目錄

簡介

背景資訊

常見原因

命令解決方案

顯示介面

show hardware internal statistics module pktflow dropped

連線模組 並顯示hardware internal qengine

其他命令

F2e資訊

show hardware internal errors mod

show hardware internal qengine vqi-map

show hardware queuing drops egress module （僅適用於F2e）

簡介

本檔案介紹Cisco Nexus 7000 F248系列(F2/F2e)線路卡輸入捨棄的原因和解決方案。輸入捨棄表示由於擁塞而在輸入佇列中捨棄的封包數。此數字包括尾部丟棄和加權隨機早期檢測(WRED)導致的丟包。

背景資訊

F2線卡將封包排入入口而非出口，並在所有輸入介面上實作虛擬輸出佇列(VOQ)，如此一來，擁塞的出口連線埠就不會影響導向其他出口連線埠的流量。在系統中廣泛使用VOQ有助於確保每個出口的最大吞吐量。一個輸出連線埠上的擁塞不會影響目的地為其他輸出介面的流量，因此可避免導致擁塞擴散的線路頭(HOL)封鎖。

VOQ還使用貸記和未貸記流量的概念。單播流量被分類為貸記流量；廣播、組播和未知的單點傳播流量被歸類為不可信流量。不可信流量不使用VOQ，流量在出口而非入口上排隊。如果輸入連線埠沒有將流量傳送到輸出連線埠的信用額，則輸入連線埠會緩衝直到獲得信用額。由於輸入連線埠緩衝區不深，可能會發生輸入捨棄情況。

常見原因

以下是輸入丟棄的常見原因：

- 交換連線埠分析器(SPAN)在F2線路卡上具有目的地連線埠，且其SPAN流量超過線路速率時，會發生輸入捨棄的最常見原因。最後，輸入連線埠會緩衝封包，導致輸入捨棄。

附註：{下一代I/O模組（如F2E、F3和M3）不易受導致SPAN目標埠內嵌和HOLB的入站埠超訂用情況的影響。SPAN }的准則和限制中也會註明這一點

- 設計不當（如10G的輸入頻寬和1G的輸出頻寬）會觸發F2硬體限制（HOL阻塞）。

- 如果來自多個埠的流量從同一介面（1G到1G或10G到10G介面）流出，則如果超過線路速率，可能會導致輸入埠上出現輸入丟棄情況。

- VLAN不匹配可能會導致輸入丟棄。使用show interface trunk命令以驗證兩台交換器是否轉送相同的VLAN。

命令解決方案

本節提供的資訊可用於對組態進行疑難排解。

附註：使用命令查詢工具(僅供已註冊客戶使用)可獲取本節中使用的命令的更多資訊。

輸出直譯器工具(僅供已註冊客戶使用)支援某些show命令。使用輸出直譯器工具來檢視show命令輸出的分析。

在以下範例中，Ethernet 2/1(Eth2/1)連線了一個主機，該主機接收兩個1Gbps流。Eth2/1運行於1G。Eth2/5和Eth2/9上的兩個流輸入。

show interface <ingress interface>

使用以下命令檢查介面的速度。如果輸入介面以10Gbps執行，而輸出介面以1Gbps執行，則很可能是HOL封鎖導致捨棄專案。

N7K1# show int eth2/5

Ethernet2/5 is up

admin state is up, Dedicated Interface

------

full-duplex, 1000 Mb/s

------

30 seconds input rate 588237960 bits/sec, 73524 packets/sec

30 seconds output rate 216 bits/sec, 0 packets/sec

Load-Interval #2: 5 minute (300 seconds)

input rate 588.56 Mbps, 73.52 Kpps; output rate 156.11 Mbps, 19.45 Kpps

RX

221333142 unicast packets  0 multicast packets  0 broadcast packets

221333128 input packets  221333169400 bytes

0 jumbo packets  0 storm suppression packets

0 runts  0 giants  0 CRC  0 no buffer

0 input error  0 short frame  0 overrun   0 underrun  0 ignored

0 watchdog  0 bad etype drop  0 bad proto drop  0 if down drop

0 input with dribble  11590977 input discard <-------

0 Rx pause

show hardware internal statistics module <x> pktflow dropped

多次運行此命令，以確定congestion_drop_bytes的值是否增加；x是輸入連線埠的模組編號。

attach module <x>和show hardware internal qengine

多次運行以下命令以識別虛擬隊列索引(VQI)編號：

attach module <x>

module-x# show hardware internal qengine voq-status |例如「0 0 0 0 0 0 0 0 0 0 0」

或

module-x# show hardware internal qengine inst 2 voq-status non-empty

在VQI上，您將看到非零計數器在不斷移動。在擁塞的連線埠上，計數器的使用時間通常都處於高位。

N7K1# attach module 2

Attaching to module 2 ...

To exit type 'exit', to abort type '$.'

module-2# show hardware internal qengine inst 2 voq-status non-empty

VQI:CCOS  BYTE_CNT  PKT_CNT  TAIL  HEAD  THR

--------  --------  -------  ----  ----  ---

0036:3    6154      3077     6804  14168 1 <------- VQI is 36 here

module-2# show hardware internal qengine voq-status | ex "0 0 0 0 0 0 0 0 0 0 0 0"

