -5     0    0    0 S  0.0  0.0   0:00.08 migration/0

4 root      15  -5     0    0    0 S  0.0  0.0   1:07.77 ksoftirqd/0

5 root      -2  -5     0    0    0 S  0.0  0.0   0:13.74 watchdog/0

6 root      RT  -5     0    0    0 S  0.0  0.0   0:00.10 migration/1

7 root      15  -5     0    0    0 S  0.0  0.0   0:54.47 ksoftirqd/1

8 root      -2  -5     0    0    0 S  0.0  0.0   0:00.20 watchdog/1

9 root      15  -5     0    0    0 S  0.0  0.0   0:02.94 events/0

10 root      15  -5     0    0    0 S  0.0  0.0   0:02.58 events/1

top - 17:31:29 up 4 days, 18:31,  3 users,  load average: 0.41, 0.38, 0.32

Tasks: 449 total,   1 running, 448 sleeping,   0 stopped,   0 zombie

Cpu(s):  3.5%us,  4.5%sy,  0.0%ni, 91.2%id,  0.1%wa,  0.1%hi,  0.5%si,  0.0%st

Mem:   8245436k total,  4192708k used,  4052728k free,    27644k buffers

Swap:        0k total,        0k used,        0k free,  1919616k cached

show system internal sysmgr service pid <pid>命令

使用此命令可以按PID顯示進程/服務的其他詳細資訊，如重新啟動時間、崩潰狀態和當前狀態。

switch# show system internal processes cpu

top - 17:37:26 up 4 days, 18:37,  3 users,  load average: 0.16, 0.35, 0.33

Tasks: 450 total,   2 running, 448 sleeping,   0 stopped,   0 zombie

Cpu(s):  3.5%us,  4.5%sy,  0.0%ni, 91.2%id,  0.1%wa,  0.1%hi,  0.5%si,  0.0%st

Mem:   8245436k total,  4193248k used,  4052188k free,    27668k buffers

Swap:        0k total,        0k used,        0k free,  1919664k cached

PID USER      PR  NI  VIRT  RES  SHR S %CPU %MEM    TIME+  COMMAND

2908 root      20   0  112m 8516 5516 S  7.5  0.1 264:58.67 pfm

31710 sjlan     20   0  3732 1656 1140 R  3.8  0.0   0:00.04 top

3192 root      20   0  334m  47m  11m S  1.9  0.6  25:38.39 netstack

3578 svc-isan  20   0  118m  13m 6952 S  1.9  0.2  24:59.08 stp

5151 root      20   0  209m  46m  11m S  1.9  0.6  38:55.52 netstack

5402 svc-isan  20   0  117m  15m 9140 S  1.9  0.2  36:09.08 stp

5751 root      20   0  209m  46m  10m S  1.9  0.6  41:20.58 netstack

6098 svc-isan  20   0  151m  15m 6188 S  1.9  0.2   3:58.40 mrib

6175 svc-isan  20   0  118m  16m 9580 S  1.9  0.2  47:12.00 stp

1 root      20   0  1988  604  524 S  0.0  0.0   0:06.52 init

2 root      15  -5     0    0    0 S  0.0  0.0   0:00.00 kthreadd

3 root      RT  -5     0    0    0 S  0.0  0.0   0:00.08 migration/0

4 root      15  -5     0    0    0 S  0.0  0.0   1:07.83 ksoftirqd/0

switch# show system internal sysmgr service pid 2908

Service "Platform Manager" ("platform", 5):

UUID = 0x18, PID = 2908, SAP = 39

State: SRV_STATE_HANDSHAKED (entered at time Mon Oct 15 23:03:45 2012).

Restart count: 1

Time of last restart: Mon Oct 15 23:03:44 2012.

The service never crashed since the last reboot.

Tag = N/A

Plugin ID: 0

EEM指令碼示例

以下是捕獲間歇性高CPU使用率的示例指令碼。使用的值以及發出的命令可根據要求進行修改：

event manager applet HIGH-CPU

event snmp oid 1.3.6.1.4.1.9.9.109.1.1.1.1.6.1 get-type exact entry-op ge

entry-val 80 exit-val 30 poll-interval 5

action 1.0 syslog msg High CPU hit $_event_pub_time

action 2.0 cli enable

action 3.0 cli show clock >> bootflash:high-cpu.txt

action 4.0 cli show processes cpu sort >> bootflash:high-cpu.txt

註：必須定義「exit-val」。 當指令碼收集資料時，會增加CPU利用率。exit-val的值可確保指令碼不會在無限循環中運行。

高CPU使用率由 進程或流量

監控CPU使用率時，沒有進程與中斷CPU使用率(如Cisco IOS®軟體平台上的情況)。要快速確定CPU使用率高的原因，請使用show system internal processes cpu命令。流量觸發的高CPU使用率很可能導致Netstack以及其他功能和進程(如地址解析協定(ARP)和網際網路組管理協定(IGMP))運行較高。

