目錄

簡介

必要條件

需求

採用元件

慣例

命令輸出

netstat poolsize

netstat devlinks

netstat gate

netstat all

netstat conn

netstat home

相關資訊

簡介

本文檔提供netstat命令的示例命令輸出。

必要條件

需求

本文件沒有特定需求。

採用元件

本文件所述內容不限於特定軟體和硬體版本。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

命令輸出

netstat poolsize

netstat poolsize

MVS TCP/IP Netstat V2R2.1

TCPIP Free pool status:

Object       # alloc     # free      Lo-water    Permit size

======       =======     ======      ========    ===========

ACB            1000         997         993         100

CCB             150         129         129          10

Dat buf         160         157         157          32

Sm dat buf        0           0           0           1

Tiny dat buf      0           0           0           0

Env             750         750         730          75

Lrg env          50          49          49          10

RCB              50          50          50           3

SCB             256         237         236          17

SKCB            256         256         256          17

TCB             256         254         254          17

UCB             100         100          99           6

netstat devlinks

netstat devlinks

MVS TCP/IP Netstat V2R2.1

Device CIP1              Type: CLAW        Status: Ready

Queue size: 0            Address: 0580

Link CHIP1            Type: IP          Net number: 1

netstat gate

netstat gate

MVS TCP/IP Netstat V2R2.1

Known gateways:

NetAddress      FirstHop        Link     Pkt Sz  Subnet Mask     Subnet Value

----------      --------        ------   ------  -----------     ------------

Default         128.207.161.1   CHIP1    1500    {none}

128.207.0.0     {direct}        CHIP1    1500    0.0.255.0       0.0.161.0

netstat all

netstat all

MVS TCP/IP Netstat V2R2.1

Client: FTPSRVCE                       Last Touched:   1:52:31

Local Socket: *..FTP-C                 Foreign Socket: *..*

BackoffCount: 0

ClientRcvNxt: 0

ClientSndNxt: 526598377

CongestionWindow: 65535

Local connection name: 1001

Sender frustration level: Contented

Incoming window number: 0

Initial receive sequence number: 0

Initial send sequence number: 526598376

Maximum segment size: 536

Outgoing window number: 0

Precedence: Routine

RcvNxt: 0

Round-trip information:

Smooth trip time:   0.000

Smooth trip variance:   1.500

SlowStartThreshold: 65535

SndNxt: 526598376

SndUna: 526598376

SndWl1: 0

SndWl2: 0

SndWnd: 0

MaxSndWnd: 0

State: Listen

No pending TCP-receive

----

Client: INTCLIEN                       Last Touched:   1:52:39

Local Socket: *..TELNET                Foreign Socket: *..*

BackoffCount: 0

ClientRcvNxt: 0

ClientSndNxt: 524397177

CongestionWindow: 65535

Local connection name: 1000

Sender frustration level: Contented

Incoming window number: 0

Initial receive sequence number: 0

Initial send sequence number: 524397176

Maximum segment size: 536

Outgoing window number: 0

Precedence: Routine

RcvNxt: 0

Round-trip information:

Smooth trip time:   0.000

Smooth trip variance:   1.500

SlowStartThreshold: 65535

SndNxt: 524397176

SndUna: 524397176

SndWl1: 0

SndWl2: 0

SndWnd: 0

MaxSndWnd: 0

State: Listen

No pending TCP-receive

----

netstat conn

netstat conn

MVS TCP/IP Netstat V2R2.1

Active Transmission Blocks

User Id  Conn  Local Socket            Foreign Socket            State

---- --  ----  ----- ------            ------- ------            -----

FTPSRVCE 1001  *..FTP-C                *..*                      Listen

INTCLIEN 1000  *..TELNET               *..*                      Listen

netstat home

netstat home

MVS TCP/IP Netstat V2R2.1

Home address list:

Address            Link

-------            ------

128.207.161.2      CHIP1

相關資訊

- IBM/SNA和權杖環技術支援

- 技術支援與文件 - Cisco Systems