VQI:CCOS CLP0 CLP1 CLP2 CLP3 CLP4 CLP5 CLP6 CLP7 CLP8 CLP9 CLPA CLPB

-------- ---- ---- ---- ---- ---- ---- ---- ---- ---- ---- ---- ----

0036:3   0    0    0    0    0    0    0    1    0    0    0    0

VQI === 36

一旦您擁有VQI編號，請使用show hardware internal qengine vqi-map命令查詢VQI對映表。檢視插槽編號和低速資料介面(LDI)編號以確定輸出介面。（插槽也稱為模組，LDI也稱為埠。） 該模組基於零，對映函式可用於確定LDI。

module-2# show hardware internal qengine vqi-map

VQI   SUP  SLOT  LDI  EQI  FPOE  NUM  XBAR   IN   ASIC  ASIC  SV  FEA_

NUM   VQI  NUM   NUM  NUM  BASE  DLS  MASK   ORD  TYPE  IDX   ID  TURE

----  ---  ----  ---  ---  ----  ---  -----  ---  ----  ----  --  ----

--snip

36     no   1     0    0    8     1    0x155  0    CLP   0     0   0x81

--snip

LDI到物理埠對映：

LDI

連接埠

0

2

1

1

2

3

3

4

4

6

5

5

6

7

7

8

8

10

9

9

10

11

11

12

12

14

13

13

14

15

15

16

16

18

17

17

18

19

19

20

20

22

21

21

22

23

23

24

24

26

25

25

26

27

27

28

28

30

29

29

30

31

31

32

32

34

33

33

34

35

35

36

36

38

37

37

38

39

39

40

40

42

41

41

42

43

43

44

44

46

45

45

46

47

47

48

物理埠= Eth 2/2

通過show system internal ethpm info interface Eth2/2驗證VQI和LDI |包括VQI

測試說明中的擁塞埠是2/1，但列出的VQI是e2/2。出現差異的原因是出口緩衝區由埠組共用，該埠組是F2/F2e模組的4個埠組。埠1-4、5-8等是每個埠組的一部分。如果連線埠群組中的任何單一連線埠在輸出方向擁塞，則可能會對輸入連線埠造成背壓，導致輸入捨棄。

其他命令

如果您繼續注意到輸入丟棄情況，請多次運行以下命令：

- 顯示介面 |以Mbps為單位|乙太網

- show hardware internal statistics pktflow dropped

- show hardware internal statistics pktflow dropped congestion

- show hard internal statistics pktflow all

- show hardware internal error

- show hardware internal statistics device qengine

- show hard internal mac port 38 qos config

- show hard internal statis device mac all port 38

- attach module 1

- show hardware internal qengine voq-status

- show hardware internal qengine vqi-map

F2e資訊

在F2e上，有一個硬體內部錯誤計數器，指向具有擁塞出口介面的埠組/asic中第一個埠的VQI。

show hardware internal errors mod <x>

使用以下命令檢查模組中檢測到擁塞的次數。

N7K2# show hardware internal errors mod 1

|------------------------------------------------------------------------|

| Device:Clipper XBAR             Role:QUE                     Mod: 1    |

| Last cleared @ Wed Jul 10 14:51:56 2013

| Device Statistics Category :: CONGESTION

|------------------------------------------------------------------------|

Instance:1

ID    Name                                          Value             Ports

--    ----                                          -----             -----

16227 Num of times congestion detected on VQI 48    0000000000001296  5-8 -

Instance:2

ID    Name                                          Value             Ports

--    ----                                          -----             -----

16227 Num of times congestion detected on VQI 48    0000000000000590  9-12 -

Instance:3

ID    Name                                          Value             Ports

--    ----                                          -----             -----

16227 Num of times congestion detected on VQI 48    0000000000001213  13-16 -

show hardware internal qengine vqi-map

使用以下命令將VQI對映到物理介面。本示例使用上一個示例中的VQI 48。檢視插槽編號和LDI編號以確定輸出介面。該模組基於零，對映函式可用於確定LDI。

module-1# show hardware internal qengine vqi-map

VQI   SUP  SLOT  LDI  EQI  FPOE  NUM  XBAR   IN   ASIC  ASIC  SV  FEA_

NUM   VQI  NUM   NUM  NUM  BASE  DLS  MASK   ORD  TYPE  IDX   ID  TURE

----  ---  ----  ---  ---  ----  ---  -----  ---  ----  ----  --  ----

--snip

48    no   0     12   0    3     1    0x155  0    CLP   3     0   0x1

--snip

Module Number = SLOT NUM + 1  (zero-based)

Module Number = 0 + 1 = 1

Physical Port = Eth 1/14 (check the LDI to physical port mapping table)

Validate VQI and LDI via "show system internal ethpm info interface Eth1/14 | include VQI"

雖然VQI 48對映到Eth1/13，但請注意，埠組/asic中的第一個埠上報告了擁塞。由於一個埠組/asic中有四個埠，因此使用next命令顯示該埠組/asic中看到擁塞的實際介面。

show hardware queuing drops egress module <x>（僅適用於F2e）

使用以下命令以顯示實際輸出介面，此介面會在上例的VQI 48一部分的連線埠群組/asic上看到擁塞。

N7K2# show hardware queuing drops egress module 1

VQ Drops

--------------------------------------------------------------------------------

|    Output   |     VQ Drops     |  VQ Congestion   | Src | Src  |    Input    |

|  Interface  |                  |                  | Mod | Inst |  Interface  |

--------------------------------------------------------------------------------

|     Eth1/14 | 0000000000000000 | 0000000000001296 |   1 |    1 |    Eth1/5-8 |

|     Eth1/14 | 0000000000000000 | 0000000000000590 |   1 |    2 |   Eth1/9-12 |

|     Eth1/14 | 0000000000000000 | 0000000000001213 |   1 |    3 |  Eth1/13-16 |

|     Eth1/14 | 0000000000000000 | 0000000000000536 |   2 |    1 |    Eth2/5-8 |

|     Eth1/14 | 0000000000000000 | 0000000000000009 |   2 |    2 |   Eth2/9-12 |

|     Eth1/14 | 0000000000000000 | 0000000000000262 |   2 |    3 |  Eth2/13-16 |

--------------------------------------------------------------------------------