進程導致CPU使用率高

根據導致CPU使用率較高的進程和問題，可能需要捕獲特定命令。以下各節介紹有用的方法。

show system internal <feature> mem-stats/memstats | 大命令中

使用此命令可顯示進程的記憶體分配；使用「in Grand」選項可監視總記憶體。記憶體洩漏可能導致進程行為不當，從而導致CPU使用率高。

Ethanalyzer

使用Ethanalyzer監控到CPU的流量。

debug指令

附註：使用 debug 指令之前，請先參閱有關 Debug 指令的重要資訊。在生產交換機上明智地使用debug命令以避免服務中斷。

儘可能使用debug logfile命令將輸出指向指定的檔案，並避免鎖定會話以填充系統日誌。以下是偵錯簡易網路管理通訊協定(SNMP)的範例：

switch# debug logfile snmpdebug

switch# debug snmp  all

switch# show debug logfile snmpdebug

2012 Oct 17 23:53:25.905914 snmpd: SDWRAP message Successfully processed

2012 Oct 17 23:53:25.906162 snmpd: Src: 0x00000501/23852  Dst: 0x00000501/28  ID

: 0x006E3C9B  Size: 276 [REQ] Opc: 182 (MTS_OPC_DEBUG_WRAP_MSG) RR: 0x006E3C9B

HA_SEQNO: 0x00000000  TS: 0x10ADFFA1666FC  REJ:0  SYNC:0  OPTIONS:0x0

2012 Oct 17 23:53:25.906208 snmpd: 01 00 00 00 E7 03 00 00 00 00 00 00 00 00 00 00

2012 Oct 17 23:53:25.906225 snmpd: 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00

2012 Oct 17 23:53:25.906239 snmpd: 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00

2012 Oct 17 23:53:25.906255 snmpd: FF FF FF FF 2F 64 65 76 2F 70 74 73 2F 30 00 00

2012 Oct 17 23:53:25.906271 snmpd: 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00

switch# show log last 10

2012 Oct 17 17:51:06 SITE1-AGG1 %ETHPORT-5-IF_TX_FLOW_CONTROL: Interface

Ethernet10/10, operational Transmit Flow Control state changed to off

2012 Oct 17 17:51:09 SITE1-AGG1 %ETH_PORT_CHANNEL-5-PORT_SUSPENDED:

Ethernet10/10: Ethernet10/10 is suspended

2012 Oct 17 17:51:51 SITE1-AGG1 last message repeated 1 time

2012 Oct 17 17:51:51 SITE1-AGG1 %ETHPORT-5-IF_DOWN_LINK_FAILURE:

Interface Ethernet10/10 is down (Link failure)

2012 Oct 17 17:51:52 SITE1-AGG1 %ETHPORT-5-SPEED: Interface Ethernet10/10,

operational speed changed to 10 Gbps

2012 Oct 17 17:51:52 SITE1-AGG1 %ETHPORT-5-IF_DUPLEX: Interface

Ethernet10/10, operational duplex mode changed to Full

2012 Oct 17 17:51:52 SITE1-AGG1 %ETHPORT-5-IF_RX_FLOW_CONTROL: Interface

Ethernet10/10, operational Receive Flow Control state changed to off

2012 Oct 17 17:51:52 SITE1-AGG1 %ETHPORT-5-IF_TX_FLOW_CONTROL: Interface

Ethernet10/10, operational Transmit Flow Control state changed to off

2012 Oct 17 17:51:55 SITE1-AGG1 %ETH_PORT_CHANNEL-5-PORT_UP: port-channel11:

Ethernet10/10 is up

2012 Oct 17 17:51:56 SITE1-AGG1 %ETHPORT-5-IF_UP: Interface Ethernet10/10

is up in mode trunk

儘可能使用debug-filter命令以最小化生產系統上的輸出。例如，封包遺失會導致單向連結偵測(UDLD)空回應：

switch# debug logfile test size 1000000

switch# debug-filter pktmgr direction inbound

switch# debug-filter pktmgr dest-mac 0100.0ccc.cccc

switch# debug pktmgr client uuid 376

switch# debug pktmgr frame

switch# debug pktmgr pkt-errors

switch# debug-filter ?

fabricpath  Debug fabricpath events

ip          IP events

ipv6        IPv6 events

l2pt        L2 Protocol Tunneling events

mpls        MPLS events

pktmgr      Pm debug-filter

routing     Routing events

流量導致CPU使用率高

當流量導致CPU使用率高時，請使用以下工具：

- Ethanalyzer — 監控進出該CPU的流量型別。

- Configuration — 檢查交換器/介面/功能組態

- CoPP/硬體速率限制器 — 確保CoPP和HWRL配置正確。有時CPU運行率不高，因為它受到CoPP和速率限制器的保護。檢查CoPP和HWRL，檢視某些流量/資料包是否存在丟包。

注意:CoPP和HWRL都只能從預設虛擬裝置環境(VDC)中獲得。它們由每個單獨的I/O模組實施。來自多個模組的聚合流量仍然會給CPU帶來沈重負擔。

高CPU使用率的根本原因分析

網路中斷可以通過使用者干預來解決，也可以自行恢復。如果您懷疑CPU使用率高導致了網路中斷，請使用以下原則調查原因。

症狀

CPU使用率高的症狀包括控制平面不穩定、由控制平面故障引起的資料平面連線問題、協定抖動(如熱待機路由器協定(HSRP)/RP抖動)、UDLD錯誤禁用、生成樹協定(STP)故障以及其他連線問題。

CPU歷史記錄

show processes cpu history命令

如果交換機未重新載入或切換，請在中斷後72小時內運行show processes cpu history命令，以檢視事件發生時是否出現CPU使用率較高的情況。

CoPP和HWRL

如果CPU使用率高是過去中斷的根本原因，並且您懷疑中斷是由網路流量觸發的，可以使用CoPP和HWRL（硬體速率限制器）來幫助識別流量型別。

show policy-map interface control-plane命令

以下是show policy-map interface control-plane命令的輸出示例：

switch# show policy-map interface control-plane

Control Plane

service-policy  input: copp-system-p-policy-strict

class-map copp-system-p-class-critical (match-any)

match access-group name copp-system-p-acl-bgp

match access-group name copp-system-p-acl-bgp6

match access-group name copp-system-p-acl-igmp

match access-group name copp-system-p-acl-msdp

match access-group name copp-system-p-acl-ospf

match access-group name copp-system-p-acl-pim

match access-group name copp-system-p-acl-pim6

match access-group name copp-system-p-acl-rip

match access-group name copp-system-p-acl-rip6

match access-group name copp-system-p-acl-vpc

match access-group name copp-system-p-acl-eigrp

match access-group name copp-system-p-acl-eigrp6

match access-group name copp-system-p-acl-mac-l2pt

match access-group name copp-system-p-acl-mpls-ldp

match access-group name copp-system-p-acl-mpls-oam

match access-group name copp-system-p-acl-ospf6

match access-group name copp-system-p-acl-otv-as

match access-group name copp-system-p-acl-mac-otv-isis

match access-group name copp-system-p-acl-mpls-rsvp

match access-group name copp-system-p-acl-mac-fabricpath-isis

match protocol mpls router-alert

match protocol mpls exp 6

set cos 7

police cir 39600 kbps , bc 250 ms

module 1 :

conformed 1108497274 bytes; action: transmit

violated 0 bytes; action: drop

module 3 :

conformed 0 bytes; action: transmit

violated 0 bytes; action: drop

module 10 :

conformed 0 bytes; action: transmit

.

.

.

show hardware rate-limiter mod <x>命令

以下是NX-OS版本6.1之前的show hardware rate-limiter mod 1命令的輸出示例：

switch# show hardware rate-limiter mod 1

Units for Config: packets per second

Allowed, Dropped & Total: aggregated since last clear counters

Rate Limiter Class                       Parameters

------------------------------------------------------------

layer-3 mtu                              Config    : 500

Allowed   : 0

Dropped   : 0

Total     : 0

layer-3 ttl                              Config    : 500

Allowed   : 0

Dropped   : 0

Total     : 0

layer-3 control                          Config    : 10000

Allowed   : 0

Dropped   : 0

.

.

.

以下是NX-OS 6.1版或更高版本中的show hardware rate-limiter mod 1命令的輸出示例：

switch# show hardware rate-limiter mod 1

switch# show hardware rate-limiter module 1

Units for Config: packets per second

Allowed, Dropped & Total: aggregated since last clear counters

Module: 1

R-L Class           Config           Allowed         Dropped            Total

+------------------+--------+---------------+---------------+-----------------+

L3 mtu                   500               0               0                 0

L3 ttl                   500               0               0                 0

L3 control             10000               0               0                 0

L3 glean                 100               0               0                 0

L3 mcast dirconn        3000               0               0                 0

L3 mcast loc-grp        3000               0               0                 0

L3 mcast rpf-leak        500               0               0                 0

L2 storm-ctrl       Disable

access-list-log          100               0               0                 0

copy                   30000               0               0                 0

receive                30000           40583               0             40583

L2 port-sec              500        20435006               0          20435006

L2 mcast-snoop         10000               0               0                 0

L2 vpc-low              4000               0               0                 0

L2 l2pt                  500               0               0                 0

f1 rl-1                 4500                               0

f1 rl-2                 1000                               0

f1 rl-3                 1000                               0

f1 rl-4                  100                               0

f1 rl-5                 1500                               0

L2 vpc-peer-gw          5000               0               0                 0

L2 lisp-map-cache       5000               0               0                 0

查詢丟棄計數遞增的任何類。找出超過所配置閾值的類是否正常。

帶內驅動程式

show hardware internal cpu-mac inband [counters | 統計資訊 | events]命令

使用以下命令檢查CPU路徑中的丟棄、XOFF流量控制、最大CPU接收和傳輸速率等。

switch# show hardware internal cpu-mac inband stats

i82571 registers

=======================================================

RMON counters                            Rx                   Tx

----------------------+--------------------+--------------------

total packets                      70563313            139905960

good packets                       70563313            139905960

64 bytes packets                          0                    0

65-127 bytes packets               66052368            135828505

128-255 bytes packets               1424632              1327796

256-511 bytes packets                280422               325220

512-1023 bytes packets                17060                14480

1024-max bytes packets              2788831              2409959

broadcast packets                         0                    0

multicast packets                         0                    0

good octets (hi)                          0                    0

good octets (low)               18573099828          25929913975

total octets (hi)                         0                    0

total octets (low)              18573090123          25929922452

XON packets                               0                    0

XOFF packets                              0                    0

-------------> Pause Frame back to R2D2 when the traffic exceeds SUP limit

management packets                        0                    0

Interrupt counters

-------------------+--

Mine                57079706

Other               0

Assertions          57079706

Rx packet timer     9638

Rx absolute timer   0

Rx overrun          0

Rx descr min thresh 0

Tx packet timer     4189

Tx absolute timer   6476

Tx queue empty      0

Tx descr thresh low 0

txdw ..... 44983549

txqe ..... 2

lsc ...... 0

rxseq .... 0

rxdmt .... 213229

rxo ...... 0

rxt ...... 32433891

mdac ..... 0

rxcfg .... 0

gpi ...... 0

Error counters

--------------------------------+--

CRC errors ..................... 0

Alignment errors ............... 0

Symbol errors .................. 0

Sequence errors ................ 0

RX errors ...................... 0

Missed packets (FIFO overflow)   0

Single collisions .............. 0

Excessive collisions ........... 0

Multiple collisions ............ 0

Late collisions ................ 0

Collisions ..................... 0

Defers ......................... 0

Tx no CRS  ..................... 0

Carrier extension errors ....... 0

Rx length errors ............... 0

FC Rx unsupported .............. 0

Rx no buffers .................. 0  ----------------- no buffer

Rx undersize ................... 0

Rx fragments ................... 0

Rx oversize .................... 0

Rx jabbers ..................... 0

Rx management packets dropped .. 0

Tx TCP segmentation context .... 0

Tx TCP segmentation context fail 0

Throttle statistics

-----------------------------+---------

Throttle interval ........... 2 * 100ms

Packet rate limit ........... 32000 pps

Rate limit reached counter .. 0

Tick counter ................ 2132276

Active ...................... 0

Rx packet rate (current/max)  169 / 610 pps  ----------------- Rx rate (current/max)

Tx packet rate (current/max)  429 / 926 pps

NAPI statistics

----------------+---------

Weight ......... 64

Poll scheduled . 57079706

Poll rescheduled 0

Poll invoked ... 117135124

Weight reached . 9

Tx packets ..... 139905960

Rx packets ..... 70563313

Rx congested ... 0

Rx redelivered . 0

qdisc stats:

----------------+---------

Tx queue depth . 1000

qlen ........... 0

packets ........ 139905960

bytes .......... 23411617016

drops .......... 0

Bahrain registers (cleared by chip reset only)

=======================================================

revision           0x00000108

scratchpad         0xaaaaaaaa

MAC status         0x00000001

MAC SerDes synced  0x00000001

MAC status 2       0x000100f8

Auto-XOFF config   1

Auto-XOFF status   0

MAC counters                     MAC0 (R2D2)            MAC1 (CPU)

----------------------+---------------------+---------------------

Rx         Tx         Rx         Tx

----------------------+----------+----------+----------+----------

64 bytes packets                0          0          0          0

65-127 bytes packets     66907289  136682635  135828505   66052368

128-255 bytes packets      570131     473705    1327796    1424632

256-511 bytes packets      280003     325182     325220     280422

512-1023 bytes packets      17061      14482      14480      17060

1024-1518 bytes packets    623614     242009     241831     623569

1519-max bytes packets    2165215    2167947    2168128    2165262

----------------------+----------+----------+----------+----------

total packets            70563313  139905960  139905960   70563313

total bytes             405350248 2496404376  160120520 1393236630

----------------------+----------+----------+----------+----------

undersized packets              0                     0

fragmented packets              0                     0

FCS errors                      0                     0

----------------------+----------+----------+----------+----------

auto-XOFF state entered         0 times

auto-XOFF reset                 0 times

XOFF packets auto-generated                0

XOFF packets                               0          0

XON  packets                    0                     0

----------------------+----------+----------+----------+----------

parity error                    0          0          0          0

fifo errors                     0                     0

overflow errors                            0                     0

----------------------+----------+----------+----------+----------

在NX-OS版本5.X之後，「events」是一個命令選項，用於提供達到每秒最大資料包(PPS)接收(RX)或傳輸(TX)CPU速率的時間。此範例顯示如何確定遇到最後一個CPU流量高峰的時間：

switch# show hardware internal cpu-mac inband events

1) Event:TX_PPS_MAX, length:4, at 648617 usecs after Fri Oct 19 13:23:06 2012

new maximum = 926

2) Event:TX_PPS_MAX, length:4, at 648622 usecs after Fri Oct 19 13:15:06 2012

new maximum = 916

3) Event:TX_PPS_MAX, length:4, at 648612 usecs after Fri Oct 19 13:14:06 2012

new maximum = 915

4) Event:TX_PPS_MAX, length:4, at 648625 usecs after Fri Oct 19 13:12:06 2012

new maximum = 914

5) Event:TX_PPS_MAX, length:4, at 648626 usecs after Fri Oct 19 13:11:06 2012

new maximum = 911

6) Event:TX_PPS_MAX, length:4, at 648620 usecs after Fri Oct 19 13:08:06 2012

new maximum = 910

show system internal pktmgr internal vdc inband <int>命令

使用此命令可以確定傳送到CPU的流量的來源。

switch# show system internal pktmgr internal vdc inband e1/5

Interface          Src Index     VDC ID    Packet rcvd

--------------------------------------------------------

Ethernet1/5          0xa1d          1          14640

Netstack/Pktmgr

Netstack是在Nexus 7000的使用者空間中實施的完整IP堆疊。元件包括L2資料包管理器、ARP、鄰接管理器、IPv4、網際網路控制消息協定v4(ICMPv4)、IPv6、ICMPv6、TCP/UDP和套接字型檔。當發往CPU的流量觸發CPU使用率較高時，您經常會看到Netstack及其各自的進程運行較高。

show system inband queuing status命令

此範例顯示如何顯示正在使用的Netstack佇列演演算法：

switch# show system inband queuing status

Weighted Round Robin Algorithm

Weights BPDU - 32, Q0 - 8, Q1 - 4, Q2 - 2 Q3 - 64

show system inband queuing statistics命令

此示例顯示可核心載入模組(KLM)和使用者空間進程中的計數器。

KLM是在預設VDC上運行並在帶內和管理介面上運行的單個例項。KLM僅在入口資料包處理期間進入圖片，以便將入口幀傳送到右側VDC Netstack進行處理。

switch# show system inband queuing statistics

Inband packets unmapped to a queue: 0

Inband packets mapped to bpdu queue: 7732593

Inband packets mapped to q0: 686667

Inband packets mapped to q1: 0

Inband packets mapped to q2: 0

Inband packets mapped to q3: 20128

In KLM packets mapped to bpdu: 7732593

In KLM packets mapped to arp : 912

In KLM packets mapped to q0  : 686667

In KLM packets mapped to q1  : 0

In KLM packets mapped to q2  : 0

In KLM packets mapped to q3  : 20128

In KLM packets mapped to veobc : 0

Inband Queues:

bpdu: recv 1554390, drop 0, congested 0 rcvbuf 2097152, sndbuf 262142 no drop 1

(q0): recv 686667, drop 0, congested 0 rcvbuf 2097152, sndbuf 262142 no drop 0

(q1): recv 0, drop 0, congested 0 rcvbuf 2097152, sndbuf 262142 no drop 0

(q2): recv 0, drop 0, congested 0 rcvbuf 2097152, sndbuf 262142 no drop 0

(q3): recv 20128, drop 0, congested 0 rcvbuf 2097152, sndbuf 262142 no drop 0

show system internal pktmgr internal vdc global-stats命令

此命令類似於前面的show system inband queuing statistics命令，提供了許多詳細資訊：

switch# show system internal pktmgr internal vdc global-stats

VDC KLM global statistics:

Inband packets not mapped to a VDC: 0

Inband diag packets received: 998222

Weighted Round Robin Algorithm

Weights BPDU - 32, Q0 - 8, Q1 - 4, Q2 - 2 Q3 - 64

Inband packets unmapped to a queue: 0

Inband packets mapped to bpdu queue: 7734430 (7734430)

Inband packets mapped to q0: 686779 (686779)

Inband packets mapped to q1: 0 (0)

Inband packets mapped to q2: 0 (0)

Inband packets mapped to q3: 20128 (20128)

Pkt Size History : 2811395 for index 1

Pkt Size History : 274508 for index 2

Pkt Size History : 74284 for index 3

Pkt Size History : 43401 for index 4

Pkt Size History : 70915 for index 5

Pkt Size History : 35602 for index 6

Pkt Size History : 30085 for index 7

Pkt Size History : 29408 for index 8

Pkt Size History : 21221 for index 9

Pkt Size History : 15683 for index 10

Pkt Size History : 13212 for index 11

Pkt Size History : 10646 for index 12

Pkt Size History : 9290 for index 13

Pkt Size History : 50298 for index 14

Pkt Size History : 5473 for index 15

Pkt Size History : 4871 for index 16

Pkt Size History : 4687 for index 17

Pkt Size History : 5507 for index 18

Pkt Size History : 15416 for index 19

Pkt Size History : 11333 for index 20

Pkt Size History : 5478 for index 21

Pkt Size History : 4281 for index 22

Pkt Size History : 3543 for index 23

Pkt Size History : 3059 for index 24

Pkt Size History : 2228 for index 25

Pkt Size History : 4390 for index 26

Pkt Size History : 19892 for index 27

Pkt Size History : 524 for index 28

Pkt Size History : 478 for index 29

Pkt Size History : 348 for index 30

Pkt Size History : 447 for index 31

Pkt Size History : 1545 for index 32

Pkt Size History : 152 for index 33

Pkt Size History : 105 for index 34

Pkt Size History : 1424 for index 35

Pkt Size History : 43 for index 36

Pkt Size History : 60 for index 37

Pkt Size History : 60 for index 38

Pkt Size History : 46 for index 39

Pkt Size History : 58 for index 40

Pkt Size History : 829 for index 41

Pkt Size History : 32 for index 42

Pkt Size History : 26 for index 43

Pkt Size History : 1965 for index 44

Pkt Size History : 21 for index 45

Pkt Size History : 1 for index 46

Pkt Size History : 1 for index 48

Pkt Size History : 1 for index 51

Pkt Size History : 1 for index 52

Pkt Size History : 1 for index 53

Pkt Size History : 3 for index 55

In KLM packets mapped to bpdu: 7734430

In KLM packets mapped to arp : 912

In KLM packets mapped to q0  : 686779

In KLM packets mapped to q1  : 0

In KLM packets mapped to q2  : 0

In KLM packets mapped to q3  : 20128

In KLM packets mapped to veobc : 0

In KLM Queue Mapping (0 1 2 3 4)

Data Available in FDs (0 0 0 0 0)

Inband Queues:

bpdu: recv 1556227, drop 0, congested 0 rcvbuf 2097152, sndbuf 262142 no drop 1

(q0): recv 686779, drop 0, congested 0 rcvbuf 2097152, sndbuf 262142 no drop 0

(q1): recv 0, drop 0, congested 0 rcvbuf 2097152, sndbuf 262142 no drop 0

(q2): recv 0, drop 0, congested 0 rcvbuf 2097152, sndbuf 262142 no drop 0

(q3): recv 20128, drop 0, congested 0 rcvbuf 2097152, sndbuf 262142 no drop 0

Mgmt packets not mapped to a VDC: 227551

Mgmt multicast packets dropped: 92365

Mgmt multicast packets delivered: 0

Mgmt packets broadcast to each VDC: 23119

Mgmt debugging packets copied:  0

Mgmt IPv6 multicast packets delivered:  0

Mgmt IPv6 link-local packets delivered:  0

Mgmt LLDP packets received: 0

show system internal pktmgr interface ethernet <int>命令

使用以下命令檢視來自介面的CPU傳出流量的封包速率和流量型別（單點傳送或多點傳送）。

switch# show system internal pktmgr interface e1/5

Ethernet1/5, ordinal: 73

SUP-traffic statistics: (sent/received)

Packets: 63503 / 61491

Bytes: 6571717 / 5840641

Instant packet rate: 0 pps / 0 pps

Packet rate limiter (Out/In): 0 pps / 0 pps

Average packet rates(1min/5min/15min/EWMA):

Packet statistics:

Tx: Unicast 3198, Multicast 60302

Broadcast 3

Rx: Unicast 3195, Multicast 58294

Broadcast 2

show system internal pktmgr client <uuid>命令

此命令顯示在Packet Manager中註冊的應用(例如STP或Cisco Discovery Protocol(CDP))以及這些應用傳送和接收的資料包數。

switch# show system internal pktmgr client

Client uuid: 268, 4 filters, pid 3127

Filter 1: EthType 0x0806,

Rx: 2650, Drop: 0

Filter 2: EthType 0xfff0, Exc 8,

Rx: 0, Drop: 0

Filter 3: EthType 0x8841, Snap 34881,

Rx: 0, Drop: 0

Filter 4: EthType 0x0800, DstIf 0x150b0000, Excl. Any

Rx: 0, Drop: 0

Options: TO 0, Flags 0x18040, AppId 0, Epid 0

Ctrl SAP: 278, Data SAP 337 (1)

Total Rx: 2650, Drop: 0, Tx: 1669, Drop: 0

Recirc Rx: 0, Drop: 0

Rx pps Inst/Max: 0/20

Tx pps Inst/Max: 0/5

COS=0 Rx: 0, Tx: 0    COS=1 Rx: 912, Tx: 0

COS=2 Rx: 0, Tx: 0    COS=3 Rx: 0, Tx: 0

COS=4 Rx: 0, Tx: 0    COS=5 Rx: 0, Tx: 1669

COS=6 Rx: 0, Tx: 0    COS=7 Rx: 1738, Tx: 0

Client uuid: 270, 1 filters, pid 3128

Filter 1: EthType 0x86dd, DstIf 0x150b0000, Excl. Any

Rx: 0, Drop: 0

Options: TO 0, Flags 0x18040, AppId 0, Epid 0

Ctrl SAP: 281, Data SAP 283 (1)

Total Rx: 0, Drop: 0, Tx: 0, Drop: 0

Recirc Rx: 0, Drop: 0

Rx pps Inst/Max: 0/0

Tx pps Inst/Max: 0/0

COS=0 Rx: 0, Tx: 0    COS=1 Rx: 0, Tx: 0

COS=2 Rx: 0, Tx: 0    COS=3 Rx: 0, Tx: 0

COS=4 Rx: 0, Tx: 0    COS=5 Rx: 0, Tx: 0

COS=6 Rx: 0, Tx: 0    COS=7 Rx: 0, Tx: 0

show system internal pktmgr stats命令

使用以下命令以檢查封包是否在輸入路徑中到達封包管理員，以及封包管理員是否正在將封包送出。此命令還可以幫助您確定接收或傳輸路徑中的緩衝區是否存在問題。

switch# show system internal pktmgr stats

Route Processor Layer-2 frame statistics

Inband driver: valid 1, state 0, rd-thr 1, wr-thr 0, Q-count 0

Inband sent: 56441521, copy_drop: 0, ioctl_drop: 0,

unavailable_buffer_hdr_drop: 0

Inband standby_sent: 0

Inband encap_drop: 0, linecard_down_drop: 0

Inband sent by priority [0=11345585,5=164281,6=43280117,7=1651538]

Inband max output queue depth 0

Inband recv: 89226232, copy_drop: 0, ioctl_drop: 0,

unavailable_buffer_hdr_drop: 0

Inband decap_drop: 0, crc_drop: 0, recv by priority: [0=89226232]

Inband bad_si 0, bad_if 0, if_down 0

Inband last_bad_si 0, last_bad_if 0, bad_di 0

Inband kernel recv 44438488, drop 0, rcvbuf 2097152, sndbuf 4194304

Mgmt driver: valid 1, state 0, rd-thr 1, wr-thr 0, Q-count 0

Mgmt sent: 971834, copy_drop: 0, ioctl_drop: 0,

unavailable_buffer_hdr_drop: 0

Mgmt standby_sent: 0

Mgmt encap_drop: 0, linecard_down_drop: 0

Mgmt sent by priority [0=925871,5=45963]

Mgmt max output queue depth 0

Mgmt recv: 1300932, copy_drop: 0, ioctl_drop: 0,

unavailable_buffer_hdr_drop: 0

Mgmt decap_drop: 0, crc_drop: 0, recv by priority: [0=1300932]

Mgmt bad_si 0, bad_if 0, if_down 0

Mgmt last_bad_si 0, last_bad_if 0, bad_di 0

Mgmt kernel recv 1300932, drop 0, rcvbuf 2097152, sndbuf 2097152

Inband2 driver: valid 0, state 1, rd-thr 0, wr-thr 0, Q-count 0

No of packets passed by   PM Policy database         876452

No of packets dropped by  PM Policy database         0

No of packets bypassed by PM Policy database         424480

No of packets dropped by  PM originating from kernel 0

MBUFSK Tx: 57413355 pkts (requested 57413355 denied 0), 62236110 mbufs

function invoked 57413355 denied 0/0 c/realloc 0/0

MBUFSK Rx: 90527161 pkts, 90527421 mbufs (requested 2388154951 denied 0)

function invoked 35132836

Global input drops: bad-interface 0, bad-encap 0, failed-decap 0,

no prot 42371

recv_encaptype_err 0, recv_decap_err 0,  recv_mac_mismatch 0, recv_no_client 0

recv_no_svi 0, recv_no_vlan 0,  recv_client_notreg 0, recv_enqueue_fail 0

Global output drops:

send_ifdown_fail 13, send_invalid_iod 0

send_invalid_vlan 0, send_security_drop 0  send_loopback_drop 0,

send_small_pkt_fail 0

send_vsl_err 0, send_dce_err 0,send_enqueue_fail 0, send_alloc_fail 0

DCE errors:

misc_err 0, lookup_err 0, encap_err 0, decap_err 0

Platform errors:

generic_encap_err 0, encap_err 0, decap_err 0

vlan_encap_err 0, vlan_decap_err 0

DC3HDR errors:

pkt_err 0, vlan_err 0, ifidx_err 0, portidx_err 0

RECIRC errors:

misc_err 0, lookup_err 0

Lcache errors:

init_err 0, timer_err 0

Stats errors:

misc_err 0, init_err 0, timer_err 0

Client errors:

alloc_err 0, pid_err 0, register_err 0,  unregister_err 0

add_err 0, delete_err 0, update_err 0

VDC errors:

alloc_err 0, set_err 0, update_err 0

Misc. errors:

mts_err 0, mbuf_err 0, drop_exception 0

invalid_drv_type 0, interface_err 0

eth_output_err 0, gre_err 0 otv_err 0

tunnel_6to4_err 0, mcec_err 0, invalid_gpc 0 invalid_ftag 0 invalid_l2_type :0

register_err 0, unregister_err 0, invalid_args 0, file_open_err 0

inband_err 0, vlan_err 0, pm_alloc_err 0, pm_ha_err 0, pm_init_err 0

arp_init_err 0, rtm_init_err 0, am_init_err 0, ui_init_err 0, mpls_init_err 0,

evc_init_err 0

sdb_err 95670, sdb_init_err 0

sysmgr_err 0, eth_span_err 0, buf_pool_err 0, feature_err 0

uuid2client_err 16, dot1q_drop 0, nfcache_init_err 0

Crossbar down drops : 0

Exception packets: mtu-fail 0, icmp-redirect 0, icmp-unreach 0, ttl 0

options 0, rpf 0, two-mcast-rpf 0, l3-bridge-drop 0

mcast-next-hop 0, municast 0

drop 0, acl-redirect 0, acl-redir-arp 0, acl-redir-dhcp 0

sup-shim-pkt 229385   Pkts recvd with peergway SUP DI 0

VPC Frame Statistics

VPC Mgr reg state 1, im-ext-sdb-state 1

Ingress BPDUs qualified for redirection 0

Ingress BPDUs redirected to peer 0

Egress BPDUs qualified for redirection 0

Egress BPDUs dropped due to remote down 0

Egress BPDUs redirected to peer 0

Ingress pkts qualified for peergateway tunneling 0

Ingress pkts tunneled to peer with peergateway conf 0

Peer-gw pkts tunneled tx :

From VPC+ leg 0, From VPC leg 0, From l2mp network 0

From orphan port in VPC+ 0, from orphan port in VPC 0

For ARP 0, IP 0, IPv6 0, unknown 0

Total Tunneled packets received from peer 0

Local delivery 0, Transmit down 0, peer-gw tunneled 0

Tunnel rx packets drop due to local vpc leg down 0

Peer-gw pkts tunneled rx :

From VPC+ leg 0, VPC leg 0, From l2mp network 0

From orphan port in VPC+ 0, from orphan port in VPC 0

For ARP 0, IP 0, IPv6 0, unknown 0

Error Statistics

VPC manager: uninit 0, library 0

Tunnel (ingress): non-mct rx 0, bad hdr 0, badpkts 0, non gpc peer 0

Tunnel (ingress): redirlooperror 0

Tunnel (egress): in-bpdu 0, e-bpdu 0, peer-gw 0

MBuf: alloc: 0, prepend: 0, pullup: 0

Invalid filter: 0

Peergw tunneling tx: invalid ftag 0, invalid swid 0

invalid iftype 0, invalid GPC of peer 0

Peergw tunneling rx: invalid msg subtype 0, invalid GPC of core 0

invalid GPC of peer 0, invalid svi 0

Unicast pkts which passed egress redirection check 0

statistics last reset 2w0d